Sommario

Domanda:

L'ESA può inviare il traffico SMTP a un numero di porta diverso da 25?

La porta 25 è la porta SMTP standard utilizzata dai server di scambio della posta per ascoltare i messaggi e-mail in arrivo. L'ESA può essere configurata per recapitare la posta a un host specifico su una porta alternativa. OSPF (Open Shortest Path First) smtproutes  nella CLI è il modo più semplice per configurare questo:

mail3.example.com> smtproutes

There are no routes configured.

Choose the operation you want to perform:

- NEW - Create a new route.

- IMPORT - Import new routes from a file.

[]> new

Enter the hostname for which you want to set up a permanent route.

Partial hostnames such as ".example.com" are allowed.

Use "ALL" for the default route.

[]> testexchange.example.com

Enter the destination hosts, separated by commas, which you want mail for

testexchange.ironport.com to be delivered.

Enter /dev/null by itself if you wish to discard the mail.

[]> exchange.example.com:1025

Mapping for testexchange.ironport.com to exchange.example.com:1025 created.

There are currently 1 routes configured.

Choose the operation you want to perform:

- NEW - Create a new route.

- DELETE - Remove a route.

- PRINT - Display all routes.

- IMPORT - Import new routes from a file.

- EXPORT - Export all routes to a file.

- CLEAR - Remove all routes.

[]>

> commit

Please enter some comments describing your changes:

[]> testing the new exchange server on an alternate port

Changes committed: Mon Mar 28 14:20:06 2005 PST

mail3.example.com>

In questo caso, il sistema è configurato per inviare messaggi di posta elettronica da testexchange.example.com a exchange.example.com sulla porta 1025.

È inoltre possibile apportare le modifiche precedenti tramite GUI, Network->SMTP Route->Add SMTP Route e compilare il dominio e l'host di destinazione con la porta desiderata. Al termine, è necessario inviare e confermare le modifiche.

Per configurare l'ESA in modo che invii la posta a un host specifico su una porta alternativa utilizzando la GUI dell'accessorio, scegliere Rete > Interfaccia IP e modificare le impostazioni dell'interfaccia IP.