Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Configurazione

Esempio di rete

Configurazioni

VTEP-1

VTEP-2

Verifica

Output di esempio

VTEP-1

VTEP-2

Risoluzione dei problemi

Introduzione

Questo documento descrive la configurazione della VXLAN (Virtual Extensible LAN) Flood e fornisce informazioni sugli switch Nexus serie 7000.

Prerequisiti

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

- Nozioni base sul routing multicast, ad esempio Rendezvous Point (RP) e Platform Independent Multicast (PIM).

- Nozioni base sulle VXLAN

Nota: in questo documento si presume che il routing IP e il routing multicast siano stati stabiliti prima della configurazione della VXLAN.

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- N77-C7710

- N77-F348XP-23

- N77-F324FQ-25

Nota: N77K esegue la versione software 7.2(0)D1(1).

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Configurazione

Esempio di rete

Configurazioni

Queste configurazioni sono specifiche della parte VXLAN della configurazione. Queste configurazioni presuppongono la completa raggiungibilità di tutte le interfacce L3 nella topologia con il protocollo di routing scelto. Nell'esempio viene utilizzato il routing statico. Inoltre, si presume che il routing multicast sia stato stabilito sulle stesse interfacce L3

VTEP-1

feature pim

system bridge-domain 50,75

feature nv overlay

feature interface-vlan

feature vni

vni 5000

vni 7500

ip route 10.10.10.2/32 Ethernet10/1 192.168.1.2

ip pim rp-address 192.168.1.1 group-list 224.0.0.0/4

bridge-domain 50

bridge-domain 75

encapsulation profile vni VSI_50_TO_5000

dot1q 50  vni 5000

encapsulation profile vni VSI_75_TO_7500

dot1q 75  vni 7500

bridge-domain 50

member vni 5000

bridge-domain 75

member vni 7500

interface nve1

no shutdown

source-interface loopback10

member vni 5000 mcast-group 225.1.1.1

member vni 7500 mcast-group 227.1.1.1

interface Bdi50

no shutdown

ip address 10.50.50.50/24

interface Bdi75

no shutdown

ip address 10.75.75.75/24

interface Ethernet7/17

no switchport

no shutdown

service instance 1 vni

no shutdown

encapsulation profile VSI_50_TO_5000  default

service instance 2 vni

no shutdown

encapsulation profile VSI_75_TO_7500 default

interface Ethernet10/1

no switchport

ip address 192.168.1.1/30

ip pim sparse-mode

no shutdown

interface loopback10

ip address 10.10.10.1/32

ip pim sparse-mode

È importante notare che l'interfaccia interna sul VTEP (Vxlan Tunnel Endpoint) è configurata come porta di layer 3 (senza switchport). Tuttavia, non vi è alcun indirizzo IP assegnato. È anche importante notare che il valore BD definito sul VTEP non deve corrispondere all'ID vlan usato per inviare il traffico verso questo dispositivo. Tuttavia, il mapping da dot1q a VNI (Vxlan Network Identifier) definito nel profilo di incapsulamento, che viene chiamato nell'istanza del servizio sull'interfaccia interna, deve corrispondere all'ID Vlan.

