Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Convenzioni

Configurazione

Esempio di rete

Configurazioni

Verifica

Risoluzione dei problemi

Comandi per la risoluzione dei problemi

Informazioni correlate

Introduzione

In questo documento viene fornita una configurazione di esempio per la VPN multipoint dinamica (DMVPN) con routing generico incapsulamento (GRE) su IPsec con Open Shortest Path First (OSPF), Network Address Translation (NAT) e Cisco IOS® Firewall.

Prerequisiti

Requisiti

Prima di poter stabilire un tunnel GRE (Multipoint GRE) e IPsec, è necessario definire un criterio IKE (Internet Key Exchange) utilizzando il comando crypto isakmp policy.

Nota: per ulteriori informazioni sui comandi menzionati in questa sezione, usare lo strumento di ricerca dei comandi (solo utenti registrati).

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- Software Cisco IOS® versione 12.2(15)T1 sul router hub e software Cisco IOS versione 12.3(1.6) sui router spoke

- Cisco 3620 come router hub, due router Cisco 1720 e un router Cisco 3620 come router spoke

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Convenzioni

Fare riferimento a Cisco Technical Tips Conventions per ulteriori informazioni sulle convenzioni dei documenti.

Configurazione

In questa sezione vengono presentate le informazioni necessarie per configurare le funzionalità descritte più avanti nel documento.

Nota: per ulteriori informazioni sui comandi menzionati in questa sezione, usare lo strumento di ricerca dei comandi (solo utenti registrati).

Esempio di rete

Nel documento viene usata questa impostazione di rete.

Configurazioni

Nel documento vengono usate queste configurazioni.

- Hub - 3620-B

- Raggio 1 - 3620-A

- Raggio 2 - 1720-b

- Raggio 3 - 1720-A

Hub - 3620-B

W2N-6.16-3620-B#write terminal

Building configuration...

Current configuration : 2613 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname W2N-6.16-3620-B

!

logging queue-limit 100

!

memory-size iomem 10

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out ftp

ip inspect name in2out tftp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out http

ip inspect name in2out udp

ip audit po max-events 100

!

!

!

!--- Create an Internet Security Association and Key Management !--- Protocol (ISAKMP) policy for Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

crypto isakmp nat keepalive 20

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!

!

!

!

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.117.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied !--- to all the dynamically created GRE tunnels.

interface Tunnel1

description MULTI-POINT GRE TUNNEL for BRANCHES

bandwidth 1000

ip address 172.16.0.1 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp network-id 99

ip nhrp holdtime 300

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source FastEthernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outbound interface.

interface FastEthernet0/0

ip address 14.24.117.1 255.255.0.0

ip nat outside

ip access-group 100 in

ip inspect in2out out

no ip mroute-cache

duplex auto

speed auto

!

interface Serial0/0

no ip address

shutdown

clockrate 2000000

no fair-queue

!

interface FastEthernet0/1

no ip address

no ip mroute-cache

duplex auto

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

network 172.16.0.0 0.0.0.255 area 0

network 192.168.117.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface FastEthernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens other inbound access as needed.

access-list 100 permit udp any host 14.24.117.1 eq 500

access-list 100 premit esp any host 14.24.117.1

access-list 100 permit gre any host 14.24.117.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.117.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

W2N-6.16-3620-B#

Raggio 1 - 3620-A

W2N-6.16-3620-A#write terminal

Building configuration...

Current configuration : 2678 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname W2N-6.16-3620-A

!

boot system flash slot0:c3620-ik9o3s7-mz.122-15.T1.bin

logging queue-limit 100

!

memory-size iomem 15

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!

!

!

!

