Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Convenzioni

Determinazione dell'hardware quando alimentato e funzionante

Output One - Switch con CatOS

Output due - Switch con Supervisor IOS

Determinazione dell'hardware quando rimosso dallo chassis

Configurazione fisica Supervisor Engine

show module Output

Determinazione del numero parte

Informazioni correlate

Introduzione

Gli switch Cisco Catalyst serie 6000 possono essere installati con due Supervisor Engine per fornire ridondanza di layer 2. Se i Supervisor Engine sono dotati di un modulo Multilayer Switch Feature Card (MSFC), anche i due moduli MSFC offrono ridondanza di layer 3.

In questo documento vengono forniti alcuni semplici controlli che è possibile eseguire per determinare se una coppia di supervisori soddisfa i requisiti hardware per la configurazione della ridondanza se installata in uno switch Cisco Catalyst 6000 o 6500. In questo documento viene fornita una breve spiegazione dei diversi componenti hardware disponibili, dei numeri di parte e una tabella con rappresentazioni grafiche dell'hardware. Per visualizzare un esempio di output del comando show module, fare clic sulle immagini nella tabella.

Queste procedure si applicano agli switch Catalyst serie 6000 con software Cisco CatOS® e Cisco IOS®. Per ulteriori informazioni sulle differenze tra i software di sistema CatOS e Cisco IOS, fare riferimento a Conversione del software di sistema da CatOS a Cisco IOS per gli switch Catalyst 6500/6000.

Prerequisiti

Requisiti

Questo documento è utile per conoscere i seguenti argomenti:

- Informazioni sul funzionamento della ridondanza del Supervisor Engine

- Ridondanza MSFC

Affinché la ridondanza sia supportata, il Supervisor Engine, il motore di routing e il motore di inoltro devono essere gli stessi in entrambi i moduli.

Nota: per la ridondanza, non è necessario che il firmware corrisponda.

Per conoscere il tipo di modulo Supervisor installato nello chassis, sono necessarie le seguenti informazioni:

- Il modello di motore Supervisor: sugli switch Catalyst 6000 e 6500 è possibile usare più modelli di motori Supervisor. Attualmente è possibile utilizzare i seguenti modelli:

- Supervisor Engine I (WS-X6K-SUP1-2GE )

- Supervisor Engine IA (WS-X6K-SUP1A-2GE)

- Supervisor Engine II (WS-X6K-SUP2-2GE)

- Supervisor Engine 720 (WS-SUP720-BASE)

- Il motore di inoltro utilizzato: a seconda del modulo, il Supervisor può essere dotato di diversi tipi di motori di inoltro. Attualmente è possibile utilizzare i seguenti modelli:

- Policy Feature Card (PFC) (WS-F6K-PFC)

- PFC 2 (WS-F6K-PFC2)

- Scheda funzione switching layer 2 (L2) (WS-F6020)

- Scheda II funzione di switching L2 (WS-F6020A)

- PFC3 ( WS-F6K-PFC3A )

- Motore di routing utilizzato: il modulo Supervisor può essere dotato anche di un motore di routing in modo che lo switch Catalyst 6000 o 6500 possa essere usato come switch di layer 3 (L3). Attualmente è possibile utilizzare i seguenti modelli:

- Multilayer Switch Feature Card (MSFC) (WS-F6K-MSFC)

- Multilayer Switch Feature Card 2 (MSFC2) (WS-F6K-MSFC2)

- Multilayer Switch Feature Card 3 (MSFC3) (WS-SUP720)

Per ulteriori informazioni sui numeri di parte, fare riferimento alle sezioni "Informazioni di base" e "Come determinare il numero di parte" nel documento Come determinare il tipo di modulo Supervisor installato sugli switch Catalyst serie 6500/6000.

Componenti usati

Gli output mostrati in questo documento si basano sulle seguenti versioni hardware e software di Catalyst serie 6000:

- Supervisor I con CatOS 8.2(1)

- Supervisor II con software Cisco IOS versione 12.1(20)E2

- Supervisor 720 con CatOS 8.1(1)

- Supervisor 720 con software Cisco IOS versione 12.2(17b)SX

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

Determinazione dell'hardware quando alimentato e funzionante

Per verificare quale hardware è in uso quando lo switch è acceso e funzionante, accedere allo switch Catalyst e usare il comando show module. A seconda del tipo di software in esecuzione (software CatOS o Cisco IOS), l'output visualizzato sarà simile a quello mostrato nell'output 1 o simile a quello mostrato nell'output 2.

