Sommario

Introduzione

Prerequisiti

Versioni hardware e software

Convenzioni

Configurazione

Esempio di rete

Configurazioni

Verifica

Comandi show

Informazioni correlate

Introduzione

In questo documento viene fornita una configurazione di esempio di come ridistribuire una route predefinita BGP (Border Gateway Protocol) in EIGRPv6 (Enhanced Interior Gateway Routing Protocol) utilizzando la ridistribuzione reciproca tra EIGRPv6 e IPv6 BGP.

Prerequisiti

Prima di provare la configurazione, verificare che siano soddisfatti i seguenti requisiti:

- Conoscenze base di EIGRPv6

- Conoscenze base di BGP IPv6

- Conoscenza di base dell'indirizzamento IPv6

Versioni hardware e software

Le configurazioni di questo documento si basano sul router Cisco serie 7200 con software Cisco IOS® versione 15.0(1).

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

Configurazione

In questo esempio, i router R2 e R1 comunicano tra loro utilizzando IPv6 eBGP. I router R1 e R3 utilizzano EIGRPv6. Il percorso predefinito viene creato nel router R2 tramite il comando neighbors default-originate. Per ridistribuire reciprocamente le route IPv6 eBGP in EIGRPv6, utilizzare il comando redistribute bgp con le metriche EIGRP. Analogamente, per ridistribuire le route EIGRPv6 in IPv6BGP, utilizzare il comando redistribute eigrp AS number in modalità di configurazione famiglia di indirizzi.

Nota: per ulteriori informazioni sui comandi menzionati in questo documento, usare lo strumento di ricerca dei comandi (solo utenti registrati).

Esempio di rete

Nel documento viene usata questa impostazione di rete:

Configurazioni

Nel documento vengono usate queste configurazioni:

- Router R1

- Router R2

- Router R3

Router R1

R1#show run

Building configuration...

!

version 15.0

!

hostname R1

!

ipv6 unicast-routing

ipv6 cef

!

!

interface Loopback10

no ip address

ipv6 address BB10::10/128

!

interface Loopback20

no ip address

ipv6 address BB20::20/128

!

interface Loopback30

no ip address

ipv6 address BB30::30/128

ipv6 eigrp 1

!

interface Serial1/0

no ip address

ipv6 address 3030:1:1:1::11/64

serial restart-delay 0

!

interface Serial1/1

no ip address

ipv6 address 4040:1:1:1::10/64

ipv6 eigrp 1

serial restart-delay 0

!

!

router bgp 505

no synchronization

bgp router-id 1.1.1.1

bgp log-neighbor-changes

neighbor 3030:1:1:1::10 remote-as 500

no auto-summary

!

address-family ipv6

redistribute eigrp 1

!--- EIGRP is redistributed in to BGP.

no synchronization

network BB10::10/128

network BB20::20/128

neighbor 3030:1:1:1::10 activate

exit-address-family

!

!

ipv6 router eigrp 1

eigrp router-id 1.1.1.1

redistribute bgp 505 metric 100 1 255 1 1500

!--- EIGRP for IPv6 has a shutdown feature. !--- Make sure that the routing process is in "no shut" mode !--- in order to start running the protocol.

!--- BGP is redistributed with EIGRP default metrics.

!

end

Router R2

R2#show run

Building configuration...

!

hostname R2

!

ipv6 unicast-routing

ipv6 cef

!

!

interface Loopback10

no ip address

ipv6 address AB10::10/128

!

interface Loopback20

no ip address

ipv6 address AB20::20/128

!

interface Serial1/0

no ip address

ipv6 address 3030:1:1:1::10/64

serial restart-delay 0

!

router bgp 500

no synchronization

bgp router-id 2.2.2.2

bgp log-neighbor-changes

neighbor 3030:1:1:1::11 remote-as 505

neighbor 3030:1:1:1::11 default-originate

no auto-summary

!

address-family ipv6

no synchronization

network AB10::10/128

network AB20::20/128

neighbor 3030:1:1:1::11 activate

neighbor 3030:1:1:1::11 default-originate

exit-address-family

!

end

!--- Originates default route to the !--- neighbor 3030:1:1:1::11.

