Sommario

Introduzione

Problema

Soluzione

Informazioni correlate

Introduzione

In questo documento viene illustrato come risolvere i problemi di integrazione di Security Management Appliance (SMA) ed Email Security Appliance (ESA) che generano errori: "(3, 'Impossibile trovare l'algoritmo di scambio chiavi corrispondente.') o "EOF imprevisto alla connessione" e sintomi aggiuntivi.

Premesse

Connessione SMA all'ESA durante la prima integrazione, SMA offre i seguenti algoritmi di scambio di cifrari/chiavi all'ESA:

kex_algorithms string: diffie-hellman-group-exchange-sha256,diffie-hellman-group-exchange-sha1,diffie-hellman-group14-sha1,ecdh-sha2-nistp256,ecdh-sha2-nistp384,ecdh-sha2-nistp521

encryption_algorithms_client_to_server string: aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,rijndael-cbc@lysator.liu.se

encryption_algorithms_server_to_client string: aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,rijndael-cbc@lysator.liu.se

Una volta stabilita la connessione SMA ed ESA, l'SMA offre all'ESA i seguenti algoritmi di scambio di cifrari/chiavi:

kex_algorithms string: curve25519-sha256@libssh.org,ecdh-sha2-nistp256,ecdh-sha2-nistp384,ecdh-sha2-nistp521,diffie-hellman-group-exchange-sha256,diffie-hellman-group-exchange-sha1,diffie-hellman-group14-sha1,diffie-hellman-group1-sha1

encryption_algorithms_client_to_server string [truncated]: aes128-ctr,aes192-ctr,aes256-ctr,arcfour256,arcfour128,aes128-gcm@openssh.com,aes256-gcm@openssh.com,chacha20-poly1305@openssh.com,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,arcfour,rijndael-cbc@lysator.liu.se

encryption_algorithms_server_to_client string [truncated]: aes128-ctr,aes192-ctr,aes256-ctr,arcfour256,arcfour128,aes128-gcm@openssh.com,aes256-gcm@openssh.com,chacha20-poly1305@openssh.com,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,arcfour,rijndael-cbc@lysator.liu.se

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Problema

Il problema si verifica quando si integra lo SMA nell'ESA dalla GUI > Management Appliance > Centralized Services > Security Appliance o dalla CLI > appliance config. Il problema provocherà un errore sulla connessione, a causa della mancanza da parte dell'ESA di alcuni algoritmi di cifratura/algoritmi kex.

1. (3, 'Could not find matching key exchange algorithm.')

2. Error — Unexpected EOF on connect.

Soluzione

Per risolvere questo problema, è necessario riportare la configurazione della cifratura ESA ssh ai valori predefiniti forniti:

lab.esa.com> sshconfig

Choose the operation you want to perform:

- SSHD - Edit SSH server settings.

- USERKEY - Edit SSH User Key settings

- ACCESS CONTROL - Edit SSH whitelist/blacklist

[]> sshd

ssh server config settings:

Public Key Authentication Algorithms:

rsa1

ssh-dss

ssh-rsa

Cipher Algorithms:

aes128-ctr

aes192-ctr

aes256-ctr

aes128-cbc

3des-cbc

blowfish-cbc

cast128-cbc

aes192-cbc

aes256-cbc

rijndael-cbc@lysator.liu.se

MAC Methods:

hmac-md5

hmac-sha1

umac-64@openssh.com

hmac-ripemd160

hmac-ripemd160@openssh.com

hmac-sha1-96

hmac-md5-96

Minimum Server Key Size:

1024

KEX Algorithms:

diffie-hellman-group-exchange-sha256

diffie-hellman-group-exchange-sha1

diffie-hellman-group14-sha1

diffie-hellman-group1-sha1

ecdh-sha2-nistp256

ecdh-sha2-nistp384

ecdh-sha2-nistp521

L'output restituito da CLI > sshconfig > sshd nella configurazione dettagliata:

[]> setup

Enter the Public Key Authentication Algorithms do you want to use

[rsa1,ssh-dss,ssh-rsa]>

Enter the Cipher Algorithms do you want to use

[aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,rijndael-cbc@lysator.liu.se]>

Enter the MAC Methods do you want to use

[hmac-md5,hmac-sha1,umac-64@openssh.com,hmac-ripemd160,hmac-ripemd160@openssh.com,hmac-sha1-96,hmac-md5-96]>

Enter the Minimum Server Key Size do you want to use

[1024]>

Enter the KEX Algorithms do you want to use

[diffie-hellman-group-exchange-sha256,diffie-hellman-group-exchange-sha1,diffie-hellman-group14-sha1,diffie-hellman-group1-sha1,ecdh-sha2-nistp256,ecdh-sha2-nistp384,ecdh-sha2-nistp521]>

Informazioni correlate

- Cisco Email Security Appliance - Guide per l'utente

- Documentazione e supporto tecnico – Cisco Systems

- Procedure ottimali per la quarantena centralizzata di virus ed epidemie

- Guida completa per la configurazione della quarantena della posta indesiderata ESA con SMA