Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Premesse

Configurazione

Esempio di rete

Attività 1. Download delle immagini ASA dalle pagine di download del software Cisco

Attività 2. Caricare le immagini ASA in Firepower Chassis Manager

Attività 3. Aggiornamento della prima unità ASA

Attività 4. Aggiornamento della seconda unità ASA

Verifica

Risoluzione dei problemi

Informazioni correlate

Introduzione

In questo documento viene descritta la procedura di aggiornamento di una coppia di appliance ASA (Adaptive Security Appliance) ad alta disponibilità installate su appliance hardware firepower.

Prerequisiti

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

- Gestione ASA

- Failover ASA

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- 2 FP4150 con codice operativo 2.0.1-86

- ASA 9.6.2.1 (aggiornato alla versione 9.6.2.3)

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Premesse

La procedura di aggiornamento di un modulo ASA installato su appliance Firepower (FPR4100, FPR9300 e così via) quando è configurato HA (Active/Standby o Active/Active) è descritta nella Guida alla configurazione di Firepower eXtensible Operating System (FXOS). La parte pertinente è la seguente:

L'obiettivo di questo documento è fornire una panoramica più dettagliata del processo di aggiornamento in un ambiente HA.

Nota: Il documento presume che la versione ASA di destinazione sia compatibile con la versione FXOS esistente, quindi in questo scenario non è necessario aggiornare il bundle FXOS. Controllare sempre la matrice di compatibilità FXOS per verificare se la versione ASA di destinazione è compatibile con l'immagine FXOS. In caso contrario, aggiornare prima le immagini FXOS come descritto nelle note sulla versione di FXOS.

Configurazione

Esempio di rete

ASA1 come appare nell'interfaccia utente di Firepower Chassis Manager (FCM):

ASA2:

Attività 1. Download delle immagini ASA dalle pagine di download del software Cisco

Selezionare Downloads Home > Products > Security > Firewall > Next-Generation Firewall (NGFW) e selezionare la piattaforma hardware (ad esempio 4100, 9000 e così via) come mostrato nell'immagine.

Attività 2. Caricare le immagini ASA in Firepower Chassis Manager

Caricare le immagini ASA sullo chassis Firepower. A tale scopo, è possibile usare l'interfaccia utente di Firepower Chassis Manager (FCM) o l'interfaccia della riga di comando (CLI) di FXOS.

Metodo 1. Caricare le immagini ASA dall'interfaccia utente di FCM.

Selezionare Sistema > Aggiornamenti. Selezionare Upload Image, specificare il nome del file e selezionare Upload:

Metodo 2. Caricare le immagini ASA dalla CLI di FXOS.

È possibile caricare l'immagine da un server FTP, SCP, SFTP o TFTP. Per verificare la connettività tra l'interfaccia di gestione dello chassis e il server remoto, attenersi alla seguente procedura:

FPR4100# connect local-mgmt

FPR4100(local-mgmt)# ping 10.48.40.70

PING 10.48.40.70 (10.48.40.70) from 10.62.148.88 eth0: 56(84) bytes of data.

64 bytes from 10.48.40.70: icmp_seq=1 ttl=61 time=34.4 ms

64 bytes from 10.48.40.70: icmp_seq=2 ttl=61 time=34.3 ms

64 bytes from 10.48.40.70: icmp_seq=3 ttl=61 time=34.3 ms

Per trasferire l'immagine ASA, accedere a questo ambito ed eseguire il comando download image:

FPR4100# scope ssa

FPR4100 /ssa # scope app-software

FPR4100 /ssa/app-software # download image ftp://ftp_username@ 10.48.40.70/cisco-asa.9.6.2.3.SPA.csp

Password:

Per monitorare lo stato del trasferimento dell'immagine, eseguire il comando show download-task detail:

FPR4100 /ssa/app-software # show download-task detail

Downloads for Application Software:

File Name: cisco-asa.9.6.2.3.SPA.csp

Protocol: Ftp

Server: 10.48.40.70

Port: 0

Userid: anonymous

Path:

Downloaded Image Size (KB): 94214

Time stamp: 2016-12-08T10:21:56.775

State: Downloading

Transfer Rate (KB/s): 450.784698

Current Task: downloading image cisco-asa.9.6.2.3.SPA.csp from 10.48.40.70(FSM-STAGE:sam:dme:ApplicationDownloaderDownload:Local)

È inoltre possibile utilizzare questo comando per verificare la riuscita del trasferimento:

FPR4100 /ssa/app-software # show download-task

Downloads for Application Software:

File Name                      Protocol   Server          Port      Userid       State

------------------------------ ---------- --------------- --------- ------------ -----

cisco-asa.9.6.2.2.SPA.csp      Ftp        10.48.40.70             0 anonymous    Downloaded

