Sommario

Introduzione

Prerequisiti

Requisiti

Componenti

Convenzioni

Sfondo

Dettagli delle variabili MIB, inclusi gli OID (Object Identifier)

Aggiunta di una VLAN a uno switch Cisco Catalyst con SNMP

Istruzioni dettagliate

Aggiunta di una VLAN a uno switch Cisco Catalyst con SNMP

Istruzioni in un unico passaggio

Eliminazione di una VLAN da uno switch Cisco Catalyst con SNMP

Istruzioni dettagliate

Aggiunta di una porta a una VLAN su uno switch Cisco Catalyst con SNMP

Come modificare una porta da una VLAN a un'altra VLAN

Informazioni correlate

Introduzione

In questo documento viene descritto come creare ed eliminare le VLAN su uno switch Cisco Catalyst che utilizza il protocollo SNMP (Simple Network Management Protocol). Descrive anche come aggiungere porte a una VLAN con SNMP.

Prerequisiti

Requisiti

Prima di usare le informazioni riportate in questo documento, accertarsi di aver compreso:

- Funzionamento di ifTable e ifIndexes

- Funzionamento delle VLAN sugli switch Cisco Catalyst

- Come visualizzare le informazioni sulla VLAN sugli switch Cisco Catalyst

- Uso generale dei comandi get, set e walk del protocollo SNMP

Componenti

Questo documento è destinato agli switch Catalyst che eseguono regolarmente il sistema operativo Catalyst o Catalyst IOS che supporta IF-MIB, CISCO-VTP-MIB e CISCO-VLAN-MEMBERSHIP-MIB. Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- Catalyst 3524XL con CatIOS 12.0(5)WC5a

- NET-SNMP versione 5.0.6 disponibile all'indirizzo http://www.net-snmp.org/

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, prima di usare un comando accertarsi di aver ben compreso l'impatto potenziale di ciascun comando.

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

Sfondo

Dettagli delle variabili MIB, inclusi gli OID (Object Identifier)

1.3.6.1.4.1.9.9.46.1.3.1.1.2 (CISCO-VTP-MIB)

vtpVlanState  OBJECT-TYPE

SYNTAX     INTEGER { operational(1),

suspended(2),

mtuTooBigForDevice(3),

mtuTooBigForTrunk(4) }

MAX-ACCESS read-only

STATUS     current

DESCRIPTION            "The state of this VLAN.

The state 'mtuTooBigForDevice' indicates that this device

cannot participate in this VLAN because the VLAN's MTU is

larger than the device can support.

The state 'mtuTooBigForTrunk' indicates that while this

VLAN's MTU is supported by this device, it is too large for

one or more of the device's trunk ports."

::= { vtpVlanEntry 2 }

1.3.6.1.4.1.9.9.46.1.4.1.1.1 (CISCO-VTP-MIB)

vtpVlanEditOperation OBJECT-TYPE

SYNTAX     INTEGER { none(1),

copy(2),

apply(3),

release(4),

restartTimer(5)

}

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "This object always has the value 'none' when read.  When

written, each value causes the appropriate action:

'copy' - causes the creation of rows in the

vtpVlanEditTable exactly corresponding to the current global

VLAN information for this management domain.  If the Edit

Buffer (for this management domain) is not currently empty,

a copy operation fails.  A successful copy operation starts

the deadman-timer.

'apply' - first performs a consistent check on the the

modified information contained in the Edit Buffer, and if

consistent, then tries to instanciate the modified

information as the new global VLAN information.  Note that

an empty Edit Buffer (for the management domain) would

always result in an inconsistency since the default VLANs

are required to be present.

'release' - flushes the Edit Buffer (for this management

domain), clears the Owner information, and aborts the

deadman-timer.  A release is generated automatically if the

deadman-timer ever expires.

'restartTimer' - restarts the deadman-timer.

'none' - no operation is performed."

