Sommario

Introduzione

Premesse

Per iniziare

1. Controllare la versione di ROMMON

2. Controlla immagine

3. Verifica VSS

4. Assicurarsi che lo switch sia in esecuzione in modalità di installazione e non in modalità bundle

5. La licenza deve essere Entservices o IP Base

6. La scheda secondaria viene visualizzata solo in modalità di installazione e non in modalità bundle

7. Numero massimo client/punti di accesso supportati

8. Connessione AP

9. Uguale a 5760/3850/3650 da qui in avanti

Introduzione

Questo documento descrive l'elenco di controllo di base da prendere in considerazione per installare e far funzionare lo switch 4500 SUP8E per la rete wireless. Questo documento non si concentra su come configurare il controller wireless sull'Sup8E, ma piuttosto sugli elementi da verificare prima e che sono specifici della piattaforma. Una volta eseguita questa operazione, la piattaforma si comporterà come qualsiasi altro switch ad accesso convergente e sarà possibile seguire altri documenti e guide.

Premesse

Cisco Catalyst® 4500E Supervisor Engine 8-E è il motore di switching di nuova generazione di classe enterprise che offre la convergenza completa tra reti cablate e wireless su un'unica piattaforma. Questo nuovo circuito integrato specifico per applicazione (ASIC) Cisco® Unified Access Data Plane (UADP) potenzia la convergenza wireless e consente l'applicazione uniforme delle policy wireless cablate, la visibilità, la flessibilità e l'ottimizzazione delle applicazioni.

Per iniziare

Per rendere il wireless operativo su questo dispositivo, è necessario verificare che i seguenti requisiti siano soddisfatti:

1. Controlla versione Rommon

2. L'immagine deve essere K9 - Crypto

3. Virtual Switching System (VSS) supportato solo nella versione 3.8 e successive (solo Dual-Sup)

4. Lo switch deve essere eseguito in modalità di installazione

5. La licenza deve essere Entservices o IP Base

6. In modalità Pacchetto, la scheda secondaria non viene visualizzata (solo in modalità di installazione)

7. Il numero massimo di punti di accesso supportati (AP) è 50/numero massimo di client supportati - 2000

8. Il punto di accesso deve terminare sullo stesso chassis/Supervisor (SUP)

9. Una volta attivate queste porte, il resto della configurazione è simile a qualsiasi switch ad accesso convergente (3850/5760 ...)

Analizziamo ciascuna di esse dal punto di vista dell'output.

1. Controllare la versione di ROMMON

Nota: Deve essere 15.1(Xr)SG4 [X - Numero a partire da 1] o superiore.

BGL.I.15-4500-2#sh version

ROM: 15.1(1r)SG4

BGL.I.15-4500-2 uptime is 6 minutes

System returned to ROM by power-on

Running default software

Jawa Revision 3, RadTrooper Revision 0x0.0x41, Conan Revision 0x1449

Last reload reason: power-on

2. Controlla immagine

Nota: Deve essere in esecuzione versione 3.7 o successiva e deve essere un'immagine K9 Crypto. Non funziona nient'altro.

L'immagine crittografica ha il seguente aspetto:

4500-2#sh version

Cisco IOS® Software, IOS®-XE Software, Catalyst 4500 L3 Switch  Software (cat4500es8-UNIVERSALK9-M), Version 03.07.00E RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2014 by Cisco Systems, Inc.

Compiled Sun 07-Dec-14 17:59 by prod_rel_team

L'immagine non crittografata ha il seguente aspetto:

Cisco IOS® Software, IOS®-XE Software, Catalyst 4500 L3 Switch Software (cat4500es8-UNIVERSAL-M), Version 03.03.00.XO RELEASE SOFTWARE (fc2)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Wed 14-Aug-13 09:51 by prod_rel_team

3. Verifica VSS

Comportamento precedente alla 3.8:

Nota: Se il servizio VSS è attivato, i comandi wireless non sono presenti e viceversa, se i comandi wireless sono attivati, i comandi VSS non sono presenti.

4500-2#sh switch  virtual

Switch Mode : Standalone

Not in Virtual Switch mode due to:

Domain ID is not configured

Avvio di IOS® XE 3.8 e versioni successive:

Nota: Il servizio VSS Dual-Sup è supportato con le operazioni wireless. Tuttavia, il servizio VSS Quad-Sup non è supportato con il wireless.

