Sommario

Introduzione

Operazioni preliminari

Convenzioni

Prerequisiti

Componenti usati

Nozioni di base

Configurazione

Esempio di rete

Configurazioni

Verifica

Risoluzione dei problemi

Informazioni correlate

Introduzione

Questo documento contiene descrizioni, configurazioni e verifiche per GRE (Generic Routing Encapsulation) in un ambiente cablato. GRE è un protocollo di tunneling sviluppato da Cisco che incapsula un'ampia varietà di tipi di pacchetti di protocollo all'interno dei tunnel IP.

Operazioni preliminari

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

Prerequisiti

Non sono previsti prerequisiti specifici per questo documento.

Componenti usati

Le informazioni fornite in questo documento si basano sulle versioni software e hardware riportate di seguito.

- Modem cablato uBR924 con software Cisco IOS® versione 12.1(5)T4

Nota: anche se è possibile configurare i tunnel GRE in altre piattaforme modem cablate Cisco, ad esempio sull'uBR904 con versioni Cisco IOS diverse, il supporto ufficiale per questa funzione è su Cisco IOS 12.1(5)T4 per uBR920 e su Cisco IOS 12.1(3) per uBR910.

Piattaforma Cable Modem

Per preparare questo documento, è stato utilizzato Cisco IOS Software Release

uBR920

12.1(5)T4

uBR910

A partire da 12.1(3)

Per eseguire questa configurazione, è necessario disporre di connettività IP tra i due modem via cavo.

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Nozioni di base

Il tunneling consente di incapsulare i pacchetti di un protocollo esterno all'interno di un protocollo di trasporto. Il tunneling è implementato come interfaccia virtuale per fornire un'interfaccia semplice per la configurazione. L'interfaccia del tunnel non è legata a protocolli passeggeri o di trasporto specifici, tuttavia è un'architettura progettata per fornire i servizi necessari per implementare uno schema standard di incapsulamento point-to-point. I tunnel sono collegamenti point-to-point ed è necessario configurare un tunnel separato per ogni collegamento.

GRE crea un collegamento virtuale point-to-point ai router Cisco nei punti remoti su una rete IP internetwork. Collegando le sottoreti multiprotocollo in un ambiente backbone a protocollo singolo, il tunneling IP con GRE consente l'espansione della rete in un ambiente backbone a protocollo singolo. Un CMTS (Cable Modem Termination System) è un router cablato headend conforme alle specifiche dell'interfaccia di servizio Data-Over-Cable (DOCSIS), ad esempio Cisco uBR7246, uBR7223 o uBR7246VXR.

Configurazione

In questa sezione vengono presentate le informazioni necessarie per configurare le funzionalità descritte più avanti nel documento.

Esempio di rete

Questo documento utilizza le impostazioni di rete mostrate nel diagramma sottostante.

Questa configurazione crea un tunnel tra i due modem via cavo uBR924-ddd5 e uBR924-b5db. Nell'esempio seguente vengono utilizzati due uBR924s e un uBR7246VXR. Per questa configurazione, i nomi dei modem via cavo sono ubr924-ddd5 e ubr924-b5db e usano Cisco IOS versione 12.1(5)T4. Le interfacce tunnel vengono create dinamicamente in modalità di configurazione globale usando il comando interface tunnel 0.

Nota: i modem cablati uBR900 non devono essere collegati allo stesso uBR7200 CMTS o alla stessa rete dello stesso provider di servizi, a condizione che vi sia connettività IP tra i due modem cablati.

Configurazioni

Questo documento utilizza le configurazioni mostrate di seguito.

Nota: il testo in grassetto si riferisce ai comandi relativi al GRE. I commenti sono in blu e si riferiscono alla riga precedente.

ubr924-ddd5

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ubr924-ddd5

!

logging rate-limit console 10 except errors

!

clock timezone - -80

ip subnet-zero

no ip finger

!

call rsvp-sync

!

!

!

!

!

!

!

!

!

!

interface Tunnel0

!--- Tunnel interface 0.

ip address 192.168.20.1 255.255.255.0

!--- IP address of the GRE tunnel interface 0.

tunnel source Ethernet0

!--- IP source of the tunnel. It is best to make this an !--- interface with a public, routable IP address so that !--- it is reachable from the other endpoint of the tunnel.

tunnel destination 11.11.11.11

!--- IP destination of the tunnel. Make sure this is !--- reachable via the ping command !--- Otherwise, the tunnel will not be created properly.

