Sommario

Introduzione

Premesse

Problema

Soluzione

Introduzione

In questo documento viene descritto come eseguire il switchover di una scheda STM/OC3 su Cisco ASR5000.

Premesse

Le schede STM1/OC3 su ASR5000 forniscono porte STM-1 e devono quindi essere gestite con particolare attenzione.

OSPF (Open Shortest Path First) STM-1 (livello 1) è la gerarchia digitale sincrona (SDH) Standard di trasmissione per rete in fibra ottica ITU-T. Ha un bit rate di 155.52 Mbit/s.

SDH è diverso da Ethernet e ha alcune specifiche che devono essere prese in considerazione.

Problema

La configurazione ha una coppia di schede STM1/OC3 configurate con la ridondanza della modalità APS (Automatic Protection Switching) - la scheda 21 e la scheda 37. La scheda 37 è attiva e la scheda 21 è in standby. Le porte 21/1 e 21/2 sono inattive e l'APS funziona. Le porte 37/1 e 37/2 sono attive e l'APS è protetto.

card 21

redundancy aps-mode

aps 1+1 uni-directional non-revertive

framing sdh e1

initial-e1-framing crc4

service-type frame-relay

#exit

******** show card table all *******

Slot        Card Type                               Oper State   SPOF Attach

----------- -------------------------------------- ------------- ---- ------

21: LC      4 PORT STM1/OC3 Channelized Card       Standby          -    5

37: LC      4 PORT STM1/OC3 Channelized Card       Active          No    5

[local]gre2mme01# show aps info 37/1

Port :37/1

Role : Protected

Mode : 1+1

Revertive : No

State : Active

Direction : Uni

Wait To Restore(sec) : 0

Redundant Port : 21/1

Lockout : No

[local]gre2mme01# show aps info 21/1

Port :21/1

Role : Working

Mode : 1+1

Revertive : No

State : Standby

Direction : Uni

Wait To Restore(sec) : 0

Redundant Port : 37/1

Lockout : No

[local]mme01# show port table

Thursday March 08 11:20:20 CET 2018

Port  Role Type                      Admin   Oper Link State   Pair Redundant

----- ---- ------------------------ -------- ---- ---- ------- ----- ---------

21/1  Srvc STM1/OC3 Channelized     Enabled     - Down Standby 37/1 APS Workn

21/2  Srvc STM1/OC3 Channelized     Enabled     - Down Standby 37/2 APS Workn

37/1  Srvc STM1/OC3 Channelized     Enabled     - Up   Active 21/1 APS Protd

37/2  Srvc STM1/OC3 Channelized     Enabled     - Up   Active 21/2 APS Protd

I tentativi di eseguire un passaggio tra le schede 21 e 37 falliscono con l'errore "errata modalità ridondanza".

[local]gre2mme01# card switch from 37 to 21

Friday March 09 00:28:10 CET 2018

Failure: wrong redundancy mode

Soluzione

Lo switchover con switch scheda da X a Y non è supportato per le schede STM1/OC3 con ridondanza in modalità APS.

In alternativa, è necessario utilizzare comandi specifici dell'APS.

aps { clear slot#/port# | exercise slot#/port# | lockout slot#/port# | switch { force | manual } slot#/port# }

switch { force | manual } slot#/port#

Switch to either the working port or the protection port:

force: Forces a switch of ports, even if there is an active alarm state.

manual: Implements a switch of ports if there are no active alarms.

slot#/port# is the CLC2/OLC2 slot number (valid range is 17 - 48) and appropriate port number (CLC2 valid range is 1 - 4; OLC2 valid value is 1)

In questo caso, il problema è stato risolto con:

aps switch manual 37/1

aps switch manual 37/2

Nota: Se lo switchover manuale ha esito negativo, è possibile che si siano verificati errori sulla porta. Verificare lo stato della porta con "show aps port-status <card/slot>". Lo switchover può essere ancora forzato con l'opzione "force".

[local]gre2mme01# show aps port-status 21/1

Friday March 09 13:19:49 CET 2018

Port                      : 21/1

Role                      : Working

Lockout                   : No

APS  Signal Failure       : No

APS  Signal Degrade       : No

Switch Over               : No

Far End Failiure          : No

Remote Not Compatible     : No

Current Command           : No Request

Switch Status             : No request

[local]gre2mme01#

[local]gre2mme01# show aps port-status 37/1

Friday March 09 13:20:07 CET 2018

Port                      : 37/1

Role                      : Protected

Lockout                   : No

APS  Signal Failure       : No

APS  Signal Degrade       : No

Switch Over               : No

Far End Failiure          : No

Remote Not Compatible     : No

Current Command           : No Request

Switch Status             : No request

Invalid K1 K2             : No

Rx K1                     : Reqest : 0x 0  (--              Channel - 0)

Rx K2                     : Status : 0x 0  (--              Channel - 0)

Tx K1                     : Reqest : 0x 0  (No Request      Channel - 0)

Tx K2                     : Status : 0x 4  (UNI,1+1         Channel - 0)