Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Configurazione

Esempio di rete

Configurazioni

N9K-1

N9K-2

Verifica

Informazioni correlate

Introduzione

In questo documento viene descritto come testare la connettività dell'infrastruttura tra due VTEP (Virtual Tunnel End Point) nella VLAN (Virtual Extensible LAN).

Prerequisiti

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

- Software Nexus NX-OS

- Border Gateway Protocol (BGP)

- VxLAN

Componenti usati

Il riferimento delle informazioni contenute in questo documento è Cisco Nexus N9K-C93180YC-EX con NXOS versione 10.3(3).

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Configurazione

Una volta configurata la VxLAN, gli utenti in genere desiderano verificare se funziona come previsto. Sebbene il modo consigliato per eseguire questa operazione sia un test ping tra due host terminali, connessi a VTEP diversi, è anche possibile testare la connettività della struttura utilizzando le interfacce di loopback sui VTEP.

Nota: L'utilizzo dell'interfaccia virtuale dello switch (SVI) come origine o destinazione del test ping non è un test valido per la connettività dell'infrastruttura. Il motivo è che disponiamo della stessa IP sulle SVI fabric a causa della funzionalità di Anycast Gateway.

Esempio di rete

Configurazioni

Nexus N9K-2 è configurato come SPINE, mentre N9K-1 e N9K-2 sono configurati come VTEP in questa implementazione VxLAN.

Il layer 3 è esteso, quindi abbiamo un VNI (Virtual Network Interface) di layer 3 su entrambi i VTEP per ciascun VRF (Virtual Routing and Forwarding).

Il VNI di layer 3 configurato per VRF evpn_a è 50100.

N9K-1

Passaggio 1. È necessario configurare un loopback come parte del VRF da testare.

N9K-1(config)# interface loopback50

N9K-1(config-if)# vrf member evpn_a

Message reported by command ::                 vrf member evpn_a

Warning: Deleted all L3 config on interface loopback50

N9K-1(config-if)# ip address 10.255.255.1/32

Passaggio 2. Il loopback viene pubblicizzato nel fabric. In caso contrario, anche se la richiesta ICMP raggiunge un dispositivo di destinazione, la destinazione stessa non sarà in grado di restituire la risposta ICMP.

N9K-1(config)# router bgp 65522

N9K-1(config-router)# vrf evpn_a

N9K-1(config-router-vrf)# address-family ipv4 unicast

N9K-1(config-router-vrf-af)# network 10.255.255.1/32

N9K-2

Passaggio 1. È necessario configurare un loopback come parte del VRF da testare.

N9K-2(config)# interface loopback50

N9K-2(config-if)# vrf member evpn_a

Message reported by command ::                 vrf member evpn_a

Warning: Deleted all L3 config on interface loopback50

N9K-2(config-if)# ip address 10.255.255.2/32

Passaggio 2. Il loopback viene pubblicizzato nel fabric. In caso contrario, anche se la richiesta ICMP raggiunge un dispositivo di destinazione, la destinazione stessa non sarà in grado di restituire la risposta ICMP.

N9K-2(config)# router bgp 65522

N9K-2(config-router)# vrf evpn_a

N9K-2(config-router-vrf)# address-family ipv4 unicast

N9K-2(config-router-vrf-af)# network 10.255.255.2/32

Verifica

Passaggio 1. Verificare che il loopback sia presente nella tabella BGP locale per la famiglia di indirizzi IPv4 Unicast.

N9K-1# show ip bgp 10.255.255.1/32 vrf evpn_a

BGP routing table information for VRF evpn_a, address family IPv4 Unicast

BGP routing table entry for 10.255.255.1/32, version 732

Paths: (1 available, best #1)

Flags: (0x80c0002) (high32 0x000020) on xmit-list, is not in urib, exported

vpn: version 1053, (0x00000000100002) on xmit-list

Multipath: eBGP iBGP

Advertised path-id 1, VPN AF advertised path-id 1

Path type: local, path is valid, is best path, no labeled nexthop, is extd

AS-Path: NONE, path locally originated

0.0.0.0 (metric 0) from 0.0.0.0 (10.2.254.100)

Origin IGP, MED not set, localpref 100, weight 32768

Extcommunity: RT:65522:50100

VRF advertise information:

Path-id 1 not advertised to any peer

VPN AF advertise information:

Path-id 1 not advertised to any peer

N9K-2# show ip bgp 10.255.255.2/32 vrf evpn_a

BGP routing table information for VRF evpn_a, address family IPv4 Unicast

BGP routing table entry for 10.255.255.2/32, version 241

Paths: (1 available, best #1)

Flags: (0x80c0002) (high32 0x000020) on xmit-list, is not in urib, exported

vpn: version 417, (0x00000000100002) on xmit-list

Multipath: eBGP iBGP

Advertised path-id 1, VPN AF advertised path-id 1

Path type: local, path is valid, is best path, no labeled nexthop, is extd

AS-Path: NONE, path locally originated

0.0.0.0 (metric 0) from 0.0.0.0 (10.2.254.100)

Origin IGP, MED not set, localpref 100, weight 32768

Extcommunity: RT:65522:50100

VRF advertise information:

Path-id 1 not advertised to any peer

VPN AF advertise information:

Path-id 1 not advertised to any peer

Passaggio 2. Verificare che il loopback sia presente nella tabella BGP locale per l'EVPN L2VPN della famiglia di indirizzi e venga annunciato ai peer NVE (Network Virtual Interface) previsti.

N9K-1# show bgp l2vpn evpn 10.255.255.1 vrf evpn_a

BGP routing table information for VRF default, address family L2VPN EVPN

Route Distinguisher: 10.2.0.49:4    (L3VNI 50100)

BGP routing table entry for [5]:[0]:[0]:[32]:[10.255.255.1]/224, version 36993

Paths: (1 available, best #1)

Flags: (0x000002) (high32 00000000) on xmit-list, is not in l2rib/evpn

Advertised path-id 1

Path type: local, path is valid, is best path, no labeled nexthop

Gateway IP: 0.0.0.0

AS-Path: NONE, path locally originated

10.2.1.49 (metric 0) from 0.0.0.0 (10.2.0.49)

Origin IGP, MED not set, localpref 100, weight 32768

Received label 50100

Extcommunity: RT:65522:50100 ENCAP:8 Router MAC:a0e0.af67.511d

Path-id 1 advertised to peers:

10.2.0.33          10.2.0.34

N9K-2#

LEAF48# show bgp l2vpn evpn 10.255.255.2 vrf evpn_a

BGP routing table information for VRF default, address family L2VPN EVPN

Route Distinguisher: 10.2.0.48:4    (L3VNI 50100)

BGP routing table entry for [5]:[0]:[0]:[32]:[10.255.255.2]/224, version 13373

Paths: (1 available, best #1)

Flags: (0x000002) (high32 00000000) on xmit-list, is not in l2rib/evpn

Advertised path-id 1

Path type: local, path is valid, is best path, no labeled nexthop

Gateway IP: 0.0.0.0

AS-Path: NONE, path locally originated

10.2.1.48 (metric 0) from 0.0.0.0 (10.2.0.48)

Origin IGP, MED not set, localpref 100, weight 32768

Received label 50100

Extcommunity: RT:65522:50100 ENCAP:8 Router MAC:6cb2.aeee.5a97

Path-id 1 advertised to peers:

10.2.0.33          10.2.0.34

Passaggio 3. Verificare che l'aggiornamento sia stato ricevuto dal peer NVE remoto.

N9K-1# show bgp l2vpn evpn 10.255.255.2 vrf evpn_a

BGP routing table information for VRF default, address family L2VPN EVPN

Route Distinguisher: 10.2.0.49:4    (L3VNI 50100)

BGP routing table entry for [5]:[0]:[0]:[32]:[10.255.255.2]/224, version 36995

Paths: (1 available, best #1)

Flags: (0x000002) (high32 00000000) on xmit-list, is not in l2rib/evpn, is not in HW

Advertised path-id 1

Path type: internal, path is valid, is best path, no labeled nexthop

Imported from 10.2.0.48:4:[5]:[0]:[0]:[32]:[10.255.255.2]/224

Gateway IP: 0.0.0.0

AS-Path: NONE, path sourced internal to AS

10.2.1.48 (metric 6) from 10.2.0.33 (10.2.0.33)

