Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Premesse

Topologia

Configurazione importante

Router CA

Configurazione gateway VPN

Dispositivo Windows

Convalida

Scenario 1. Il certificato è valido per l'autenticazione

Scenario 2. Il certificato è revocato e l'autenticazione non riesce

Risoluzione dei problemi

Introduzione

In questo documento viene descritto come risolvere i problemi relativi all'elenco di revoche di certificati (CRL) configurato per l'autenticazione basata sui certificati AnyConnect.

Prerequisiti

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

- CA (Certificate Authority)

- PKI (Public Key Infrastructure)

- RA VPN su FTD

- Windows 10 con client AnyConnect

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software:

- CSR1000V - Cisco IOS® XE, versione 16.12.03 - come server Cisco IOS XE CA

- NGFWv - versione 7.1.0 - come gateway VPN

- AnyConnect Secure Mobility Client versione 4.10.07073- come client VPN

- Windows 10 come computer locale

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Premesse

CRL consente ai dispositivi di determinare se un certificato è stato revocato prima della scadenza della durata del certificato. Un CRL contiene il numero di serie e la data di revoca del certificato. Un gateway sicuro come i sistemi Firepower Thread Defense (FTD) o altri dispositivi terminali utilizza questa funzionalità per rafforzare l'autenticazione del certificato convalidandone lo stato.

Topologia

Topologia di base che fornisce la connettività al gateway VPN e al server CA.

Configurazione importante

Per eseguire l'autenticazione basata su certificati con CRL, la configurazione presentata è stata utilizzata in ognuno dei dispositivi interessati.

Router CA

L'autorità di certificazione del server è responsabile del rilascio dei certificati di identità agli utenti per fornire l'autenticazione per il gateway VPN. Inoltre, il router archivia il file del database CRL e funge da punto di distribuzione CRL (CDP, CRL Distribution Point).

In un CDP, il gateway VPN e gli altri utenti finali recuperano le informazioni del CRL. Queste informazioni vengono memorizzate nella cache locale e sono valide solo per un periodo di tempo specifico. Alla scadenza di questo periodo, viene scaricato un nuovo CRL.

Nota: il database CRL e il percorso in cui i dispositivi hanno accesso al CRL possono trovarsi sullo stesso dispositivo. Tuttavia, per motivi di sicurezza, si consiglia di memorizzare il CRL a cui accedono i dispositivi finali in un dispositivo diverso da quello del database CRL. Nell'esempio, il router CA archivia il database CRL e funge da CDP per il gateway VPN.

crypto pki server CAS

database level complete

no database archive

issuer-name cn=calo_root,ou=TAC,o=cisco

grant auto

hash sha256

lifetime crl 2

lifetime certificate 300

lifetime ca-certificate 1000

cdp-url http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

eku server-auth client-auth

database url ser nvram:

crypto pki trustpoint TP-self-signed-1507329386

enrollment selfsigned

subject-name cn=IOS-Self-Signed-Certificate-1507329386

revocation-check none

rsakeypair TP-self-signed-1507329386

crypto pki trustpoint CAS

revocation-check crl

rsakeypair CAS

interface GigabitEthernet2

ip address 192.0.2.10 255.255.255.0

negotiation auto

ip http server

ntp master 1

Configurazione gateway VPN

L'FTD è configurato per fornire una VPN ad accesso remoto agli utenti finali utilizzando i certificati come metodo di autenticazione (solo certificato). Dopo aver ricevuto il certificato di identità dall'utente, l'FTD verifica se il certificato è stato rilasciato da un'Autorità di certificazione (CA) nota e ne conferma la validità ottenendo il CRL dal CDP definito nel certificato.

tunnel-group local type remote-access

tunnel-group local general-attributes

address-pool AC_pool

default-group-policy local_gp

username-from-certificate use-entire-name

tunnel-group local_test webvpn-attributes

authentication certificate

group-alias test enable

Dispositivo Windows

Un certificato di identità è stato rilasciato dal server CA e installato nel dispositivo Windows.

