Sommario

Introduzione

Premesse

Prerequisiti

Requisiti

Componenti usati

Fasi di ripristino

Introduzione

Questo documento descrive le operazioni da eseguire per ripristinare bootflash e immagine del sistema su CGR 1000.

Premesse

CGR1000 utilizza la memoria SD (Secure Digital) di Cisco per archiviare immagini kickstart, immagini di sistema, configurazioni, ecc.  In rari casi, la scheda SD si danneggia. Di conseguenza, l'immagine kickstart e/o l'immagine di sistema vengono danneggiate. Questo impedisce l'avvio del CGR. La sequenza di avvio è descritta nella figura riportata di seguito. La procedura descritta in questo articolo consiste nel ripristinare CGR da uno stato di memoria della scheda SD danneggiato.

Prerequisiti

1. Server TFTP (Trivial File Transfer Protocol) installato sul PC locale

2. Configurare il server TFTP in modo che disponga dell'immagine kickstart e dell'immagine del sistema

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

1. Cavo console

2. CAT 5

3. Immagine kickstart e immagini di sistema

Componenti usati

Il documento può essere consultato solo per le versioni CGOS su CGR 1120 e CGR1240.

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Fasi di ripristino

1. Impostare il cavo della console utilizzando putty.

2. Collegare il cavo CAT5 dalla scheda NIC del PC locale all'ETH 2/2 di CGR. Questa è l'unica interfaccia funzionante al momento del processo di ripristino.

3. Configurare la scheda NIC del PC locale nella stessa subnet di CGR.

Ad esempio, la scheda NIC del PC è 192.0.2.1 subnet 255.255.255.0.

Per il CGR sarà 192.0.2.2 subnet 255.255.255.0.

4. Nella sessione Putty, vedi:

"loader>"

IOFPGA @ 0xd0000000 version=0x30020700, datecode=0xc080d17 CPLD version 0x14

Reset Reason = 0(0)

Scratch pad test passed !!!

BIOS Version: Build # 12 -   Wed 06/27/2012

CGR Loader Version: 1.00.01

Filesystem type is ext2fs, partition type 0x83

Filesystem type is ext2fs, partition type 0x83

GNU GRUB  version 0.97

CGR Loader Version 1.00.01

loader>

5. Impostare l'indirizzo IP di ETH2/2 con il comando "set ip".

set ip 192.0.2.2 255.255.255.0

Correct - ip addr is 192.0.2.2, mask is 255.255.255.0

Found Intel IOH GBE [2:0.1] at 0xe020, ROM address 0x0000

Probing...[Intel IOH GBE]

MAC address 78:da:6e:8:ad:e1

External PHY link UP @ 1000/full

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 0.0.0.0

Gateway: 0.0.0.0

loader>

6. Configurare l'indirizzo del gateway come scheda NIC del PC locale con il comando "set gw".

set gw 192.0.2.1

Correct gateway addr 192.0.2.1

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 0.0.0.0

Gateway: 192.0.2.1

7. Avviare l'immagine kickstart dal server tftp locale con il comando "boot tftp://".

loader> boot tftp://192.0.2.1/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 192.0.2.1

Gateway: 192.0.2.1

Filesystem type is tftp, using whole disk

Booting: /cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin console=ttyS0,9600n8nn quie

t loader_ver="1.00.01"....

...............................................................................

................Kickstart image verification Successful

Image verification OK

INIT: Checking all filesystems ....... done.

Warning: switch is starting up with default configuration

Creating boot config file...

/etc/rc.d/rcS.d/S26check-flash: line 528: /mnt/bootloader/boot/grub/menu.lst.local: No such file or directory

cp: cannot stat `/mnt/cfg/0/boot/grub/menu.lst.local': No such file or directory

WARNING: image sync is going to be disabled after a loader netboot

Loading system software

INIT: Sending processes the TERM signal[H[J

INIT: Sending processes the TERM signal

INIT: Sending processes the

KILL signal

8.  Una volta avviata l'immagine, verrà visualizzato un output simile a questo output.

Router(boot)# ?

Exec commands:

clear     Reset functions

config    Enter configuration mode

copy      Copy from one file to another

delete    Delete a file or directory

dir       Directory listing for files

exit      Exit from the EXEC

find      Find a file below the current directory

format    Format disks

init      Initialize internal disk

load      Load system image

mkdir     Create new directory

move      Move files

no        Disable debugging functions

pwd       View current directory

reload    Reboot this supervisor module

rmdir     Remove existing directory

show      Show running system information

sleep     Sleep for the specified number of seconds

ssh       SSH to another system

tail      Display the last part of a file

telnet    Telnet to another system

9. Formattare la scheda SD danneggiata con il comando "format bootflash:".

This command is going to erase the contents of your bootflash:.

