Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Convenzioni

Configurazione

Esempio di rete

Configurazioni

Verifica

Risoluzione dei problemi

Comandi per la risoluzione dei problemi

Informazioni correlate

Introduzione

Questo documento spiega come supportare un client PPPoE (Point-to-Point Protocol over Ethernet) su router Cisco IOS® connessi tramite un'interfaccia Ethernet a un modem DSL o alle apparecchiature DSL della sede del cliente (CPE) di un altro fornitore.

Gli ISP spesso forniscono ai clienti un modem DSL dotato di un'interfaccia Ethernet per il collegamento al segmento Ethernet del cliente e di un'altra interfaccia per la connettività della linea DSL. In questo caso, il modem DSL funge da bridge solo se il CPE non è configurabile per alcuna connettività IP o funzionalità avanzate tramite DSL. Ciò limita la connettività a un solo PC client PPPoE. Con l'aggiunta di un router Cisco IOS connesso all'interfaccia Ethernet del modem DSL, è possibile eseguire la funzione PPPoE Client IOS sul router Cisco. In questo modo è possibile connettere più PC sul segmento Ethernet collegato al router Cisco IOS. Con l'uso del router Cisco IOS, è possibile migliorare le connettività DSL e tutte le funzionalità di IOS, ad esempio la sicurezza, NAT (Network Address Translation) e DHCP (Dynamic Host Configuration Protocol), per gli host interni.

La funzionalità PPPoE consente di avviare una sessione PPP su un client Ethernet di bridging semplice. La sessione viene trasportata sul collegamento ATM tramite frame Ethernet con bridge incapsulati. È possibile terminare la sessione presso un ufficio centrale del vettore di scambio locale o presso un punto di presenza dell'ISP.

Prerequisiti

Requisiti

Nessun requisito specifico previsto per questo documento.

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- Software Cisco 827-4V CPE IOS release 12.1(1)XB

- Router Cisco 2611 con software Cisco IOS versione 12.2(2)T1

- Cisco 6400 Universal Access Concentrator (UAC) con software Cisco IOS versione 12.1(5)DC1 image

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

Configurazione

In questa sezione vengono presentate le informazioni necessarie per configurare le funzionalità descritte più avanti nel documento.

Nota: per ulteriori informazioni sui comandi menzionati in questo documento, usare lo strumento di ricerca dei comandi (solo utenti registrati).

Esempio di rete

Nel documento viene usata l'impostazione di rete mostrata nel diagramma.

Nota: in questo documento, la connessione del client PPPoE viene avviata dal router Cisco. Questo è il router Cisco 2611 in questa configurazione. Il router Cisco 827 nel diagramma rappresenta il CPE DSL non Cisco.

Configurazioni

Nel documento vengono usate queste configurazioni.

- 2611 Router

- Cisco DSL 827 Router

- Cisco 6400 Router

2611 Router

!

hostname pooh

ip host rund 172.17.247.195

!

ip subnet-zero

no ip domain-lookup

!

vpdn enable

no vpdn logging

!

vpdn-group 1

request-dialin

protocol pppoe

!

!

!

!

interface Ethernet0/0

ip address 10.200.56.22 255.255.255.0

ip nat inside

no ip mroute-cache

!

!

!

!

interface Ethernet0/1

no ip address

pppoe enable

pppoe-client dial-pool-number 1

!

interface Dialer1

ip address negotiated

ip nat outside

ip mtu 1492

encapsulation ppp

no ip mroute-cache

dialer pool 1

dialer-group 1

ppp authentication pap

ppp pap sent-username cisco password cisco1

!

ip classless

no ip http server

!

dialer-list 1 protocol ip permit

ip nat inside source list 1 interface Dialer1 overload

ip route 0.0.0.0 0.0.0.0 dialer1

access-list 1 permit 10.200.56.0 0.0.0.255

!

line con 0

exec-timeout 0 0

transport input none

line vty 0 4

login

password ww

!

end

Cisco DSL 827 Router

Building configuration...

Current configuration : 821 bytes

!

version 12.2

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Chansey

!

!

ip subnet-zero

no ip domain-lookup

!

!

!

interface Ethernet0

no ip address

bridge-group 1

!

interface ATM0

no ip address

no atm ilmi-keepalive

bundle-enable

bridge-group 1

dsl operating-mode auto

!

interface ATM0.1 point-to-point

pvc 53/53

!--- vpi/vci given by the ISP

!

