Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Premesse

Configura esempio

Esempio di rete

Configurazione

Verifica

Introduzione

Questo documento descrive la procedura per configurare le confederazioni Border Gateway Protocol (BGP) su Nexus serie 9000.

Prerequisiti

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

- Switch Nexus

- BGP

Componenti usati

il documento può essere consultato per tutte le versioni software o hardware.

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Premesse

Il meccanismo utilizzato da BGP per evitare i loop di routing consiste nell'aggiungere il proprio numero di sistema autonomo (ASN) all'attributo AS PATH. Per una topologia IBGP, gli aggiornamenti non modificano l'attributo AS-PATH in quanto appartengono allo stesso ASN e possono causare un loop di routing.

BGP utilizza la regola di divisione dell'orizzonte che stabilisce che un dispositivo BGP riceve un prefisso tramite un peer IBGP e non può annunciare il prefisso a un altro router adiacente IBGP. Questa regola impone la presenza di una topologia a rete completa per lo scambio di prefissi con ogni router adiacente IBGP. Affinché le reti di grandi dimensioni abbiano uno scenario a rete completa non è scalabile in quanto utilizza risorse eccessive per creare i peer.

Le alternative a una topologia a rete completa per iBGP sono:

- Riflesso percorso

- Confederazione

Questo documento si concentra esclusivamente sull'utilizzo delle confederazioni BGP.

BGP Confederation elimina la necessità di una topologia a maglia completa dividendo un ASN in più sistemi sub-autonomi e raggruppandoli in una confederazione.

Configura esempio

Per controllare la guida alla configurazione della BGP Confederation, vedere la guida alla configurazione avanzata di BGP Nexus 9000.

Esempio di rete

Nota: Nella topologia, Nexus 1, Nexus 2, Nexus 3 e Nexus 4 fanno parte della stessa confederazione ASN 64513, dividendo la confederazione in 2 ASN più piccole (64512 e 64514)

Nota: Nexus 1 e Nexus 3 stabiliscono un vicinato iBGP.

Nota: Nexus 2 e Nexus 4 stabiliscono un vicinato iBGP.

Nota: Nexus 1 e Nexus 2 stabiliscono un vicinato eBGP.

Configurazione

Nota: La configurazione della Confederazione determina la reimpostazione di ogni peer bgp stabilito. Questa configurazione deve essere eseguita in una finestra di manutenzione.