Quando si installano due Supervisor Engine, il primo Supervisor Engine online diventa il modulo attivo; il secondo Supervisor Engine entra in modalità standby. Tutte le funzioni di gestione amministrativa e di rete, come SNMP, la console dell'interfaccia della riga di comando (CLI), Telnet, Spanning Tree Protocol (STP), Cisco Discovery Protocol (CDP) e VLAN Trunking Protocol (VTP), vengono elaborate sul Supervisor Engine attivo. Sul Supervisor Engine di standby, la porta della console è inattiva, lo stato del modulo viene visualizzato come "standby" e lo stato delle porte di uplink viene mostrato normalmente.

Output One - Switch con CatOS

Questo è il primo esempio di output.

6513-47a(enable)  show module

Mod  Slot Ports Module-Type                Model               Sub Status

--- ---- ----- -------------------------  ------------------- --- --------

1   1    2     1000BaseX Supervisor       WS-X6K-SUP2-2GE     yes ok

15  1    1     Multilayer Switch Feature  WS-F6K-MSFC2        no  OK

2   2    2     1000BaseX Supervisor       WS-X6K-SUP2-2GE     yes standby

16  2    1     Multilayer Switch Feature  WS-F6K-MSFC2        no  OK

Mod Module-Name         Serial-Num

--- ------------------- -----------

1                       SAD051307ER

15                      SAD050814J3

2                       SAD0421058D

16                      SAD042106PB

Mod MAC-Address(es)                        Hw     Fw         Sw

--- -------------------------------------- ------ ---------- -----------------

1   00-01-64-75-eb-ce to 00-01-64-75-eb-cf 2.2    6.1(3)     6.2(2)

00-01-64-75-eb-cc to 00-01-64-75-eb-cd

00-05-5f-0f-ec-80 to 00-05-5f-0f-ec-bf

15  00-05-5e-da-ee-00 to 00-05-5e-da-ee-3f 1.2    12.1(8a)E5 12.1(8a)E5

2   00-01-64-f8-38-ac to 00-01-64-f8-38-ad 0.310  6.1(2)     6.3(3)

00-01-64-f8-38-ae to 00-01-64-f8-38-af

16  00-02-fd-b1-0f-00 to 00-02-fd-b1-0f-3f 1.1    12.1(8a)E5 12.1(8a)E5

Mod Sub-Type                Sub-Model           Sub-Serial  Sub-Hw

--- ----------------------- ------------------- ----------- ------

1   L3 Switching Engine II  WS-F6K-PFC2         SAD051405TV 1.3

2   L3 Switching Engine II  WS-F6K-PFC2         SAD04110B5E 0.305

Esaminate l'output evidenziato in grassetto. È possibile visualizzare le seguenti informazioni:

- WS-X6K-SUP2-2GE: Supervisor Engine II

- WS-F6K-PFC2: Il modulo è dotato di un PFC 2

- WS-F6K-MSFC2: Il modulo è dotato di MSFC 2

Output due - Switch con Supervisor IOS

In alternativa, l'output potrebbe essere simile al seguente:

Telix> show module

Mod   Ports Card Type                                Model             Serial No.

---   ----- ---------------------------------        ----------------  -----------

1      2  Cat 6k Supervisor 1 Enhanced QoS (Active) WS-X6K-SUP1A-2GE SAD03460665

4     48  48 port 10/100 mb RJ-45 ethernet          WS-X6248-RJ-45   SAD040201BS

Mod MAC addresses                       Hw     Fw             SW     Status

--- --------------------------------- ------ ---------     --------- -------

2  00d0.bcf0.2064 to 00d0.bcf0.2065   1.0    5.1(1)       7.1(0.9)  OK

4  0030.962d.afdc to 0030.962d.b00b   1.1    4.2(0.24)    7.1(0.9)  OK

Mod Sub-Module                     Model         Serial             Hw    Status

--- ---------------------------   ------------   ---------------   ------ ------

1 Policy Feature Card           WS-F6K-PFC      SAD03477104       1.0    OK

1 MSFC Cat6k daughterboard      WS-F6K-MSFC     SAD03470065       1.2    OK

Esaminate l'output evidenziato in grassetto. È possibile visualizzare le seguenti informazioni:

- WS-X6K-SUP1A-2GE: Supervisor Engine IA

- WS-F6K-PFC: Il modulo è dotato di un PFC

- WS-F6K-MSFC: Il modulo è dotato di MSFC

Determinazione dell'hardware quando rimosso dallo chassis

Se si rimuovono i moduli dallo chassis, è comunque possibile determinare il tipo di hardware disponibile e individuare il numero di parte utilizzato. La tabella seguente mostra graficamente le diverse combinazioni che soddisfano i requisiti hardware per la ridondanza sugli switch Cisco Catalyst 6000/6500. Se si fa clic sul collegamento sopra l'immagine, viene visualizzato un output show module corrispondente.

Configurazione fisica Supervisor Engine

- Sup IA con F-6020

- Sup IA con PFC

- Sup IA con PFC e MSFC

- Sup IA con PFC e MSFC2

- Sup II con PFC2 e MSFC2 forniti prima di novembre 2001

- Sup II con PFC2 e MSFC2 forniti dopo novembre 2001

show module Output

Sup IA con F-6020A

Console>(enable) show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    2     1000BaseX Supervisor      WS-X6K-SUP1A-2GE    yes ok

2   2    2     1000BaseX Supervisor      WS-X6K-SUP1A-2GE    yes standby

Mod Module-Name         Serial-Num

--- ------------------- -----------

1                       SAD050404KM

2                       SAD05040EC2

Mod MAC-Address(es)                        Hw     Fw         Sw

--- -------------------------------------- ------ ---------- -----------------

1   00-02-7e-27-17-f6 to 00-02-7e-27-17-f7 7.0    5.3(1)     5.5(9)

00-02-7e-27-17-f4 to 00-02-7e-27-17-f5

00-d0-03-8c-9c-00 to 00-d0-03-8c-9f-ff

2   00-01-64-75-80-16 to 00-01-64-75-80-17 7.0    5.3(1)     5.5(9)

00-01-64-75-80-14 to 00-01-64-75-80-15

Mod Sub-Type                Sub-Model           Sub-Serial  Sub-Hw

--- ----------------------- ------------------- ----------- ------

1   L2 Switching Engine II  WS-F6020A           SAD05030WR5 2.0

2   L2 Switching Engine II  WS-F6020A           SAD05030VZH 2.0

Sup IA con PFC

Console> show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    2     1000BaseX Supervisor      WS-X6K-SUP1A-2GE    yes OK

2   2    2     1000BaseX Supervisor      WS-X6K-SUP1A-2GE    yes standby

Mod Module-Name         Serial-Num

--- ------------------- -----------

1                       SAD041203B9

2                       SAD040803Z5

Mod MAC-Address(Es)                        Hw     Fw         SW

--- -------------------------------------- ------ ---------- -----------------

1   00-30-7b-90-f5-ba to 00-30-7b-90-f5-bb 3.1    5.3(1)     5.5(9)

00-30-7b-90-f5-b8 to 00-30-7b-90-f5-b9

00-d0-06-24-f0-00 to 00-d0-06-24-f3-ff

2   00-d0-d3-36-b1-a6 to 00-d0-d3-36-b1-a7 3.1    5.3(1)     5.5(9)

00-d0-d3-36-b1-a4 to 00-d0-d3-36-b1-a5

Mod Subtype                Sub-Model           Sub-Serial  Sub-Hw

--- ----------------------- ------------------- ----------- ------

1   L3 Switching Engine     WS-F6K-PFC          SAD04120059 1.1

2   L3 Switching Engine     WS-F6K-PFC          SAD04080DR8 1.0

Sup IA con PFC e MSFC

Console> show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    2     1000BaseX Supervisor      WS-X6K-SUP1A-2GE    yes OK

