Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Problema

Sintomi

Condizioni

Risoluzione dei problemi

Soluzione

Conferma

Soluzioni

Versioni risolte

Informazioni correlate

Introduzione

In questo documento viene descritto come risolvere i problemi e verificare che uno switch Cisco Nexus serie 7000 sia interessato dal difetto software Cisco ID bug CSCud02139.

Prerequisiti

Requisiti

Nessun requisito specifico previsto per questo documento.

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- Cisco Nexus serie 7000 Switch

- Sistema operativo Cisco Nexus (NX-OS) versioni da 5.2(5) a 5.2(7) incluse

- Cisco NX-OS versioni da 6.0(1) a 6.1(3) incluse

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Problema

Sintomi

Gli utenti non possono accedere in remoto a uno switch Nexus serie 7000 Virtual Device Context (VDC) con autenticazione TACACS.

Inoltre, questi messaggi vengono visualizzati nei log:

n7k-vdc-1# show log last 200 | grep TACACS

2013 May 13 17:17:31 n7k-vdc-1  TACACS-3-TACACS_ERROR_MESSAGE  All servers

failed to respond

2013 May 13 17:17:46 n7k-vdc-1  TACACS-3-TACACS_ERROR_MESSAGE  All servers

failed to respond

2013 May 13 17:18:06 n7k-vdc-1  TACACS-3-TACACS_ERROR_MESSAGE  All servers

failed to respond

2013 May 13 17:18:12 n7k-vdc-1  TACACS-3-TACACS_ERROR_MESSAGE  All servers

failed to respond

2013 May 13 17:18:16 n7k-vdc-1  TACACS-3-TACACS_ERROR_MESSAGE  All servers

failed to respond

2013 May 13 17:20:26 n7k-vdc-1  TACACS-3-TACACS_ERROR_MESSAGE  All servers

failed to respond

2013 May 13 17:20:39 n7k-vdc-1  TACACS-3-TACACS_ERROR_MESSAGE  All servers

failed to respond

2013 May 13 17:21:50 n7k-vdc-1  TACACS-3-TACACS_ERROR_MESSAGE  All servers

failed to respond

2013 May 13 17:22:09 n7k-vdc-1  TACACS-3-TACACS_ERROR_MESSAGE  All servers

failed to respond

n7k-vdc-1#

Condizioni

Questo problema si verifica sugli switch Nexus serie 7000 con Cisco NX-OS versione 5.2(5) e 5.2(7), nonché tra la 6.0.1 e la 6.1(3).

Il VDC deve utilizzare l'autenticazione TACACS, come nell'esempio seguente:

n7k-vdc-1# show run tacacs+

!Command: show running-config tacacs+

!Time: Mon May 13 17:20:57 2013

version 6.1(2)

feature tacacs+

ip tacacs source-interface mgmt0

tacacs-server timeout 30

tacacs-server host 192.0.2.9 key 7 "keypassword"

aaa group server tacacs+ default

server 192.0.2.9

use-vrf management

n7k-vdc-1# show run aaa

!Command: show running-config aaa

!Time: Mon May 13 17:21:30 2013

version 6.1(2)

aaa authentication login default group default

aaa authorization config-commands default group default

aaa authorization commands default group default

aaa accounting default group default

no aaa user default-role

aaa authentication login error-enable

tacacs-server directed-request

Risoluzione dei problemi

1. Confermare lo stato del server TACACS

- Confermare che lo switch Nexus serie 7000 sia in grado di eseguire correttamente il ping sul server TACACS tramite il VRF (Virtual Routing and Forwarding) corretto.

- Confermare che il server TACACS autentica comunque correttamente gli utenti su altri dispositivi.