Router R3

R3#show run

!

version 15.0

!

hostname R3

!

ipv6 unicast-routing

ipv6 cef

!

interface Loopback10

no ip address

ipv6 address CC10::10/128

ipv6 eigrp 1

!

interface Loopback20

no ip address

ipv6 address CC20::20/128

ipv6 eigrp 1

!

interface Serial1/0

no ip address

ipv6 address 4040:1:1:1::11/64

ipv6 eigrp 1

serial restart-delay 0

!

!

ipv6 router eigrp 1

eigrp router-id 3.3.3.3

!

end

Verifica

Fare riferimento a questa sezione per verificare che la configurazione funzioni correttamente.

Lo strumento Output Interpreter (solo utenti registrati) (OIT) supporta alcuni comandi show. Usare l'OIT per visualizzare un'analisi dell'output del comando show.

Comandi show

Per verificare che il router R3 riceva la route predefinita BGP IPv6 ridistribuita, utilizzare il comando show ipv6 route eigrp nel router R3.

show ipv6 route eigrp

Nel router R3
R3#show ipv6 route eigrp

IPv6 Routing Table - default - 9 entries

Codes: C - Connected, L - Local, S - Static, U - Per-user Static route

B - BGP, HA - Home Agent, MR - Mobile Router, R - RIP

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

D - EIGRP, EX - EIGRP external, ND - Neighbor Discovery

O - OSPF Intra, OI - OSPF Inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

EX  ::/0 [170/26112256]

via FE80::C806:16FF:FE08:0, Serial1/0

EX  AB10::10/128 [170/26112256]

via FE80::C806:16FF:FE08:0, Serial1/0

EX  AB20::20/128 [170/26112256]

via FE80::C806:16FF:FE08:0, Serial1/0

D   BB30::30/128 [90/2297856]

via FE80::C806:16FF:FE08:0, Serial1/0

!--- The above output shows that the default route !--- is redistributed in EIGRP. EX indicates EIGRP external routes.

Per verificare che le route EIGRPv6 vengano ridistribuite correttamente nel router R2, utilizzare il comando show ipv6 route bgp nel router R2.

show ipv6 route bgp

Nel router R2
R2#show ipv6 route bgp

IPv6 Routing Table - default - 9 entries

Codes: C - Connected, L - Local, S - Static, U - Per-user Static route

B - BGP, HA - Home Agent, MR - Mobile Router, R - RIP

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

D - EIGRP, EX - EIGRP external, ND - Neighbor Discovery

O - OSPF Intra, OI - OSPF Inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

B   BB10::10/128 [20/0]

via FE80::C806:16FF:FE08:0, Serial1/0

B   BB20::20/128 [20/0]

via FE80::C806:16FF:FE08:0, Serial1/0

B   CC10::10/128 [20/2297856]

via FE80::C806:16FF:FE08:0, Serial1/0

B   CC20::20/128 [20/2297856]

via FE80::C806:16FF:FE08:0, Serial1/0

!--- The above output shows that the eigrp routes !--- are redistributed in to BGP.

Verificare la raggiungibilità tra i router R2 e R3 utilizzando il comando ping.

ping

Dal router R2:

R2#ping  CC10::10

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to CC10::10, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/40/96 ms

R2#ping CC20::20

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to CC20::20, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/44/100 ms

Dal router R3:

R3#ping AA10::10

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to AA10::10, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/33/92 ms

R3#ping AA20::20

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to AA20::20, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/33/92 ms

!--- The above ping responses shows that R1 and R3 are able !--- to communicate with each other.

Informazioni correlate

- Pagina di supporto BGP

- Pagina di supporto per IPv6

- Guida di riferimento ai comandi di Cisco IOS IPv6

- Case study del protocollo BGP

- Pagina di supporto del protocollo EIGRP

- Documentazione e supporto tecnico – Cisco Systems