Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Premesse

Configurazione

Esempio di rete

ASR1K

ASR9K

Verifica

Risoluzione dei problemi

Comando per verificare la configurazione di ASR9K

Verifica XC L2VPN

Controllo dell'elenco delle interfacce

Verifica PWHE utilizzato da un elenco di interfacce

Verificare che MA disponga di PWHE con le informazioni corrette

Verifica informazioni di riepilogo PWHE

Etichette assegni

Sessioni/perdita di traffico non visualizzate

Comandi Show correlati a BNG

Debug da abilitare

Escalation

Introduzione

In questo documento viene descritta la procedura per configurare le sessioni IP over Ethernet (IPoE) su Pseudowire Headend (PWHE) su ASR9K.

Prerequisiti

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

- VPN MPLS layer 2

- Funzionalità BNG su ASR9K

Suggerimento: per familiarizzare con le funzionalità BNG, consultare l'articolo della Guida alla configurazione del gateway di rete a banda larga per Cisco ASR serie 9000 Cisco.

Suggerimento: per acquisire familiarità con le VPN di livello 2 MPLS, consultare l'articolo della guida alla configurazione delle VPN di livello 2 MPLS.

Componenti usati

Il documento può essere consultato per tutte le versioni software, ma la scheda di linea utilizzata con ASR9K è A9K-MPA-20X1GE.

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Premesse

BNG fornisce il supporto per gli utenti registrati su PWHE. PWHE fornisce connettività L3 ai nodi periferici del cliente tramite una connessione a pseudofilo. Il PWHE termina i circuiti L2VPN esistenti tra i nodi Access-Provider Edge (A-PE) e un'interfaccia virtuale, ed esegue il routing sul pacchetto IP nativo. Ogni interfaccia virtuale può utilizzare una o più interfacce fisiche verso il cloud di accesso per raggiungere i router del cliente tramite i nodi A-PE.

Nota: questa funzione è supportata per gli abbonati PPPoE PTA, PPPoE LAC Subscriber over PWHE e IPoE.

Configurazione

Esempio di rete

Per eseguire questo test, viene utilizzato un ASR1K con versione 154-3.S2 e un ASR9K con versione IOS-XR 5.2.2. OSPF viene utilizzato come protocollo di routing per raggiungere gli altri indirizzi di loopback.

Indirizzo di loopback ASR9K: 10.1.1.1/32

Indirizzo di loopback ASR1K: 10.2.2.2/32

ASR1K

pseudowire-class MPLS

encapsulation mpls

interface GigabitEthernet1/0/0

no ip address

media-type rj45

negotiation auto

cdp enable

xconnect 10.1.1.1 2020 encapsulation mpls pw-class MPLS

end

ASR1K#show etherchannel summary

Flags:  D - down        P/bndl - bundled in port-channel

I - stand-alone s/susp - suspended

H - Hot-standby (LACP only)

R - Layer3      S - Layer2

U - in use      f - failed to allocate aggregator

M - not in use, minimum links not met

u - unsuitable for bundling

w - waiting to be aggregated

d - default port

Number of channel-groups in use: 1

Number of aggregators:           1

Group  Port-channel  Protocol    Ports

------+-------------+-----------+-----------------------------------------------

20 Po20(RU) LACP  Gi1/0/1(bndl) Gi1/1/1(bndl)

RU - L3 port-channel UP State

SU - L2 port-channel UP state

P/bndl -  Bundled

S/susp  - Suspended

interface Port-channel20

ip address 192.168.20.2 255.255.255.0

no negotiation auto

mpls ip

end

ASR9K

Di seguito viene riportata la configurazione di ASR9K, che agisce come BNG PWHE.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show bundle bundle-ether 20

Thu May 21 06:35:39.294 UTC

Bundle-Ether20

Status:                                    Up

Local links

: 2 / 0 / 2 Local bandwidth

: 2000000 (2000000) kbps MAC address (source): 10f3.1172.02c8 (Chassis pool) Inter-chassis link: No Minimum active links / bandwidth: 1 / 1 kbps Maximum active links: 64 Wait while timer: 2000 ms Load balancing: Default LACP: Operational Flap suppression timer: Off Cisco extensions: Disabled mLACP: Not configured IPv4 BFD: Not configured Port Device State Port ID B/W, kbps -------------------- --------------- ----------- -------------- ---------- Gi0/0/1/18 Local Active 0x8000, 0x0007 1000000 Link is Active Gi0/0/1/19 Local Active 0x8000, 0x0008 1000000 Link is Active interface Bundle-Ether20 ipv4 address 192.168.20.1 255.255.255.0 load-interval 30 !

