Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Configurazione

Esempio di rete

Configurazioni

Supporto OSPF per Fast Hellos

Nuovi comandi timer OSPF per annunci allo stato del collegamento e limitazione SPF

Filtraggio route OSPF con ACL

Miglioramenti monitoraggio OSPF

OSPF Redistribute BGP

Verifica

Risoluzione dei problemi

Introduzione

In questo documento vengono descritte le nuove funzionalità e i comandi introdotti nel software Adaptive Security Appliance (ASA) versione 9.2.1 in relazione al protocollo OSPF (Open Shortest Path First).

Prerequisiti

Requisiti

Nessun requisito specifico previsto per questo documento.

Componenti usati

Per la stesura del documento, è stato usato un firewall Cisco ASA serie 5500-X con software Cisco ASA versione 9.2(1) e successive.

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Configurazione

Nota: per ulteriori informazioni sui comandi menzionati in questa sezione, usare lo strumento di ricerca dei comandi (solo utenti registrati).

Esempio di rete

Configurazioni

Supporto OSPF per Fast Hellos

I pacchetti hello OSPF sono pacchetti che un processo OSPF invia ai propri vicini OSPF per mantenere la connettività con tali vicini. I pacchetti hello vengono inviati a intervalli configurabili (in secondi). Le impostazioni predefinite sono 10 secondi per un collegamento Ethernet e 30 secondi per un collegamento non broadcast. I pacchetti Hello includono un elenco di tutti i router adiacenti per i quali è stato ricevuto un pacchetto hello entro l'intervallo di inattività. Anche l'intervallo inattivo è un intervallo configurabile (in secondi) e per impostazione predefinita è quattro volte il valore dell'intervallo hello. Il valore di tutti gli intervalli hello deve essere lo stesso all'interno di una rete. Analogamente, il valore di tutti gli intervalli inattivi deve essere lo stesso all'interno di una rete.

I pacchetti hello veloci OSPF si riferiscono ai pacchetti hello inviati a intervalli inferiori a 1 secondo. Per abilitare i pacchetti fast hello OSPF, immettere il comando ospf dead-interval. Per gli helper al secondo, l'intervallo di inattività è impostato su 1 secondo o su un valore minimo e il valore del moltiplicatore hello è impostato sul numero di pacchetti hello che si desidera inviare in quel secondo. Ad esempio, se l'intervallo di inattività è impostato su 1 secondo e il moltiplicatore di elio è impostato su 4, le eliche verranno inviate ogni 0,25 secondi.

Quando sull'interfaccia sono configurati pacchetti hello veloci, l'intervallo hello annunciato nei pacchetti hello inviati da questa interfaccia è impostato su 0. L'intervallo hello nei pacchetti hello ricevuti su questa interfaccia viene ignorato. È importante notare che l'intervallo inattivo deve essere coerente su un segmento. Sia che sia impostato su 1 secondo (per i pacchetti hello veloce) o su qualsiasi altro valore, deve essere coerente tra i vicini di quel segmento. Non è necessario che il moltiplicatore hello sia lo stesso per l'intero segmento, a condizione che almeno un pacchetto hello venga inviato entro l'intervallo di inattività.

Per abilitare i fast hellop con un multiplo di 4, immettere il comando ospf dead-interval minimum hello-moltiplicator 4 nella configurazione di interfaccia appropriata.

interface GigabitEthernet0/0

nameif inside

security-level 100

ip address 198.51.100.1 255.255.255.0

ospf dead-interval minimal hello-multiplier 4

router ospf 1

network 198.51.100.0 255.255.255.0 area 0

Verificare con il comando show ospf interface.

asa(config)# show ospf interface

inside is up, line protocol is up

Internet Address 198.51.100.1 mask 255.255.255.0, Area 0

Process ID 928, Router ID 198.51.100.1, Network Type BROADCAST, Cost: 10

Transmit Delay is 1 sec, State DR, Priority 1

Designated Router (ID) 198.51.100.1, Interface address 198.51.100.1

No backup designated router on this network

Timer intervals configured, Hello 250 msec, Dead 1, Wait 1, Retransmit 5

Hello due in 48 msec

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 0, maximum is 0

Last flood scan time is 0 msec, maximum is 0 msec

Neighbor Count is 0, Adjacent neighbor count is 0

Suppress hello for 0 neighbor(s)

Nuovi comandi timer OSPF per annunci allo stato del collegamento e limitazione SPF

Questi comandi sono stati introdotti in ASA versione 9.2.1 e successive: timer arrivo lsa, timer pacing, timer throttle lsa e timer throttle spf come parte della configurazione del router OSPF.

asa(config-router)# timers ?

router mode commands/options:

lsa       OSPF LSA timers

pacing    OSPF pacing timers

throttle  OSPF throttle timers

Questi comandi sono stati rimossi: timer spf e timer lsa-grouping-pacing.

