Sommario

Introduzione

Utilizzo

Elenco di dispositivi ottici a 10 Gbps e 1 Gbps supportati con adattatore CVR-QSFP-SFP10G

C9600-LC-24C Line Card - Layout e mappatura porte del pannello anteriore

Limitazioni dell'adattatore CVR-QSFP-SFP10G

Introduzione

Questo documento descrive l'uso e i limiti dell'adattatore CVR-QSFP-SFP10G sulla scheda di linea C9600-LC-24C sulla piattaforma Catalyst 9600.

Utilizzo

La scheda di linea C9600-LC-24C della piattaforma C9600 è dotata di 24 porte QSFP che supportano ottiche 40G e 100G. Non è possibile inserire direttamente un'ottica da 10 Gbps o 1 Gbps basata su SFP su queste porte.

L'adattatore CVR-QSFP-SFP10G offre la flessibilità di utilizzare ottiche 10 Gbps o 1 Gbps basate su SFP su porte QSFP di schede di linea C9600-LC-24C sulla piattaforma C9600.

Elenco di dispositivi ottici a 10 Gbps e 1 Gbps supportati con adattatore CVR-QSFP-SFP10G

N. Sl

Ottica

Speed

Versione minima di Cisco IOS® XE

1

SFP-10G-SR

10 Gb/s

16.11.1

2

SFP-10G-SR-S

10 Gb/s

16.11.1

3

SFP-10G-LR

10 Gb/s

16.11.1

4

SFP-10G-LR-S

10 Gb/s

16.11.1

5

SFP-10G-ER

10 Gb/s

16.11.1

6

SFP-10G-ER-S

10 Gb/s

16.11.1

7

SFP-10G-ZR

10 Gb/s

16.11.1

8

SFP-10G-ZR-S

10 Gb/s

16.11.1

9

DWDM-SFP10G-xxx

10 Gb/s

16.11.1

10

SFP-H10GB-CU1M

10 Gb/s

16.11.1

11

SFP-H10GB-CU3M

10 Gb/s

16.11.1

12

SFP-H10GB-CU5M

10 Gb/s

16.11.1

13

GLC-T*

1 Gb/s

16.12.2/17.1.1

14

GLC-TE*

1 Gb/s

16.12.2/17.1.1

15

GLC-LH-SMD

1 Gb/s

16.12.2/17.1.1

16

GLC-SX-MMD

1 Gb/s

16.12.2/17.1.1

* La velocità di 10 Mbps e 100 Mbps con GLC-T e GLC-TE non sono supportati con l'adattatore CVR-QSFP-SFP10G. Con l'adattatore CVR-QSFP-SFP10G è supportata solo una velocità di 1 Gbps con GLC-T e GLC-TE.

C9600-LC-24C Line Card - Layout e mappatura porte del pannello anteriore

1/25

3/27

5/29

7/31

9/33

11/35

13/37

15/39

17/41

19/43

21/45

23/47

2/26

4/28

6/30

8/32

10/34

12/36

14/38

16/40

18/42

20/44

22/46

24/48

Queste CLI possono essere usate per controllare la mappatura delle porte. Modalità di velocità operativa e numerazione da porta fisica a porta virtuale (per interfacce a 100 Gb/s):

show hw-module subslot x/0 port-group mapping

show hw-module subslot x/0 port-group operation-mode

show hw-module subslot x/0 port-group port-number

dove x è il numero di slot della scheda di linea.

Output di esempio:

Switch#show hw-module subslot 1/0 port-group mapping

Port Group Mapping for slot 1

Port-Group Ports

1 Fo1/0/1, Fo1/0/2, Hu1/0/25

2 Fo1/0/3, Fo1/0/4, Hu1/0/27

3 Fo1/0/5, Fo1/0/6, Hu1/0/29

4 Fo1/0/7, Fo1/0/8, Hu1/0/31

5 Fo1/0/9, Fo1/0/10, Hu1/0/33

6 Fo1/0/11, Fo1/0/12, Hu1/0/35

7 Fo1/0/13, Fo1/0/14, Hu1/0/37

8 Fo1/0/15, Fo1/0/16, Hu1/0/39

9 Fo1/0/17, Fo1/0/18, Hu1/0/41

10 Fo1/0/19, Fo1/0/20, Hu1/0/43

11 Fo1/0/21, Fo1/0/22, Hu1/0/45

12 Fo1/0/23, Fo1/0/24, Hu1/0/47

Switch#show hw-module subslot 1/0 port-group operation-mode

Module 1 port group 1 is running in HundredGigabitEthernet mode

Module 1 port group 2 is running in FortyGigabitEthernet mode

Module 1 port group 3 is running in FortyGigabitEthernet mode

Module 1 port group 4 is running in FortyGigabitEthernet mode

Module 1 port group 5 is running in FortyGigabitEthernet mode

Module 1 port group 6 is running in FortyGigabitEthernet mode

Module 1 port group 7 is running in HundredGigabitEthernet mode

Module 1 port group 8 is running in HundredGigabitEthernet mode

Module 1 port group 9 is running in HundredGigabitEthernet mode

Module 1 port group 10 is running in HundredGigabitEthernet mode

Module 1 port group 11 is running in HundredGigabitEthernet mode

Module 1 port group 12 is running in HundredGigabitEthernet mode

Switch#show hw-module subslot 1/0 port-group port-numbering

Physical Port Mapping for slot 1

Physical-Port Mapped-Port

1 Hu1/0/25

2 Hu1/0/26

3 Hu1/0/27

4 Hu1/0/28

5 Hu1/0/29

6 Hu1/0/30

7 Hu1/0/31

8 Hu1/0/32

9 Hu1/0/33

10 Hu1/0/34

11 Hu1/0/35

12 Hu1/0/36

13 Hu1/0/37

14 Hu1/0/38

15 Hu1/0/39

16 Hu1/0/40

17 Hu1/0/41

18 Hu1/0/42

19 Hu1/0/43

20 Hu1/0/44

21 Hu1/0/45

22 Hu1/0/46

23 Hu1/0/47

24 Hu1/0/48

Limitazioni dell'adattatore CVR-QSFP-SFP10G

- L'adattatore CVR-QSFP-SFP10G non deve essere installato su una porta con numero pari in cui la corrispondente porta con numero dispari dispone di ottica 40GE. Ad esempio, se la porta 1 ha ottiche 40GE, il CVR-QSFP-SFP10G non deve essere installato nella porta 2.

- La scheda CVR-QSFP-SFP10G non deve essere installata su nessuna porta che disponga di una configurazione di abilitazione. Ad esempio, la scheda CVR-QSFP-SFP10G non deve essere installata su una porta configurata per funzionare in 100GE.