Do you want to continue? (y/n)  [n] y

Formatting bootflash:

Formatting started at:  Fri Feb 20 23:56:00 UTC 2015

mke2fs 1.35 (28-Feb-2004)

Formatting finished at:  Fri Feb 20 23:56:52 UTC 2015

Formatting completed

10. Eseguire il sistema di inizializzazione (passo dell'opzione: questo comando formatta la scheda SD e cancella tutto).

Router(boot)# init system

This command is going to erase your startup-config, licenses as well as the contents of your bootflash:.

Do you want to continue? (y/n)  [n] yInitializing the system

mount: /dev/mmcblk0p4 already mounted or /bootflash busy

mount: according to mtab, /dev/mmcblk0p4 is already mounted on /bootflash

ERROR: cannot mount filesystem

cp: omitting directory `/bootflash/'

Partitioning failed

11. Configurare l'interfaccia di gestione (necessaria per copiare l'immagine kickstart e di sistema in bootflash).

Router(boot)# configure terminal

Router(boot)(config)# interface mgmt0

Router(boot)(config-if)#ip address 192.0.2.2 255.255.255.0

Router(boot)(config-if)#no shut

12. Copiare l'immagine di kickstart e di sistema nella bootflash.

Router(boot)# copy tftp://192.0.2.1/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

Router(boot)# copy tftp://192.0.2.1/cgr1000-uk9.5.2.1.CG4.3.SPA.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

13. Verificare che l'immagine kickstart e di sistema si trovino sul CGR con "dir".

Router(boot)#dir

29167616    Feb 21 00:39:59 2015  cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin

143332283    Feb 21 00:42:06 2015  cgr1000-uk9.5.2.1.CG4.3.SPA.bin

372    Feb 23 17:55:52 2015  fpga.log

1905    Feb 23 18:39:54 2015  mts.log

Usage for bootflash://

691462144 bytes used

8859394048 bytes free

9550856192 bytes total

14. Avviare l'immagine del sistema con il comando "load bootflash".

Router(boot)# load bootflash:cgr1000-uk9.5.2.1.CG4.3.SPA.bin

Loading system software

Uncompressing bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin..........done. (in 37 seconds)

Loading plugin 0: core_plugin...

INIT: Switching to runlevel: 3

INIT: Sending processes the TERM signal

Router(boot)#

INIT:

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

2015 Feb 21 00:47:56  %$ VDC-1 %$ %COPP-2-COPP_NO_POLICY: Control-plane is unprotected.System is coming up ... Please wait ...

2015 Feb 21 00:47:58  %$ VDC-1 %$ %VDC_MGR-2-VDC_ONLINE: vdc 1 has come online 2015 Feb 21 00:47:58 Router %$ VDC-1 %$ %PLATFORM-2-

INPUT_POWER_SOURCE_TRANSITION: Three Phase and DC Input Status Alert:  L1 Phase ON, L2 Phase OFF, L3 Phase OFF, DC Input Absent

15. Una volta avviato CGR nell'immagine del sistema, è necessario installare il kickstart e l'immagine del sistema con "install all bootflash:<kickstart-image> system bootflash:<immagine del sistema>.

cgr1120# install all kickstart bootflash:cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin system bootflash:cgr1000-uk9.5.2.1.CG4.3.SPA.bin

Verifying image bootflash:/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin for boot variable "kickstart".

-- SUCCESS

Verifying image bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin for boot variable "system".

-- SUCCESS

Verifying image type.

-- SUCCESS

Extracting "system" version from image bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin.

-- SUCCESS

Extracting "kickstart" version from image bootflash:/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin.

-- SUCCESS

Extracting "bios" version from image bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin.

-- SUCCESS

Checking for Battery Power Mode.

-- SUCCESS

Checking for Module Power Status.

-- SUCCESS

Checking for WPAN upgrade compatibility.

-- SUCCESS

Performing module support checks.

-- SUCCESS

Notifying services about system upgrade.

-- SUCCESS

Compatibility check is done:

Module  bootable          Impact  Install-type  Reason

------  --------  --------------  ------------  ------

1       yes      disruptive         reset  Hitless upgrade is not supported

Images will be upgraded according to following table:

Module       Image                  Running-Version(pri:alt)           New-Version  Upg-Required

------  ----------  ----------------------------------------  --------------------  ------------

1      system                              5.2(1)CG4(3)          5.2(1)CG4(3)            no

1   kickstart                              5.2(1)CG4(3)          5.2(1)CG4(3)            no

1        bios   v16.1.0(10/15/2013):V12.1.0(06/27/2012)   v16.1.0(10/15/2013)            no

1        fpga                                   2.07.00               2.07.00            no

Switch will be reloaded for disruptive upgrade.

Do you want to continue with the installation (y/n)?  [n] y