!

ip classless

ip http server

!

bridge 1 protocol ieee

!

line con 0

exec-timeout 0 0

stopbits 1

line vty 0 4

exec-timeout 0 0

password ww

login local

!

scheduler max-task-time 5000

end

Cisco 6400 Router

Current configuration : 3231 bytes

!

version 12.1

no service single-slot-reload-enable

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname alyssa_nrp1

!

logging rate-limit console 10 except errors

aaa new-model

aaa authentication ppp default local

enable password ww

!

username cisco password  cisco1

redundancy

main-cpu

auto-sync standard

no secondary console enable

ip subnet-zero

ip cef

vpdn enable

no vpdn logging

!

vpdn-group cisco

accept-dialin

protocol pppoe

virtual-template 2

!

!

!

!

!

!

!

interface Loopback5

ip address 212.93.195.100 255.255.255.0

!

!

interface ATM0/0/0

no ip address

no ip mroute-cache

load-interval 30

atm pvc 16 0 16 ilmi

no atm ilmi-keepalive

pvc 10/100

!

hold-queue 1000 in

!

interface ATM0/0/0.60 multipoint

pvc 6/60

encapsulation aal5snap

protocol pppoe

!

!

interface Ethernet0/0/1

no ip address

!

interface Ethernet0/0/0

ip address 10.200.56.8 255.255.255.0

!

interface FastEthernet0/0/0

no ip address

full-duplex

!

!

interface Virtual-Template2

ip unnumbered Loopback5

ip mtu 1492

no ip route-cache cef

peer default ip address pool nrp1

ppp authentication pap

!

ip local pool nrp1 212.93.198.1

ip classless

!

!

line con 0

exec-timeout 0 0

password ww

transport input none

line aux 0

line vty 0 4

exec-timeout 0 0

password ww

!

!

end

Verifica

Le informazioni contenute in questa sezione permettono di verificare che la configurazione funzioni correttamente.

Alcuni comandi show sono supportati dallo strumento Output Interpreter (solo utenti registrati); lo strumento permette di visualizzare un'analisi dell'output del comando show.

- show vpdn session all: visualizza le informazioni sulla sessione VPDN. Queste informazioni includono le statistiche relative a interfaccia, tunnel, nome utente, pacchetti, stato e finestra.

- show interface ethernet 0/1: visualizza le informazioni sull'interfaccia Ethernet sul router.

- show interfaces dialer 1: visualizza le informazioni sulla dialer sul router.

- show ip local pool nrp1: visualizza le informazioni sul pool locale ip.

- show ip route: visualizza le informazioni sul router IP.

Questo è l'output del comando show vpdn session all su Cisco 2611.

pooh#show vpdn session all

%No active L2TP tunnels

%No active L2F tunnels

%No active PPTP tunnels

PPPoE Session Information Total tunnels 1 sessions 1

session id: 1

!--- Local MAC address.

local MAC address: 0030.9424.af21,

remote MAC address: 0050.736f.4c37

virtual access interface: Vi1, outgoing interface: Et0/1

599 packets sent, 599 received

9202 bytes sent, 8154 received

!--- Verify that the outgoing interface for the PPPoE session !--- is Ethernet0/1 and the local MAC address that displays is the !--- MAC address of Ethernet0/1. The remote MAC address that displays !--- is the MAC address of the Aggregator device (6400). !--- You can see it on the 6400 as the local MAC address in the !--- show vpdn session on the 6400.

Questo è l'output del comando show interface ethernet 0/1 su Cisco 2611.

pooh#show interface ethernet 0/1

Ethernet0/1 is up, line protocol is up

Hardware is AmdP2, address is 0030.9424.af21 (bia 0030.9424.af21

MTU 1500 bytes, BW 10000 Kbit, DLY 1000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:40, output 00:00:01, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

739 packets input, 64127 bytes, 0 no buffer

Received 57 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 input packets with dribble condition detected

1153 packets output, 89766 bytes, 0 underruns(1/0/0)

0 output errors, 1 collisions, 1 interface resets

0 babbles, 0 late collision, 2 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

Questo è l'output del comando show interfaces dialer 1 su Cisco 2611.

pooh#show interfaces dialer 1

Dialer1 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address is 212.93.198.1/32

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Interface is bound to Vi1

Last input never, output never, output hang never

Last clearing of "show interface" counters 01:38:43

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/0/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

403 packets input, 6082 bytes

403 packets output, 6978 bytes

Bound to:

Virtual-Access1 is up, line protocol is up

Hardware is Virtual Access interface

MTU 1500 bytes, BW 100000 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

Interface is bound to Di1 (Encapsulation PPP)

LCP Open

Listen: CDPCP

Open: IPCP

Last input 00:00:09, output never, output hang never

Last clearing of "show interface" counters 00:35:16

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

430 packets input, 6453 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

430 packets output, 7400 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Questo è l'output del comando show vpdn session all su Cisco 6400.

