Sommario

Introduzione

Accesso remoto al nodo dal nodo locale tramite comandi TL1

Introduzione

Questo documento descrive il metodo per effettuare il login ai nodi remoti raggiungibili dal nodo locale tramite TL1.

Accesso remoto al nodo dal nodo locale tramite comandi TL1

Nel tentativo di effettuare il login a un nodo remoto da un nodo raggiungibile adiacente, se Cisco Transport Controller (CTC) non funziona, rimane il metodo TL1.

Questo metodo descrive come eseguire il login al nodo remoto dal nodo locale connesso e i passi sono:

Passaggio 1. Accedere al nodo e verificare se il nodo remoto è raggiungibile tramite qualsiasi canale, ad esempio. (DCC/GCC/OSI) o accessibile direttamente tramite ping.

-> acNodes

========================== AlrmC Nodes =================================

ind Val NodeName          IP Addr      Cri Maj Min N-A N-R Vwire ProdField VirtWrProdNm VirtWireProdEnum MsgVer

--- --- -------------------- ----------------  --- --- --- --- --- -----

0 Yes 206                  10.105.142.206      3   0   2   8   1  xxxx ONS15454  1 400

1 Yes WXC-207              10.105.142.207      0   1   5   6   0  xxxx ONS15454  1 400

2 Yes 197                  10.105.142.197      3   2  11  11   5  xxxx ONS15454  1 400

Passaggio 2. Accedere tramite TL1 nel nodo locale utilizzando questa sintassi.

Sintassi:

UTENTE ACT:[<TID>]:<uid>:<CTAG>:<pid>;

ACT-USER::CISCO15:123::******;

206 2000-12-15 23:43:21

M  123 COMPLD

"CISCO15:2000-12-15 23-42-43,2000-12-15 23-15-04,0"

;

206 2000-12-15 23:43:21

A  0 REPT EVT SESSION

"206:NO,"

/* TL1 Agent Copyright (c) 1999-2007 Cisco Systems, Inc.

WARNING

This system is restricted to authorized users for business purposes. Unauthorized

access is a violation of the law. This service may be monitored for administrative

and security reasons. By proceeding, you consent to this monitoring.

User CISCO15 logged in from 64.103.228.115 */

;

User CISCO15 logged in from 10.105.142.206 */

;RTRV-ALM-ALL:::123;

206 2000-12-15 23:47:04

M  123 COMPLD

"SLOT-11,EQPT:MN,EQPT,NSA,12-04,03-26-24,NEND,NA:\"Equipment Failure\",TCC"

"LINEWL-17-4-RX-1530.33,OCH:CR,LOS-P,SA,12-09,02-55-16,NEND,NA:\"Incoming Payload Signal Absent\",40-SMR1-C"

"LINEWL-17-4-RX-1531.90,OCH:CR,LOS-P,SA,12-09,02-57-20,NEND,NA:\"Incoming Payload Signal Absent\",40-SMR1-C"

"LINE-17-5-TX,OTS:CR,OPWR-LFAIL,SA,12-09,02-55-19,NEND,NA:\"Optical Power Failure Low\",40-SMR1-C"

"LINE-17-1-TX,OTS:MN,APC-OUT-OF-RANGE,NSA,12-15,22-55-33,NEND,NA:\"APC Cannot Set Value Due To Range Limits\",40-SMR1-C"

Passaggio 3. Dalla sintassi, modificare il TID e a ACT-USER login per il nodo remoto a cui si desidera accedere. Anche per altri comandi è necessario utilizzare il valore TID, ad esempio il nome del nodo remoto.

> ACT-USER:WXC-207:CISCO15:123::******;

WXC-207 2004-06-03 18:50:20

M  123 COMPLD

"CISCO15:2004-06-03 18-23-24,2004-06-03 16-35-48,0"

;

>

WXC-207 2004-06-03 18:50:20

A  0 REPT EVT SESSION

"WXC-207:NO,"

/* TL1 Agent Copyright (c) 1999-2007 Cisco Systems, Inc.

WARNING

This system is restricted to authorized users for business purposes. Unauthorized

access is a violation of the law. This service may be monitored for administrative

and security reasons. By proceeding, you consent to this monitoring.

User CISCO15 logged in from 10.105.142.206 */

Per altri comandi, come mostrato nell'esempio, è necessario immettere i rispettivi valori TID, ad esempio il nome del nodo come WXC-207:

> RTRV-ALM-ALL:WXC-207::123;

WXC-207 2004-06-03 18:50:54

M  123 COMPLD

"SLOT-11,EQPT:MN,PROTNA,NSA,05-21,21-55-10,NEND,NA:\"Protection Unit Not Available\",TCC"

"BITS-1,BITS:MN,LOS,NSA,05-21,21-55-25,NEND,RCV:\"Loss Of Signal\","

"BITS-2,BITS:MN,LOS,NSA,05-21,21-55-25,NEND,RCV:\"Loss Of Signal\","

"SYNC-NE,SYNCN:MJ,SYNCPRI,SA,05-21,21-55-25,NEND,NA:\"Primary Synchronization Reference Failure\","

"SYNC-NE,SYNCN:MN,SYNCSEC,NSA,05-21,21-55-25,NEND,NA:\"Secondary Synchronization Reference Failure\","

"PWR-A,EQPT:MN,BAT-FAIL,NSA,05-21,21-55-18,NEND,NA:\"Battery Failure\","

;

Anche se è stato eseguito l'accesso al nodo remoto, è possibile spostarsi in qualsiasi altro nodo connesso e modificare TID per i remoti e mantenerlo vuoto come TID per i nodi locali.