VTEP-2

feature pim

system bridge-domain 50,75

feature nv overlay

feature interface-vlan

feature vni

vni 5000

vni 7500

ip route 10.10.10.1/32 Ethernet10/7 192.168.1.1

ip pim rp-address 192.168.1.1 group-list 224.0.0.0/4

bridge-domain 50

bridge-domain 75

encapsulation profile vni VSI_50_TO_5000

dot1q 50  vni 5000

encapsulation profile vni VSI_75_TO_7500

dot1q 75  vni 7500

bridge-domain 50

member vni 5000

bridge-domain 75

member vni 7500

interface nve1

no shutdown

source-interface loopback10

member vni 5000 mcast-group 225.1.1.1

member vni 7500 mcast-group 227.1.1.1

interface Bdi50

no shutdown

ip address 10.50.50.51/24

interface Bdi75

no shutdown

ip address 10.75.75.76/24

interface Ethernet7/30

no switchport

no shutdown

service instance 1 vni

no shutdown

encapsulation profile VSI_50_TO_5000  default

service instance 2 vni

no shutdown

encapsulation profile VSI_75_TO_7500 default

interface Ethernet10/7

no switchport

ip address 192.168.1.2/30

ip pim sparse-mode

no shutdown

interface loopback10

ip address 10.10.10.2/32

ip pim sparse-mode

È importante notare che l'interfaccia interna del VTEP è configurata come porta di layer 3 (senza switchport). Tuttavia, non vi è alcun indirizzo IP assegnato. È anche importante notare che il valore BD definito sul VTEP non deve corrispondere all'ID VLAN usato per inviare il traffico a questo dispositivo. Tuttavia, il mapping da dot1q a VNI definito nel profilo di incapsulamento, che viene chiamato nell'istanza del servizio sull'interfaccia interna, deve corrispondere all'ID Vlan.

Verifica

Fare riferimento a questa sezione per verificare che la configurazione funzioni correttamente.

Output di esempio

Questi output sono in stato stabile. I peer VTEP si sono scoperti a vicenda e il traffico è passato tra le due direzioni in Encrypt e Decapp.

VTEP-1

VTEP-1# show nve vni

Codes: CP - Control Plane        DP - Data Plane

UC - Unconfigured         SA - Suppress ARP

Interface VNI      Multicast-group   State Mode Type [BD/VRF]      Flags

--------- -------- ----------------- ----- ---- ------------------ -----

nve1      5000     225.1.1.1         Up    DP   L2 [50]

nve1      7500     227.1.1.1         Up    DP   L2 [75]

VTEP-1# show running-config interface nve 1

interface nve1

no shutdown

source-interface loopback10

member vni 5000 mcast-group 225.1.1.1

member vni 7500 mcast-group 227.1.1.1

VTEP-1# show service instance vni detail

VSI: VSI-Ethernet7/17.1

If-index: 0x35310001

Admin Status: Up

Oper Status: Up

Auto-configuration Mode: No

encapsulation profile vni VSI_50_TO_5000

dot1q 50 vni 5000

Dot1q   VNI     BD

------------------

50      5000    50

VSI: VSI-Ethernet7/17.2

If-index: 0x35310002

Admin Status: Up

Oper Status: Up

Auto-configuration Mode: No

encapsulation profile vni TEST

dot1q 100 vni 7500

Dot1q   VNI     BD

------------------

100     7500    75

VTEP-1# show bridge-domain

Bridge-domain 50  (2 ports in all)

Name:: Bridge-Domain50

Administrative State: UP               Operational State: UP

VSI-Eth7/17.1

vni5000

nve1

Bridge-domain 75  (2 ports in all)

Name:: Bridge-Domain75

Administrative State: UP               Operational State: UP

VSI-Eth7/17.2

vni7500

nve1

VTEP-1# show mac address-table dynamic

Note: MAC table entries displayed are getting read from software.

Use the 'hardware-age' keyword to get information related to 'Age'

Legend:

* - primary entry, G - Gateway MAC, (R) - Routed MAC, O - Overlay MAC

age - seconds since last seen,+ - primary entry using vPC Peer-Link, E -

EVPN entry

(T) - True, (F) - False ,  ~~~ - use 'hardware-age' keyword to retrieve

age info

VLAN/BD   MAC Address      Type      age     Secure NTFY Ports/SWID.SSID.LID

---------+-----------------+--------+---------+------+----+------------------

* 50       547f.eeec.af43    dynamic     ~~~      F    F  nve1/10.10.10.2

* 50       547f.eeec.af44    dynamic     ~~~      F    F  VSI-Eth7/17.1

* 50       547f.eeec.af45    dynamic     ~~~      F    F  nve1/10.10.10.2

* 75       547f.eeec.af44    dynamic     ~~~      F    F  VSI-Eth7/17.2

* 75       547f.eeec.af45    dynamic     ~~~      F    F  nve1/10.10.10.2

VTEP-1# show ip mroute detail

IP Multicast Routing Table for VRF "default"

Total number of routes: 7

Total number of (*,G) routes: 2

Total number of (S,G) routes: 4

Total number of (*,G-prefix) routes: 1

(*, 225.1.1.1/32), uptime: 19:51:28, nve(1) ip(0) pim(1)