Convalida

Nei successivi debug e acquisizioni viene visualizzata la differenza tra un utente che utilizza un certificato valido (scenario di lavoro) e un utente che utilizza un certificato revocato (scenario di non lavoro).

Scenario 1. Il certificato è valido per l'autenticazione

Quando l'utente avvia il tentativo di connessione, fornisce all'FTD il proprio certificato di identità, il gateway VPN verifica che l'autorità emittente sia nota e inizia a richiedere l'elenco di revoche di certificati (CRL) al CDP definito nel certificato di identità tramite una richiesta HTTP/GET. Il server CA risponde con il CRL e l'FTD controlla se il numero di serie del certificato è elencato. Poiché il CRL è vuoto (nessun certificato revocato), il FTD accetta il certificato come valido e consente all'utente di eseguire l'autenticazione.

PKI[7]: Cert to verify

PKI[7]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /O=cisco/OU=TAC/CN=calo_root. ctx->error: (0)ok, cert_idx: 1

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (0)ok, cert_idx: 0

PKI[8]: pki_ossl_find_valid_chain took 217 microsecs

PKI[6]: Verified chain:

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[6]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[6]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

[..output ommitted]

CRYPTO_PKI: bitValue of KEY_USAGE = a0PKI[7]: CRYPTO_PKI:check_key_usage: Checking KU for case VPN peer certs.

PKI[7]: CRYPTO_PKI:check_key_usage: KU bit digitalSignature is ON.

PKI[7]: ExtendedKeyUsage OID = serverAuth NOT acceptable for usage type SSL VPN Peer

PKI[7]: ExtendedKeyUsage OID = clientAuth acceptable for usage type: SSL VPN Peer

PKI[7]: check_key_usage:Extended Key/Key Usage check OK

PKI[12]: pki_ossl_revocation_check, pki_ossl_validate.c:931

PKI[7]: Starting revocation check for session 0x06c8d45f

PKI[12]: pki_init_revocation, pki_ossl_revocation.c:162

PKI[12]: pki_ossl_eval_revocation, pki_ossl_validate.c:699

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x06c8d45f, cert 0 has rev_status 0, using methods 1/3/0 at index 0

PKI[12]: cert_revoc_exempt, pki_ossl_revocation.c:250

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[13]: pki_crl_cached, pki_ossl_crl_cache.c:1351

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_check_cache, pki_ossl_crl_cache.c:1269

PKI[7]: Starting OSSL CRL cache check.

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[9]: Attempting to find cached CRL for CDP http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_SelectCRLByIssuerTimeDER, pki_ossl_crl_cache.c:1219

PKI[14]: pki_ossl_get_name_string, pki_ossl.c:315

PKI[9]: Select DER crl(O=cisco, OU=TAC, CN=calo_root)

PKI[12]: pki_ossl_get_crl_internal, pki_ossl_crl_cache.c:506

PKI[7]: CRL not cached. Initiating CRL download for cert idx 0.

PKI[12]: do_get_crl, pki_ossl_revocation.c:85

PKI[9]: starting CRL FSM #0

PKI[11]: drive_fsm, pki_ossl_revocation.c:33

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: In PKICRL_InitTransaction

PKI[12]: get_cdps, pki_crl_fsm_act.c:202

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[7]: cdp: (len=58, type=URI, prot=HTTP) http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: PKICRL_InitTransaction, Return status: 0

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: In PKICRL_NextCDP

PKI[12]: crldl_cdp_blacklisted, pki_ossl_crl.c:1374

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[7]: CDP is not blacklisted

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: PKICRL_NextCDP, Return status: 0

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: In PKICRL_Request

PKI[13]: crldp_download_pending, pki_ossl_crl.c:1184

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[8]: session 0x06c8d45f adding pending CRL entry for cert 0

PKI[12]: crldp_add_pending_download, pki_ossl_crl.c:1203

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: retrieve_crl, pki_crl_fsm_act.c:233

