Sommario

Introduzione

Porte predefinite

Tabella dei servizi delle porte inverse

Introduzione

Questo documento descrive le porte TCP e UDP usate dalla piattaforma Cisco CGR2010 per le applicazioni e le comunicazioni in rete.

Porte predefinite

In Cisco CGR2010 queste porte sono abilitate per impostazione predefinita:

Router#show control-plane host open-ports

Active internet connections (servers and established)

Prot               Local Address             Foreign Address                  Service    State

tcp                        *:23                         *:0                   Telnet   LISTEN

Router#

Se il protocollo SSH è abilitato nel router, la porta 22 è aperta in CGR 2010:

Router#show control-plane host open-ports

Active internet connections (servers and established)

Prot               Local Address             Foreign Address                 Service    State

tcp                        *:22                         *:0              SSH-Server   LISTEN

tcp                        *:23                         *:0                  Telnet   LISTEN

Utilizzare Nmap per verificare le porte abilitate nel router.

C:\Program Files (x86)\Nmap>nmap -sS -p1-10000 10.31.126.137

Starting Nmap 7.70 ( https://nmap.org ) at 2018-12-06 20:05 Central Standard Time (Mexico)

Nmap scan report for 10.31.126.137

Host is up (0.0054s latency).

Not shown: 9998 closed ports

PORT STATE SERVICE

22/tcp open ssh

23/tcp open telnet

Nmap done: 1 IP address (1 host up) scanned in 14.23 seconds

C:\Program Files (x86)\Nmap>

Quando si installa un modulo dello switch su CGR2010, il router apre le porte 2003, 4003, 6003 e 9003. Date un'occhiata al tavolo.

C:\Program Files (x86)\Nmap>nmap -sS -p1-10000 10.31.126.137

Starting Nmap 7.70 ( https://nmap.org ) at 2018-12-06 20:22 Central Standard Time (Mexico)

Nmap scan report for 10.31.126.137

Host is up (0.0067s latency).

Not shown: 9994 closed ports

PORT STATE SERVICE

22/tcp open ssh

23/tcp open telnet

2003/tcp open finger

4003/tcp open pxc-splr-ft

6003/tcp open X11:3

9003/tcp open unknown

Nmap done: 1 IP address (1 host up) scanned in 12.54 seconds

C:\Program Files (x86)\Nmap>

Tabella dei servizi delle porte inverse

Nome servizio

Intervallo porte riservate

Telnet normale

2000-2xxx

TCP non elaborato

4000-4xxx

Modalità binaria Telnet

6000-6xxx

Reverse Xremote

9000-9xxx

Questo comportamento è trattato nei seguenti CDETS: https://bst.cloudapps.cisco.com/bugsearch/bug/CSCsh95539