A questo punto, configurare la connessione x tra ASR1K e ASR9K. Specificare l'indirizzo di loopback di ASR1K (10.2.2.2/32) come router adiacente xconnect.

l2vpn

router-id 10.1.1.1

pw-class ASR1K

encapsulation mpls

transport-mode ethernet

!

!

xconnect group PWHE

p2p ASR1K

interface PW-Ether20

neighbor ipv4 10.2.2.2 pw-id 2020

pw-class ASR1K

!

!

!

!

generic-interface-list BE20_ONLY

interface Bundle-Ether20

interface GigabitEthernet0/0/1/18

interface GigabitEthernet0/0/1/19

!

interface PW-Ether20

ipv4 address 192.168.1.1 255.255.255.0

attach generic-interface-list BE20_ONLY

!

A questo punto, configurare la policy di controllo del destinatario e applicarla all'interfaccia PW-Ethernet a cui il destinatario termina.

dynamic-template

type ipsubscriber WDAAR_PWHE_DT

ipv4 verify unicast source reachable-via rx

ipv4 unnumbered Loopback44

ipv4 unreachables disable

!

!

policy-map type control subscriber IPoE_WDAAR_PWHE

event session-start match-first

class type control subscriber DHCPv4 do-until-failure

5 authorize aaa list WDAAR identifier source-address-mac password cisco

10 activate dynamic-template WDAAR_PWHE_DT

!

!

end-policy-map

interface PW-Ether20.250

ipv4 address 192.168.10.1 255.255.255.252

service-policy type control subscriber IPoE_WDAAR_PWHE

encapsulation dot1q 250

ipsubscriber ipv4 l2-connected

initiator dhcp

!

!

Verifica

Le informazioni contenute in questa sezione permettono di verificare che la configurazione funzioni correttamente. Di seguito sono elencati i comandi che è possibile utilizzare per verificare che xconnect sia attivo/attivo su ASR9K.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect

Legend: ST = State, UP = Up, DN = Down, AD = Admin Down, UR = Unresolved,

SB = Standby, SR = Standby Ready, (PP) = Partially Programmed

XConnect                   Segment 1                       Segment 2

Group      Name       ST   Description            ST       Description            ST

------------------------   -----------------------------   -----------------------------

PWHE       ASR1K      UP   PE20                   UP       10.2.2.2         2020   UP

----------------------------------------------------------------------------------------

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect brief

AToM

Like-to-Like                        UP       DOWN        UNR

PW-Ether                           1          0          0

Total                              1          0          0

Total                                1          0          0

Total: 1 UP, 0 DOWN, 0 UNRESOLVED

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show subscriber session filter ipv4-address 192.168.44.254

Codes: IN - Initialize, CN - Connecting, CD - Connected, AC - Activated,

ID - Idle, DN - Disconnecting, ED - End

Type         Interface                State     IP Address (Vrf)

--------------------------------------------------------------------------------

IP:DHCP      PE20.250.ip1             AC        192.168.44.254 (default)

Una volta che l'interfaccia xconnect è attiva e la sessione IPoE è in linea su ASR9K, si può notare che l'interfaccia Access-Ethernet è PW-Ether.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show subscriber session filter ipv4-address 192.168.44.254 detail