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[7]: CDP type HTTP

PKI[7]: getting http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_crl_build_http_io, pki_ossl_crl.c:1017

PKI[13]: pki_parse_uri, pki_ossl_uri.c:75

PKI[14]: pki_uri_map_protocol, pki_ossl_uri.c:17

PKI[14]: pki_uri_get_port, pki_ossl_uri.c:34

PKI[13]: pki_free_uri, pki_ossl_uri.c:57

PKI[11]: pki_crl_request_send_async, pki_ossl_crl.c:627

PKI[8]: [15] IOCB allocated

PKI[7]: PKI CRL I/O request queue result: IO_STATUS_QUEUED

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: PKICRL_Request, Return status: 0

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 0, revoked: 0, error: 0, pending: 1, fail-allow: 0

PKI[9]: Async unlocked for session 0x06c8d45f

PKI[8]: [15] Received IO request msg

PKI[8]: [15] DNS resolve issued for 192.0.2.10

PKI[9]: CERT API thread sleeps!

PKI[7]: [15] DNS resolve 192.0.2.10 (192.0.2.10)

PKI[8]: [15] Socket open success

PKI[8]: [15] IPv4 Route lookup to 192.0.2.10 use interface outside

PKI[8]: [15] Connect sent to 192.0.2.10 from 192.0.2.1

PKI[12]: pki_io_cbfunc_log_revocation_check, pki_ossl_revocation.c:421

PKI[7]: 6717056: Attempting CRL revocation check from outside:192.0.2.1/62075 to 192.0.2.10/80 using HTTP.

PKI[8]: [15] Received Socket transmit ready msg

----- Begin Data Type:HTTP Request [15]

Length: 76 -----

47 45 54 20 2f 63 67 69 2d 62 69 6e 2f 70 6b 69 | GET /cgi-bin/pki

63 6c 69 65 6e 74 2e 65 78 65 3f 6f 70 65 72 61 | client.exe?opera

74 69 6f 6e 3d 47 65 74 43 52 4c 20 48 54 54 50 | tion=GetCRL HTTP

2f 31 2e 30 0d 0a 48 6f192.0.2.10 73 74 3a 20 31 39 32 2e | /1.0..Host: 192.

31 38 31 2e 33 2e 31 30 0d 0a 0d 0a | 0.2.10....

----- End Data Type:HTTP Request [15]

Length: 76 -----

PKI[8]: [15] Sent 76 bytes

PKI[8]: [15] Received Socket read ready msg

PKI[8]: [15] read 662 bytes

PKI[8]: [15] Read EOF

PKI[12]: pki_io_cbfunc, pki_crl_fsm_act.c:59

PKI[7]: Callback received for vcid: 0, sess_id: 0x06c8d45f, cert_idx: 0, status: IO_STATUS_OK(1), datalen: 662

PKI[13]: get_fsm_data, pki_ossl_revocation.c:446

PKI[7]: [15] IOCB freed

PKI[13]: CERT_API_QueueFSMEvent, vpn3k_cert_api.c:137

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: CERT API thread wakes up!

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=2, session=0x06c8d45f

PKI[9]: Async locked for session 0x06c8d45f

PKI[11]: pki_notify_fsm_evt, pki_ossl_revocation.c:56

PKI[11]: drive_fsm, pki_ossl_revocation.c:33

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: In PKICRL_ProcessResp

PKI[13]: pki_ossl_util_find_http_payload, pki_ossl_utils.c:36

PKI[8]: Received CRL of length 249 for session 0x06c8d45f, cert idx 0

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_crl_add_to_cache, pki_ossl_crl_cache.c:1177

PKI[12]: pki_ossl_crypto_verify_and_insert_crl, pki_ossl_crl_cache.c:1126

PKI[12]: pki_ossl_insert_der_crl_int, pki_ossl_crl_cache.c:1017

PKI[8]: Inserting CRL

PKI[14]: pki_ossl_get_crl_summary, pki_ossl.c:151

PKI[8]: ---------CRL--------:

Certificate Revocation List (CRL):

Version 1 (0x0)

Signature Algorithm: sha1WithRSAEncryption

Issuer: /O=cisco/OU=TAC/CN=calo_root

Last Update: Sep 24 22:18:38 2023 GMT

Next Update: Sep 25 00:18:38 2023 GMT

No Revoked Certificates.