Per ulteriori informazioni sui vantaggi della limitazione LSA (Link State Advertisement) e SPF (Shortest Path First), consultare i seguenti documenti:

- Limitazione primo percorso più breve OSPF

- OSPF Link-State Advertisement (LSA)

Filtraggio route OSPF con ACL

Il filtro route con un ACL (Access Control List) è ora supportato. A tale scopo, è possibile usare il comando distribute-list per filtrare le route.

Ad esempio, per filtrare i percorsi per 10.20.20.0/24, la configurazione sarà simile alla seguente:

access-list ospf standard deny host 10.20.20.0

access-list ospf standard permit any4

!

router ospf 1

network 198.51.100.0 255.255.255.0 area 0

log-adj-changes

distribute-list ospf in interface inside

Quando l'ACL associato è selezionato, indica che ha un numero di accessi incrementale:

asa(config)# show access-list ospf

access-list ospf; 2 elements; name hash: 0xb5dd06eb

access-list ospf line 1 standard deny host 10.20.20.0 (hitcnt=1) 0xe29503b8

access-list ospf line 2 standard permit any4 (hitcnt=2) 0x51ff4e67

Inoltre, è possibile controllare il database RIB (Routing Information Base) sull'appliance ASA per verificarne ulteriormente la funzionalità. Immettere il comando show ospf rib detail per restituire il database completo delle informazioni di routing per il processo del router OSPF. I 'flag' associati a ogni route indicano se è stato installato o meno nel RIB.

asa(config)# show ospf rib detail

OSPF Router with ID (198.51.100.10) (Process ID 1)

OSPF local RIB

Codes: * - Best, > - Installed in global RIB

*>  172.18.124.0/32, Intra, cost 11, area 0

SPF Instance 13, age 0:13:59

Flags: RIB, HiPrio

via 198.51.100.2, inside, flags: RIB

LSA: 1/198.51.100.2/198.51.100.2

*   10.20.20.0/32, Intra, cost 11, area 0

SPF Instance 13, age 0:13:59

Flags: HiPrio

via 198.51.100.2, inside, flags: none

LSA: 1/198.51.100.2/198.51.100.2

*>  192.168.10.0/32, Intra, cost 11, area 0

SPF Instance 13, age 0:13:59

Flags: RIB, HiPrio

via 198.51.100.2, inside, flags: RIB

LSA: 1/198.51.100.2/198.51.100.2

*   198.51.100.0/24, Intra, cost 10, area 0

SPF Instance 13, age 0:52:52

Flags: Connected

via 198.51.100.10, inside, flags: Connected

LSA: 2/198.51.100.2/192.151.100.10

Nell'output precedente, i router elencati con i flag 'RIB' sono stati installati, mentre il router con i flag 'none' non è stato installato. Ciò dovrebbe riflettersi anche nella tabella di routing globale. Controllare con il comando show route.

asa(config)# show route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

Gateway of last resort is 10.106.44.1 to network 0.0.0.0

S*    0.0.0.0 0.0.0.0 [1/0] via 10.106.44.1, tftp

O        172.18.124.0 255.255.255.0 [110/11] via 198.51.100.2, 00:00:03, inside

O        192.168.10.0 255.255.255.0 [110/11] via 198.51.100.2, 00:00:03, inside

O        10.20.20.0 255.255.255.0 [110/11] via 198.51.100.2, 00:00:03, inside

S        10.76.76.160 255.255.255.255 [1/0] via 10.106.44.1, tftp

C        10.86.195.0 255.255.255.0 is directly connected, management

L        10.86.195.1 255.255.255.255 is directly connected, management

Miglioramenti monitoraggio OSPF

Questi comandi sono stati introdotti per agevolare il monitoraggio e il monitoraggio del processo del router OSPF. Per riferimento vengono forniti output di esempio da questi comandi.

show ospf interface brief

Immettere il comando show ospf interface brief per ottenere un'istantanea rapida delle adiacenze presenti sull'appliance ASA.

asa(config)# show ospf interface brief

Interface    PID   Area            IP Address/Mask    Cost  State Nbrs F/C

inside          1     0               198.51.100.2/255.255.255.0    10    DR 1/1

show ospf statistics [Detail]