alyssa_nrp1#show vpdn session  all

%No active L2TP tunnels

%No active L2F tunnels

%No active PPTP tunnels

PPPoE Session Information Total tunnels 1 sessions 1

session id: 1

local MAC address: 0050.736f.4c37, remote MAC address: 0030.9424.af21

virtual access interface: Vi3, outgoing interface: AT0/0/0, vc: 6/60

495 packets sent, 494 received

7369 bytes sent, 7346 received

Questo è l'output del comando show ip local pool nrp1 su Cisco 6400.

alyssa_nrp1#show ip local pool nrp1

Pool                     Begin           End             Free  In use

nrp1                    212.93.198.1    212.93.198.1       0       1

Available addresses:

None

Inuse addresses:

212.93.198.1       Vi3                         nrp1

Questo è l'output del comando show ip route su Cisco 6400.

alyssa_nrp1#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 0.0.0.0 to network 0.0.0.0

212.93.198.0/32 is subnetted, 1 subnets

C       212.93.198.1 is directly connected, Virtual-Access3

!--- You have to see the installed route for the remote PPPoE session.

C    212.93.195.0/24 is directly connected, Loopback5

10.0.0.0/8 is variably subnetted, 3 subnets, 2 masks

C       10.200.56.0/24 is directly connected, Ethernet0/0/0

Risoluzione dei problemi

Le informazioni contenute in questa sezione permettono di risolvere i problemi relativi alla configurazione.

Comandi per la risoluzione dei problemi

Alcuni comandi show sono supportati dallo strumento Output Interpreter (solo utenti registrati); lo strumento permette di visualizzare un'analisi dell'output del comando show.

Nota: prima di usare i comandi di debug, consultare le informazioni importanti sui comandi di debug.

- show debugging: visualizza le informazioni di debug sul router.

Questo è l'output del comando show debugging su Cisco 2611.

pooh#show debugging

PPP:

PPP protocol negotiation debugging is on

VPN:

PPPoE protocol events debugging is on

PPPoE control packets debugging is on

01:54:21:  Sending PADI: Interface = Ethernet0/1

01:54:21: pppoe_send_padi:

FF FF FF FF FF FF 00 30 94 24 AF 21 88 63 11 09

00 00 00 0C 01 01 00 00 01 03 00 04 82 2E 39 F0

00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 ...

01:54:21: PPPoE 0: I PADO L:0030.9424.af21 R:0050.736f.4c37 Et0/1

00 30 94 24 AF 21 00 50 73 6F 4C 37 88 63 11 07

00 00 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

01:54:23:  PPPOE: we've got our pado and the pado timer went off

01:54:23: OUT PADR from PPPoE tunnel

00 50 73 6F 4C 37 00 30 94 24 AF 21 88 63 11 19

00 00 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

01:54:23: PPPoE 1: I PADS L:0030.9424.af21 R:0050.736f.4c37 Et0/1

00 30 94 24 AF 21 00 50 73 6F 4C 37 88 63 11 65

00 01 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

01:54:23: IN PADS from PPPoE tunnel

01:54:23: Vi1 Debug: Condition 1, interface Di1 triggered, count 1

01:54:23: %DIALER-6-BIND: Interface Vi1 bound to profile Di1

01:54:23: PPPoE: Virtual Access interface obtained.

01:54:23: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

01:54:23: Vi1 PPP: Treating connection as a callout

01:54:23: Vi1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

01:54:23: Vi1 PPP: No remote authentication for call-out

01:54:23: Vi1 LCP: O CONFREQ [Closed] id 1 len 10

01:54:23: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:23: Vi1 LCP: I CONFACK [REQsent] id 1 len 10

01:54:23: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:25: Vi1 LCP: I CONFREQ [ACKrcvd] id 2 len 18

01:54:25: Vi1 LCP:    MRU 1492 (0x010405D4)

01:54:25: Vi1 LCP:    AuthProto PAP (0x0304C023)

01:54:25: Vi1 LCP:    MagicNumber 0x5C799D85 (0x05065C799D85)

01:54:25: Vi1 LCP: O CONFNAK [ACKrcvd] id 2 len 8

01:54:25: Vi1 LCP:    MRU 1500 (0x010405DC)

01:54:25: Vi1 LCP: TIMEout: State ACKrcvd

01:54:25: Vi1 LCP: O CONFREQ [ACKrcvd] id 2 len 10

01:54:25: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:25: Vi1 LCP: I CONFREQ [REQsent] id 3 len 18