[..outout ommitted]

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x06c8d45f, cert 0 has rev_status 3, using methods 1/3/0 at index 0

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 1, revoked: 0, error: 0, pending: 0, fail-allow: 0

PKI[7]: session: 0x06c8d45f, all revocation processing complete

PKI[5]: session: 0x06c8d45f, CRL for certificate 0 has been cached

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: pki_ossl_crl_add_cache_to_store, pki_ossl_crl_cache.c:1396

PKI[9]: OSSL certstore updated with 0 certs, 1 CRLs and 0 policies, 0 certs added to stack

PKI[7]: session 0x06c8d45f, Starting chain validation with cached CRL checking

PKI[12]: pki_ossl_find_valid_chain, pki_ossl_validate.c:472

PKI[9]: Begin sorted cert chain

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[9]: End sorted cert chain

PKI[13]: pki_ossl_get_store, pki_ossl_certstore.c:61

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: Cert to verify

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /O=cisco/OU=TAC/CN=calo_root. ctx->error: (0)ok, cert_idx: 1

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (0)ok, cert_idx: 0

PKI[8]: pki_ossl_find_valid_chain took 167 microsecs

PKI[7]: session 0x06c8d45f, Validation with CRL checking completed, status 0

PKI[7]: session 0x06c8d45f, Revocation check complete, no revoked certs found

PKI[12]: pki_ossl_do_callback, pki_ossl_validate.c:164

PKI[13]: CERT_Close, vpn3k_cert_api.c:291

PKI[8]: Close session 0x06c8d45f asynchronously

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: Async unlocked for session 0x06c8d45f

PKI[8]: No IOCB found for SOCKET CLOSE message, handle 0x5dba666

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=1, session=0x06c8d45f

PKI[9]: Async locked for session 0x06c8d45f

PKI[9]: Async unlocked for session 0x06c8d45f

PKI[13]: pki_ossl_free_valctx, pki_ossl_validate.c:251

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[9]: CERT API thread sleeps!

PKI[13]: CERT_GetGroupFromSSLRule, vpn3k_cert_api.c:1672

La successiva acquisizione FTD visualizza la transazione HTTP tra FTD e CDP (in questo caso il server CA) per recuperare il CRL.

Scenario 2. Il certificato è revocato e l'autenticazione non riesce

Un certificato di identità viene revocato nel server CA e registrato nel file di database CRL. Tuttavia, il CRL aggiornato non è disponibile per l'FTD fino alla scadenza del CRL corrente (configurato per essere valido per due ore).

CA-router#show crypto pki server CAS crl

Certificate Revocation List:

Issuer: cn=calo_root,ou=TAC,o=cisco

This Update: 22:18:38 UTC Sep 24 2023

Next Update: 00:18:38 UTC Sep 25 2023

Number of CRL entries: 0

CRL size: 249 bytes

CA-router#show crypto pki server CAS certificates

Serial Issued date Expire date Subject Name

1 20:18:36 UTC Sep 24 2023 20:18:36 UTC Jun 20 2026 cn=calo_root ou=TAC o=cisco

2 20:19:33 UTC Sep 24 2023 20:19:33 UTC Jul 20 2024 hostname=CA-router cn=desktop.example.com

3 23:50:58 UTC Sep 24 2023 23:50:58 UTC Jul 20 2024 cn=test.cisco.com

CA-router#crypto pki server CAS revoke 0x2

% Certificate 02 succesfully revoked.

