Sommario

Introduzione

Perché alcune voci ARP dinamiche sono ancora presenti nella tabella ARP dopo la scadenza del relativo timeout ARP?

Informazioni correlate

Introduzione

Questo documento descrive la durata della voce ARP (Dynamic Address Resolution Protocol).

Perché alcune voci ARP dinamiche sono ancora presenti nella tabella ARP dopo la scadenza del relativo timeout ARP?

Nel software Cisco IOS®, il timeout della cache ARP è impostato su quattro ore (240 minuti) per impostazione predefinita, ma può essere modificato in modalità di configurazione interfaccia.

Immettere il comando show interfaces per visualizzare il timeout della cache ARP:

ASR1k#show interfaces gi0/0/2 | include ARP

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

La voce ARP viene effettivamente memorizzata nella cache ARP anche dopo la scadenza del timeout. Nell'esempio, la voce ARP dinamica per l'indirizzo IP 10.2.2.2 è presente nella cache ARP da 253 minuti:

ASR1k#show arp

Protocol  Address          Age (min)  Hardware Addr   Type   Interface

Internet  10.2.2.1                -   30e4.dbb7.7e02  ARPA   GigabitEthernet0/0/2

Internet  10.2.2.2              253   0004.c01d.7c1a  ARPA   GigabitEthernet0/0/2

Il tempo aggiuntivo è la variazione aggiunta a ciascuna voce ARP dinamica al momento della creazione. Il jitter casuale viene aggiunto al timeout della cache ARP per evitare la scadenza sincrona delle voci ARP, che potrebbe causare una tempesta ARP. Il jitter deve essere un numero casuale compreso tra 0 secondi e 30 minuti, con un jitter massimo di 30 minuti.

In questa procedura viene descritto come confermare che la variazione è casuale:

1. Immettere il comando show arp IP address detail per controllare i dettagli della voce ARP:

ASR1k#show arp 10.2.2.2 detail

ARP entry for 10.2.2.2, link type IP.

Dynamic, via GigabitEthernet0/0/2, last updated 253 minutes ago.

Encap type is ARPA, hardware address is 0004.c01d.7c1a, 6 bytes long.

ARP subblocks:

* Dynamic ARP Subblock

Entry will be refreshed in 9 minutes and 4 seconds.

It has 2 chances to be refreshed before it is purged.

Entry is complete.

* ARP HA

ARP entry is a new entry and has not been synchronized to standby RP.

* IP ARP Adjacency

Adjacency (for 10.2.2.2 on GigabitEthernet0/0/2) was installed.

Connection ID: 0

2. Cancellare la voce ARP e acquisire di nuovo l'output del comando show arp IP address detail:

ASR1k#clear arp 10.2.2.2

ASR1k#show arp 10.2.2.2 detail

ARP entry for 10.2.2.2, link type IP.

Dynamic, via GigabitEthernet0/0/2, last updated 0 minute ago.

Encap type is ARPA, hardware address is 0004.c01d.7c1a, 6 bytes long.

ARP subblocks:

* Dynamic ARP Subblock

Entry will be refreshed in 261 minutes and 42 seconds.

It has 2 chances to be refreshed before it is purged.

Entry is complete.
Il timer è stato reimpostato.

3. Ripetere il passaggio 2 e notare che il risultato è diverso:

ASR1k #clear arp 10.2.2.2

ASR1k #show arp 10.2.2.2 det

ARP entry for 10.2.2.2, link type IP.

Dynamic, via GigabitEthernet0/0/2, last updated 0 minute ago.

Encap type is ARPA, hardware address is 0004.c01d.7c1a, 6 bytes long.

ARP subblocks:

* Dynamic ARP Subblock

Entry will be refreshed in 263 minutes and 58 seconds.

It has 2 chances to be refreshed before it is purged.

Entry is complete.

Informazioni correlate

- Per visualizzare il comando arp nella guida di riferimento dei comandi di Cisco IOS IP Addressing Services

- Documentazione e supporto tecnico – Cisco Systems