Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Premesse

Visualizza

Configurazione

Verifica

Informazioni correlate

Introduzione

In questo documento viene descritta la configurazione iniziale e la procedura di verifica per configurare lo switch Catalyst 9600.

Prerequisiti

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

Verificare che lo chassis e il Supervisor siano installati come indicato nelle guide all'installazione.

- Guida all'installazione dello chassis

- Guida all'installazione del Supervisor

Componenti usati

Le informazioni di questo documento si basano sulle seguenti versioni software e hardware:

- Hardware: Catalyst 9600 Switch

- Software: Cisco IOS® XE 16.12.3a

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Premesse

È possibile avviare, configurare e verificare Catalyst 9600 in tre passaggi.

Visualizza

- Collegare la console

- Accendere il sistema

- Osserva messaggi della console

- Seleziona opzione della finestra di dialogo di configurazione

Configurazione

- Gestione dispositivi

- Nome host

- Orologio

- Salvare la configurazione

Verifica

- Versione e pacchetto software

- Hardware di sistema, alimentazione e così via.

- Connettività IP di gestione

- Integrità del sistema

- Ora

Visualizza

- Collegamento del PC alla console di Catalyst 9600 con RJ45 o USB

- Accendere il sistema

- Osserva la console stampa sullo schermo l'inizializzazione dell'hardware del sistema e altre informazioni

Avvio iniziale:

Initializing Hardware...

Initializing Hardware......

System Bootstrap, Version 17.3.1r[FC2], RELEASE SOFTWARE (P)

Compiled 30-04-2020 12:00:00.00 by rel

Current ROMMON image : Primary Rommon Image

Last reset cause:LocalSoft

C9600-SUP-1 platform with 16777216 Kbytes of main memory

Preparing to autoboot. [Press Ctrl-C to interrupt]  0

boot: attempting to boot from [bootflash:packages.conf]

boot: reading file packages.conf

<truncated

###########################################################################

<truncated>

Base Ethernet MAC Address          : 6c:b2:ae:4a:70:c0

Motherboard Assembly Number        : 4C57

Motherboard Serial Number          : FXS230103TN

Model Revision Number              : V02

Motherboard Revision Number        : 3

Model Number                       : C9606R

System Serial Number               : FXS2302Q2EP

Attendere che venga visualizzata la finestra di dialogo Configurazione di sistema. Selezionare l'opzione No per accedere alla modalità di configurazione manuale e selezionare Yes (Sì) per interrompere l'installazione automatica e accedere alla configurazione manuale semplice.

--- System Configuration Dialog ---

Would you like to enter the initial configuration dialog? [yes/no]: no

Would you like to terminate autoinstall? [yes]: yes

Press RETURN to get started

*Nov  5 15:40:26.909: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan1, changed state to down

*Nov  5 15:40:26.909: %LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEthernet0/0, changed state to down

Configurazione

Nota: Usare il comando show running-config in qualsiasi momento in modalità "abilitazione" per controllare i valori configurati.

Configurare la porta di gestione con un indirizzo IP della rete e abilitare la porta.

Switch#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Switch(config)#interface gigabitEthernet 0/0

Switch(config-if)#ip address 10.122.186.8 255.255.255.240

Switch(config-if)#no shutdown

Configurare una route statica per raggiungere il gateway predefinito per la rete di gestione, utilizzare l'IP e il gateway della rete.

Switch(config)#ip route vrf Mgmt-vrf 10.122.157.250 255.255.255.255 10.122.186.1

Configurare Line VTY, Virtual Terminal, per accedere tramite telnet e impostare una password a scelta.

Switch(config)#line vty 0 4

Switch(config-line)#password cisco

Switch(config-line)#login

Transport input all consente tutti i protocolli (es. ssh, telnet) per accedere al dispositivo tramite sessioni VTY.

Switch(config-line)#transport input all

Switch(config-line)#exit

Configurare la password in modalità utente per l'accesso alla console.

Switch(config)#line console 0

Switch(config-line)#password cisco

Switch(config-line)#login

Switch(config-line)#exit

Configurare una password per la modalità di abilitazione avanzata.

Switch(config)#enable secret cisco

Impostare l'orologio di sistema.

Switch(config)#clock timezone utc +5 30

*Nov 6 04:34:58.910: %SYS-6-CLOCKUPDATE: System clock has been updated from 10:05:58 utc Fri Nov 6 2020 to 10:04:58 utc Fri Nov 6 2020, configured from console by console.

*Nov 6 04:35:59.634: %SYS-5-CONFIG_I: Configured from console by console

Switch#clock set 04:30:00 6 Nov 2020

*Nov 5 23:00:00.000: %SYS-6-CLOCKUPDATE: System clock has been updated from 10:06:19 utc Fri Nov 6 2020 to 04:30:00 utc Fri Nov 6 2020, configured from console by console.