Nexus 1

Nexus1# show running-config bgp

!Command: show running-config bgp

!Running configuration last done at: Thu Jul 20 21:13:08 2023

!Time: Thu Jul 20 23:28:41 2023

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 64512 --> Local ASN

confederation identifier 64513 --> BGP Confederation identifier

confederation peers 64514 --> ASN that belong to the Confederation

log-neighbor-changes

neighbor 10.0.5.2

remote-as 64515

address-family ipv4 unicast

neighbor 172.16.255.2

remote-as 64514

update-source loopback0

address-family ipv4 unicast

neighbor 172.16.255.3

remote-as 64512

log-neighbor-changes

update-source loopback0

address-family ipv4 unicast

Nexus 2

Nexus2# show running-config bgp

!Command: show running-config bgp

!Running configuration last done at: Thu Jul 20 21:12:54 2023

!Time: Thu Jul 20 23:31:04 2023

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 64514 --> Local ASN

confederation identifier 64513 --> BGP Confederation identifier

confederation peers 64512 --> ASN that belong to the Confederation

log-neighbor-changes

neighbor 172.16.255.1

remote-as 64512

update-source loopback0

address-family ipv4 unicast

neighbor 172.16.255.4

remote-as 64514

update-source loopback0

address-family ipv4 unicast

Nexus 3

Nexus3# show running-config bgp

!Command: show running-config bgp

!Running configuration last done at: Thu Jul 20 21:14:54 2023

!Time: Thu Jul 20 23:31:45 2023

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 64512 --> Local ASN

confederation identifier 64513 --> BGP Confederation identifier

log-neighbor-changes

neighbor 172.16.255.1

remote-as 64512

log-neighbor-changes

update-source loopback0

address-family ipv4 unicast

Nexus 4

Nexus4# show running-config bgp

!Command: show running-config bgp

!Running configuration last done at: Thu Jul 20 15:11:15 2023

!Time: Thu Jul 20 17:32:58 2023

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 64514 --> Local ASN

confederation identifier 64513 --> BGP Confederation identifier

log-neighbor-changes

address-family ipv4 unicast

network 172.30.1.0/24

network 172.30.2.0/24

network 172.30.3.0/24

network 172.30.4.0/24

network 172.30.5.0/24

network 172.30.6.0/24

network 172.30.7.0/24

network 172.30.8.0/24

neighbor 172.16.255.2

remote-as 64514

update-source loopback0

address-family ipv4 unicast

Nexus 5

Nexus5# show running-config bgp

!Command: show running-config bgp

!Running configuration last done at: Thu Jul 20 21:13:32 2023

!Time: Thu Jul 20 23:33:34 2023

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 64515 --> Local ASN

log-neighbor-changes

address-family ipv4 unicast

network 192.168.1.0/24

network 192.168.2.0/24

network 192.168.3.0/24

network 192.168.4.0/24

network 192.168.5.0/24

network 192.168.6.0/24

network 192.168.7.0/24

network 192.168.8.0/24

neighbor 10.0.5.1

remote-as 64513

address-family ipv4 unicast

Verifica

Nexus 1

Passaggio 1:  I router BGP adiacenti vengono stabiliti e si scambiano prefissi.

Nexus1# show ip bgp summary

BGP summary information for VRF default, address family IPv4 Unicast

BGP router identifier 172.16.255.1, local AS number 64512

BGP table version is 28, IPv4 Unicast config peers 3, capable peers 3

16 network entries and 16 paths using 4416 bytes of memory

BGP attribute entries [2/704], BGP AS path entries [2/12]

BGP community entries [0/0], BGP clusterlist entries [0/0]

Neighbor        V    AS    MsgRcvd    MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

10.0.5.2        4 64515        328        321       28    0    0 05:00:34 8

172.16.255.2    4 64514        270        264       28    0    0 04:16:51 8

172.16.255.3    4 64512        318        318       28    0    0 05:12:28 0

Passaggio 2: I prefissi appresi dal peer confederazione vengono identificati dallo stato c-confed.

Nexus1# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 28, Local Router ID is 172.16.255.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>c172.30.1.0/24      172.16.255.4                      100          0 (64514) i

*>c172.30.2.0/24      172.16.255.4                      100          0 (64514) i

*>c172.30.3.0/24      172.16.255.4                      100          0 (64514) i

*>c172.30.4.0/24      172.16.255.4                      100          0 (64514) i

*>c172.30.5.0/24      172.16.255.4                      100          0 (64514) i

*>c172.30.6.0/24      172.16.255.4                      100          0 (64514) i

*>c172.30.7.0/24      172.16.255.4                      100          0 (64514) i

*>c172.30.8.0/24      172.16.255.4                      100          0 (64514) i

*>e192.168.1.0/24     10.0.5.2                                       0 64515 i

*>e192.168.2.0/24     10.0.5.2                                       0 64515 i

*>e192.168.3.0/24     10.0.5.2                                       0 64515 i

*>e192.168.4.0/24     10.0.5.2                                       0 64515 i

*>e192.168.5.0/24     10.0.5.2                                       0 64515 i

*>e192.168.6.0/24     10.0.5.2                                       0 64515 i

*>e192.168.7.0/24     10.0.5.2                                       0 64515 i

*>e192.168.8.0/24     10.0.5.2                                       0 64515 i

Nexus 2

Passaggio 1:  I router BGP adiacenti vengono stabiliti e si scambiano prefissi.