2. Controllare i log degli errori del processo di autenticazione, autorizzazione e accounting (AAA)

Per controllare i log degli errori del processo AAA, usare questo comando:

n7k-vdc-1# show system internal aaa event-history errors

1) Event:E_DEBUG, length:54, at 786852 usecs after Mon May 13 17:22:09 2013

[102] All Configured methods failed for default:default

2) Event:E_DEBUG, length:53, at 786796 usecs after Mon May 13 17:22:09 2013

[102] protocol TACACS failed with server group default

3) Event:E_DEBUG, length:54, at 379206 usecs after Mon May 13 17:22:09 2013

[102] All Configured methods failed for default:default

4) Event:E_DEBUG, length:53, at 379172 usecs after Mon May 13 17:22:09 2013

[102] protocol TACACS failed with server group default

5) Event:E_DEBUG, length:54, at 89083 usecs after Mon May 13 17:21:51 2013

[102] All Configured methods failed for default:default

6) Event:E_DEBUG, length:53, at 89051 usecs after Mon May 13 17:21:51 2013

[102] protocol TACACS failed with server group default

3. Controllare i log degli errori di elaborazione TACACS+

Utilizzare questo comando per controllare i log degli errori di processo TACACS+:

n7k-vdc-1# show system internal tacacs+ event-history errors

1) Event:E_DEBUG, length:88, at 786728 usecs after Mon May 13 17:22:09 2013

[100] switch_tac_server:  Unreachable servers case .setting error code  for

aaa session 0

2) Event:E_DEBUG, length:77, at 786726 usecs after Mon May 13 17:22:09 2013

[100] switch_tac_server:  no more server in the server group for

aaa session 0

3) Event:E_DEBUG, length:103, at 786680 usecs after Mon May 13 17:22:09 2013

[100] connect_tac_server: non blocking connect failed, switching server for

aaa session id(0) rtvalue(3)

4) Event:E_DEBUG, length:97, at 786677 usecs after Mon May 13 17:22:09 2013

[100] non_blocking_connect(171): getaddrinfo(DNS cache fail) with retcode:-1

for server:192.0.2.9

5) Event:E_DEBUG, length:62, at 786337 usecs after Mon May 13 17:22:09 2013

[100] tplus_encrypt(655):key is configured for this aaa session.

6) Event:E_DEBUG, length:95, at 786287 usecs after Mon May 13 17:22:09 2013

[100] tplus_make_acct_request(1343):Not calling the name-resolution routine

as rem_addr is empty

7) Event:E_DEBUG, length:63, at 786285 usecs after Mon May 13 17:22:09 2013

[100] tplus_make_acct_request(1308):Accounting userdata&colon;console0

8) Event:E_DEBUG, length:63, at 786266 usecs after Mon May 13 17:22:09 2013

[100] init_tplus_req_state_machine:Global source-interface mgmt0

9) Event:E_DEBUG, length:48, at 785842 usecs after Mon May 13 17:22:09 2013

[100] is_intf_up_with_valid_ip(1129):Port is up.

10) Event:E_DEBUG, length:57, at 785812 usecs after Mon May 13 17:22:09 2013

[100] is_intf_up_with_valid_ip(1126):Proper IOD is found.

11) Event:E_DEBUG, length:52, at 785799 usecs after Mon May 13 17:22:09 2013

[100] Exiting function: get_if_index_from_global_conf

12) Event:E_DEBUG, length:66, at 785797 usecs after Mon May 13 17:22:09 2013

[100] Function get_if_index_from_global_conf: found interface mgmt0

13) Event:E_DEBUG, length:53, at 785783 usecs after Mon May 13 17:22:09 2013

[100] Entering function: get_if_index_from_global_conf

14) Event:E_DEBUG, length:68, at 785781 usecs after Mon May 13 17:22:09 2013

[100] init_tplus_req_state_machine:Falling to globally configured one

15) Event:E_DEBUG, length:79, at 785779 usecs after Mon May 13 17:22:09 2013

[100] init_tplus_req_state_machine:No source-interface configured for this group

4. Debug delle richieste di autenticazione TACACS+

- Attiva debug per richieste di autenticazione TACACS+.

- Il debug AAA genera i seguenti log:

n7k-vdc-1# debug tacacs+ aaa-request

n7k-vdc-1# show logging logfile last 5

2013 May 13 18:20:26.077572 tacacs: tplus_encrypt(655):key is configured

for this aaa session.