Nov 5 23:00:00.000: %PKI-6-AUTHORITATIVE_CLOCK: The system clock has been set.

Configurare il nome host per il sistema.

Switch(config)#hostname Catalyst-9600

Salvare la configurazione configurata finora nella configurazione di avvio.

Catalyst-9600#write memory

Building configuration...

[OK]

*Nov  5 16:11:46.061: %SYS-2-PRIVCFG_ENCRYPT: Successfully encrypted private config file

Verifica

Controllare la versione del software sul sistema, osservare il tempo di attività, i dettagli del sistema e così via.

Catalyst-9600#show version

Cisco IOS XE Software, Version 16.12.03a

Cisco IOS Software [Gibraltar], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 16.12.3a, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2020 by Cisco Systems, Inc.

Compiled Tue 28-Apr-20 09:37 by mcpre

Cisco IOS-XE software, Copyright (c) 2005-2020 by cisco Systems, Inc.

All rights reserved.  Certain components of Cisco IOS-XE software are

licensed under the GNU General Public License ("GPL") Version 2.0.  The

software code licensed under GPL Version 2.0 is free software that comes

with ABSOLUTELY NO WARRANTY.  You can redistribute and/or modify such

GPL code under the terms of GPL Version 2.0.  For more details, see the

documentation or "License Notice" file accompanying the IOS-XE software,

or the applicable URL provided on the flyer accompanying the IOS-XE

software.

ROM: IOS-XE ROMMON

BOOTLDR: System Bootstrap, Version 17.3.1r[FC2], RELEASE SOFTWARE (P)

Catalyst-9600 uptime is 36 minutes

Uptime for this control processor is 37 minutes

System returned to ROM by Reload Command

System image file is "bootflash:packages.conf"

Last reload reason: Reload Command

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

Technology Package License Information:

------------------------------------------------------------------------------

Technology-package                                     Technology-package

Current                        Type                       Next reboot

------------------------------------------------------------------------------

network-advantage   Smart License                            network-advantage

dna-advantage            Subscription Smart License     dna-advantage

AIR License Level: AIR DNA Advantage

Next reload AIR license Level: AIR DNA Advantage

Smart Licensing Status: UNREGISTERED/EVAL MODE

cisco C9606R (X86) processor (revision V00) with 1867991K/6147K bytes of memory.

Processor board ID FXS2302Q2EP

1 Virtual Ethernet interface

24 Forty/Hundred Gigabit Ethernet interfaces

48 TwentyFive Gigabit Ethernet interfaces

32768K bytes of non-volatile configuration memory.

16009160K bytes of physical memory.

11161600K bytes of Bootflash at bootflash:.

1638400K bytes of Crash Files at crashinfo:.

0K bytes of WebUI ODM Files at webui:.

Base Ethernet MAC Address          : 6c:b2:ae:4a:70:c0

Motherboard Assembly Number        : 4C57

Motherboard Serial Number          : FXS230103TN

Model Revision Number              : V02

Motherboard Revision Number        : 3

Model Number                       : C9606R

System Serial Number               : FXS2302Q2EP

Configuration register is 0x102

Controllare i pacchetti installati.

Catalyst-9600#show install summary

[ R0 R1 ] Installed Package(s) Information:

State (St): I - Inactive, U - Activated & Uncommitted,

C - Activated & Committed, D - Deactivated & Uncommitted

--------------------------------------------------------------------------------

Type  St   Filename/Version

--------------------------------------------------------------------------------

IMG   C    16.12.3a.0.4

--------------------------------------------------------------------------------

Auto abort timer: inactive

--------------------------------------------------------------------------------

Controllare il percorso per il VRF di gestione.

Switch#show ip route vrf Mgmt-vrf

Routing Table: Mgmt-vrf

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

S*    0.0.0.0/0 [1/0] via 10.122.186.1                       <--- the default gateway

10.0.0.0/8 is variably subnetted, 3 subnets, 2 masks

S        10.122.157.250/32 [1/0] via 10.122.186.1

C        10.122.186.0/28 is directly connected, GigabitEthernet0/0

L        10.122.186.8/32 is directly connected, GigabitEthernet0/0

Verificare la raggiungibilità alla rete tramite il gateway predefinito.

Switch#ping vrf Mgmg-vrf 10.122.186.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.122.186.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

Switch#

Controllare i moduli installati nel sistema.

Catalyst-9600#show module

Chassis Type: C9606R

Mod Ports Card Type                                   Model          Serial No.