Nexus2# show ip bgp summary

BGP summary information for VRF default, address family IPv4 Unicast

BGP router identifier 172.16.255.2, local AS number 64514

BGP table version is 27, IPv4 Unicast config peers 2, capable peers 2

16 network entries and 16 paths using 3904 bytes of memory

BGP attribute entries [2/344], BGP AS path entries [1/12]

BGP community entries [0/0], BGP clusterlist entries [0/0]

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

172.16.255.1    4 64512     274     265       27    0    0 04:20:26 8

172.16.255.4    4 64514     269     262       27    0    0 04:16:00 8

Passaggio 2: I prefissi appresi dal peer confederazione vengono identificati dallo stato c-confed.

Nexus2# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 27, Local Router ID is 172.16.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>i172.30.1.0/24      172.16.255.4                      100          0 i

*>i172.30.2.0/24      172.16.255.4                      100          0 i

*>i172.30.3.0/24      172.16.255.4                      100          0 i

*>i172.30.4.0/24      172.16.255.4                      100          0 i

*>i172.30.5.0/24      172.16.255.4                      100          0 i

*>i172.30.6.0/24      172.16.255.4                      100          0 i

*>i172.30.7.0/24      172.16.255.4                      100          0 i

*>i172.30.8.0/24      172.16.255.4                      100          0 i

*>c192.168.1.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>c192.168.2.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>c192.168.3.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>c192.168.4.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>c192.168.5.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>c192.168.6.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>c192.168.7.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>c192.168.8.0/24     10.0.5.2                          100          0 (64512) 64515 i

Nexus 3

Passaggio 1: Il router BGP adiacente è stato stabilito e si sta scambiando i prefissi.

Nexus3# show ip bgp summary

BGP summary information for VRF default, address family IPv4 Unicast

BGP router identifier 172.16.255.3, local AS number 64512

BGP table version is 34, IPv4 Unicast config peers 1, capable peers 1

16 network entries and 16 paths using 4416 bytes of memory

BGP attribute entries [2/704], BGP AS path entries [2/12]

BGP community entries [0/0], BGP clusterlist entries [0/0]

Neighbor        V    AS    MsgRcvd    MsgSent   TblVer  InQ OutQ Up/Down  State/

PfxRcd

172.16.255.1    4 64512        332        323       34    0    0 05:17:52 16

Passaggio 2: Dal punto di vista di Nexus 3, i prefissi vengono appresi come normali prefissi iBGP. Dal suo punto di vista, non ha alcun vicino di confederazione, e il suo unico peer è un peer iBGP.

Nexus3# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 34, Local Router ID is 172.16.255.3

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>i172.30.1.0/24      172.16.255.4                      100          0 (64514) i

*>i172.30.2.0/24      172.16.255.4                      100          0 (64514) i

*>i172.30.3.0/24      172.16.255.4                      100          0 (64514) i

*>i172.30.4.0/24      172.16.255.4                      100          0 (64514) i

*>i172.30.5.0/24      172.16.255.4                      100          0 (64514) i

*>i172.30.6.0/24      172.16.255.4                      100          0 (64514) i

*>i172.30.7.0/24      172.16.255.4                      100          0 (64514) i

*>i172.30.8.0/24      172.16.255.4                      100          0 (64514) i

*>i192.168.1.0/24     10.0.5.2                          100          0 64515 i

*>i192.168.2.0/24     10.0.5.2                          100          0 64515 i

*>i192.168.3.0/24     10.0.5.2                          100          0 64515 i

*>i192.168.4.0/24     10.0.5.2                          100          0 64515 i

*>i192.168.5.0/24     10.0.5.2                          100          0 64515 i

*>i192.168.6.0/24     10.0.5.2                          100          0 64515 i

*>i192.168.7.0/24     10.0.5.2                          100          0 64515 i

*>i192.168.8.0/24     10.0.5.2                          100          0 64515 i

Nexus 4

Passaggio 1: Il router BGP adiacente è stato stabilito e si sta scambiando i prefissi.