15  1    1     Multilayer Switch Feature WS-F6K-MSFC         no  OK

2   2    2     1000BaseX Supervisor      WS-X6K-SUP1A-2GE    yes standby

16  2    1     Multilayer Switch Feature WS-F6K-MSFC         no  OK

Mod Module-Name         Serial-Num

--- ------------------- -----------

1                       SAD041203B2

15                      SAD041009DF

2                       SAD040803Z1

16                      SAD0406045K

Mod MAC-Address(Es)                        Hw     Fw         SW

--- -------------------------------------- ------ ---------- -----------------

1   00-30-7b-90-f5-ba to 00-30-7b-90-f5-bb 3.1    5.3(1)     5.5(9)

00-30-7b-90-f5-b8 to 00-30-7b-90-f5-b9

00-d0-06-24-f0-00 to 00-d0-06-24-f3-ff

15  00-30-7b-90-f5-bc to 00-30-7b-90-f5-fb 1.3    12.1(8a)E5 12.1(8a)E5

2   00-d0-d3-36-b1-a6 to 00-d0-d3-36-b1-a7 3.1    5.3(1)     5.5(9)

00-d0-d3-36-b1-a4 to 00-d0-d3-36-b1-a5

16  00-d0-d3-36-b1-a8 to 00-d0-d3-36-b1-e7 1.3    12.1(8a)E5 12.1(8a)E5

Mod Subtype                Sub-Model           Sub-Serial  Sub-Hw

--- ----------------------- ------------------- ----------- ------

1   L3 Switching Engine     WS-F6K-PFC          SAD041200V9 1.1

2   L3 Switching Engine     WS-F6K-PFC          SAD04080DR7 1.0

Sup IA con PFC e MSFC2

Console> (enable) show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    2     1000BaseX Supervisor      WS-X6K-SUP1A-2GE    yes OK

15  1    1     Multilayer Switch Feature WS-F6K-MSFC2        no  OK

2   2    2     1000BaseX Supervisor      WS-X6K-SUP1A-2GE    yes standby

16  2    1     Multilayer Switch Feature WS-F6K-MSFC2        no  OK

Mod Module-Name          Serial-Num

--- -------------------- -----------

1                        SAD0433088P

15                       SAD04360AJ8

2                        SAD05030UEW

16                       SAD05030Z4W

Mod MAC-Address(Es)                        Hw     Fw         SW

--- -------------------------------------- ------ ---------- -----------------

1   00-d0-d3-3d-d2-3a to 00-d0-d3-3d-d2-3b 3.2    5.3(1)     6.3(3)

00-d0-d3-3d-d2-38 to 00-d0-d3-3d-d2-39

00-30-7b-4e-64-00 to 00-30-7b-4e-67-ff

15  00-03-6b-f1-2a-40 to 00-03-6b-f1-2a-7f 1.1    12.1(8a)E5  12.1(8a)E5

2   00-02-7e-f5-c8-7e to 00-02-7e-f5-c8-7f 7.1    5.3(1)     6.2(2)

00-02-7e-f5-c8-7c to 00-02-7e-f5-c8-7d

16  00-04-dd-f1-f0-80 to 00-04-dd-f1-f0-bf 1.2    12.1(8a)E5  12.1(8a)E5

Mod Subtype                Sub-Model           Sub-Serial  Sub-Hw

--- ----------------------- ------------------- ----------- ------

1   L3 Switching Engine     WS-F6K-PFC          SAD04330KWZ 1.1

2   L3 Switching Engine     WS-F6K-PFC          SAD050315AR 1.1

Sup II con PFC2 e MSFC2 forniti prima di novembre 2001

Console> show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    2     1000BaseX Supervisor      WS-X6K-SUP2-2GE     yes OK

15  1    1     Multilayer Switch Feature WS-F6K-MSFC2        no  OK

2   2    2     1000BaseX Supervisor      WS-X6K-SUP2-2GE     yes standby

16  2    1     Multilayer Switch Feature WS-F6K-MSFC2        no  OK

Mod Module-Name         Serial-Num

--- ------------------- -----------

1                       SAD051307ER

15                      SAD050814J3

2                       SAD0421058D

16                      SAD042106PB

Mod MAC-Address(Es)                        Hw     Fw         SW

--- -------------------------------------- ------ ---------- -----------------

1   00-01-64-75-eb-ce to 00-01-64-75-eb-cf 2.2    6.1(3)     6.2(2)