Il comando show ospf statistics detail fornisce una breve descrizione della data dell'ultima esecuzione di SPF e del numero di esecuzioni. Indica inoltre il numero di nuove LSA aggiunte al database.

asa(config)# show ospf statistics detail

OSPF Router with ID (198.51.100.10) (Process ID 1)

Area 0: SPF algorithm executed 12 times

SPF 3 executed 00:32:56 ago, SPF type Full

SPF calculation time (in msec):

SPT    Intra  D-Intr Summ   D-Summ Ext7   D-Ext7 Total

0      0      0      0      0      0      00

LSIDs processed R:2 N:1 Stub:1 SN:0 SA:0 X7:0

Change record 0x0

LSIDs changed 1

Changed LSAs. Recorded is LS ID and LS type:

198.51.100.2(R)

SPF 4 executed 00:28:16 ago, SPF type Full

SPF calculation time (in msec):

SPT    Intra  D-Intr Summ   D-Summ Ext7   D-Ext7 Total

0      0      0      0      0      0      00

LSIDs processed R:1 N:1 Stub:0 SN:0 SA:0 X7:0

Change record 0x0

LSIDs changed 2

Changed LSAs. Recorded is LS ID and LS type:

198.51.100.2(R) 198.51.100.10(R)

SPF 5 executed 00:28:06 ago, SPF type Full

SPF calculation time (in msec):

SPT    Intra  D-Intr Summ   D-Summ Ext7   D-Ext7 Total

0      0      0      0      0      0      00

LSIDs processed R:2 N:1 Stub:1 SN:0 SA:0 X7:0

Change record 0x0

LSIDs changed 1

Changed LSAs. Recorded is LS ID and LS type:

198.51.100.2(R)

SPF 6 executed 00:26:40 ago, SPF type Full

SPF calculation time (in msec):

SPT    Intra  D-Intr Summ   D-Summ Ext7   D-Ext7 Total

0      0      0      0      0      0      00

LSIDs processed R:1 N:1 Stub:0 SN:0 SA:0 X7:0

Change record 0x0

LSIDs changed 2

Changed LSAs. Recorded is LS ID and LS type:

198.51.100.2(R) 198.51.100.10(R)

mostra router adiacente eventi ospf

Si tratta di un comando utile per controllare lo stato adiacente di OSPF, in particolare nel caso in cui OSPF si sposti. Fornisce un elenco di eventi e transizioni di stato per ogni router adiacente insieme all'indicatore orario di tali eventi. Nell'esempio, il router adiacente 10.10.40.1 è passato dagli stati DOWN a FULL.

asa(config)# show ospf events neighbor

OSPF Router with ID (198.51.100.10) (Process ID 1)

279 May 15 13:07:31.737: Neighbor 198.51.100.2, Interface inside state changes from

LOADING to FULL

280 May 15 13:07:31.737: Neighbor 198.51.100.2, Interface inside state changes from

EXCHANGE to LOADING

281 May 15 13:07:31.737: Neighbor 198.51.100.2, Interface inside state changes from

EXSTART to EXCHANGE

290 May 15 13:07:31.737: Neighbor 198.51.100.2, Interface inside state changes from

2WAY to EXSTART

296 May 15 13:07:31.738: Neighbor 198.51.100.2, Interface inside state changes from

INIT to 2WAY

297 May 15 13:07:31.728: Neighbor 198.51.100.2, Interface inside state changes from

DOWN to INIT

show ospf events lsa

Questo comando è utile per verificare quali LSA sono state generate e ricevute. Questi sono utili in caso di link flapping e allagamento LSA.

asa(config)# show ospf events lsa

OSPF Router with ID (198.51.100.10) (Process ID 1)

253 May 15 13:07:49.167: Rcv Changed Type-1 LSA, LSID 198.51.100.2,

Adv-Rtr 198.51.100.2, Seq# 80000002, Age 1, Area 0

271 May 15 13:07:32.237: Generate New Type-2 LSA, LSID 198.51.100.1,

Seq# 80000001, Age 0, Area 0

275 May 15 13:07:32.238: Generate Changed Type-1 LSA, LSID 198.51.100.10,

Seq# 80000002, Age 0, Area 0

276 May 15 13:07:32.228: Rcv New Type-1 LSA, LSID 198.51.100.2,

Adv-Rtr 198.51.100.2, Seq# 80000001, Age 1, Area 0

mostra nervatura adiacente eventi ospf

Questo comando fornisce informazioni sulle route aggiunte nel RIB e sul tipo di route installato (Intra/Inter).

