Sommario

Introduzione

Premesse

Scenario

ID bug Cisco correlati

Introduzione

In questo documento viene descritto uno scenario OTV (Overlay Transport Virtualization) comune in cui la VLAN del sito non è online o il dispositivo AED (Authoritative Edge Device) non inoltra un set di VLAN e la procedura per risolvere il problema.

Premesse

In questo documento si presume che sia stata eseguita un'installazione con più AED per i sistemi OTV unicast o multicast.

Scenario

L'AED non diventa attivo per una VLAN.

1. Immettere il comando show otv e verificare la presenza di errori. Ad esempio, 'ID-sito non corrispondente' è un problema.

2. Immettere il comando show otv site e confermare 'System-ID'.
Questa opzione viene usata per selezionare l'AED e sapere cosa deve essere attivo per ciascuna VLAN.

RTP-OTV1# show otv site

[snip]

System-ID 8478.ac0b.6044

Site-Identifier aaaa.aaaa.aaaa

Site-VLAN 6 State is Up

Site Information for Overlay1:

Local device is AED-Capable

Neighbor Edge Devices in Site: 1

Hostname   System-ID   Adjacency-   Adjacency-     AED-

State     Uptime         Capable

-------------------------------------------------------------

RTP-OTV1  8478.ac0c.7b44   Full       1w6d           Yes

3. Verificare che la VLAN del sito sia la stessa in entrambi i contesti di dispositivo virtuale (VDC) OTV del sito.
Nexus-otv# show run | in "site-vlan"

otv site-vlan 7

La procedura ottimale è utilizzare VLAN di sito diverse per sito.

4. Verificare lo stato Spanning Tree Protocol (STP) della VLAN di sito su tutti gli switch del percorso tra VDC OTV. Deve essere inoltrata alle porte di layer 2 (L2) all'agg e l'agg deve avere le sue porte inoltrate anche tra VDC.
Nexus-otv# show spanning-tree vlan 7

[snip]

Interface        Role Sts Cost      Prio.Nbr Type

---------------- ---- --- --------- -------- --------------------------------

Po1              Root FWD 1         128.4096 Network P2p

5. Controllare la cronologia degli eventi per verificare che gli host provengano dall'altro AED sul sito locale attraverso la sovrimpressione e la VLAN del sito e che l'AED locale ne invii due.
RTP-OTV1# show otv isis internal event-history iih | in "IIH"

2015 Mar 26 14:35:09.227474 isis_otv default [14312]: [14321]:

Send L1 LAN IIH over Overlay1 len 1397    prio6,dmac 0100.0cdf.dfdf

2015 Mar 26 14:35:08.803200 isis_otv default [14312]: [14325]:

Receive L1 LAN IIH over Overlay1 from      SJ-OTV1 (8478.ac0c.7b47) len 1397 prio 7

2015 Mar 26 14:35:08.434157 isis_otv default [14312]: [14325]:

Receive L1 LAN IIH over site-vlan from    RTP-OTV1 (8478.ac0c.7b44) len 1497 prio 7

2015 Mar 26 14:35:08.345369 isis_otv default [14312]:

[14321]: Send L1 LAN IIH over site-vlan len 1497    prio6,dmac 0100.0cdf.dfdf

Nota: Se la VLAN del sito è la stessa su entrambi i siti e i pacchetti Hello vengono scambiati da un sito all'altro, OTV rileva l'ID del sito diverso e disattiva le VLAN per arrestare un sito. Questa operazione viene completata per evitare un loop L2. Immettere il comando show otv output per la verifica. In questo caso, dovrebbe essere visualizzato il messaggio "Site-ID mismatch" (ID sito non corrispondente). Per risolvere il problema, è possibile modificare la VLAN del sito o arrestare il loop prima della VLAN del sito. L'AED può quindi essere menzionato.

6. Controllare le statistiche per verificare se gli helper vengono ricevuti nei contatori.
RTP-OTV1# show otv isis site statistics | begin PDU

OTV-IS-IS PDU statistics for site-vlan:

PDU         Received     Sent          RcvAuthErr    OtherRcvErr   ReTransmit

LAN-IIH     91697        91700             0              0             n/a <<<<<<

RTP-OTV2# show otv isis traffic

OTV-IS-IS process: default

VPN: Overlay1

OTV-IS-IS Traffic:

PDU           Received     Sent    RcvAuthErr  OtherRcvErr ReTransmit

LAN-IIH        85530   23298                0               0           n/a <<<<<<

7. Verificare che i numeri ordinali siano assegnati correttamente:
////////////////////////////////////// Note //////////////////////////////////////

Lower IS-IS System-ID (Ordinal 0) = AED for EVEN VLANs

Higher IS-IS System-ID (Ordinal 1) = AED for ODD VLANs

//////////////////////////////////////////////////////////////////////////////////

RTP-OTV1# show otv internal site

Group:239.1.1.1 Queue-size:2 num_site_adjs:2 fwd_rdy_cnt:2 local-present:1

System-ID           Up Time   Ordinal  Fwd-Rdy

8478.ac0b.6044      1w6d       0        1

* 8478.ac0c.7b44  1w6d       1        1 <<<<< active for ordinal 1,

so this VDC should be AED for odd VLANs

RTP-OTV2# show otv internal site

Group:239.1.1.1 Queue-size:2 num_site_adjs:2 fwd_rdy_cnt:0 local-present:1

System-ID            Up Time   Ordinal  Fwd-Rdy

* 8478.ac0b.6044  1w6d       0        1 <<<< active for ordinal 0,

so this VDC should be AED for even VLANs

8478.ac0c.7b44       1w6d       0        1

RTP-OTV1# show otv vlan

OTV Extended VLANs and Edge Device State Information (* - AED)

Legend:

(NA) - Non AED, (VD) - Vlan Disabled, (OD) - Overlay Down

(DH) - Delete Holddown, (HW) - HW: State Down

(NFC) - Not Forward Capable

VLAN   Auth. Edge Device      Vlan State     Overlay

---- -------------------- ----------- -------

190     RTP-OTV2               inactive(NA)  Overlay1

191*    RTP-OTV1              active           Overlay1 <<< This AED

is active for odd vlans as expected

Nota: quando si esaminano gli ordinali, tenere presente l'ID bug Cisco CSCur30401!

ID bug Cisco correlati

- ID bug Cisco CSCum54509 - Versione 6.2(6), adiacenza del sito bloccata in stato parziale perché i pacchetti scheda di linea serie F destinati a 100.0cdf.dfdf non vengono trasmessi a Bridge Domain (BD)

- Cisco bug ID CSCur30401 - L'ordinale in 'show otv site detail' è 0 per tutti gli switch