Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Configurazione

Esempio di rete

Configurazioni

Verifica

Risoluzione dei problemi

Introduzione

In questo documento viene descritto lo scopo del comando dampen-igp-metric nel protocollo Border Gateway Protocol (BGP) sulla famiglia di switch Cisco Nexus con sistema operativo NX-OS.

Prerequisiti

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

- Software Nexus NX-OS.

- Protocollo di routing BGP.

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- Cisco N9K-C9508

- NXOS versione 7.0(3)I7(6)

Il documento può essere consultato per tutte le versioni software o hardware.

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Configurazione

Per impostazione predefinita, il comando dampen-igp-metric della famiglia di switch Nexus è impostato sul valore predefinito di 600 secondi nella sezione di configurazione BGP.

Questo influisce sul modo in cui BGP gestisce le modifiche delle metriche IGP (Interior Gateway Protocol) segnalate per le route ridistribuite. BGP attutisce questi cambiamenti elaborandoli in batch con un ritardo di 10 minuti.

Questo comando consente di regolare il ritardo o di rimuoverlo completamente per ottenere una risposta più rapida a queste modifiche.

L'attributo BGP MED (Multi Exit Discriminator) viene aggiornato con il nuovo costo della route IGP ridistribuita alla scadenza del timer.

Nexus - Nexus NX-OS

Nexus# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Nexus(config)# router bgp 65535

Nexus(config-router)# address-family ipv4 unicast

Nexus(config-router-af)# dampen-igp-metric ?

<20-3600>  Time interval in seconds

*Default value is 600

Nexus(config-router-af)# no dampen-igp-metric

Analogamente, è possibile configurare questo comando per le istanze ipv6 unicast e per VRF della famiglia di indirizzi nella sezione di configurazione BGP.

Nota: Il comando dampen-igp-metric controlla anche il tempo di ritardo per aggiornare altri attributi BGP, ad esempio l'attributo Next-hop, quando le route IGP vengono perse in altre VRF con l'uso di BGP.

Esempio di rete

In questo scenario, lo switch Nexus è stato configurato per ridistribuire le route Open Shortest Path First (OSPF) dalla tabella di routing alla tabella BGP.

Configurazioni

R1 - Cisco IOS

configure terminal

!

hostname R1

!

router ospf 1

router-id 10.255.255.1

!

interface Loopback0

ip address 10.255.255.1 255.255.255.255

ip ospf 1 area 0

!

interface GigabitEthernet0/0

ip address 10.1.2.1 255.255.255.0

ip ospf network point-to-point

ip ospf 1 area 0

no shutdown

!

end

Nexus - NX-OS

configure terminal

!

hostname Nexus

!

feature ospf

feature bgp

!

route-map ALL

!

router ospf 1

router-id 10.255.255.2

!

router bgp 65535

router-id 10.255.255.2

address-family ipv4 unicast

redistribute ospf 1 route-map ALL

neighbor 10.2.3.3

remote-as 65535

address-family ipv4 unicast

!

interface Ethernet1/1

ip address 10.1.2.2/24

ip ospf network point-to-point

ip router ospf 1 area 0.0.0.0

no shutdown

!

interface Ethernet1/2

ip address 10.2.3.2/24

no shutdown

R3 - Cisco IOS

configure terminal

!

hostname R3

!

router bgp 65535

bgp log-neighbor-changes

neighbor 10.2.3.2 remote-as 65535

!

interface GigabitEthernet0/0

ip address 10.2.3.3 255.255.255.0

no shutdown

!

end

Verifica

Eseguire il comando show bgp internal af. Assicurarsi che il valore desiderato sia indicato dalla riga Intervallo smorzamento metrica IGP.

Il valore predefinito è 600 (secondi).

Nexus - NX-OS

Nexus# show bgp internal af

. . .

BGP Address Family Information for VRF: default

Import Pending               : No

Import Pending               : never

Import Pending Reset         : never

Table Context Address : 0xcfa08bf4

Address family: IPv4 Unicast

. . .

