Sommario

Introduzione

Prerequisiti per l'installazione di ISR-WAAS

Differenza tra NIM-SSD e ISR-SSD

NIM-SSD

ISR-SSD

Installazione ISR-WAAS

Risoluzione dei problemi di ISR-WAAS

Scenario errore installazione WAAS

Scenario di errore attivazione ISR-WAAS

Scenario errore SSD

Introduzione

In questo documento viene descritta la guida all'installazione di Cisco ISR-WAAS su Cisco Integrated Services Router (ISR). Si tratta dell'implementazione di virtual Wide Area Application Services (vWAAS) su un Cisco ISR.

ISR-WAAS viene distribuito all'interno di un contenitore IOS-XE. In questo contesto, per contenitore si intende l'hypervisor che esegue applicazioni virtualizzate su un router Cisco ISR serie 4000.

Prerequisiti per l'installazione di ISR-WAAS

Ogni versione del software WAAS può avere requisiti di risorse diversi (memoria, CPU e unità a stato solido (SSD) ). Se non si soddisfano tali requisiti, possono verificarsi problemi di prestazioni o addirittura errori durante l'installazione.

Consultare la guida alla configurazione al seguente collegamento:

https://www.cisco.com/c/en/us/support/routers/virtual-wide-area-application-services-vwaas/products-installation-and-configuration-guides-list.html

In questa tabella vengono riepilogati i requisiti delle risorse e le piattaforme ISR supportate per ogni modello ISR.

Differenza tra NIM-SSD e ISR-SSD

NIM-SSD

NIM-SSD è l'unità esterna all'RCI e sostituibile a caldo.

Questo è un modulo che viene installato in uno dei Network Interface Module (NIM) disponibili dei router ISR.

Questi sono identificatori di prodotto (PID) per NIM-SSD e SSD che possono essere utilizzati per aumentare la RMA:

NIM-SSD(=)NIM Carrier Card for SSD drives

SSD-SATA-200G(=)200 GB, SATA Solid State Disk for NIM-SSD

Per rimuovere NIM-SSD o NIM-HDD dal router, attenersi alla seguente procedura:

Passaggio 1. Utilizzare un cacciavite Phillips per allentare le viti di fissaggio su entrambi i lati, come mostrato nella seguente immagine:

Passaggio 2. Rimuovere NIM-SSD o NIM-HDD dal router, come mostrato nell'immagine:

ISR-SSD

ISR-SSD invece è installato all'interno dello chassis del router, è necessario spegnere il router, aprire il coperchio per individuare l'ISR-SSD.

ISR-SSD non è sostituibile a caldo.

Questo è il PID per ISR-SSD sulla serie ISR 4300 che può essere utilizzato per aumentare la RMA:

SSD-MSATA-200G(=)200 GB, mSATA Solid State Disk

Nell'immagine sono illustrate le posizioni della scheda di memoria flash e dei dispositivi di storage SSD mSATA:

Installazione ISR-WAAS

Una volta soddisfatti tutti i requisiti per l'installazione di ISR-WAAS, il passaggio successivo consiste nel scaricare un file OAV (Open Virtualization Appliance) della versione ISR-WAAS che si intende installare. È possibile scaricare il software da questo link:

https://software.cisco.com/download/home/280484571/type/280836712

Una volta scaricato il software, è necessario trasferire il file nella memoria bootflash del router:

Dalla CLI del router, attenersi alla seguente procedura per distribuire ISR-WAAS e utilizzare il programma EZConfig:

1. Eseguire il comando Service WAAS enable.

2. Selezionare l'immagine .ova trasferita in precedenza per la versione WAAS da distribuire.

3. Selezionare il profilo WAAS da distribuire.

4. Configurare l'indirizzo IP ISR-WAAS.

5. Configurare l'indirizzo IP di WAAS Central Manager.

6. Selezionare l'interfaccia WAN (Wide Area Network) sul router in cui si desidera abilitare l'intercettazione WAAS.

7. Al termine, salvare la configurazione. Immagine dell'installazione completata.

Risoluzione dei problemi di ISR-WAAS

Scenario errore installazione WAAS

L'installazione di ISR-WAAS non riesce se non è presente un'unità SSD. Verificare innanzitutto se l'unità SSD è presente.

Scenario di errore attivazione ISR-WAAS

In alcuni scenari, l'attivazione di ISR-WAAS non riuscirà dopo la sostituzione del router e l'installazione dell'SSD nel nuovo chassis.