!

interface Ethernet0

ip address 9.9.9.9 255.255.255.0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

!

interface cable-modem0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

cable-modem downstream saved channel 525000000 40 1

cable-modem mac-timer t2 40000

no cable-modem compliant bridge

!

router rip

version 2

passive-interface Tunnel0

!--- This command is used to avoid recursive routing.

network 10.0.0.0

network 9.0.0.0

no auto-summary

!

ip default-gateway 10.1.4.1

ip classless

no ip http server

no ip http cable-monitor

!

snmp-server packetsize 4096

snmp-server manager

!

voice-port 0

input gain -2

!

voice-port 1

input gain -2

!

!

line con 0

transport input none

line vty 0 4

login

!

end

ubr924-ddd5#

ubr924-b5db

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ubr924-b5db

!

logging rate-limit console 10 except errors

enable password ww

!

clock timezone - -80

ip subnet-zero

no ip finger

!

mgcp

call rsvp-sync

!

!

!

!

!

!

!

!

!

!

interface Tunnel0

!--- Tunnel interface 0

ip address 192.168.20.2 255.255.255.0

!--- IP address of the gre tunnel interface 0

tunnel source Ethernet0

!--- IP source of the tunnel. It is best to make this an !--- interface with a public, routable IP address so that !--- it is reachable from the other endpoint of the tunnel.

tunnel destination 9.9.9.9

!--- IP destination of the tunnel. Make sure this is !--- reachable via the ping command !--- Otherwise, the tunnel will not be created properly.

!

interface Ethernet0

ip address 11.11.11.11 255.255.255.0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

!

no ip route-cache

no ip mroute-cache

!

interface cable-modem0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

no ip route-cache

no ip mroute-cache

no cable-modem compliant bridge

!

router rip

version 2

passive-interface Tunnel0

!--- This command is used to avoid recursive routing.

network 10.0.0.0

network 11.0.0.0

no auto-summary

!

ip default-gateway 10.1.4.1

ip classless

no ip http server

no ip http cable-monitor

!

snmp-server packetsize 4096

snmp-server manager

!

voice-port 0

input gain -2

!

voice-port 1

input gain -2

!

!

line con 0

exec-timeout 0 0

transport input none

line vty 0 4

password ww

login

!

end

ubr924-b5db#

Verifica

Le informazioni contenute in questa sezione permettono di verificare che la configurazione funzioni correttamente.

Alcuni comandi show sono supportati dallo strumento Output Interpreter, che consente di visualizzare un'analisi dell'output del comando show.

Verificare che la configurazione del CMTS (7246VXR) sia corretta e che i modem via cavo siano in linea. La configurazione del CMTS è illustrata di seguito.

7246VXR#show run

Building configuration...

Current configuration : 4579 bytes

!

! Last configuration change at 13:22:17 PDT Mon Feb 26 2001

! NVRAM config last updated at 13:22:46 PDT Mon Feb 26 2001

!

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug datetime msec localtime

service timestamps log datetime localtime

no service password-encryption

service linenumber

service udp-small-servers max-servers no-limit

!

hostname 7246VXR

!

logging buffered 1000000 debugging

logging rate-limit console 10 except errors

enable password cable

!

cable qos profile 8

cable qos profile 10

cable qos profile 10 grant-size 1500

cable qos profile 12 guaranteed-upstream 100000

no cable qos permission create

no cable qos permission update

cable qos permission modems

cable time-server

clock timezone PDT -8

clock summer-time PDT recurring

clock calendar-valid

ip subnet-zero

no ip finger

!

interface Ethernet2/0

ip address 172.16.30.4 255.255.255.192

no ip mroute-cache

half-duplex

!

interface Cable4/0

ip address 172.16.29.1 255.255.255.224 secondary

ip address 10.1.4.1 255.255.255.0

no keepalive

cable downstream rate-limit token-bucket shaping

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 555000000

cable upstream 0 frequency 40000000

cable upstream 0 power-level 0

no cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

cable helper-address 172.16.30.2

!

interface Cable5/0

ip address 172.16.29.225 255.255.255.224 secondary

ip address 10.1.5.1 255.255.255.0

load-interval 30

no keepalive

cable downstream rate-limit token-bucket shaping

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 620000000

cable upstream 0 frequency 25008000

cable upstream 0 power-level 0

no cable upstream 0 shutdown

no cable upstream 1 shutdown

cable dhcp-giaddr policy

!

router eigrp 202

redistribute connected

redistribute static

network 10.0.0.0

network 172.16.0.0

no auto-summary

no eigrp log-neighbor-changes

!

router rip

version 2

redistribute connected

redistribute static

network 10.0.0.0

network 172.16.0.0

no auto-summary

!

ip default-gateway 172.16.30.1

ip classless

ip route 0.0.0.0 0.0.0.0 172.16.30.1

ip route 172.16.30.0 255.255.255.0 Ethernet2/0

ip http server

ip http authentication local

!

access-list 188 permit tcp any any eq www log

access-list 188 permit ip any any

route-map docsis permit 10

!