::= { vtpEditControlEntry 1 }

1.3.6.1.4.1.9.9.46.1.4.1.1.3 (CISCO-VTP-MIB)

vtpVlanEditBufferOwner OBJECT-TYPE

SYNTAX     OwnerString

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The management station which is currently using the Edit

Buffer for this management domain.  When the Edit Buffer for

a management domain is not currently in use, the value of

this object is the zero-length string.  Note that it is also

the zero-length string if a manager fails to set this object

when invoking a copy operation."

::= { vtpEditControlEntry 3 }

1.3.6.1.4.1.9.9.46.1.4.2.1.11 (CISCO-VTP-MIB)

vtpVlanEditRowStatus OBJECT-TYPE

SYNTAX     RowStatus

1:active

2:notInService

3:notReady

4:createAndGo

5:createAndWait

6:destroy

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The status of this row.  Any and all columnar objects in an

existing row can be modified irrespective of the status of

the row.

A row is not qualified for activation until instances of at

least its vtpVlanEditType, vtpVlanEditName and

vtpVlanEditDot10Said columns have appropriate values.

The management station should endeavor to make all rows

consistent in the table before 'apply'ing the buffer.  An

inconsistent entry in the table will cause the entire

buffer to be rejected with the vtpVlanApplyStatus object

set to the appropriate error value."

::= { vtpVlanEditEntry 11 }

1.3.6.1.4.1.9.9.46.1.4.2.1.3.1.48 (CISCO-VTP-MIB)

vtpVlanEditType OBJECT-TYPE

SYNTAX     VlanType

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The type which this VLAN would have.

An implementation may restrict access to this object."

DEFVAL     { ethernet }

::= { vtpVlanEditEntry 3 }

1.3.6.1.4.1.9.9.46.1.4.2.1.4.1.48 (CISCO-VTP-MIB)

vtpVlanEditName OBJECT-TYPE

SYNTAX     DisplayString (SIZE (1..32))

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The name which this VLAN would have.  This name would be

used as the ELAN-name for an ATM LAN-Emulation segment of

this VLAN.

An implementation may restrict access to this object."

::= { vtpVlanEditEntry 4 }

1.3.6.1.4.1.9.9.46.1.4.2.1.6.1.48 (CISCO-VTP-MIB)

vtpVlanEditDot10Said OBJECT-TYPE

SYNTAX     OCTET STRING (SIZE (4))

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The value of the 802.10 SAID field which would be used for

this VLAN.

An implementation may restrict access to this object."

::= { vtpVlanEditEntry 6 }

1.3.6.1.4.1.9.9.46.1.4.1.1.2.1 (CISCO-VTP-MIB)

vtpVlanApplyStatus OBJECT-TYPE

SYNTAX     INTEGER { inProgress(1),

succeeded(2),

configNumberError(3),

inconsistentEdit(4),

tooBig(5),

localNVStoreFail(6),

remoteNVStoreFail(7),

editBufferEmpty(8),

someOtherError(9)

}

MAX-ACCESS read-only

STATUS     current

DESCRIPTION            "The current status of an 'apply' operation to instanciate

the Edit Buffer as the new global VLAN information (for this

management domain).  If no apply is currently active, the

status represented is that of the most recently completed

apply.  The possible values are:

inProgress - 'apply' operation in progress;

succeeded - the 'apply' was successful (this value is

also used when no apply has been invoked since the

last time the local system restarted);

configNumberError - the apply failed because the value of

vtpVlanEditConfigRevNumber was less or equal to

the value of current value of

managementDomainConfigRevNumber;

inconsistentEdit - the apply failed because the modified

information was not self-consistent;

tooBig - the apply failed because the modified

information was too large to fit in this VTP

Server's non-volatile storage location;

localNVStoreFail - the apply failed in trying to store

the new information in a local non-volatile

storage location;

remoteNVStoreFail - the apply failed in trying to store

the new information in a remote non-volatile

storage location;

editBufferEmpty - the apply failed because the Edit

Buffer was empty (for this management domain).

someOtherError - the apply failed for some other reason

(e.g., insufficient memory)."