CA-router#show crypto pki server CAS crl

Certificate Revocation List:

Issuer: cn=calo_root,ou=TAC,o=cisco

This Update: 23:59:32 UTC Sep 24 2023

Next Update: 01:59:32 UTC Sep 25 2023

Number of CRL entries: 1

CRL size: 272 bytes

Revoked Certificates:

Serial Number (hex): 02

Revocation Date: 23:59:32 UTC Sep 24 2023

Quando si tenta una nuova connessione dopo la conferma della scadenza dell'elenco di revoche di certificati, l'ispezione del certificato è per lo più identica allo scenario precedente. Il nuovo CRL viene richiesto dopo che l'FTD conferma che non è presente alcun CRL nella cache. Dopo aver ricevuto il nuovo CRL, l'FTD controlla se il numero di serie del certificato di identità fa parte dell'elenco. Il numero di serie viene contrassegnato come revocato e l'FTD procede negando l'accesso all'utente.

CRYPTO_PKI: bitValue of KEY_USAGE = a0PKI[7]: CRYPTO_PKI:check_key_usage: Checking KU for case VPN peer certs.

PKI[7]: CRYPTO_PKI:check_key_usage: KU bit digitalSignature is ON.

PKI[7]: ExtendedKeyUsage OID = serverAuth NOT acceptable for usage type SSL VPN Peer

PKI[7]: ExtendedKeyUsage OID = clientAuth acceptable for usage type: SSL VPN Peer

PKI[7]: check_key_usage:Extended Key/Key Usage check OK

PKI[12]: pki_ossl_revocation_check, pki_ossl_validate.c:931

PKI[7]: Starting revocation check for session 0x0dc288f9

PKI[12]: pki_init_revocation, pki_ossl_revocation.c:162

PKI[12]: pki_ossl_eval_revocation, pki_ossl_validate.c:699

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x0dc288f9, cert 0 has rev_status 0, using methods 1/3/0 at index 0

PKI[12]: cert_revoc_exempt, pki_ossl_revocation.c:250

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[13]: pki_crl_cached, pki_ossl_crl_cache.c:1351

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_check_cache, pki_ossl_crl_cache.c:1269

PKI[7]: Starting OSSL CRL cache check.

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[9]: Attempting to find cached CRL for CDP http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_SelectCRLByIssuerTimeDER, pki_ossl_crl_cache.c:1219

PKI[14]: pki_ossl_get_name_string, pki_ossl.c:315

PKI[9]: Select DER crl(O=cisco, OU=TAC, CN=calo_root)

PKI[12]: pki_ossl_get_crl_internal, pki_ossl_crl_cache.c:506

PKI[7]: CRL not cached. Initiating CRL download for cert idx 0.

PKI[12]: do_get_crl, pki_ossl_revocation.c:85

PKI[9]: starting CRL FSM #0

PKI[11]: drive_fsm, pki_ossl_revocation.c:33

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_InitTransaction

PKI[12]: get_cdps, pki_crl_fsm_act.c:202

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[7]: cdp: (len=58, type=URI, prot=HTTP) http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_InitTransaction, Return status: 0

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_NextCDP

PKI[12]: crldl_cdp_blacklisted, pki_ossl_crl.c:1374

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[7]: CDP is not blacklisted

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_NextCDP, Return status: 0

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_Request

PKI[13]: crldp_download_pending, pki_ossl_crl.c:1184

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[8]: session 0x0dc288f9 adding pending CRL entry for cert 0

PKI[12]: crldp_add_pending_download, pki_ossl_crl.c:1203

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: retrieve_crl, pki_crl_fsm_act.c:233

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[7]: CDP type HTTP

PKI[7]: getting http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_crl_build_http_io, pki_ossl_crl.c:1017

PKI[13]: pki_parse_uri, pki_ossl_uri.c:75

PKI[14]: pki_uri_map_protocol, pki_ossl_uri.c:17

PKI[14]: pki_uri_get_port, pki_ossl_uri.c:34

PKI[13]: pki_free_uri, pki_ossl_uri.c:57

PKI[11]: pki_crl_request_send_async, pki_ossl_crl.c:627

PKI[8]: [16] IOCB allocated

PKI[7]: PKI CRL I/O request queue result: IO_STATUS_QUEUED

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_Request, Return status: 0

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 0, revoked: 0, error: 0, pending: 1, fail-allow: 0

PKI[9]: Async unlocked for session 0x0dc288f9

PKI[8]: [16] Received IO request msg

PKI[8]: [16] DNS resolve issued for 192.0.2.10

PKI[9]: CERT API thread sleeps!