snmp-server engineID local 00000009020000E01ED77E40

snmp-server community public RO

snmp-server community private RW

line con 0

exec-timeout 0 0

transport input none

line aux 0

speed 19200

line vty 0 4

session-timeout 60

exec-timeout 0 0

!

ntp clock-period 17179973

end

7246VXR#show cable modem

Interface   Prim Online     Timing Rec    QoS CPE IP address      MAC address

Sid  State      Offset Power

Cable4/0/U0 69   online     2812    0.25  5   0   10.1.4.3        0002.1685.b5db

Cable4/0/U0 70   online     2288    0.00  5   0   10.1.4.6        0010.7bed.9b23

Cable4/0/U0 71   online     2289    0.50  5   0   10.1.4.2        0010.7bed.9b45

Cable4/0/U0 72   online     2812    0.00  5   0   10.1.4.4        0002.fdfa.0a63

Cable4/0/U0 73   online     2812   -0.75  5   0   10.1.4.5        0004.2752.ddd5

Cable4/0/U0 74   online     2813    0.25  5   0   10.1.4.7        0001.64ff.e47d

Se lo stato in linea dei modem via cavo non viene visualizzato in linea, consultare il documento sulla risoluzione dei problemi dei modem via cavo uBR non in linea.

7246VXR#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

FastEthernet0/0            192.168.7.253   YES NVRAM  up                    down

Ethernet2/0                172.16.30.4     YES manual up                    up

Ethernet2/1                unassigned      YES NVRAM  administratively down down

Ethernet2/2                unassigned      YES NVRAM  administratively down down

Ethernet2/3                unassigned      YES NVRAM  administratively down down

Cable3/0                   10.1.3.1        YES manual up                    up

Cable4/0                   10.1.4.1        YES manual up                    up

Cable5/0                   10.1.5.1        YES manual up                    up

7246VXR#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.16.30.1 to network 0.0.0.0

172.16.0.0/16 is variably subnetted, 4 subnets, 3 masks

C       172.16.29.224/27 is directly connected, Cable5/0

C       172.16.29.0/27 is directly connected, Cable4/0

S       172.16.30.0/24 is directly connected, Ethernet2/0

C       172.16.30.0/26 is directly connected, Ethernet2/0

9.0.0.0/24 is subnetted, 1 subnets

R       9.9.9.0 [120/1] via 10.1.4.5, 00:00:09, Cable4/0

R    192.168.20.0/24 [120/1] via 10.1.4.5, 00:00:09, Cable4/0

10.0.0.0/8 is variably subnetted, 5 subnets, 2 masks

C       10.1.3.0/24 is directly connected, Cable3/0

R       10.5.5.0/24 [120/1] via 10.1.4.4, 00:00:01, Cable4/0

R       10.0.0.0/8 [120/1] via 172.16.30.10, 00:00:24, Ethernet2/0

C       10.1.5.0/24 is directly connected, Cable5/0

C       10.1.4.0/24 is directly connected, Cable4/0

11.0.0.0/24 is subnetted, 1 subnets

R       11.11.11.0 [120/1] via 10.1.4.3, 00:00:15, Cable4/0

S*   0.0.0.0/0 is directly connected

Dal lato dei modem via cavo, verificare la versione sh di entrambi i dispositivi, come mostrato di seguito.

ubr924-ddd5#sh ver

Cisco Internetwork Operating System Software

IOS (tm) 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/pcgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Fri 02-Feb-01 10:55 by ccai

Image text-base: 0x800100A0, data-base: 0x806DB770

ROM: System Bootstrap, Version 12.0(6r)T3, RELEASE SOFTWARE (fc1)

ROM: 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

ubr924-ddd5 uptime is 2 hours, 1 minute

System returned to ROM by reload at 12:45:25 - Fri Feb 23 2001

System restarted at 12:46:07 - Fri Feb 23 2001

System image file is "flash:ubr920-k1v4y556i-mz.121-5.T4"

cisco uBR920 CM (MPC850) processor (revision 4.d) with 15872K/1024K bytes of memory.

Processor board ID FAA0444Q14Z

Bridging software.

1 Ethernet/IEEE 802.3 interface(s)

1 Cable Modem network interface(s)

3968K bytes of processor board System flash (Read/Write)

1536K bytes of processor board Boot flash (Read/Write)

Configuration register is 0x2102

ubr924-b5db#show ver

Cisco Internetwork Operating System Software

IOS (tm) 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/pcgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Fri 02-Feb-01 10:55 by ccai

Image text-base: 0x800100A0, data-base: 0x806DB770

ROM: System Bootstrap, Version 12.0(6r)T3, RELEASE SOFTWARE (fc1)

ROM: 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

ubr924-b5db uptime is 1 hour, 53 minutes

System returned to ROM by reload at 12:55:34 - Fri Feb 23 2001

System restarted at 12:56:15 - Fri Feb 23 2001

System image file is "flash:ubr920-k1v4y556i-mz.121-5.T4"

cisco uBR920 CM (MPC850) processor (revision 3.e) with 15872K/1024K bytes of memory.