00-01-64-75-eb-cc to 00-01-64-75-eb-cd

00-05-5f-0f-ec-80 to 00-05-5f-0f-ec-bf

15  00-05-5e-da-ee-00 to 00-05-5e-da-ee-3f 1.2    12.1(8a)E5 12.1(8a)E5

2   00-01-64-f8-38-ac to 00-01-64-f8-38-ad 0.310  6.1(2)     6.3(3)

00-01-64-f8-38-ae to 00-01-64-f8-38-af

16  00-02-fd-b1-0f-00 to 00-02-fd-b1-0f-3f 1.1    12.1(8a)E5 12.1(8a)E5

Mod Subtype                Sub-Model           Sub-Serial  Sub-Hw

--- ----------------------- ------------------- ----------- ------

1   L3 Switching Engine II  WS-F6K-PFC2         SAD051405TV 1.3

2   L3 Switching Engine II  WS-F6K-PFC2         SAD04110B5E 0.305

Sup II con PFC2 e MSFC2 forniti dopo novembre 2001

Console> (enable) show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    2     1000BaseX Supervisor      WS-X6K-SUP2-2GE     yes ok

15  1    1     Multilayer Switch Feature WS-F6K-MSFC2        no  ok

2   2    2     1000BaseX Supervisor      WS-X6K-SUP2-2GE     yes standby

16  2    1     Multilayer Switch Feature WS-F6K-MSFC2        no  ok

Mod Module-Name         Serial-Num

--- ------------------- -----------

1                       SAD051307ER

15                      SAD050814J3

2                       SAD0421058D

16                      SAD042106PB

Mod MAC-Address(es)                        Hw     Fw         Sw

--- -------------------------------------- ------ ---------- -----------------

1   00-01-64-75-eb-ce to 00-01-64-75-eb-cf 2.2    6.1(3)     6.2(2)

00-01-64-75-eb-cc to 00-01-64-75-eb-cd

00-05-5f-0f-ec-80 to 00-05-5f-0f-ec-bf

15  00-05-5e-da-ee-00 to 00-05-5e-da-ee-3f 1.2    12.1(8a)E5 12.1(8a)E5

2   00-01-64-f8-38-ac to 00-01-64-f8-38-ad 0.310  6.1(2)     6.3(3)

00-01-64-f8-38-ae to 00-01-64-f8-38-af

16  00-02-fd-b1-0f-00 to 00-02-fd-b1-0f-3f 1.1    12.1(8a)E5 12.1(8a)E5

Mod Sub-Type                Sub-Model           Sub-Serial  Sub-Hw

--- ----------------------- ------------------- ----------- ------

1   L3 Switching Engine II  WS-F6K-PFC2         SAD051405TV 1.3

2   L3 Switching Engine II  WS-F6K-PFC2         SAD04110B5E 0.305

Sup 720 con PFC3 con Cisco CatOS

Console> (enable) show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

3   3    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

5   5    2     1000BaseX Supervisor      WS-SUP720-BASE      yes ok

Mod      Module-Name               Serial-Num

---   --------------------         -----------

3                                   SAD04350CUY

5                                   SAD072704PE

Mod    MAC-Address(es)                          Hw     Fw     Sw

---     -------------------------------------- ------ -------- ------------

3       00-01-97-55-0e-70 to 00-01-97-55-0e-9f  1.1   5.4(2) 8.1(1)

5       00-0c-ce-64-1c-4e to 00-0c-ce-64-1c-4f  2.1   7.7(1) 8.1(1)

00-0c-ce-64-1c-4c to 00-0c-ce-64-1c-4f

00-0a-42-d1-75-80 to 00-0a-42-d1-79-7f

Mod  Sub-Type                 Sub-Model    Sub-Serial  Sub-Hw    Sub-Sw

--- ----------------------- ------------------- ----------- ------ ------

3  Inline Power Module      WS-F6K-VPWR                  1.0      0.0(0)

5  L3 Switching Engine III  WS-F6K-PFC3A   SAD072704UN   1.1

Sup 720 con PFC3 e MSFC3 con software Cisco IOS

Router# show module

Mod     Ports      Card Type                                           Model             Serial No.