4. Assicurarsi che lo switch sia in esecuzione in modalità di installazione e non in modalità bundle

Bundle Mode - bootsystem pointing to .bin image (no wireless commands)

Install Mode - Bootsystem pointing to package.conf instead of Bin

BGL.I.15-4500-2#dir bootflash:

In modalità Bundle:

Directory of bootflash:/

81602  -rw-   181583336   Oct 7 2014 09:18:45 +00:00  cat4500es8-universal.SPA.03.03.00.XO.151-1.XO.bin

81603  -rw-   181601128  Nov 18 2014 18:28:43 +00:00  cat4500es8-universal.SPA.03.03.02.XO.151-1.XO2.bin

81604  -rw-   483862876  Dec 31 2014 20:21:43 +00:00  cat4500es8-universalk9.SPA.03.07.00.E.152-3.E.bin

1708220416 bytes total (857677824 bytes free)

This is how the boot looks like

4500-2#sh boot

---------------------------

Switch 1

---------------------------

Current Boot Variables:

BOOT variable = flash:cat4500es8-universal.SPA.03.07.00.E.152-3.E.bin;

Boot Variables on next reload:

BOOT variable = flash:cat4500es8-universal.SPA.03.07.00.E.152-3.E.bin;

Allow Dev Key = yes

Manual Boot = no

Enable Break = no

In modalità di installazione:

BGL.I.20-4500-1#dir bootflash:

Directory of bootflash:/

81602  -rwx   199051336   Oct 7 2014 02:00:02 +00:00  cat4500es8-universalk9.SPA.03.06.00.E.152-2.E.bin

81603  -rw-   215049252  Dec 29 2014 07:07:31 +00:00  cat4500es8-universal.SPA.03.07.00.E.152-3.E.bin

16  drwx        4096  Dec 29 2014 07:14:26 +00:00  virtual-instance

18  drwx        4096  Dec 29 2014 07:14:26 +00:00  virtual-instance-stby-sync

81606  drwx        4096  Dec 30 2014 01:52:34 +00:00  wnweb_store

21  -rw-   126880776  Dec 30 2014 01:34:38 +00:00  cat4500es8-base.SPA.03.07.00E.pkg

57125  -rw-    82245776  Dec 30 2014 01:34:45 +00:00  cat4500es8-dc-base.SPA.03.07.00E.pkg

57126  -rw-     7019480  Dec 30 2014 01:34:47 +00:00  cat4500es8-dc-drivers.SPA.03.07.00E.pkg

57127  -rw-    35161204  Dec 30 2014 01:34:46 +00:00  cat4500es8-dc-infra.SPA.03.07.00E.pkg

81604  -rw-   483862876  Dec 30 2014 01:24:49 +00:00  cat4500es8-universalk9.SPA.03.07.00.E.152-3.E.bin

57128  -rw-    26876920  Dec 30 2014 01:34:47 +00:00  cat4500es8-dc-platform.SPA.03.07.00E.pkg

57129  -rw-     4225328  Dec 30 2014 01:34:39 +00:00  cat4500es8-firmware.SPA.03.07.00E.pkg

57130  -rw-       54192  Dec 30 2014 01:34:39 +00:00  cat4500es8-infra.SPA.03.07.00E.pkg

57131  -rw-     1987552  Dec 30 2014 01:34:47 +00:00  cat4500es8-platform.SPA.03.07.00E.pkg

57132  -rw-    88661144  Dec 30 2014 01:34:42 +00:00  cat4500es8-universalk9.SPA.152-3.E.pkg

57133  -rw-   110742524  Dec 30 2014 01:34:51 +00:00  cat4500es8-wcm.SPA.10.3.100.0.pkg

20  -rw-        1724  Dec 30 2014 01:35:59 +00:00  packages.conf

81605  ----       11679  Dec 31 2014 23:15:15 +00:00  dc_console_log-20141230-014159-UTC

1708220416 bytes total (321839104 bytes free)

BGL.I.20-4500-1#

4500-2#sh run | i boot

boot-start-marker

boot system bootflash:packages.conf

boot-end-marker

BGL.I.15-4500-2#sh boot

BOOT variable = bootflash:packages.conf,12;

CONFIG_FILE variable does not exist

BOOTLDR variable does not exist

Configuration register is 0x2102

Nota: Il registro di configurazione è 0x2102 è un requisito per la scheda secondaria da rilevare.

Nota: 4500(config)#config-register? <0x0-0xFFFF> Numero del registro di configurazione

Come convertire Bundle in Install

5. La licenza deve essere Entservices o IP Base

Nota: Dopo aver abilitato Entservices e riavviato il sistema, è possibile visualizzare il conteggio AP nell'RTU (Right-To-Use).