::= { vtpEditControlEntry 2 }

1.3.6.1.4.1.9.9.68.1.2.2.1.2 (CISCO-VLAN-MEMBERSHIP-MIB)

vmVlan  OBJECT-TYPE

SYNTAX     INTEGER(0..4095)

MAX-ACCESS read-write

STATUS     current

DESCRIPTION                "The VLAN id of the VLAN the port is assigned to

when vmVlanType is set to static or dynamic.

This object is not instantiated if not applicable.

The value may be 0 if the port is not assigned

to a VLAN.

If vmVlanType is static, the port is always

assigned to a VLAN and the object may not be

set to 0.

If vmVlanType is dynamic the object's value is

0 if the port is currently not assigned to a VLAN.

In addition, the object may be set to 0 only."

::= { vmMembershipEntry 2 }

Aggiunta di una VLAN a uno switch Cisco Catalyst con SNMP

Istruzioni dettagliate

Nell'esempio seguente, la VLAN 11 viene aggiunta allo switch:

1. Per verificare quali VLAN sono attualmente configurate sullo switch, usare uno snmpwalk sull'OID vtpVlanState:

Nota: l'ultimo numero nell'OID è il numero VLAN.

snmpwalk -c public crumpy vtpVlanState

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.48 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1002 : INTEGER: operational

2. Verificare se l'edizione è utilizzata da un'altra stazione o dispositivo NMS. Se viene visualizzato questo messaggio, l'edizione non è in uso: nessun oggetto MIB contenuto nella sottostruttura:

snmpwalk -c public crumpy vtpVlanEditTable

no MIB objects contained under subtree.

3. L'edizione non è in uso, pertanto è consigliabile iniziare a modificarla. Impostare vtpVlanEditOperation sullo stato di copia (integer 2). Ciò consente di creare la VLAN.

snmpset -c private crumpy vtpVlanEditOperation.1 integer 2

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditOperation.1 : INTEGER: copy

4. Per rendere visibile il proprietario corrente dell'autorizzazione alla modifica, è possibile impostarlo quando si esegue il comando vtpVlanEditBufferOwner.

snmpset -c private crumpy vtpVlanEditBufferOwner.1 octetstring "Gerald"

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditBufferOwner.1 : OCTET STRING- (ascii):    Gerald

5. In questo esempio viene illustrato come verificare l'esistenza della tabella:

snmpwalk -c public crumpy vtpVlanEditTable

vtpVlanEditState.1.1 : INTEGER: operational

vtpVlanEditState.1.2 : INTEGER: operational

vtpVlanEditState.1.3 : INTEGER: operational

..

6. L'esempio è la VLAN 11 e mostra come creare una riga e impostare il tipo e il nome:

snmpset -c private crumpy vtpVlanEditRowStatus.1.11 integer 4

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditRowStatus.1.11 : INTEGER: createAndGo

snmpset -c private crumpy vtpVlanEditType.1.11 integer 1

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditType.1.11 : INTEGER: ethernet

snmpset -c private crumpy vtpVlanEditName.1.11 octetstring "test_11_gerald"

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditName.1.11 : DISPLAY STRING- (ascii):  test_11_gerald

7. Impostare vtpVlanEditDot10Said. Il numero VLAN + 100000 è convertito in esadecimale. Nell'esempio viene creata la VLAN 11, quindi il valore di vtpVlanEditDot10Said deve essere: 11 + 100000 = 100011 -> Hex: 000186AB

snmpset -c private crumpy vtpVlanEditDot10Said.1.11 octetstringhex 000186AB

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEdi

ntry.vtpVlanEditDot10Said.1.11 : OCTET STRING-   (hex): length = 4

0:  00 01 86 ab -- -- -- -- -- -- -- -- -- -- -- --     ................