---       -----    --------------------------------------          ------------------     -----------

1          16       SFM-capable 16 port 1000mb GBIC                WS-X6516-GBIC         SAD050706EW

3          48       48 port 10/100 mb RJ45                         WS-X6348-RJ-45        SAD04350CUY

5           2       Supervisor Engine 720 (Active)                 WS-SUP720-BASE        SAD072905FS

Mod     MAC addresses                              Hw           Fw            Sw               Status

---    ----------------------------------        ------       ------------  ------------       -------

1      00d0.c0d4.7a7c to 00d0.c0d4.7a8b           2.0          6.1(3)         8.3(0.63)TET      Ok

3      0001.9755.0e70 to 0001.9755.0e9f           1.1          5.4(2)         8.3(0.63)TET      Ok

5      000c.ce64.2590 to 000c.ce64.2593           2.3          7.7(1)         12.2(17b)SXA      Ok

Mod     Sub-Module                 Model                     Serial       Hw       Status

---   ------------------------    ---------------          ----------     -------  -------

3      Inline Power Module         WS-F6K-PWR                               1.0       Ok

5      Policy Feature Card 3       WS-F6K-PFC3A            SAD0727054R      1.2       Ok

5      MSFC3 Daughterboard         WS-SUP720               SAD0722004E      1.5       Ok

Mod Online Diag Status

--- -------------------

1 Pass

3 Pass

5 Pass

Determinazione del numero parte

Dopo aver ottenuto le informazioni descritte nelle sezioni precedenti, è possibile determinare il numero di parte che corrisponde allo switch Catalyst.

Nota: la quantità di memoria installata sul Supervisor e sull'MSFC deve essere sempre controllata separatamente, in quanto ciò non si riflette sempre in un numero di parte diverso.

Sul Supervisor Engine I:

- WS-X6K-SUP1-2GE: Supervisor Engine I, Scheda funzionalità L2

- WS-X6K-SUP1A-2GE: Supervisor Engine I, Scheda funzionalità L2

- WS-X6K-SUP1A-PFC: Supervisor Engine I, PFC

- WS-X6K-SUP1A-MSFC: Supervisor Engine I, PFC, MSFC

- WS-X6K-S1A-MSFC2: Supervisor Engine I, PFC, MSFC2

Sul Supervisor Engine II:

- WS-X6K-S2-PFC2: Supervisor Engine II, PFC2

- WS-X6K-S2-MSFC2: Supervisor Engine II, PFC2, MSFC2

- WS-X6K-S2U-MSFC2: Supervisor Engine II con 256 MB di DRAM sul Supervisor, PFC2, 256 MB di DRAM su MSFC2

Su Supervisor 720:

- WS-SUP720: Supervisor Engine 720, fabric integrato, PFC3A, MSFC3

Nota: in alcune circostanze, è possibile che i comandi MSFC, MSFC2 o MSFC3 non vengano visualizzati quando si utilizzano i comandi illustrati in questo documento. se l'output di questi comandi non visualizza l'MSFC, MSFC2 o MSFC3, ma si è certi che il modulo Supervisor disponga di un motore di routing, fare riferimento a Recuperare un MSFC mancante dal comando show module del Supervisor Engine per ulteriori informazioni.

Informazioni correlate

- Ridondanza MSFC interna sugli switch Catalyst 6000 in modalità ibrida

- Come determinare il tipo di modulo Supervisor installato negli switch Catalyst serie 6500/6000

- Cisco Catalyst serie 6000 Switch Configurazione della ridondanza

- Configurazione della ridondanza del Supervisor Engine RPR o RPR+

- Guide alla configurazione degli switch Cisco Catalyst serie 6000

- Riferimenti per i comandi degli switch Cisco Catalyst serie 6000

- Cisco Catalyst serie 6000 Switch - Panoramica

- Guide all'installazione di switch Cisco Catalyst serie 6000

- Supporto tecnico – Cisco Systems