---+-----+--------------------------------------+--------------+--------------

1   24   24-Port 40GE/12-Port 100GE                  C9600-LC-24C     CAT2252L0PY

3   0    Supervisor 1 Module                         C9600-SUP-1      CAT2252L0SH

4   0    Supervisor 1 Module                         C9600-SUP-1      CAT2252L0SU

6   48   48-Port 10GE / 25GE                         C9600-LC-48YL    CAT2302L16G

Mod MAC addresses                    Hw   Fw           Sw                 Status

---+--------------------------------+----+------------+------------------+--------

1   70B3.175A.7580 to 70B3.175A.75FF 0.10 17.3.1r[FC2]  16.12.03a          ok

3   70B3.175A.5680 to 70B3.175A.56FF 0.10 17.3.1r[FC2]  16.12.03a          ok

4   70B3.175A.5600 to 70B3.175A.567F 0.10 17.3.1r[FC2]  16.12.03a          ok

6   6C8B.D307.6680 to 6C8B.D307.66FF 0.10 17.3.1r[FC2]  16.12.03a          ok

Mod Redundancy Role     Operating Redundancy Mode Configured Redundancy Mode

---+-------------------+-------------------------+---------------------------

3   Active              sso                       sso

4   Standby             sso                       sso

Chassis MAC address range: 64 addresses from 6cb2.ae4a.70c0 to 6cb2.ae4a.70ff

Verificare lo stato del sistema utilizzando i risultati POST (Power-on self-test) e diagnostici.

Catalyst-9600#show post

Stored system POST messages:

Switch C9606R

--------------

Thu Nov  5 15:34:27 2020 POST: Module: 6 Mac Loopback Begin

Thu Nov  5 15:34:27 2020 POST: Module: 6 Mac Loopback: loopback Test: End, Status Passed

Thu Nov  5 15:34:27 2020 POST: Module: 1 Mac Loopback Begin

Thu Nov  5 15:34:27 2020 POST: Module: 1 Mac Loopback: loopback Test: End, Status Passed

Catalyst-9600#show diagnostic result module all

Current bootup diagnostic level: minimal

module 1:   SerialNo : CAT2252L0PY

Overall Diagnostic Result for module 1 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestGoldPktLoopback:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

2) TestOBFL ------------------------> U

3) TestThermal ---------------------> .

4) TestPortTxMonitoring:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  .  U  .  U  U  U  U  U  U  U  U  U  U  .  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

module 3:   SerialNo : CAT2252L0SH

Overall Diagnostic Result for module 3 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestOBFL ------------------------> U

2) TestFantray ---------------------> .

3) TestThermal ---------------------> .

4) TestScratchRegister -------------> .

module 4:   SerialNo : CAT2252L0SU

Overall Diagnostic Result for module 4 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestOBFL ------------------------> U

2) TestFantray ---------------------> U

3) TestThermal ---------------------> .

4) TestScratchRegister -------------> U

module 6:   SerialNo : CAT2302L16G

Overall Diagnostic Result for module 6 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestGoldPktLoopback:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

2) TestOBFL ------------------------> U

3) TestThermal ---------------------> .

4) TestPortTxMonitoring:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

.  .  U  U  U  .  U  .  U  .  .  .  U  U  .  U  U  U  U  U  U  U  U  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  .  U  U  U  U  U  U  U  U  U  U  U  .  U  .  U  U  U  U  .  .  U

Verificare che l'orologio sia impostato correttamente.

Catalyst-9600#show clock

*16:32:55.196 UTC Thu Nov 5 2020

Controllare gli alimentatori installati e il loro stato.

Catalyst-9600#show power detail

Power                                                       Fan States

Supply  Model No              Type  Capacity  Status        1     2

------  --------------------  ----  --------  ------------  -----------

PS1     C9600-PWR-2KWAC       ac    2000 W    active        good  good

PS4     C9600-PWR-2KWAC       ac    2000 W    active        good  good

PS Current Configuration Mode : none

PS Current Operating State    : none

Power supplies currently active    : 2

Power supplies currently available : 2

Power Summary          Maximum

(in Watts)    Used    Available

-------------  ------  ---------

System Power   2800    3940

-------------  ------  ---------

Total          2800    3940

Power Budget Mode           : Dual Sup

Power                                  Out of  In

Mod  Model No              State     Budget  Instantaneous  Peak  Reset   Reset

---  --------------------  --------  ------  -------------  ----  ------  -----

1    C9600-LC-24C          accepted  300     0              0     300     10

3    C9600-SUP-1           accepted  950     0              0     950     202

4    C9600-SUP-1           accepted  950     0              0     950     202

6    C9600-LC-48YL         accepted  300     0              0     300     10

FM1  C9606-FAN             accepted  300     --             --    300     --

---  --------------------  --------  ------  -------------  ----  ------  -----

Total allocated power:            2800

Total required power: 2800

Informazioni correlate

- Per informazioni dettagliate sulle opzioni di configurazione, consultare la guida alla configurazione della gestione del sistema.

- Documentazione e supporto tecnico – Cisco Systems