01:54:25: Vi1 LCP:    MRU 1500 (0x010405DC)

01:54:25: Vi1 LCP:    AuthProto PAP (0x0304C023)

01:54:25: Vi1 LCP:    MagicNumber 0x5C799D85 (0x05065C799D85)

01:54:25: Vi1 LCP: O CONFACK [REQsent] id 3 len 18

01:54:25: Vi1 LCP:    MRU 1500 (0x010405DC)

01:54:25: Vi1 LCP:    AuthProto PAP (0x0304C023)

01:54:25: Vi1 LCP:    MagicNumber 0x5C799D85 (0x05065C799D85)

01:54:25: Vi1 LCP: I CONFACK [ACKsent] id 2 len 10

01:54:25: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:25: Vi1 LCP: State is Open

01:54:25: Vi1 PPP: Phase is AUTHENTICATING, by the peer [0 sess, 0 load]

01:54:25: Vi1 PAP: O AUTH-REQ id 4 len 18 from "cisco"

01:54:25: Vi1 PAP: I AUTH-ACK id 4 len 5

01:54:25: Vi1 PPP: Phase is UP [0 sess, 0 load]

01:54:25: Vi1 IPCP: O CONFREQ [Closed] id 1 len 10

01:54:25: Vi1 IPCP:    Address 0.0.0.0 (0x030600000000)

01:54:25: Vi1 CDPCP: O CONFREQ [Closed] id 1 len 4

01:54:25: Vi1 IPCP: I CONFREQ [REQsent] id 1 len 10

01:54:25: Vi1 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

01:54:25: Vi1 IPCP: O CONFACK [REQsent] id 1 len 10

01:54:25: Vi1 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

01:54:25: Vi1 IPCP: I CONFNAK [ACKsent] id 1 len 10

01:54:25: Vi1 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

01:54:25: Vi1 IPCP: O CONFREQ [ACKsent] id 2 len 10

01:54:25: Vi1 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

01:54:25: Vi1 LCP: I PROTREJ [Open] id 4 len 10 protocol CDPCP

(0x820701010004)

01:54:25: Vi1 CDPCP: State is Closed

01:54:25: Vi1 IPCP: I CONFACK [ACKsent] id 2 len 10

01:54:25: Vi1 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

01:54:25: Vi1 IPCP: State is Open

01:54:25: Di1 IPCP: Install negotiated IP interface address 212.93.198.1

01:54:25: Di1 IPCP: Install route to 212.93.195.100

01:54:26: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access1,

changed state to up

Questo è l'output del comando show debug su Cisco 6400.

*Aug 16 15:58:51.346: PPPoE: IN PADI discovery packet

*Aug 16 15:58:51.346:   PPPoE: LMAC:ffff.ffff.ffff RMAC:0030.9424.af21 6/60

AT0/0/0.60

FF FF FF FF FF FF 00 30 94 24 AF 21 88 63 11 09

00 00 00 0C 01 01 00 00 01 03 00 04 82 2E 39 F0

00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 ...

*Aug 16 15:58:51.346: PPPoE: PADO OUT from PPPoE tunnel

*Aug 16 15:58:51.346:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

00 05 09 00 AA AA 03 00 80 C2 00 07 00 00 00 30

94 24 AF 21 00 50 73 6F 4C 37 88 63 11 07 00 00

00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0 01 ...

*Aug 16 15:58:53.390: PPPoE: IN PADR discovery packet

*Aug 16 15:58:53.390:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

00 50 73 6F 4C 37 00 30 94 24 AF 21 88 63 11 19

00 00 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

*Aug 16 15:58:53.394: Vi3 PPP: Phase is DOWN, Setup [0 sess, 0 load]

*Aug 16 15:58:53.418: PPPoE: Create session: 1

*Aug 16 15:58:53.418: PPPoE:  1: Created

*Aug 16 15:58:53.418:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

*Aug 16 15:58:53.418: PPPoE: PADS OUT from PPPoE tunnel

*Aug 16 15:58:53.418:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

00 05 09 00 AA AA 03 00 80 C2 00 07 00 00 00 30

94 24 AF 21 00 50 73 6F 4C 37 88 63 11 65 00 01

00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0 01 ...