Questi errori possono essere rilevati sul router ISR:

09/16 11:44:08.946 [vman]: [31298]: (note): VM (AUTOWAAS) State Transition: next_state: LIFECYCLE_DEACTIVATE

09/16 11:44:17.613 [vman]: [31298]: (ERR): Loading of machine definition (/vol/harddisk/virtual-instance/AUTOWAAS/ISR4331X.xml) failed

09/16 11:44:17.613 [vman]: [31298]: (ERR): Failed to load machine definition

09/16 11:44:17.613 [vman]: [31298]: (note): Setting failure response (1)

09/16 11:44:17.613 [vman]: [31298]: (ERR): Virtual Service failure log[AUTOWAAS]::Validation::Package validation::Failed to process package-def file::File '/vol/harddisk/virtual-instance/AUTOWAAS/ISR4331X.xml'

09/16 11:44:17.613 [errmsg]: [31298]: (ERR): %VMAN-3-PROCESS_PKG_DEF: Virtual Service[AUTOWAAS]::Validation::Package validation::Failed to process package-def file::File '/vol/harddisk/virtual-instance/AUTOWAAS/ISR4331X.xml'

09/16 11:44:17.613 [vman]: [31298]: (note): VM (AUTOWAAS) State Transition: next_state: LIFECYCLE_WAIT_ACTIVATE

09/16 11:44:17.613 [vman]: [31298]: (note): IF MTU message received:

09/16 11:44:17.613 [vman]: [31298]: (ERR): Invalid bridge ID or the bridge(31) has not been created yet

09/16 11:44:17.614 [vman]: [31298]: (ERR): Failed to set DP IF mtu for DP bridge 31

09/16 11:44:17.614 [vman]: [31298]: (note): vman IF MTU message processed

09/16 11:44:24.725 [vman]: [31298]: (note): Get local RP location rp/0/0

09/16 11:44:27.758 [vman]: [31298]: (note): Get local RP location rp/0/0

09/16 11:44:27.759 [vman]: [31298]: (note): Get local RP location rp/0/0

09/16 11:44:27.772 [vman]: [31298]: (note): Get local RP location rp/0/0

09/16 11:44:27.779 [vman]: [31298]: (note): Get local RP location rp/0/0

09/16 11:44:27.779 [vman]: [31298]: (note): Successfully removed VM init ctx for VM [AUTOWAAS]

09/16 11:44:27.780 [vman]: [31298]: (note): Per-VM message marshalled successfully into persistent DB

09/16 11:44:27.780 [vman]: [31298]: (note): Successfully reset per-VM mac address binding into TDL msg

09/16 11:44:28.063 [vman]: [31298]: (ERR): vman_libvirt_err: code=1

09/16 11:44:28.063 [vman]: [31298]: (ERR): internal error '/usr/sbin/lvremove -f /dev/lvm_raid/vdc.AUTOWAAS' exited with non-zero status 5 and signal 0:   /dev/harddisk1: read failed after 0 of 4096 at 21474770944: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 21474828288: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 0: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 4096: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4429119488: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4429176832: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4096: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 11072897024: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 11072954368: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 4096: Input/output error

/dev/dm-3: read failed after 0 of 4096 at 1630

09/16 11:44:28.063 [vman]: [31298]: (ERR): Failed to delete volume vdc.AUTOWAAS in pool virt_strg_pool_vg

09/16 11:44:28.241 [vman]: [31298]: (ERR): vman_libvirt_err: code=1

09/16 11:44:28.241 [vman]: [31298]: (ERR): internal error '/usr/sbin/lvremove -f /dev/lvm_raid/vdb.AUTOWAAS' exited with non-zero status 5 and signal 0:   /dev/harddisk1: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-3: read failed after 0 of 4096 at 0: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 21474770944: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 21474828288: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 4096: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4429119488: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4429176832: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4096: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 11072897024: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 11072954368: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 4096: I

09/16 11:44:28.241 [vman]: [31298]: (ERR): Failed to delete volume vdb.AUTOWAAS in pool virt_strg_pool_vg

09/16 11:44:28.418 [vman]: [31298]: (ERR): vman_libvirt_err: code=1

09/16 11:44:28.418 [vman]: [31298]: (ERR): internal error '/usr/sbin/lvremove -f /dev/lvm_raid/vda.AUTOWAAS' exited with non-zero status 5 and signal 0:   /dev/harddisk1: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 0: Input/output error

/dev/dm-3: read failed after 0 of 4096 at 0: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 21474770944: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 21474828288: Input/output error

/dev/harddisk1: read failed after 0 of 4096 at 4096: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4429119488: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4429176832: Input/output error

/dev/dm-1: read failed after 0 of 4096 at 4096: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 11072897024: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 11072954368: Input/output error

/dev/dm-2: read failed after 0 of 4096 at 4096: I

09/16 11:44:28.418 [vman]: [31298]: (ERR): Failed to delete volume vda.AUTOWAAS in pool virt_strg_pool_vg

09/16 11:44:28.420 [vman]: [31298]: (note): Found orphaned volume(vda.AUTOWAAS) in pool(virt_strg_pool_vg). Deleting...

È possibile che il disco rigido sia danneggiato e che vengano eseguite le seguenti operazioni:

# show platform hardware subslot <ssd subslot> module device filesystem

# request platform hardware filesystem harddisk: destroy

# hw-module subslot 0/5 reload

Scenario errore SSD

In alcuni casi, se l'unità SSD è guasta mentre si eseguono comandi relativi al disco rigido e al file system, si verificano questi errori.

“request platform hardware filesystem harddisk: destroy”

%This operation can take some time, please be patient

%Harddisk not present. Destroy filesystem aborted.

Per risolvere il problema, provare la seguente procedura:

Passaggio 1. Provare a ricollocare l'SSD.

Passaggio 2. Riavviare il router.

Passaggio 3. Se questi passaggi non sono riusciti, eseguire l'autorizzazione al reso (RMA) per l'unità SSD.