8. Dopo aver creato la VLAN 11, occorre applicare le modifiche. Usare nuovamente l'OID vtpVlanEditOperation. Questa volta, usare il comando Apply per confermare le impostazioni:

snmpset -c private crumpy vtpVlanEditOperation.1 integer 3

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditOperation.1 : INTEGER: apply

9. Verificare che la VLAN sia stata creata correttamente. Usare OID vtpVlanApplyStatus. Controllare il processo fino a quando lo stato non è: operazione completata:

snmpget –c public crumpy vtpVlanApplyStatus.1

vtpVlanApplyStatus.1 : INTEGER: inProgress

snmpget –c public crumpy vtpVlanApplyStatus.1

vtpVlanApplyStatus.1 : INTEGER: inProgress

snmpget –c public crumpy vtpVlanApplyStatus.1

vtpVlanApplyStatus.1 : INTEGER: succeeded

10. L'ultima azione consiste nel confermare le modifiche e rilasciare le autorizzazioni in modo che altri utenti possano aggiungere, modificare o eliminare le VLAN dal relativo NMS.

snmpset  -c private crumpy vtpVlanEditOperation.1 integer 4

vtpVlanEditOperation.1 : INTEGER: release

11. Verificare che il buffer sia vuoto:

snmpwalk –c public crumpy vtpVlanEditTable

no MIB objects contained under subtree.

12. Verificare che la VLAN 11 sia stata creata sullo switch con il comando show vlan della CLI o con una snmpwalk:

snmpwalk -c public crumpy vtpVlanState

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.11 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.48 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1002 : INTEGER: operational

…

Aggiunta di una VLAN a uno switch Cisco Catalyst con SNMP

Istruzioni in un unico passaggio

Il processo in un unico passaggio utilizza i numeri OID anziché i nomi OID, come nel processo precedente. Vedere i dettagli MIB per la traduzione. In questo esempio viene creata la VLAN 6:

snmpset -c private crumpy 1.3.6.1.4.1.9.9.46.1.4.1.1.1.1 integer 2 1.3.6.1.4.1.9.9.46.1.4.1.1.3.1 octetstring "gcober"

snmpset -c private gooroo 1.3.6.1.4.1.9.9.46.1.4.2.1.11.1.6 integer 4 1.3.6.1.4.1.9.9.46.1.4.2.1.3.1.6 integer 1 1.3.6.1.4.1.9.9.46.1.4.2.1.4.1.6 octetstring "vlan6" 1.3.6.1.4.1.9.9.46.1.4.2.1.6.1.6 octetstringhex 000186A6 1.3.6.1.4.1.9.9.46.1.4.1.1.1.1 integer 3

snmpset -c private gooroo 1.3.6.1.4.1.9.9.46.1.4.1.1.1.1 integer 4

snmpwalk -c public crumpy 1.3.6.1.4.1.9.9.46.1.3.1.1.2

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.6 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.11 : INTEGER: operational

Nota: alcune versioni di SNMP richiedono l'uso di un punto (.) prima dell'OID nei comandi SET di SNMP.

Eliminazione di una VLAN da uno switch Cisco Catalyst con SNMP

Istruzioni dettagliate

Nell'esempio, la VLAN 48 viene eliminata dallo switch. Per ulteriori informazioni, consultare il documento sull'aggiunta di una VLAN a Cisco Catalyst con SNMP. La differenza tra questa sezione in cui si elimina una VLAN e quella in cui si aggiunge una VLAN è che si usa il comando delete anziché il comando CreateAndGo per il parametro vtpVlanEditRowStatus:

1. Per eliminare la VLAN 48, eseguire il comando:

snmpset -c private crumpy vtpVlanEditOperation.1 integer 2

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditOperation.1 : INTEGER: copy

snmpset -c private crumpy vtpVlanEditRowStatus.1.48 integer 6

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditRowStatus.1.48 : INTEGER: destroy

2. Per verificare che la VLAN 48 sia stata eliminata, usare vtpVlanState o show vlan sulla CLI:

snmpwalk -c public crumpy vtpVlanState

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1002 : INTEGER: operational

…

Aggiunta di una porta a una VLAN su uno switch Cisco Catalyst con SNMP

Nell'esempio viene mostrato come aggiungere una porta Fast Ethernet 0/5 alla VLAN 48.