Interface:                PW-Ether20.250.ip1

Circuit ID:               Unknown

Remote ID:                Unknown

Type:                     IP: DHCP-trigger

IPv4 State:               Up, Mon Apr 20 19:32:51 2015

IPv4 Address:             192.168.44.254, VRF: default

Mac Address:              001f.ca3f.7924

Account-Session Id:       00000068

Nas-Port:                 Unknown

User name:                001f.ca3f.7924

Formatted User name:      unknown

Client User name:         unknown

Outer VLAN ID:            250

Subscriber Label:         0x000001db

Created:                  Mon Apr 20 19:32:49 2015

State:                    Activated

Authentication:           unauthenticated

Authorization:            authorized

Access-interface: PW-Ether20.250 Policy Executed:

policy-map type control subscriber IPoE_WDAAR_PWHE

event Session-Start match-first [at Mon Apr 20 19:32:49 2015]

class type control subscriber DHCPv4 do-until-failure [Succeeded]

5 authorize aaa list WDAAR [Succeeded]

10 activate dynamic-template WDAAR_PWHE_DT [Succeeded]

Session Accounting: disabled

Last COA request received: unavailable

Verificare ora la connettività di layer 3 del sottoscrittore BNG su PWHE.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#ping 192.168.44.254

Mon Feb 23 19:37:58.188 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.44.254, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/2 ms

RP/0/RSP0/CPU0:ACDC-ASR9000-1#

Risoluzione dei problemi

In questa sezione vengono fornite informazioni che è possibile utilizzare per risolvere i problemi relativi alla configurazione e verificare lo stato di xconnect su ASR9K.

Comando per verificare la configurazione di ASR9K

Questi comandi possono essere utilizzati per verificare che la configurazione sia corretta su ASR9K.

- show running-configuration l2vpn

- show running-configuration int PW-Ether<Numero-Interfaccia>

- show running-configuration mpls ldp

- show running-configuration generic-interface-list

Assegno L2VPN XC

controllare la connessione xconnect. xconnect (e quindi AC e PW) deve essere attivo. È possibile utilizzare questi comandi per verificare lo stato.

- mostra riepilogo xconnect l2vpn

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect summary

Thu May 21 05:40:05.068 UTC

Number of groups: 1

Number of xconnects: 1

Up: 1  Down: 0  Unresolved: 0 Partially-programmed: 0

AC-PW: 1  AC-AC: 0  PW-PW: 0 Monitor-Session-PW: 0

Number of Admin Down segments: 0

Number of MP2MP xconnects: 0

Up 0 Down 0

Advertised: 0 Non-Advertised: 0

Number of CE Connections: 0

Advertised: 0 Non-Advertised: 0

Backup PW:

Configured   : 0

UP           : 0

Down         : 0

Admin Down   : 0

Unresolved   : 0

Standby      : 0

Standby Ready: 0

Backup Interface:

Configured   : 0

UP           : 0

Down         : 0

Admin Down   : 0

Unresolved   : 0

Standby      : 0

show l2vpn xconnect interface <Interface> detail

OR

show l2vpn xconnect detai

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect interface pw-eth20 detail

Thu May 21 05:40:55.789 UTC

Group PWHE, XC ASR1K, state is up; Interworking none

AC: PW-Ether20, state is up

Type PW-Ether

Interface-list: BE20_ONLY

Replicate status:

BE20: success

Gi0/0/1/18: success

Gi0/0/1/19: success

MTU 1500; interworking none

Internal label: 16001

Statistics:

packets: received 52970, sent 0

bytes: received 3485714, sent 0

PW: neighbor 10.2.2.2, PW ID 2020, state is up ( established )

PW class asr1k, XC ID 0xc0000001

Encapsulation MPLS, protocol LDP

Source address 10.1.1.1

PW type Ethernet, control word disabled, interworking none

PW backup disable delay 0 sec

Sequencing not set

PW Status TLV in use

MPLS         Local                          Remote

------------ ------------------------------ -----------------------------

Label        16002                          17

Group ID     0x920                          unknown

Interface    PW-Ether20                     unknown

MTU          1500                           1500

Control word disabled                       disabled

PW type      Ethernet                       Ethernet

VCCV CV type 0x2                            0x2

(LSP ping verification)        (LSP ping verification)

VCCV CC type 0x6                            0x6

(router alert label)           (router alert label)