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.118.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.2 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source Ethernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outbound interface.

interface Ethernet0/0

ip address 14.24.118.1 255.255.0.0

ip nat outside

ip access-group 100 in

ip inspect in2out out

no ip mroute-cache

half-duplex

!

interface Ethernet0/1

no ip address

half-duplex

!

interface Ethernet0/2

no ip address

shutdown

half-duplex

!

interface Ethernet0/3

no ip address

shutdown

half-duplex

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.118.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface Ethernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.118.1 eq 500

access-list 100 premit esp any host 14.24.118.1

access-list 100 permit gre any host 14.24.118.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.118.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

W2N-6.16-3620-A#

Raggio 2 - 1720-b

1720-b#write terminal

Building configuration...

Current configuration : 2623 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 1720-b

!

logging queue-limit 100

enable password cisco

!

username 7206-B password 0 cisco

ip subnet-zero

!

!

no ip domain lookup

!

ip cef

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

vpdn-group 1

request-dialin

protocol pppoe

!

!

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.116.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.3 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source Dialer1

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

half-duplex

!

interface FastEthernet0

no ip address

no ip mroute-cache

speed auto

pppoe enable

pppoe-client dial-pool-number 1

!

!--- This is the outbound interface.

interface Dialer1

ip address 2.2.2.10 255.255.255.0

ip inspect in2out out

ip access-group 100 in encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication pap chap callin

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.116.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface Dialer1 overload

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 0.0.0.0 0.0.0.0 Dialer1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 premit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.116.0 0.0.0.255 any

dialer-list 1 protocol ip permit

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

no scheduler allocate

end

1720-b#

Raggio 3 - 1720-A

W2N-6.16-1720-A#write terminal

Building configuration...

Current configuration : 2303 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname W2N-6.16-1720-A

!

logging queue-limit 100

!

memory-size iomem 25

ip subnet-zero

!

!

no ip domain lookup

!

ip cef

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit notify log

ip audit po max-events 100

!

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.120.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.4 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source FastEthernet0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

no ip mroute-cache

half-duplex

!

!--- This is the outbound interface.

interface FastEthernet0

ip address 14.24.120.1 255.255.0.0

ip nat outside

ip inspect in2out out

ip access-group 100 in

no ip mroute-cache

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.120.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface FastEthernet0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 premit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.120.0 0.0.0.255 any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 permit ip 192.168.120.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

end

W2N-6.16-1720-A#

Verifica

Per verificare che la configurazione funzioni correttamente, consultare questa sezione.

Lo strumento Output Interpreter (solo utenti registrati) (OIT) supporta alcuni comandi show. Usare l'OIT per visualizzare un'analisi dell'output del comando show.

- show crypto isakmp sa: visualizza lo stato dell'associazione di sicurezza ISAKMP.

- show crypto engine connections active: visualizza il totale di crittografia/decrittografia per SA.

- show crypto ipsec sa: visualizza le statistiche sui tunnel attivi.

- show ip route: visualizza la tabella di routing.

- show ip ospf neighbor: visualizza le informazioni sui router adiacenti OSPF per singola interfaccia.

- show ip nhrp: visualizza la cache NHRP (IP Next Hop Resolution Protocol), facoltativamente limitata alle voci di cache dinamica o statica per un'interfaccia specifica.

Risoluzione dei problemi

Le informazioni contenute in questa sezione permettono di risolvere i problemi relativi alla configurazione.

Comandi per la risoluzione dei problemi

Nota: consultare le informazioni importanti sui comandi di debug prima di usare i comandi di debug.

- debug crypto ipsec: visualizza gli eventi IPsec.

- debug crypto isakmp: visualizza i messaggi sugli eventi IKE.

- debug crypto engine: visualizza le informazioni provenienti dal crypto engine.

Per ulteriori informazioni sulla risoluzione dei problemi relativi a IPSec, consultare il documento sulla risoluzione dei problemi di protezione IP - descrizione e uso dei comandi di debug.

Informazioni correlate

- Risoluzione dei problemi di configurazione di Cisco IOS Firewall

- Panoramica di DMVPN e Cisco IOS

- Negoziazione IPSec/protocolli IKE

- Documentazione e supporto tecnico – Cisco Systems