Per ulteriori dettagli:

FPR4100 /ssa/app-software # show download-task fsm status expand

File Name: cisco-asa.9.6.2.3.SPA.csp

FSM Status:

Affected Object: sys/app-catalogue/dnld-cisco-asa.9.6.2.3.SPA.csp/fsm

Current FSM: Download

Status: Success

Completion Time: 2016-12-08T10:26:52.142

Progress (%): 100

FSM Stage:

Order  Stage Name                               Status       Try

------ ---------------------------------------- ------------ ---

1      DownloadLocal                            Success      1

2      DownloadUnpackLocal                      Success      1

L'immagine ASA viene visualizzata nel repository dello chassis:

FPR4100 /ssa/app-software # exit

FPR4100 /ssa # show app

Application:

Name       Version    Description Author     Deploy Type CSP Type    Is Default App

---------- ---------- ----------- ---------- ----------- ----------- --------------

asa        9.6.2.1    N/A         cisco      Native      Application No

asa        9.6.2.3    N/A         cisco      Native      Application No

Attività 3. Aggiornamento della prima unità ASA

Aggiornare prima l'unità ASA in standby, come mostrato nell'immagine:

Specificare la nuova immagine e selezionare OK per avviare l'aggiornamento:

Verifica

Stato dell'aggiornamento dell'ASA dalla GUI di FCM:

Dopo 1-2 minuti l'interfaccia utente di FCM visualizza:

Il modulo ASA viene ricaricato:

Processo di aggiornamento dell'ASA dalla CLI dello chassis Firepower.

La CLI mostra che il dispositivo logico (ASA) viene riavviato. L'intero processo di aggiornamento dalla CLI di avvio del modulo in questo output:

asa/sec/stby(config)#

[screen is terminating]

Disconnected from asa console!

Firepower-module1>

INIT: SwitchingStopping OpenBSD Secure Shell server: sshdstopped /usr/sbin/sshd (pid 5738)

.

Stopping Advanced Configuration and Power Interface daemon: stopped /usr/sbin/acpid (pid 5742)

acpid: exiting

acpid.

Stopping system message bus: dbus.

Stopping ntpd: stopped process in pidfile '/var/run/ntp.pid' (pid 6186)

done

Stopping crond: OK

Deconfiguring network interfaces... done.

Sending all processes the TERM signal...

SIGKILL_ALL will be delayed for 1 + 5 secs

Sending all processes the KILL signal...

Deactivating swap...

Unmounting local filesystems...

Rebooting... [ 1679.605561] Restarting system.

Cisco Systems, Inc.

Configuring and testing memory..

Cisco Systems, Inc.

Configuring and testing memory..

Configuring platform hardware...

Bios Version : FXOSSM1.1.2.1.3.031420161207

Platform ID  : FXOSSM1

Processor(s) Intel(R) Xeon(R) CPU E5-2699 v4 @ 2.20GHz

Total Memory  = 256 GB Effective Memory = 256 GB

Memory Operating Speed 2400 Mh

Please wait, preparing to boot.. .........................................................................................................

UEFI Interactive Shell v2.0. UEFI v2.40 (American Megatrends, 0x0005000B). Revision 1.02

Mapping table

fs0: Alias(s):HD17a65535a1:;blk1:

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(1,MBR,0x000EC692,0x800,0xEE6800)

blk0: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)

blk2: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(2,MBR,0x000EC692,0xEE7000,0x3BA000)

blk3: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(3,MBR,0x000EC692,0x12A1000,0x950000)

blk4: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(4,MBR,0x000EC692,0x1BF1000,0x2CD20800)

blk5: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(4,MBR,0x000EC692,0x1BF1000,0x2CD20800)/HD(1,MBR,0x00000000,0x1BF1800,0x5D22000)

blk6: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(4,MBR,0x000EC692,0x1BF1000,0x2CD20800)/HD(2,MBR,0x00000000,0x7914000,0x26FFD800)

To launch ROMMON.

CpuFrequency = 2200002 KHz

Cisco FXOSSM1 Blade Rommon 1.2.1.3, Mar 14 2016 12:11:29

Platform: SSPXRU

INFO: enic_identify: Enabling Cruz driver...

INFO: enic_identify: Cruz driver enabled.

INFO: init_spi_interface: HSFS_BERASE_4K.

INFO: enic_init: bar[0].vaddr 0xc6e00000.

INFO: enic_init: bar[2].vaddr 0xc6e10000.

INFO: enic_init: eNic port MTU is 1500.

INFO: enic_init: eNic bsize 1500 ring size 512.

INFO: enic_init: Waiting for Cruz link...

INFO: enic_init: Cruz link detected.