asa(config)# show ospf events neighbor rib

255 May 15 13:07:54.168: RIB Update, dest 172.18.124.0, mask 255.255.255.255,

gw 198.51.100.2, via inside, source 198.51.100.2, type Intra

287 May 15 13:07:31.738: Neighbor 198.51.100.2, Interface inside state changes from

LOADING to FULL

288 May 15 13:07:31.738: Neighbor 198.51.100.2, Interface inside state changes from

EXCHANGE to LOADING

289 May 15 13:07:31.738: Neighbor 198.51.100.2, Interface inside state changes from

EXSTART to EXCHANGE

298 May 15 13:07:31.738: Neighbor 198.51.100.2, Interface inside state changes from

2WAY to EXSTART

304 May 15 13:07:31.738: Neighbor 198.51.100.2, Interface inside state changes from

INIT to 2WAY

305 May 15 13:07:31.728: Neighbor 198.51.100.2, Interface inside state changes from

DOWN to INIT

show ospf events spf

Durante l'esecuzione del calcolo SPF, i tempi di esecuzione e le probabilità LSA risultanti vengono registrati nell'elenco degli eventi SPF.

asa(config)# show ospf events spf

235 May 15 13:07:54.167: End of SPF, SPF time 0ms, next wait-interval 10000ms

240 May 15 13:07:54.167: Starting External processing in area 0

241 May 15 13:07:54.167: Starting External processing

244 May 15 13:07:54.167: Starting summary processing, Area 0

250 May 15 13:07:54.167: Starting Intra-Area SPF, Area 0, spf_type Full

251 May 15 13:07:54.167: Starting SPF, wait-interval 5000ms

254 May 15 13:07:49.167: Schedule SPF, Area 0, spf-type Full, Change in LSA

Type RLSID 198.51.100.2, Adv-Rtr 198.51.100.2

255 May 15 13:07:37.227: End of SPF, SPF time 0ms, next wait-interval 10000ms

260 May 15 13:07:37.228: Starting External processing in area 0

261 May 15 13:07:37.228: Starting External processing

264 May 15 13:07:37.228: Starting summary processing, Area 0

268 May 15 13:07:37.228: Starting Intra-Area SPF, Area 0, spf_type Full

269 May 15 13:07:37.228: Starting SPF, wait-interval 5000ms

272 May 15 13:07:32.238: Schedule SPF, Area 0, spf-type Full, Change in LSA

Type NLSID 198.51.100.1, Adv-Rtr 198.51.100.10

274 May 15 13:07:32.238: Schedule SPF, Area 0, spf-type Full, Change in LSA

Type RLSID 198.51.100.10, Adv-Rtr 198.51.100.10

277 May 15 13:07:32.228: Schedule SPF, Area 0, spf-type Full, Change in LSA

Type RLSID 198.51.100.2, Adv-Rtr 198.51.100.2

show ospf events generic

Questo output contiene eventi generici a livello di processo, ad esempio la scelta del router designato (DR) e le modifiche alle adiacenze.