(TTL expiry)                   (TTL expiry)

------------ ------------------------------ -----------------------------

Incoming Status (PW Status TLV):

Status code: 0x0 (Up) in Notification message

Outgoing Status (PW Status TLV):

Status code: 0x0 (Up) in Notification message

MIB cpwVcIndex: 3221225473

Create time: 21/05/2015 02:52:43 (02:48:12 ago)

Last time status changed: 21/05/2015 05:21:17 (00:19:38 ago)

Last time PW went down: 21/05/2015 03:10:45 (02:30:10 ago)

Statistics:

packets: received 52970, sent 0

bytes: received 3485714, sent 0

Controllo dell'elenco delle interfacce

Visualizzare l'elenco di interfacce utilizzato dal PWHE: deve esistere e disporre delle interfacce appropriate.

- show generic-interface-list name <NOME>

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show generic-interface-list name BE20_ONLY

Thu May 21 05:43:26.649 UTC

generic-interface-list: BE20_ONLY (ID: 1, interfaces: 3)

Bundle-Ether20 - items pending 0, downloaded to FIB

GigabitEthernet0/0/1/18 - items pending 0, downloaded to FIB

GigabitEthernet0/0/1/19 - items pending 0, downloaded to FIB

Number of items: 1

List is downloaded to FIB

Verifica PWHE utilizzato da un elenco di interfacce

L'output privato seguente indica quali interfacce membro sono "attive", ovvero quali sono state scaricate in FIB.

- show l2vpn generic-interface-list name <NOME>

- show l2vpn generic-interface-list private

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn generic-interface-list name BE20_ONLY detail

Thu May 21 05:39:04.983 UTC

Generic-interface-list: BE20_ONLY (ID: 1, interfaces: 3)

Bundle-Ether20 - items pending 0

GigabitEthernet0/0/1/18 - items pending 0

GigabitEthernet0/0/1/19 - items pending 0

Number of items: 1

PW-Ether: 20

Verificare che MA disponga di PWHE con le informazioni corrette

Le informazioni sull'elenco di interfacce, il peso variabile, il tipo VC, ecc., devono essere impostate correttamente in MA.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn ma pwhe interface PW-Ether 20 private

Thu May 21 05:36:28.170 UTC

Interface: PW-Ether20   Interface State: Up, Admin state: Up

Interface handle 0x920

MTU:  1514

BW:   10000 Kbit

Interface MAC addresses (1 address):

10f3.1172.02c5

IDB is not in Replicate Linked List

IDB is not in Create Linked List

IDB is not in Attr Linked List

Opaque flags: 0xe

Flags: 0x3c

Valid  : IFH, MTU, MAC, BW

MA trace history [Num events: 32]

---------------------------------------------------

Time                Event                     Value      Sticky Many

====                =====                     ========== ====== ====

05/21/2015 02:56:05 Remove retry list         0x3        No     No

05/21/2015 02:56:05 IDB Set flag              0x3c       No     No

05/21/2015 03:08:26 IDB Set State             0x1        No     No

05/21/2015 03:08:26 IM publish attr           0x45       No     No

05/21/2015 03:08:26 IM update init-data       0x1e       No     No

05/21/2015 03:08:26 IDB Set flag              0x3c       No     No

05/21/2015 03:08:26 Remove retry list         0x3        No     No

05/21/2015 03:08:26 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 IDB Set State             0          No     No

05/21/2015 03:09:54 IM publish attr           0x45       No     No

05/21/2015 03:09:54 IM publish attr           0x52       No     No

05/21/2015 03:09:54 IM update init-data       0x1e       No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 Remove retry list         0x3        No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 Remove retry list         0x3        No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:10:45 IDB Set State             0x1        No     No

05/21/2015 03:10:45 IM publish attr           0x45       No     No

05/21/2015 03:10:45 IM update init-data       0x1e       No     No

05/21/2015 03:10:45 IDB Set flag              0x3c       No     No

05/21/2015 03:10:45 Remove retry list         0x3        No     No

05/21/2015 03:10:45 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 IDB Set State             0          No     No