2013 May 13 18:20:26.077918 tacacs: non_blocking_connect(171): getaddrinfo

DNS cache fail) with retcode:-1 for server:192.0.2.9

2013 May 13 18:20:26.077938 tacacs: connect_tac_server: non blocking connect

failed, switching server for aaa session id(0) rtvalue(3)

2013 May 13 18:20:26.077978 tacacs: switch_tac_server:  no more server in the

server group for aaa session 0

2013 May 13 18:20:26.077993 tacacs: switch_tac_server:  Unreachable servers

case .setting error code  for aaa session 0

5. Acquisizione di pacchetti sul server TACACS

Un'operazione di acquisizione sul server TACACS mostra che il VDC non invia pacchetti.

6. Eseguire un'acquisizione con etanalyzer sullo switch Nexus serie 7000

L'acquisizione di Ethanalyzer indica che nessun pacchetto viene inviato al server TACACS.

7. Controllare i processi in esecuzione sul controller di dominio virtuale

Il comando show proc cpu sort mostra 33 istanze (32 inattive) del processo TACACSD in esecuzione.

n7k-vdc-1# show proc cpu sort | include tacacs

1538           16        16   1014    0.0%  tacacsd

1855           16        10   1625    0.0%  tacacsd

2163           16        10   1678    0.0%  tacacsd

2339           15        23    676    0.0%  tacacsd

3820           15        10   1595    0.0%  tacacsd

3934           16        13   1272    0.0%  tacacsd

4416           25         8   3211    0.0%  tacacsd

4470           16        23    734    0.0%  tacacsd

5577           26        12   2191    0.0%  tacacsd

6592       969767  14589069     66    0.0%  tacacs

6934           16        13   1297    0.0%  tacacsd

8878           16        13   1252    0.0%  tacacsd

8979           16        12   1345    0.0%  tacacsd

10153           26        11   2453    0.0%  tacacsd

10202           15         8   1888    0.0%  tacacsd

10331           26        11   2368    0.0%  tacacsd

10482           16        14   1190    0.0%  tacacsd

14148           15        11   1433    0.0%  tacacsd

14385           14        10   1496    0.0%  tacacsd

14402           15         9   1775    0.0%  tacacsd

20678           16         9   1785    0.0%  tacacsd

20836           16        13   1246    0.0%  tacacsd

21257           15        13   1212    0.0%  tacacsd

21617           15         9   1749    0.0%  tacacsd

22159           15        12   1328    0.0%  tacacsd

23776           15        12   1320    0.0%  tacacsd

24017           25         9   2788    0.0%  tacacsd

29496           15         8   1990    0.0%  tacacsd

29972           15        11   1368    0.0%  tacacsd

30111           25         9   2847    0.0%  tacacsd

30204           15         9   1721    0.0%  tacacsd

30409           16        13   1254    0.0%  tacacsd

32410           15         8   1876    0.0%  tacacsd

Soluzione

Il VDC rileva il difetto software noto. ID bug Cisco CSCud02139.

Il processo TACACSD genera processi secondari che rimangono bloccati. In questo modo si raggiunge un massimo di 32 processi e non è più possibile generare codice per superare l'autenticazione.

Conferma

1. Confermare la presenza di 33 istanze di TACACSD. È possibile utilizzare il comando show proc cpu sort | grep -c 'tacacsd' per contare le istanze.

2. Eseguire un'acquisizione con etanalyzer e verificare che la richiesta non lasci lo switch Nexus serie 7000.

3. Corrispondono ai messaggi di registro precedenti.

Soluzioni

Ci sono tre possibilità. Rimuovere tutta la configurazione TACACS, quindi rimuovere e leggere la funzionalità e la configurazione. Un'altra opzione è quella di eseguire il cambio del supervisore. In alternativa, è possibile ricaricare il VDC.

Versioni risolte

- NX-OS versione 5.2(9) e successive nel treno 5.2

- NX-OS versione 6.1(3) e successive nel treno 6.1

Informazioni correlate

- Cisco Bug Toolkit - ID bug Cisco CSCud02139

- Panoramica tecnica dei contesti dei dispositivi virtuali

- Ethanalyzer: Utilità di acquisizione pacchetti integrata del software Cisco NX-OS

- Documentazione e supporto tecnico – Cisco Systems