PKI[7]: [16] DNS resolve 192.0.2.10 (192.0.2.10)

PKI[8]: [16] Socket open success

PKI[8]: [16] IPv4 Route lookup to 192.0.2.10 use interface outside

PKI[8]: [16] Connect sent to 192.0.2.10 from 192.0.2.1

PKI[12]: pki_io_cbfunc_log_revocation_check, pki_ossl_revocation.c:421

PKI[7]: 6717056: Attempting CRL revocation check from outside:192.0.2.1/27791 to 192.0.2.10/80 using HTTP.

PKI[8]: [16] Received Socket transmit ready msg

----- Begin Data Type:HTTP Request [16]

Length: 76 -----

47 45 54 20 2f 63 67 69 2d 62 69 6e 2f 70 6b 69 | GET /cgi-bin/pki

63 6c 69 65 6e 74 2e 65 78 65 3f 6f 70 65 72 61 | client.exe?opera

74 69 6f 6e 3d 47 65 74 43 52 4c 20 48 54 54 50 | tion=GetCRL HTTP

2f 31 2e 30 0d 0a 48 6f 73 74 3a 20 31 39 32 2e | /1.0..Host: 192.

31 38 31 2e 33 2e 31 30 0d 0a 0d 0a | 0.2.10....

----- End Data Type:HTTP Request [16]

Length: 76 -----

PKI[8]: [16] Sent 76 bytes

PKI[8]: [16] Received Socket read ready msg

PKI[8]: [16] read 685 bytes

PKI[8]: [16] Read EOF

PKI[12]: pki_io_cbfunc, pki_crl_fsm_act.c:59

PKI[7]: Callback received for vcid: 0, sess_id: 0x0dc288f9, cert_idx: 0, status: IO_STATUS_OK(1), datalen: 685

PKI[13]: get_fsm_data, pki_ossl_revocation.c:446

PKI[7]: [16] IOCB freed

PKI[13]: CERT_API_QueueFSMEvent, vpn3k_cert_api.c:137

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: CERT API thread wakes up!

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=2, session=0x0dc288f9

PKI[9]: Async locked for session 0x0dc288f9

PKI[11]: pki_notify_fsm_evt, pki_ossl_revocation.c:56

PKI[11]: drive_fsm, pki_ossl_revocation.c:33

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_ProcessResp

PKI[13]: pki_ossl_util_find_http_payload, pki_ossl_utils.c:36

PKI[8]: Received CRL of length 272 for session 0x0dc288f9, cert idx 0

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_crl_add_to_cache, pki_ossl_crl_cache.c:1177

PKI[12]: pki_ossl_crypto_verify_and_insert_crl, pki_ossl_crl_cache.c:1126

PKI[12]: pki_ossl_insert_der_crl_int, pki_ossl_crl_cache.c:1017

PKI[8]: Inserting CRL

PKI[14]: pki_ossl_get_crl_summary, pki_ossl.c:151

PKI[8]: ---------CRL--------:

Certificate Revocation List (CRL):

Version 1 (0x0)