05/21/2015 05:21:17 IM publish attr           0x45       No     No

05/21/2015 05:21:17 IM publish attr           0x52       No     No

05/21/2015 05:21:17 IM update init-data       0x1e       No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 Remove retry list         0x3        No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 Remove retry list         0x3        No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

CLIENT MA trace history [Num events: 27]

---------------------------------------------------

Time                Event                     Value      Sticky Many

====                =====                     ========== ====== ====

05/21/2015 02:54:01 IM Notify Up              0x50049e10 No     No

05/21/2015 02:54:01 FSM state change          0x200      No     No

05/21/2015 02:54:01 FSM state change          0x2030d    No     No

05/21/2015 02:54:02 Double restart detected   0x5        No     No

05/21/2015 02:55:00 I/f created/added         0x4000540  No     No

05/21/2015 02:55:00 I/f created/added         0x4000580  No     No

05/21/2015 02:55:00 I/f created/added         0x4000540  No     No

05/21/2015 02:55:00 I/f created/added         0x4000580  No     No

05/21/2015 02:55:00 Intf list change          0x3000300  No     No

05/21/2015 02:55:00 Intf add error            0x4000540  No     No

05/21/2015 02:55:00 Intf add error            0x4000580  No     No

05/21/2015 02:55:00 FSM state change          0x30505    No     No

05/21/2015 02:55:01 Replicate result          0x13fe     No     No

05/21/2015 02:55:01 FSM state change          0x5060b    No     No

05/21/2015 02:55:01 I/f up                    0x4000580  No     No

05/21/2015 02:55:01 I/f up                    0x4000580  No     No

05/21/2015 02:55:02 I/f up                    0x4000540  No     No

05/21/2015 02:55:02 I/f up                    0x4000540  No     No

05/21/2015 02:56:05 Added to peer             0x6060606  No     No

05/21/2015 02:56:05 FSM state change          0x60704    No     No

05/21/2015 02:56:05 Fill VIMI attr            0x20002    No     No

05/21/2015 03:08:26 FSM state change          0x70605    No     No

05/21/2015 03:09:54 FSM state change          0x60704    No     No

05/21/2015 03:09:54 Fill VIMI attr            0x20002    No     No

05/21/2015 03:10:45 FSM state change          0x70605    No     No

05/21/2015 05:21:17 FSM state change          0x60704    No     No

05/21/2015 05:21:17 Fill VIMI attr            0x20002    No     No

PW-HE IDB client data

---------------------

IDB handle 0x5016db2c

Dot1q vlan: 0x81000000

Label: 16001

Remote VC label: 17

Remote PE: 10.2.2.2

Use flow-label on tx: N

L2-overhead: 0

VC-type: 5

CW: N

FSM state: 'Up'(7)

Fwding is up: Y, got route update: Y

Use OWNED_RESOURCE fwding: N

OWNED_RESOURCE fwding is up: N

OWNED_RESOURCE data&colon; 0

Replication error msg has been printed: N

VIF MA reg_handle: 50049e10

PIC array:

(nil)

Replicate retry count: 0

Configured i/f list name: 'BE20_ONLY'

From L2VPN i/f list name: 'BE20_ONLY', i/f list id: 1

L3 i/f:'Bundle-Ether20', idx=0, repl_status 1, fwding up:N, active:Y

L3 i/f:'GigabitEthernet0/0/1/18', idx=1, repl_status 1, fwding up:Y, active:Y

L3 i/f:'GigabitEthernet0/0/1/19', idx=2, repl_status 1, fwding up:Y, active:Y

List intf: 0x5016e154, PLs size:4, num in use:2

I/f:'Gi0/0/1/18', ifh:0x4000540, bundle: 0xb20, ifl idx:1, in-use:Y, misconfig:Y, in peer route:Y, VIMI active:Y

Repl:Y pending:N failed:N not supp:N, unrepl pending:N failed:N, up:Y us:3

I/f:'Gi0/0/1/19', ifh:0x4000580, bundle: 0xb20, ifl idx:2, in-use:Y, misconfig:Y, in peer route:Y, VIMI active:Y