IGP Metric Dampening Interval  : 600

Nel caso in cui la route OSPF nella tabella di routing aggiorni il proprio costo, si verificherà un ritardo nel riflettere questo nuovo valore nell'attributo del percorso BGP MED.

Nexus - NX-OS

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/41], 01:58:41, ospf-1, intra

Nexus#

* There is an update in the Cost of the OSPF route 10.255.255.1/32

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/190], 00:00:02, ospf-1, intra

Nexus#

Nexus# show bgp ipv4 unicast

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 4, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                 41        100      32768 ?

Nexus#

* After 600 seconds.

Nexus# show bgp ipv4 unicast

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 5, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                190        100      32768 ?

Eseguire il comando no dampen-igp-metric nella sezione di configurazione della famiglia di indirizzi BGP per aggiornare immediatamente l'attributo MED nella tabella BGP in caso di modifica del costo OSPF nella tabella di routing.

Nexus - NX-OS

Nexus# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Nexus(config)# router bgp 65535

Nexus(config-router)#   address-family ipv4 unicast

Nexus(config-router-af)# no dampen-igp-metric

* There is an update in the Cost of the OSPF route 10.255.255.1/32

Nexus# show ip route 10.255.255.1

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

10.255.255.1/32, ubest/mbest: 1/0

*via 10.1.2.1, Eth1/1, [110/190], 00:00:02, ospf-1, intra

Nexus# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 7, Local Router ID is 10.255.255.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.255.255.1/32    0.0.0.0                190        100      32768 ?

Risoluzione dei problemi

Per confermare la funzionalità del comando dampen-igp-metric su NX-OS, attivare i successivi debug.

- prefisso bgp debug-filter <PREFIX/MASK>

- debug logfile <NOME_FILE>

- debug bgp smorzamento brib

Nexus - NX-OS

Nexus# debug-filter bgp prefix 10.255.255.1/32

Nexus# debug logfile bgpdebug.log

Nexus# debug bgp dampening brib

Nexus#

Nexus# show debug logfile bgpdebug.log

2019 Jul 23 21:13:27.676328 bgp: [25368] (default) BRIB: [IPv4 Unicast] Setting the update pending flag for 10.255.255.1/32

Nexus# show debug logfile bgpdebug.log

2019 Jul 23 21:13:27.676328 bgp: [25368] (default) BRIB: [IPv4 Unicast] Setting the update pending flag for 10.255.255.1/32

2019 Jul 23 21:20:47.641987 bgp: [25368] (default) BRIB: [IPv4 Unicast] Clearing the update pending flag for 10.255.255.1/32

2019 Jul 23 21:20:47.642013 bgp: [25368] (default) BRIB: [IPv4 Unicast] Originating prefix 10.255.255.1/32, route type redist

2019 Jul 23 21:20:47.642075 bgp: [25368] (default) BRIB: [IPv4 Unicast] Installing prefix 10.255.255.1/32 (redist) via 0.0.0.0 (0x0/0x0) into BRIB with extcomm Extcommunity: OSPF RT:0.0.0.0:0:0

2019 Jul 23 21:20:47.642395 bgp: [25368] (default) BRIB: [IPv4 Unicast] Path to 10.255.255.1/32 via 0.0.0.0 already exists, dflags=0x80002

2019 Jul 23 21:20:47.642415 bgp: [25368] (default) BRIB: [IPv4 Unicast] (10.255.255.1/32 (local)): bgp_brib_add: handling nexthop, path->flags2: 0x1

2019 Jul 23 21:20:47.642447 bgp: [25368] (default) BRIB: [IPv4 Unicast] (10.255.255.1/32 (local)): returning from bgp_brib_add, reeval=0new_path: 0, change: 1, undelete: 0, history: 0, force: 0, (pflags=0x2408) rnh_flag_change 0

2019 Jul 23 21:20:47.642475 bgp: [25368] (default) BRIB: [IPv4 Unicast] Cleanup for dest 10.255.255.1/32 exits since it's on newlist

Nexus#

Al termine, disabilitare i debug con i comandi seguenti:

- annulla debug di tutto

- no debug-filter all

- clear debug logfile <NOME_FILE>