Signature Algorithm: sha1WithRSAEncryption

Issuer: /O=cisco/OU=TAC/CN=calo_root

Last Update: Sep 25 00:18:09 2023 GMT

Next Update: Sep 25 02:18:09 2023 GMT

Number of Revoked Certificates: 1

PKI[12]: asn1_to_unix_time, crypto_pki.c:1735

PKI[12]: asn1_to_unix_time, crypto_pki.c:1735

PKI[12]: pki_ossl_crypto_certc_insert_CRL, pki_ossl_crl_cache.c:735

PKI[7]: CRL: current time is 1695601164

PKI[7]: CRL: nextupdate time is 1695608289

PKI[7]: CRL: lastupdate time is 1695601089

PKI[7]: set CRL update timer with delay: 7125

PKI[12]: pki_ossl_get_crl_internal, pki_ossl_crl_cache.c:506

PKI[7]: the current device time: 00:19:24 UTC Sep 25 2023

PKI[7]: the last CRL update time: 00:18:09 UTC Sep 25 2023

PKI[7]: the next CRL update time: 02:18:09 UTC Sep 25 2023

PKI[7]: CRL cache delay being set to: 3600000

PKI[14]: pki_ossl_set_crl_store_dirty, pki_ossl_crl_cache.c:1441

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: crldl_notify_result, pki_ossl_crl.c:1304

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_ProcessResp, Return status: 0

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_Callback

PKI[12]: rev_cb, pki_ossl_validate.c:902

PKI[7]: revocation status queued for session 0x0dc288f9 and cert_idx 0, rev_status 3

PKI[13]: CERT_API_QueueFSMResp, vpn3k_cert_api.c:158

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_Callback, Return status: 0

PKI[9]: Async unlocked for session 0x0dc288f9

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=3, session=0x0dc288f9

PKI[9]: Async locked for session 0x0dc288f9

PKI[12]: pki_ossl_eval_revocation, pki_ossl_validate.c:699

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x0dc288f9, cert 0 has rev_status 3, using methods 1/3/0 at index 0

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 1, revoked: 0, error: 0, pending: 0, fail-allow: 0

PKI[7]: session: 0x0dc288f9, all revocation processing complete

PKI[5]: session: 0x0dc288f9, CRL for certificate 0 has been cached

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: pki_ossl_crl_add_cache_to_store, pki_ossl_crl_cache.c:1396

PKI[9]: OSSL certstore updated with 0 certs, 1 CRLs and 0 policies, 0 certs added to stack

PKI[7]: session 0x0dc288f9, Starting chain validation with cached CRL checking

PKI[12]: pki_ossl_find_valid_chain, pki_ossl_validate.c:472

PKI[9]: Begin sorted cert chain

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)<<<<<<<<<<<<<<<<<<<

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[9]: End sorted cert chain

PKI[13]: pki_ossl_get_store, pki_ossl_certstore.c:61

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: Cert to verify

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[6]: val status=0: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (23)certificate revoked, cert_idx: 0<<<<<<<<<<<<<<<<<

PKI[14]: is_crl_error, pki_ossl_validate.c:278

PKI[14]: is_crl_error, pki_ossl_validate.c:278

PKI[4]: Certificate verification error: certificate revoked<<<<<<<<<<<<<<<<<<<

PKI[14]: map_ossl_error, pki_ossl_validate.c:62

PKI[7]: session 0x0dc288f9, Validation with CRL checking completed, status 15

PKI[5]: session 0x0dc288f9, Error in revocation check or revoked certs found

PKI[12]: pki_ossl_do_callback, pki_ossl_validate.c:164

PKI[13]: CERT_Close, vpn3k_cert_api.c:291

PKI[8]: Close session 0x0dc288f9 asynchronously

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: Async unlocked for session 0x0dc288f9

PKI[8]: No IOCB found for SOCKET CLOSE message, handle 0x1a6b367e

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=1, session=0x0dc288f9

PKI[9]: Async locked for session 0x0dc288f9

PKI[9]: Async unlocked for session 0x0dc288f9

PKI[13]: pki_ossl_free_valctx, pki_ossl_validate.c:251

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[9]: CERT API thread sleeps!

[..output ommitted]

PKI[7]: Cert to verify

PKI[7]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /O=cisco/OU=TAC/CN=calo_root. ctx->error: (0)ok, cert_idx: 1

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (0)ok, cert_idx: 0

PKI[8]: pki_ossl_find_valid_chain took 233 microsecs

PKI[6]: Verified chain:

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[6]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[6]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

[..ooutput ommitted]

CRYPTO_PKI: bitValue of KEY_USAGE = a0PKI[7]: CRYPTO_PKI:check_key_usage: Checking KU for case VPN peer certs.