Repl:Y pending:N failed:N not supp:N, unrepl pending:N failed:N, up:Y us:3

I/f:'', ifh:0x0, bundle: 0x0, ifl idx:0, in-use:N, misconfig:N, in peer route:N, VIMI active:N

Repl:N pending:N failed:N not supp:N, unrepl pending:N failed:N, up:N us:0

I/f:'', ifh:0x0, bundle: 0x0, ifl idx:0, in-use:N, misconfig:N, in peer route:N, VIMI active:N

Repl:N pending:N failed:N not supp:N, unrepl pending:N failed:N, up:N us:0

---------------------------------------------------

Verifica informazioni di riepilogo PWHE

Verificare che i contatori nell'output siano corretti:

- show l2vpn pwhe summary

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn pwhe summary

Thu May 21 05:35:59.381 UTC

Number of PW-HE interfaces: 1

Up: 1  Down: 0  Admindown: 0

PW-Ether: 1

Up: 1  Down: 0  Admindown: 0

PW-IW: 0

Up: 0  Down: 0  Admindown: 0

Etichette assegni

Controllare l'etichetta nella tabella delle etichette. Con questo comando è innanzitutto necessario ottenere le etichette interne dalle informazioni xconnect.

- visualizzazione dei dettagli di xconnect l2vpn

quindi cercare internal Label nell'output ed eseguire questo comando show per verificare l'associazione tra etichetta e interfaccia su ASR9K.

- mostra dettaglio etichetta tabella etichette mpls <internal_label>

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect detail

Thu May 21 05:27:11.762 UTC

Group PWHE, XC ASR1K, state is up; Interworking none

AC: PW-Ether20, state is up

Type PW-Ether

Interface-list: BE20_ONLY

Replicate status:

BE20: success

Gi0/0/1/18: success

Gi0/0/1/19: success

MTU 1500; interworking none

Internal label: 16001

Statistics:

packets: received 27293, sent 0

bytes: received 1996176, sent 0

PW: neighbor 10.2.2.2, PW ID 2020, state is up ( established )

PW class asr1k, XC ID 0xc0000001

Encapsulation MPLS, protocol LDP

Source address 10.1.1.1

PW type Ethernet, control word disabled, interworking none

PW backup disable delay 0 sec

Sequencing not set

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show mpls label table label 16001 detail

Thu May 21 05:27:55.760 UTC

Table Label   Owner                        State  Rewrite

----- ------- ---------------------------- ------ -------

0     16001   L2VPN:Active                 InUse  Yes

(PW-HE, vers:0, intf=PE20)

Sessioni/perdita di traffico non visualizzate

Se la sessione non viene visualizzata, verificare se i pacchetti ignorati in NP. È possibile utilizzare questi comandi per visualizzare il rilascio del pacchetto in NP su ASR9K.

- clear counters

- visualizzazione dei dettagli di xconnect l2vpn | include il pacchetto

- cancella tutti i contatori np dei controller

- mostra tutti i contatori np controller

Comandi Show correlati a BNG

Utilizzare questi comandi per controllare le informazioni relative a BNG su ASR9K.

- mostra riepilogo di tutte le sessioni del sottoscrittore

- show subscriber manager disconnect-history unique summary

- mostra totale debug statistiche di subscriber manager

- mostra totale riepilogo statistiche di gestione sottoscrittori

- show subscriber manager trace event/error

Debug da abilitare

Se la sessione non è stata rilevata su ASR9K e non è stato trovato alcun pacchetto scartato su NP, è possibile attivare questi debug su ASR9K per capire perché la sessione non viene rilevata in ASR9K.

- debug l2vpn ea pwhe platform verbose

- debug l2vpn forwarding platform common all

- percorso api debug pm <percorso>

- percorso errore debug pm <percorso>

- percorso errori api uidb debug <location>

Escalation

Se il problema persiste, rivolgersi a Cisco TAC e raccogliere il messaggio Show tech da ASR9K.

- show tech-support subscriber

- show tech-support l2vpn