1. Per verificare se dispone di ifIndex Fast Eth 0/5, eseguire uno snmpwalk di ifDescr:

snmpwalk -c public crumpy ifDescr

…

interfaces.ifTable.ifEntry.ifDescr.6 : DISPLAY STRING- (ascii):  FastEthernet0/5

…

2. Poiché si sa che la porta Fast Eth 0/5 ha un ifIndex pari a 6, aggiungere la porta alla VLAN 48:

snmpset -c private crumpy vmVlan.6 integer 48

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.6 : INTEGER: 48

3. Verificare che la porta sia stata aggiunta correttamente eseguendo nuovamente una query sullo stesso OID.

snmpget -c public crumpy vmVlan.6

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.6 : INTEGER: 48

È possibile verificare questa condizione anche sullo switch:

crumpy#sh vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/1, Fa0/2, Fa0/3, Fa0/4,

Fa0/6, Fa0/7, Fa0/8, Fa0/9,

Fa0/10, Fa0/11, Fa0/12, Fa0/13,

Fa0/14, Fa0/15, Fa0/16, Fa0/17,

Fa0/18, Fa0/19, Fa0/20, Fa0/21,

Fa0/22, Fa0/23, Fa0/24, Gi0/1,

Gi0/2

48   VLAN0048                         active    Fa0/5

Come modificare una porta da una VLAN a un'altra VLAN

Nell'esempio viene mostrato come la porta Fast Ethernet 0/3 appartiene alla VLAN 48 e come spostarla sulla VLAN 1 (VLAN predefinita):

1. Per verificare se dispone di ifIndex Fast Eth 0/3, eseguire uno snmpwalk di ifDescr:

snmpwalk -c public crumpy ifDescr

…

interfaces.ifTable.ifEntry.ifDescr.4 : DISPLAY STRING- (ascii):  FastEthernet0/3

…

2. Poiché si sa che la porta Fast Eth 0/3 ha un ifIndex pari a 4, è possibile verificare a quale VLAN la porta appartiene attualmente:

snmpget -c public crumpy vmVlan.4

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.4 : INTEGER: 48

3. La porta appartiene alla VLAN 48.

snmpset -c private crumpy vmVlan.4 integer 1

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.4 : INTEGER: 1

4. Per spostare la porta dalla VLAN 48 alla VLAN 1, usare un comando snmpset di vmVlan.

5. Per verificare se la porta è stata modificata sull'altra VLAN, eseguire di nuovo la query su vmVlan:

snmpget -c public crumpy vmVlan.4

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.4 : INTEGER: 1

È possibile verificare questa condizione anche sullo switch stesso:

Prima della modifica:

crumpy#sh vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/1, Fa0/2, Fa0/4, Fa0/5,

Fa0/6, Fa0/7, Fa0/8, Fa0/9,

Fa0/10, Fa0/11, Fa0/12, Fa0/13,

Fa0/14, Fa0/15, Fa0/16, Fa0/17,

Fa0/18, Fa0/19, Fa0/20, Fa0/21,

Fa0/22, Fa0/23, Fa0/24, Gi0/1,

Gi0/2

48   VLAN0048                         active    Fa0/3

Dopo la modifica:

crumpy#sh vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/1, Fa0/2, Fa0/3, Fa0/4,

Fa0/5, Fa0/6, Fa0/7, Fa0/8,

Fa0/9, Fa0/10, Fa0/11, Fa0/12,

Fa0/13, Fa0/14, Fa0/15, Fa0/16,

Fa0/17, Fa0/18, Fa0/19, Fa0/20,

Fa0/21, Fa0/22, Fa0/23, Fa0/24,

Gi0/1, Gi0/2

48   VLAN0048                         active

Nota: è possibile apportare altre modifiche, ad esempio il nome della VLAN, il proprietario e molto altro ancora. Fare riferimento all'intero MIB per ulteriori dettagli su OID.

Informazioni correlate

- Supporto tecnico – Cisco Systems