Nexus4# show ip bgp summary

BGP summary information for VRF default, address family IPv4 Unicast

BGP router identifier 172.16.255.4, local AS number 64514

BGP table version is 18, IPv4 Unicast config peers 1, capable peers 1

16 network entries and 16 paths using 4416 bytes of memory

BGP attribute entries [2/704], BGP AS path entries [1/12]

BGP community entries [0/0], BGP clusterlist entries [0/0]

Neighbor        V    AS    MsgRcvd    MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

172.16.255.2    4 64514        268        267       18    0    0 04:21:40 8

Passaggio 2:  Dal punto di vista di Nexus 4, i prefissi vengono appresi come normali prefissi iBGP. Dal suo punto di vista, non ha alcun vicino di confederazione, e il suo unico peer è un peer iBGP.

Nexus4# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 18, Local Router ID is 172.16.255.4

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>l172.30.1.0/24      0.0.0.0                           100      32768 i

*>l172.30.2.0/24      0.0.0.0                           100      32768 i

*>l172.30.3.0/24      0.0.0.0                           100      32768 i

*>l172.30.4.0/24      0.0.0.0                           100      32768 i

*>l172.30.5.0/24      0.0.0.0                           100      32768 i

*>l172.30.6.0/24      0.0.0.0                           100      32768 i

*>l172.30.7.0/24      0.0.0.0                           100      32768 i

*>l172.30.8.0/24      0.0.0.0                           100      32768 i

*>i192.168.1.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>i192.168.2.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>i192.168.3.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>i192.168.4.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>i192.168.5.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>i192.168.6.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>i192.168.7.0/24     10.0.5.2                          100          0 (64512) 64515 i

*>i192.168.8.0/24     10.0.5.2                          100          0 (64512) 64515 i

Nexus 5

Passaggio 1: Il router BGP adiacente è stato stabilito e si sta scambiando i prefissi. In questo caso l'unico vicino è il Nexus 3, e questo è un vicino eBGP.

Nexus5# show ip bgp summary

BGP summary information for VRF default, address family IPv4 Unicast

BGP router identifier 172.16.255.5, local AS number 64515

BGP table version is 18, IPv4 Unicast config peers 1, capable peers 1

16 network entries and 16 paths using 3904 bytes of memory

BGP attribute entries [2/344], BGP AS path entries [1/6]

BGP community entries [0/0], BGP clusterlist entries [0/0]

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

10.0.5.1        4 64513     317     317       18    0    0 05:11:26 8

Passaggio 2: Dal punto di vista di Nexus 5, i prefissi ricevuti da Nexus 3 vengono ricevuti utilizzando il percorso AS della Confederazione ASN, ma vengono ricevuti come normali prefissi eBGP.

Nexus5# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 18, Local Router ID is 172.16.255.5

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>e172.30.1.0/24      10.0.5.1                                       0 64513 i

*>e172.30.2.0/24      10.0.5.1                                       0 64513 i

*>e172.30.3.0/24      10.0.5.1                                       0 64513 i

*>e172.30.4.0/24      10.0.5.1                                       0 64513 i

*>e172.30.5.0/24      10.0.5.1                                       0 64513 i

*>e172.30.6.0/24      10.0.5.1                                       0 64513 i

*>e172.30.7.0/24      10.0.5.1                                       0 64513 i

*>e172.30.8.0/24      10.0.5.1                                       0 64513 i

*>l192.168.1.0/24     0.0.0.0                           100      32768 i

*>l192.168.2.0/24     0.0.0.0                           100      32768 i

*>l192.168.3.0/24     0.0.0.0                           100      32768 i

*>l192.168.4.0/24     0.0.0.0                           100      32768 i

*>l192.168.5.0/24     0.0.0.0                           100      32768 i

*>l192.168.6.0/24     0.0.0.0                           100      32768 i

*>l192.168.7.0/24     0.0.0.0                           100      32768 i

*>l192.168.8.0/24     0.0.0.0                           100      32768 i

Nota: Nexus 5 non è a conoscenza della Confederazione utilizzata tra Nexus 1 e Nexus 4. Dal suo punto di vista questi sono normali prefissi eBGP.