PKI[7]: CRYPTO_PKI:check_key_usage: KU bit digitalSignature is ON.

PKI[7]: ExtendedKeyUsage OID = serverAuth NOT acceptable for usage type SSL VPN Peer

PKI[7]: ExtendedKeyUsage OID = clientAuth acceptable for usage type: SSL VPN Peer

PKI[7]: check_key_usage:Extended Key/Key Usage check OK

PKI[12]: pki_ossl_revocation_check, pki_ossl_validate.c:931

PKI[7]: Starting revocation check for session 0x1acca1bd

PKI[12]: pki_init_revocation, pki_ossl_revocation.c:162

PKI[12]: pki_ossl_eval_revocation, pki_ossl_validate.c:699

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x1acca1bd, cert 0 has rev_status 0, using methods 1/3/0 at index 0

PKI[12]: cert_revoc_exempt, pki_ossl_revocation.c:250

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[13]: pki_crl_cached, pki_ossl_crl_cache.c:1351

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_check_cache, pki_ossl_crl_cache.c:1269

PKI[7]: Starting OSSL CRL cache check.

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[9]: Attempting to find cached CRL for CDP http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_SelectCRLByIssuerTimeDER, pki_ossl_crl_cache.c:1219

PKI[14]: pki_ossl_get_name_string, pki_ossl.c:315

PKI[9]: Select DER crl(O=cisco, OU=TAC, CN=calo_root)

PKI[12]: pki_ossl_get_crl_internal, pki_ossl_crl_cache.c:506

PKI[13]: is_crl_dst, pki_ossl_crl_cache.c:479

PKI[7]: CRL for cert idx 0 found in cache

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 1, revoked: 0, error: 0, pending: 0, fail-allow: 0

PKI[7]: session: 0x1acca1bd, all revocation processing complete

PKI[5]: session: 0x1acca1bd, CRL for certificate 0 has been cached

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[7]: session 0x1acca1bd, Starting chain validation with cached CRL checking

PKI[12]: pki_ossl_find_valid_chain, pki_ossl_validate.c:472

PKI[9]: Begin sorted cert chain

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[9]: End sorted cert chain

PKI[13]: pki_ossl_get_store, pki_ossl_certstore.c:61

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: Cert to verify

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[6]: val status=0: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (23)certificate revoked, cert_idx: 0

PKI[14]: is_crl_error, pki_ossl_validate.c:278

PKI[14]: is_crl_error, pki_ossl_validate.c:278

PKI[4]: Certificate verification error: certificate revoked

PKI[14]: map_ossl_error, pki_ossl_validate.c:62

PKI[7]: session 0x1acca1bd, Validation with CRL checking completed, status 15

PKI[5]: session 0x1acca1bd, Error in revocation check or revoked certs found

PKI[12]: pki_ossl_do_callback, pki_ossl_validate.c:164

PKI[13]: CERT_Close, vpn3k_cert_api.c:291

PKI[8]: Close session 0x1acca1bd asynchronously

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: Async unlocked for session 0x1acca1bd

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=1, session=0x1acca1bd

PKI[9]: Async locked for session 0x1acca1bd

PKI[9]: Async unlocked for session 0x1acca1bd

PKI[13]: pki_ossl_free_valctx, pki_ossl_validate.c:251

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[9]: CERT API thread sleeps!

Nella successiva acquisizione FTD viene visualizzata la transazione HTTP tra l'FTD e il CDP per recuperare il CRL ora che nell'elenco è memorizzato un certificato revocato.

Risoluzione dei problemi

Questi comandi possono essere utilizzati per identificare ulteriori problemi relativi ai certificati:

- Nell'FTD:

debug crypto ca 14

- Sul router CA:

debug crypto pki API

debug crypto pki callbacks

debug crypto pki messages

debug crypto pki validation

debug crypto pki error

debug crypto pki server

debug crypto pki transactions