2d08h: %LINK-3-UPDOWN: Interface Virtual-Access3, changed state to up

*Aug 16 15:58:53.426: Vi3 PPP: Treating connection as a dedicated line

*Aug 16 15:58:53.426: Vi3 PPP: Phase is ESTABLISHING, Active Open [0 sess,

0 load]

*Aug 16 15:58:53.426: Vi3 LCP: O CONFREQ [Closed] id 1 len 18

*Aug 16 15:58:53.426: Vi3 LCP:    MRU 1492 (0x010405D4)

*Aug 16 15:58:53.426: Vi3 LCP:    AuthProto PAP (0x0304C023)

*Aug 16 15:58:53.426: Vi3 LCP:    MagicNumber 0x5C7E3144 (0x05065C7E3144)

*Aug 16 15:58:53.466: Vi3 LCP: I CONFREQ [REQsent] id 1 len 10

*Aug 16 15:58:53.466: Vi3 LCP:    MagicNumber 0x31017223 (0x050631017223)

*Aug 16 15:58:53.466: Vi3 LCP: O CONFACK [REQsent] id 1 len 10

*Aug 16 15:58:53.466: Vi3 LCP:    MagicNumber 0x31017223 (0x050631017223)

*Aug 16 15:58:53.470: Vi3 LCP: I CONFNAK [ACKsent] id 1 len 8

*Aug 16 15:58:53.470: Vi3 LCP:    MRU 1500 (0x010405DC)

*Aug 16 15:58:53.470: Vi3 LCP: O CONFREQ [ACKsent] id 2 len 18

*Aug 16 15:58:53.470: Vi3 LCP:    MRU 1500 (0x010405DC)

*Aug 16 15:58:53.470: Vi3 LCP:    AuthProto PAP (0x0304C023)

*Aug 16 15:58:53.470: Vi3 LCP:    MagicNumber 0x5C7E3144 (0x05065C7E3144)

*Aug 16 15:58:53.510: Vi3 LCP: I CONFACK [ACKsent] id 2 len 18

*Aug 16 15:58:53.510: Vi3 LCP:    MRU 1500 (0x010405DC)

*Aug 16 15:58:53.510: Vi3 LCP:    AuthProto PAP (0x0304C023)

*Aug 16 15:58:53.510: Vi3 LCP:    MagicNumber 0x5C7E3144 (0x05065C7E3144)

*Aug 16 15:58:53.510: Vi3 LCP: State is Open

*Aug 16 15:58:53.510: Vi3 PPP: Phase is AUTHENTICATING, by this end [0

sess, 0 load]

*Aug 16 15:58:53.514: Vi3 PAP: I AUTH-REQ id 5 len 18 from "cisco"

*Aug 16 15:58:53.514: Vi3 PPP: Phase is FORWARDING [0 sess, 0 load]

*Aug 16 15:58:53.514: Vi3 PPP: Phase is AUTHENTICATING [0 sess, 0 load]

*Aug 16 15:58:53.514: Vi3 PAP: Authenticating peer cisco

*Aug 16 15:58:53.514: Vi3 PAP: O AUTH-ACK id 5 len 5

*Aug 16 15:58:53.514: Vi3 PPP: Phase is UP [0 sess, 0 load]

*Aug 16 15:58:53.514: Vi3 IPCP: O CONFREQ [Closed] id 1 len 10

*Aug 16 15:58:53.514: Vi3 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

*Aug 16 15:58:53.574: Vi3 IPCP: I CONFREQ [REQsent] id 1 len 10

*Aug 16 15:58:53.574: Vi3 IPCP:    Address 0.0.0.0 (0x030600000000)

*Aug 16 15:58:53.574: Vi3 IPCP: Pool returned 212.93.198.1

*Aug 16 15:58:53.574: Vi3 IPCP: O CONFNAK [REQsent] id 1 len 10

*Aug 16 15:58:53.574: Vi3 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

*Aug 16 15:58:53.574: Vi3 CDPCP: I CONFREQ [Not negotiated] id 1 len 4

*Aug 16 15:58:53.574: Vi3 LCP: O PROTREJ [Open] id 3 len 10 protocol CDPCP

(0x820701010004)

*Aug 16 15:58:53.574: Vi3 IPCP: I CONFACK [REQsent] id 1 len 10

*Aug 16 15:58:53.574: Vi3 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

*Aug 16 15:58:53.618: Vi3 IPCP: I CONFREQ [ACKrcvd] id 2 len 10

*Aug 16 15:58:53.618: Vi3 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

*Aug 16 15:58:53.618: Vi3 IPCP: O CONFACK [ACKrcvd] id 2 len 10

*Aug 16 15:58:53.618: Vi3 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

*Aug 16 15:58:53.618: Vi3 IPCP: State is Open

*Aug 16 15:58:53.622: Vi3 IPCP: Install route to 212.93.198.1

2d08h: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access3,

changed state to up

Informazioni correlate

- Configurazione del router Cisco 827

- Informazioni di supporto sulla tecnologia Cisco DSL

- Supporto tecnico – Cisco Systems