INFO: nb_eth_app_init: MAC address for interface 0: 00 15 a5 01 01 00

INFO: nb_eth_app_init: IP address 127.128.1.254

Start communicating with MIO in blade slot 1...

INFO: Allocated 1000 bytes of memory for cmd at 0x78a7d018.

INFO: Allocated 1000 bytes of memory for status at 0x76d34918.

INFO: Allocated 196608 bytes of memory for key file at 0x76d03018.

INFO: Status code 1: 'rommon initialize is completed'.

INFO: tftp_open: '/rommon/status_1.txt'@127.128.254.1 via 127.128.254.1

!

INFO: nb_tftp_upload: 31 bytes sent.

tftpget 0x78a7d018 1000

INFO: tftp_open: '/rommon/command_1.txt'@127.128.254.1 via 127.128.254.1

Received 154 bytes

WARNING: retrieve_mio_cmd_info: Invalid checksum 0x0.

tftpget 0x76d03018 196608

INFO: tftp_open: 'rommon/key_1.bin'@127.128.254.1 via 127.128.254.1

!

Received 131072 bytes

INFO: Status code 8: 'rommon succeeds to retrieve key file'.

INFO: tftp_open: '/rommon/status_1.txt'@127.128.254.1 via 127.128.254.1

!

INFO: nb_tftp_upload: 31 bytes sent.

INFO: Primary keys in flash are up-to-date.

INFO: Backup keys in flash are up-to-date.

continue check local image

the image file path: installables/chassis/fxos-lfbff-k8.9.6.2.2.SPA

the image file name only: fxos-lfbff-k8.9.6.2.2.SPA

local_image_file: fs0:fxos-lfbff-k8.9.6.2.2.SPA

INFO: File 'fs0:fxos-lfbff-k8.9.6.2.2.SPA' has 104831328 bytes.

local_image_file_size 104831328

Found image fs0:fxos-lfbff-k8.9.6.2.2.SPA in local storage, boot local image.

set pboot_image fxos-lfbff-k8.9.6.2.2.SPA

INFO: File 'fs0:fxos-lfbff-k8.9.6.2.2.SPA' has 104831328 bytes.

INFO: 'fs0:fxos-lfbff-k8.9.6.2.2.SPA' has 104831328 bytes

INFO: Booting LFBFF image...

INFO: Status code 7: 'rommon about to verify image signature from local disk'.

INFO: tftp_open: '/rommon/status_1.txt'@127.128.254.1 via 127.128.254.1

!

INFO: nb_tftp_upload: 31 bytes sent.

INIT: version 2.88 booting

Starting udev

Configuring network interfaces... done.

Populating dev cache

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

No Partitions for HDD2.. Creating partition..

mount: special device /dev/sdb1 does not exist

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

Create libvirt group

Start libvirtd Service

* Starting virtualization library daemon: libvirtd

no /usr/bin/dnsmasq found; none killed

2016-12-07 12:47:24.090+0000: 4373: info : libvirt version: 1.1.2

2016-12-07 12:47:24.090+0000: 4373: warning : virGetHostname:625 : getadd[ ok ]failed for 'ciscoasa': Name or service not known

Disable the default virtual networks

Network default destroyed

Done with libvirt initialization

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

+++++++++++++++ BOOT CLI FILES COPIED +++++++++++++++++++++++++++

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

Turbo Boost is UNSUPPORTED on this platform.

Configuration Xml found is /opt/cisco/csp/applications/configs/cspCfg_cisco-asa.9.6.2.3__asa_001_JAD201200C64A93395.xml

INIT: Entering runlevel: 3

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

Starting system message bus: dbus.

Starting OpenBSD Secure Shell server: sshd

generating ssh RSA key...

generating ssh ECDSA key...

generating ssh DSA key...

done.

Starting Advanced Configuration and Power Interface daemon: acpid.

acpid: starting up

acpid: 1 rule loaded

acpid: waiting for events: event logging is off

Starting ntpd: done

Starting crond: OK

Cisco Security Services Platform

Type ? for list of commands

Firepower-module1>

Firepower-module1>show services status

Services currently running:

Feature   | Instance ID    |     State  |          Up Since

-----------------------------------------------------------

asa     | 001_JAD201200C64A93395 |   RUNNING  | :00:00:20

Firepower-module1>

L'intera procedura richiede circa 5 minuti.

È possibile anche usare il comando show app-instance dalla CLI dello chassis per verificare che l'applicazione ASA sia online:

FPR4100# scope ssa

FPR4100 /ssa # show app-instance

Application Name     Slot ID    Admin State     Operational State  Running Version Startup Version Cluster Oper State

-------------------- ---------- --------------- ------------------ --------------- --------------- ------------------

asa                  1          Enabled         Online             9.6.2.3          9.6.2.3         Not Applicabl

I moduli ASA si scoprono a vicenda:

asa/sec/actNoFailover>

************WARNING****WARNING****WARNING******************************** Mate version 9.6(2)1 is not identical with ours 9.6(2)3 ************WARNING****WARNING****WARNING********************************

.