Data Created: No

VXLAN Flags

VXLAN Encap

Stats: 0/0 [Packets/Bytes], 0.000   bps

Incoming interface: Ethernet10/1, RPF nbr: 1.1.1.1

Outgoing interface list: (count: 2)

Ethernet10/1, uptime: 19:51:09, pim, (RPF)

nve1, uptime: 19:51:28, nve

(10.10.10.1/32, 225.1.1.1/32), uptime: 19:51:28, nve(0) mrib(0) ip(0) pim(1)

Data Created: No

Received Register stop

VXLAN Flags

VXLAN Encap

Stats: 19/2274 [Packets/Bytes], 0.000   bps

Incoming interface: loopback10, RPF nbr: 10.10.10.1, internal

Outgoing interface list: (count: 1)

Ethernet10/1, uptime: 19:51:09, pim

(10.10.10.2/32, 225.1.1.1/32), uptime: 18:10:06, pim(1) mrib(1) ip(0)

Data Created: Yes

VXLAN Flags

VXLAN Decap

Stats: 9/846 [Packets/Bytes], 0.000   bps

Incoming interface: Ethernet10/1, RPF nbr: 1.1.1.2, internal

Outgoing interface list: (count: 2)

Ethernet10/1, uptime: 01:00:32, pim, (RPF)

nve1, uptime: 18:10:06, mrib

(*, 227.1.1.1/32), uptime: 12:52:13, nve(1) ip(0) pim(1)

Data Created: No

VXLAN Flags

VXLAN Encap

Stats: 0/0 [Packets/Bytes], 0.000   bps

Incoming interface: Ethernet10/1, RPF nbr: 1.1.1.1

Outgoing interface list: (count: 2)

Ethernet10/1, uptime: 12:51:52, pim, (RPF)

nve1, uptime: 12:52:13, nve

(10.10.10.1/32, 227.1.1.1/32), uptime: 12:52:13, nve(0) mrib(0) ip(0) pim(1)

Data Created: No

Received Register stop

VXLAN Flags

VXLAN Encap

Stats: 300/39850 [Packets/Bytes], 0.000   bps

Incoming interface: loopback10, RPF nbr: 10.10.10.1, internal

Outgoing interface list: (count: 1)

Ethernet10/1, uptime: 12:51:52, pim

(10.10.10.2/32, 227.1.1.1/32), uptime: 12:51:34, pim(1) mrib(1) ip(0)

Data Created: Yes

VXLAN Flags

VXLAN Decap

Stats: 22/1928 [Packets/Bytes], 0.000   bps

Incoming interface: Ethernet10/1, RPF nbr: 1.1.1.2, internal

Outgoing interface list: (count: 2)

Ethernet10/1, uptime: 00:52:14, pim, (RPF)

nve1, uptime: 12:51:34, mrib

(*, 232.0.0.0/8), uptime: 20:56:33, pim(0) ip(0)

Data Created: No

Stats: 0/0 [Packets/Bytes], 0.000   bps

Incoming interface: Null, RPF nbr: 0.0.0.0

Outgoing interface list: (count: 0)