asa(config)# show ospf events generic

236 May 15 13:07:54.167: Generic:  ospf_external_route_sync0x0

237 May 15 13:07:54.167: Generic:  ospf_external_route_sync0x0

238 May 15 13:07:54.167: Generic:  ospf_external_route_sync0x0

239 May 15 13:07:54.168: Generic:  ospf_external_route_sync0x0

242 May 15 13:07:54.168: Generic:  ospf_inter_route_sync0x0

243 May 15 13:07:54.168: Generic:  ospf_inter_route_sync0x0

245 May 15 13:07:54.168: Generic:  post_spf_intra0x0

246 May 15 13:07:54.168: Generic:  ospf_intra_route_sync0x0

248 May 15 13:07:54.168: Generic:  ospf_intra_route_sync0x0

249 May 15 13:07:54.168: DB add:  172.18.124.00x987668 204

252 May 15 13:07:51.668: Timer Exp:  if_ack_delayed0xcb97dfe0

256 May 15 13:07:37.228: Generic:  ospf_external_route_sync0x0

257 May 15 13:07:37.228: Generic:  ospf_external_route_sync0x0

258 May 15 13:07:37.228: Generic:  ospf_external_route_sync0x0

259 May 15 13:07:37.228: Generic:  ospf_external_route_sync0x0

262 May 15 13:07:37.228: Generic:  ospf_inter_route_sync0x0

263 May 15 13:07:37.228: Generic:  ospf_inter_route_sync0x0

265 May 15 13:07:37.228: Generic:  post_spf_intra0x0

266 May 15 13:07:37.228: Generic:  ospf_intra_route_sync0x0

267 May 15 13:07:37.228: Generic:  ospf_intra_route_sync0x0

270 May 15 13:07:34.728: Timer Exp:  if_ack_delayed0xcb97dfe0

273 May 15 13:07:32.238: DB add:  198.51.100.100x987848 206

278 May 15 13:07:32.228: DB add:  198.51.100.20x987938 205

283 May 15 13:07:31.738: Elect DR:  inside198.51.100.10

284 May 15 13:07:31.738: Elect BDR:  inside198.51.100.2

285 May 15 13:07:31.736: i/f state nbr chg:  inside0x5

287 May 15 13:07:31.736: Elect DR:  inside198.51.100.10

288 May 15 13:07:31.736: Elect BDR:  inside198.51.100.2

289 May 15 13:07:31.736: i/f state nbr chg:  inside0x5

291 May 15 13:07:31.736: nbr state adjok:  198.51.100.20x3

293 May 15 13:07:31.736: Elect DR:  inside198.51.100.10

294 May 15 13:07:31.736: Elect BDR:  inside198.51.100.2

295 May 15 13:07:31.736: i/f state nbr chg:  inside0x5

mostra dettagli nervatura ospf

Questo comando, menzionato in precedenza, consente a un amministratore di verificare quali route sono state apprese dai peer e se tali route sono state installate nel RIB. Le route potrebbero non essere installate nel RIB a causa del filtro route (elencato in precedenza).

asa(config)# show ospf rib detail

OSPF Router with ID (198.51.100.1) (Process ID 1)

OSPF local RIB

Codes: * - Best, > - Installed in global RIB

*>  172.18.124.0/32, Intra, cost 11, area 0

SPF Instance 13, age 0:13:59

Flags: RIB, HiPrio

via 198.51.100.2, inside, flags: RIB

LSA: 1/198.51.100.2/198.51.100.2

*   10.20.20.0/32, Intra, cost 11, area 0

SPF Instance 13, age 0:13:59

Flags: HiPrio

via 198.51.100.2, inside, flags: none

LSA: 1/198.51.100.2/198.51.100.2

*>  192.168.10.0/32, Intra, cost 11, area 0

SPF Instance 13, age 0:13:59

Flags: RIB, HiPrio

via 198.51.100.2, inside, flags: RIB

LSA: 1/198.51.100.2/198.51.100.2

*   198.51.100.0/24, Intra, cost 10, area 0

SPF Instance 13, age 0:52:52

Flags: Connected

via 198.51.100.10, inside, flags: Connected

LSA: 2/198.51.100.2/192.151.100.10

mostra dettagli router adiacente ospf

Il comando show ospf neighbors detail consente di specificare lo stato dell'adiacenza OSPF.

asa(config)# show ospf neighbor detail

Neighbor 198.51.100.2, interface address 198.51.100.2

In the area 0 via interface ISP

Neighbor priority is 1, State is FULL, 6 state changes

DR is 198.51.100.10 BDR is 198.51.100.2

Options is 0x12 in Hello (E-bit, L-bit)

Options is 0x52 in DBD (E-bit, L-bit, O-bit)

Dead timer due in 0:00:16

Neighbor is up for 00:02:45

Index 1/1, retransmission queue length 0, number of retransmission 0

First 0x0(0)/0x0(0) Next 0x0(0)/0x0(0)

Last retransmission scan length is 0, maximum is 0

Last retransmission scan time is 0 msec, maximum is 0 msec

OSPF Redistribute BGP

Per supportare la ridistribuzione del Border Gateway Protocol (BGP) in e in uscita da altri protocolli di routing, il comando redistribute bgp è stato introdotto nella configurazione del router OSPF. Immettere questo comando per ridistribuire il routing appreso tramite BGP nel processo OSPF in esecuzione.

asa(config)# router ospf 1

asa(config-router)# redistribute bgp ?

router mode commands/options:

100  Autonomous system number

ASA-1(config-router)# redistribute bgp 100

Verifica

Attualmente non è disponibile una procedura di verifica per questa configurazione.

Risoluzione dei problemi

Al momento non sono disponibili informazioni specifiche per la risoluzione dei problemi di questa configurazione.