BGL.I.15-4500-2#sh license right-to-use

License Store: Primary License Storage

License Store: Dynamic License Storage

StoreIndex: 1 Feature: entservices  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: Non-Counted

StoreIndex: 3 Feature: ipbase  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: Non-Counted

StoreIndex: 4 Feature: lanbase  Version: 1.0

License Type: PermanentRightToUse

License State: Active, Not in Use, EULA not accepted

License Count: Non-Counted

StoreIndex: 6 Feature: apcount  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: 0/0

4500-2#license right-to-use activate entservices acceptEula (Requires Reboot)

BGL.I.15-4500-2#sh license right-to-use

License Store: Primary License Storage

License Store: Dynamic License Storage

StoreIndex: 1 Feature: entservices  Version: 1.0

License Type: PermanentRightToUse

License State: Active, In Use

License Count: Non-Counted

StoreIndex: 3 Feature: ipbase  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: Non-Counted

StoreIndex: 4 Feature: lanbase  Version: 1.0

License Type: PermanentRightToUse

License State: Active, Not in Use, EULA not accepted

License Count: Non-Counted

StoreIndex: 6 Feature: apcount  Version: 1.0

License Type: PermanentRightToUse

License State: Inactive

License Count: 0/0

6. La scheda secondaria viene visualizzata solo in modalità di installazione e non in modalità bundle

Nota: Se il dispositivo viene eseguito in modalità Bundle, la scheda secondaria necessaria per Wireless non viene visualizzata. È possibile verificare questa condizione con il comando show module. Gli errori delle schede figlie sono considerati errori SUP e potrebbero richiedere un'autorizzazione al reso (RMA).

Durante l'avvio del dispositivo, è possibile visualizzare:

Cisco IOS®-XE software, Copyright (c) 2005-2014 by Cisco Systems, Inc.

All rights reserved.  Certain components of Cisco IOS-XE software are

licensed under the GNU General Public License ("GPL") Version 2.0.  The

software code licensed under GPL Version 2.0 is free software that comes

with ABSOLUTELY NO WARRANTY.  You can redistribute and/or modify such

GPL code under the terms of GPL Version 2.0.

(http://www.gnu.org/licenses/gpl-2.0.html) For more details, see the

documentation or "License Notice" file accompanying the IOS-XE software,

or the applicable URL provided on the flyer accompanying the IOS-XE

software.

Daughter Card is booting.. Please stand by..............................................

Daughter Card is ready, continuing in wireless mode..

BGL.I.20-4500-1#sh module

Chassis Type : WS-C4510R+E

Power consumed by backplane : 40 Watts

Mod Ports Card Type                              Model              Serial No.

---+-----+--------------------------------------+------------------+-----------

2     2  1000BaseX (GBIC)                       WS-X4302-GB        JAE10307QDW

3    48  10/100/1000BaseT POE E Series          WS-X4648-RJ45V-E   JAE1211B9K2

4     6  1000BaseX (GBIC)                       WS-X4306           JAE053700PA

5    12  Sup 8-E 10GE (SFP+), 1000BaseX (SFP)   WS-X45-SUP8-E      CAT1814L3A7

M MAC addresses                    Hw  Fw           Sw               Status

--+--------------------------------+---+------------+----------------+---------

2 0015.62e6.e2b8 to 0015.62e6.e2b9 3.2                               Ok

3 001e.7af2.95f0 to 001e.7af2.961f 1.0                               Ok

4 0004.4dfb.87c4 to 0004.4dfb.87c9 2.0                               Ok

5 70ca.9b5e.6600 to 70ca.9b5e.660b 1.1 15.1(1r)SG4  03.07.00E        Ok

Mod  Redundancy role     Operating mode      Redundancy status

----+-------------------+-------------------+----------------------------------

5   Active Supervisor   RPR                 Active

Mod  Submodule               Model             Serial No.   Hw   Status

----+-----------------------+-----------------+------------+----+---------

5   Daughter Card           WS-UA-SUP8E       CAT1814L5H1  1.0  Ok

7. Numero massimo client/punti di accesso supportati

Numero massimo di punti di accesso supportati -50/Numero massimo di client supportati - 2000

8. Connessione AP

Accertarsi che i punti di accesso terminino sullo stesso chassis/SUP, altrimenti i punti di accesso non si uniranno al controller wireless dello switch.

Analogamente agli switch 3850 e 3650, per collegarsi al controller Sup8, gli access point devono essere collegati direttamente a una porta di accesso dello switch 4507.

9. Uguale a 5760/3850/3650 da qui in avanti

Nota: Una volta risolte le questioni descritte in precedenza, il resto è simile per rendere operativi gli switch 3850/5760.

La GUI è simile a quella mostrata nell'immagine.