Detected an Active mate

Beginning configuration replication from mate.

End configuration replication from mate.

asa/sec/stby>

Verifica

FPR4100# connect module 1 console

Telnet escape character is '~'.

Trying 127.5.1.1...

Connected to 127.5.1.1.

Escape character is '~'.

CISCO Serial Over LAN:

Close Network Connection to Exit

Firepower-module1> connect asa

asa> enable

Password:

asa/sec/stby# show failover

Failover On

Failover unit Secondary

Failover LAN Interface: fover Ethernet1/8 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 2 of 1041 maximum

MAC Address Move Notification Interval not set

Version: Ours 9.6(2)3, Mate 9.6(2)1

Serial Number: Ours FLM2006EQFW, Mate FLM2006EN9U

Last Failover at: 12:48:23 UTC Dec 7 2016

This host: Secondary - Standby Ready

Active time: 0 (sec)

slot 0: UCSB-B200-M3-U hw/sw rev (0.0/9.6(2)3) status (Up Sys)

Interface INSIDE (192.168.0.2): Normal (Not-Monitored)

Interface OUTSIDE (192.168.1.2): Normal (Monitored)

Interface management (0.0.0.0): Normal (Waiting)

Other host: Primary - Active

Active time: 10320 (sec)

slot 0: UCSB-B200-M3-U hw/sw rev (0.0/9.6(2)1) status (Up Sys)

Interface INSIDE (192.168.0.1): Normal (Not-Monitored)

Interface OUTSIDE (192.168.1.1): Normal (Monitored)

Interface management (10.0.0.50): Normal (Waiting)

...

Per verificare che il failover sia corretto tra le unità ASA, eseguire questi comandi:

- mostra conteggio conn

- mostra conteggio xlate

- show crypto ipsec sa

Attività 4. Aggiornamento della seconda unità ASA

Cambiare i peer di failover e aggiornare l'appliance ASA primaria:

asa/sec/stby# failover active

Switching to Active

asa/sec/act#

Specificare la nuova immagine e avviare l'aggiornamento:

Dopo 5 minuti, l'aggiornamento termina.

Verifica

Dalla CLI dello chassis, verificare che l'applicazione ASA sia online:

FPR4100# scope ssa

FPR4100 /ssa # show app-instance

Application Name     Slot ID    Admin State     Operational State  Running Version Startup Version Cluster Oper State

-------------------- ---------- --------------- ------------------ --------------- --------------- ------------------

asa                  1          Enabled         Online             9.6.2.3          9.6.2.3         Not Applicable

Dal modulo ASA verificare l'operazione di failover:

asa/pri/stby# show failover

Failover On

Failover unit Primary

Failover LAN Interface: fover Ethernet1/8 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 2 of 1041 maximum

MAC Address Move Notification Interval not set

Version: Ours 9.6(2)3, Mate 9.6(2)3

Serial Number: Ours FLM2006EN9U, Mate FLM2006EQFW

Last Failover at: 14:35:37 UTC Dec 7 2016

This host: Primary - Standby Ready

Active time: 0 (sec)

slot 0: UCSB-B200-M3-U hw/sw rev (0.0/9.6(2)3) status (Up Sys)

Interface INSIDE (192.168.0.2): Normal (Not-Monitored)

Interface OUTSIDE (192.168.1.2): Normal (Waiting)

Interface management (0.0.0.0): Normal (Waiting)

Other host: Secondary - Active

Active time: 656 (sec)

slot 0: UCSB-B200-M3-U hw/sw rev (0.0/9.6(2)3) status (Up Sys)

Interface INSIDE (192.168.0.1): Failed (Not-Monitored)

Interface OUTSIDE (192.168.1.1): Normal (Waiting)

Interface management (10.0.0.50): Normal (Waiting)

Stateful Failover Logical Update Statistics

Link : fover Ethernet1/8 (up)

Stateful Obj    xmit       xerr       rcv        rerr

General         7          0          8          0

...

Ripristinare il failover per avere Primary/Active, Secondary/Standby:

asa/pri/stby# failover active

Switching to Active

asa/pri/act#

Risoluzione dei problemi

Al momento non sono disponibili informazioni specifiche per la risoluzione dei problemi di questa configurazione.

Informazioni correlate

- Guida alla configurazione di FXOS

- Guida alla compatibilità FXOS-ASA

- Note sulla release di FXOS

- Documentazione e supporto tecnico – Cisco Systems