VTEP-1# show ip arp

Flags: * - Adjacencies learnt on non-active FHRP router

+ - Adjacencies synced via CFSoE

# - Adjacencies Throttled for Glean

D - Static Adjacencies attached to down interface

IP ARP Table for context default

Total number of entries: 4

Address         Age       MAC Address     Interface

10.50.50.1      00:11:32  547f.eeec.af44  Bdi50

10.50.50.2      00:11:14  547f.eeec.af44  Bdi50

10.75.75.1      00:10:45  547f.eeec.af44  Bdi75

10.75.75.2      00:15:04  547f.eeec.af45  Bdi75

192.168.1.2     00:05:39  547f.eeec.af43  Ethernet10/1

VTEP-1# show ip route

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

192.168.1.0/30, ubest/mbest: 1/0, attached

*via 1.1.1.1, Eth10/1, [0/0], 20:25:13, direct

192.168.1.1/32, ubest/mbest: 1/0, attached

*via 1.1.1.1, Eth10/1, [0/0], 20:25:13, local

10.10.10.1/32, ubest/mbest: 2/0, attached

*via 10.10.10.1, Lo10, [0/0], 20:25:45, local

*via 10.10.10.1, Lo10, [0/0], 20:25:45, direct

10.10.10.2/32, ubest/mbest: 1/0

*via 1.1.1.2, Eth10/1, [1/0], 20:23:42, static

50.50.50.0/24, ubest/mbest: 1/0, attached

*via 50.50.50.50, Bdi50, [0/0], 01:18:47, direct

50.50.50.50/32, ubest/mbest: 1/0, attached

*via 50.50.50.50, Bdi50, [0/0], 01:18:47, local

75.75.75.0/24, ubest/mbest: 1/0, attached

*via 75.75.75.75, Bdi75, [0/0], 01:10:05, direct

75.75.75.75/32, ubest/mbest: 1/0, attached

*via 75.75.75.75, Bdi75, [0/0], 01:10:05, local

Nota: Tutti questi output sono stati raccolti con una mesh completa del traffico che scorre tra tutti gli host nella topologia.

VTEP-2

VTEP-2# show nve vni

Codes: CP - Control Plane        DP - Data Plane

UC - Unconfigured         SA - Suppress ARP

Interface VNI      Multicast-group   State Mode Type [BD/VRF]      Flags

--------- -------- ----------------- ----- ---- ------------------ -----

nve1      5000     225.1.1.1         Up    DP   L2 [50]

nve1      7500     227.1.1.1         Up    DP   L2 [75]

VTEP-2# show running-config interface nve 1

interface nve1

no shutdown

source-interface loopback10

member vni 5000 mcast-group 225.1.1.1

member vni 7500 mcast-group 227.1.1.1

VTEP-2# show service instance vni detail

VSI: VSI-Ethernet7/30.1

If-index: 0x3531d001

Admin Status: Up

Oper Status: Up

Auto-configuration Mode: No

encapsulation profile vni VSI_50_TO_5000

dot1q 50 vni 5000

Dot1q   VNI     BD

------------------

50      5000    50

VSI: VSI-Ethernet7/30.2

If-index: 0x3531d002

Admin Status: Up

Oper Status: Up

Auto-configuration Mode: No

encapsulation profile vni TEST

dot1q 100 vni 7500

Dot1q   VNI     BD

------------------

100     7500    75

VTEP-2# show bridge-domain

Bridge-domain 50  (2 ports in all)

Name:: Bridge-Domain50

Administrative State: UP               Operational State: UP

vni5000

VSI-Eth7/30.1

nve1

Bridge-domain 75  (2 ports in all)

Name:: Bridge-Domain75

Administrative State: UP               Operational State: UP

vni7500

VSI-Eth7/30.2

nve1

VTEP-2# show mac address-table dynamic

Note: MAC table entries displayed are getting read from software.

Use the 'hardware-age' keyword to get information related to 'Age'

Legend:

* - primary entry, G - Gateway MAC, (R) - Routed MAC, O - Overlay MAC

age - seconds since last seen,+ - primary entry using vPC Peer-Link, E -

EVPN entry

(T) - True, (F) - False ,  ~~~ - use 'hardware-age' keyword to retrieve

age info

VLAN/BD   MAC Address      Type      age     Secure NTFY Ports/SWID.SSID.LID

---------+-----------------+--------+---------+------+----+------------------

* 50       547f.eeec.af44    dynamic     ~~~      F    F  nve1/10.10.10.1

* 50       547f.eeec.af45    dynamic     ~~~      F    F  VSI-Eth7/30.1

* 75       547f.eeec.af45    dynamic     ~~~      F    F  VSI-Eth7/30.2

* 75       547f.eeec.af48    dynamic     ~~~      F    F  nve1/10.10.10.1

VTEP-2# show ip mroute detail

IP Multicast Routing Table for VRF "default"

Total number of routes: 5

Total number of (*,G) routes: 2

Total number of (S,G) routes: 2

Total number of (*,G-prefix) routes: 1

(*, 225.1.1.1/32), uptime: 19:56:19, nve(1) ip(0) pim(0)