Origin IGP, MED not set, localpref 100, weight 0

Received label 50100

Extcommunity: RT:65522:50100 Route-Import:10.2.1.147:3100 Source AS:65522:0

ENCAP:8 Router MAC:6cb2.aeee.5a97

Originator: 10.2.0.48 Cluster list: 0.0.255.242

Path-id 1 not advertised to any peer

N9K-2# show bgp l2vpn evpn 10.255.255.1 vrf evpn_a

BGP routing table information for VRF default, address family L2VPN EVPN

Route Distinguisher: 10.2.0.48:4    (L3VNI 50100)

BGP routing table entry for [5]:[0]:[0]:[32]:[10.255.255.1]/224, version 13372

Paths: (1 available, best #1)

Flags: (0x000002) (high32 00000000) on xmit-list, is not in l2rib/evpn, is not in HW

Advertised path-id 1

Path type: internal, path is valid, is best path, no labeled nexthop

Imported from 10.2.0.49:4:[5]:[0]:[0]:[32]:[10.255.255.1]/224

Gateway IP: 0.0.0.0

AS-Path: NONE, path sourced internal to AS

10.2.1.49 (metric 6) from 10.2.0.33 (10.2.0.33)

Origin IGP, MED not set, localpref 100, weight 0

Received label 50100

Extcommunity: RT:65522:50100 Route-Import:10.2.1.49:3100 Source AS:65522:0

ENCAP:8 Router MAC:a0e0.af67.511d

Originator: 10.2.0.49 Cluster list: 0.0.255.242

Path-id 1 not advertised to any peer

Passaggio 4. Verificare che nella tabella di routing sia presente una route per il loopback remoto e che l'hop successivo sia il peer NVE previsto.

N9K-1# show ip route 10.255.255.2 vrf evpn_a

IP Route Table for VRF "evpn_a"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%

' in via output denotes VRF

10.255.255.2/32, ubest/mbest: 1/0

*via 10.2.1.48%default, [200/0], 00:12:39, bgp-65522, internal, tag 65522, segid: 50100 tunnelid: 0xa020130 encap: VXLAN

N9K-2# show ip route 10.255.255.1 vrf evpn_a

IP Route Table for VRF "evpn_a"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%

' in via output denotes VRF

10.255.255.1/32, ubest/mbest: 1/0

*via 10.2.1.49%default, [200/0], 00:15:36, bgp-65522, internal, tag 65522, segid: 50100 tunnelid: 0xa020131 encap: VXLAN

Passaggio 5. Inviare la richiesta ICMP al loopback remoto, utilizzando come origine il loopback locale.

N9K-1# ping 10.255.255.2 source-interface loopback 50

PING 10.255.255.2 (10.255.255.2): 56 data bytes

64 bytes from 10.255.255.2: icmp_seq=0 ttl=254 time=2.009 ms

64 bytes from 10.255.255.2: icmp_seq=1 ttl=254 time=1.26 ms

64 bytes from 10.255.255.2: icmp_seq=2 ttl=254 time=1.231 ms

64 bytes from 10.255.255.2: icmp_seq=3 ttl=254 time=1.142 ms

64 bytes from 10.255.255.2: icmp_seq=4 ttl=254 time=1.127 ms

--- 10.255.255.2 ping statistics ---

5 packets transmitted, 5 packets received, 0.00% packet loss

round-trip min/avg/max = 1.127/1.353/2.009 ms

N9K-2# ping 10.255.255.1 source-interface loopback 50

PING 10.255.255.1 (10.255.255.1): 56 data bytes

64 bytes from 10.255.255.1: icmp_seq=0 ttl=254 time=1.47 ms

64 bytes from 10.255.255.1: icmp_seq=1 ttl=254 time=1.396 ms

64 bytes from 10.255.255.1: icmp_seq=2 ttl=254 time=1.327 ms

64 bytes from 10.255.255.1: icmp_seq=3 ttl=254 time=1.451 ms

64 bytes from 10.255.255.1: icmp_seq=4 ttl=254 time=1.366 ms

--- 10.255.255.1 ping statistics ---

5 packets transmitted, 5 packets received, 0.00% packet loss

round-trip min/avg/max = 1.327/1.402/1.47 ms

Informazioni correlate

Configurazione di VXLAN BGP VPN