Data Created: No

VXLAN Flags

VXLAN Encap

Stats: 8/748 [Packets/Bytes], 0.000   bps

Incoming interface: Ethernet10/7, RPF nbr: 1.1.1.1

Outgoing interface list: (count: 1)

nve1, uptime: 19:56:19, nve

(10.10.10.2/32, 225.1.1.1/32), uptime: 19:56:19, nve(0) mrib(0) pim(1) ip(0)

Data Created: No

Received Register stop

VXLAN Flags

VXLAN Encap

Stats: 9/834 [Packets/Bytes], 0.000   bps

Incoming interface: loopback10, RPF nbr: 10.10.10.2

Outgoing interface list: (count: 1)

Ethernet10/7, uptime: 18:15:17, pim

(*, 227.1.1.1/32), uptime: 12:57:03, nve(1) ip(0) pim(0)

Data Created: No

VXLAN Flags

VXLAN Encap

Stats: 10/864 [Packets/Bytes], 0.000   bps

Incoming interface: Ethernet10/7, RPF nbr: 1.1.1.1

Outgoing interface list: (count: 1)

nve1, uptime: 12:57:03, nve

(10.10.10.2/32, 227.1.1.1/32), uptime: 12:57:03, nve(0) mrib(0) ip(0) pim(1)

Data Created: No

Received Register stop

VXLAN Flags

VXLAN Encap

Stats: 30/2648 [Packets/Bytes], 0.000   bps

Incoming interface: loopback10, RPF nbr: 10.10.10.2

Outgoing interface list: (count: 1)

Ethernet10/7, uptime: 12:56:45, pim

(*, 232.0.0.0/8), uptime: 18:20:36, pim(0) ip(0)

Data Created: No

Stats: 0/0 [Packets/Bytes], 0.000   bps

Incoming interface: Null, RPF nbr: 0.0.0.0

Outgoing interface list: (count: 0)

VTEP-2# show ip arp

Flags: * - Adjacencies learnt on non-active FHRP router

+ - Adjacencies synced via CFSoE

# - Adjacencies Throttled for Glean

D - Static Adjacencies attached to down interface

IP ARP Table for context default

Total number of entries: 4

Address         Age       MAC Address     Interface

10.50.50.1      00:11:30  547f.eeec.af44  Bdi50

10.50.50.2      00:17:07  547f.eeec.af45  Bdi50

10.75.75.1      00:04:14  547f.eeec.af45  Bdi75

10.75.75.2      00:03:24  547f.eeec.af45  Bdi75

192.168.1.1     00:10:52  547f.eeec.af48  Ethernet10/7

VTEP-2# show ip route

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

192.168.1.0/30, ubest/mbest: 1/0, attached

*via 1.1.1.2, Eth10/7, [0/0], 20:30:24, direct

192.168.1.2/32, ubest/mbest: 1/0, attached

*via 1.1.1.2, Eth10/7, [0/0], 20:30:24, local

10.10.10.1/32, ubest/mbest: 1/0

*via 1.1.1.1, Eth10/7, [1/0], 20:29:48, static

10.10.10.2/32, ubest/mbest: 2/0, attached

*via 10.10.10.2, Lo10, [0/0], 20:29:39, local

*via 10.10.10.2, Lo10, [0/0], 20:29:39, direct

50.50.50.0/24, ubest/mbest: 1/0, attached

*via 50.50.50.51, Bdi50, [0/0], 01:22:50, direct

50.50.50.51/32, ubest/mbest: 1/0, attached

*via 50.50.50.51, Bdi50, [0/0], 01:22:50, local

75.75.75.0/24, ubest/mbest: 1/0, attached

*via 75.75.75.76, Bdi75, [0/0], 01:14:50, direct

75.75.75.76/32, ubest/mbest: 1/0, attached

*via 75.75.75.76, Bdi75, [0/0], 01:14:50, local

Nota: Tutti questi output sono stati raccolti con una mesh completa del traffico che scorre tra tutti gli host nella topologia.

Risoluzione dei problemi

Al momento non sono disponibili informazioni specifiche per la risoluzione dei problemi di questa configurazione.