Processor board ID FAA0422Q04F

Bridging software.

1 Ethernet/IEEE 802.3 interface(s)

1 Cable Modem network interface(s)

3968K bytes of processor board System flash (Read/Write)

1536K bytes of processor board Boot flash (Read/Write)

Configuration register is 0x2102

Il tunnel verrà mostrato verso l'alto/verso l'alto, se sussistono le seguenti condizioni:

- È configurato con indirizzi IP validi.

- La tabella di routing contiene un percorso all'indirizzo IP di destinazione del tunnel e non l'indirizzo IP assegnato all'estremità remota del tunnel.

Ciò deve avvenire indipendentemente dal fatto che sia possibile eseguire il ping dell'indirizzo di destinazione. Un percorso statico non corretto o un percorso predefinito che punta nella direzione errata genererà il tunnel, ma non funzionerà.

Per verificare che il tunnel funzioni correttamente, occorre prima verificare che il tunnel sia attivo. Eseguire i comandi show ip interface brief e show interface tunnel 0 su entrambi i modem via cavo. Di seguito è riportato un esempio di output del comando.

ubr924-ddd5#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Ethernet0                  9.9.9.9         YES manual up                    up

Tunnel0                    192.168.20.1    YES manual up                    up

cable-modem0               10.1.4.5        YES unset  up                    up

ubr924-ddd5#show interface tunnel 0

Tunnel0 is up, line protocol is up

Hardware is Tunnel

Internet address is 192.168.20.1/24

MTU 1514 bytes, BW 9 Kbit, DLY 500000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation TUNNEL, loopback not set

Keepalive set (10 sec)

Tunnel source 9.9.9.9 (Ethernet0), destination 11.11.11.11

Tunnel protocol/transport GRE/IP, key disabled, sequencing disabled

Checksumming of packets disabled

Last input 00:15:25, output 00:14:27, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/0, 2 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

146 packets input, 21024 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

172 packets output, 57392 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

ubr924-b5db#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Ethernet0                  11.11.11.11     YES manual up                    up

Tunnel0                    192.168.20.2    YES manual up                    up

cable-modem0               10.1.4.3        YES NVRAM  up                    up

ubr924-b5db#show interface tunnel 0

Tunnel0 is up, line protocol is up

Hardware is Tunnel

Internet address is 192.168.20.2/24

MTU 1514 bytes, BW 9 Kbit, DLY 500000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation TUNNEL, loopback not set

Keepalive set (10 sec)

Tunnel source 11.11.11.11 (Ethernet0), destination 9.9.9.9

Tunnel protocol/transport GRE/IP, key disabled, sequencing disabled

Checksumming of packets disabled

Last input 00:16:42, output 00:17:40, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/0, 5 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

118 packets input, 19144 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

164 packets output, 49624 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

Verificare che il tunnel funzioni correttamente eseguendo il ping dell'indirizzo IP di destinazione del tunnel. In questo modo verrà verificata solo la connettività IP e non l'effettivo funzionamento del tunnel.

From ubr924-ddd5 we ping 11.11.11.11

ubr924-ddd5#ping 11.11.11.11

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 11.11.11.11, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/14/17 ms

ubr924-ddd5#

Eseguire il ping tra ubr924-b5db e l'indirizzo di destinazione 9.9.9.9.

ubr924-b5db#ping 9.9.9.9

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 9.9.9.9, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/14/16 ms

ubr924-b5db#

Per verificare che il tunnel funzioni, usare il comando show ip route x.x.x.x, dove x.x.x.x è l'indirizzo IP assegnato all'estremità remota del tunnel. In questo caso, sarebbe l'indirizzo di loop-back del router remoto. Se l'unico percorso mostrato è verso l'interfaccia del tunnel, un ping su quell'indirizzo dimostrerà che il tunnel funziona.

Se esiste uno schema di indirizzamento IP che annuncia i percorsi al segmento del tunnel su tutta la rete, vi sarebbe più di un percorso all'estremità remota dell'interfaccia del tunnel. In questo caso, è molto difficile verificare che il tunnel funzioni. In questo caso, in genere non si desidera creare percorsi duplicati per la rete del tunnel. È necessario prendere misure per impedire che i percorsi vengano annunciati da un protocollo di routing attraverso la rete. Se il tunnel viene utilizzato per trasportare il traffico di un protocollo diverso da IP, viene applicato lo stesso metodo di verifica di base.

From ubr924-ddd5 we get

ubr924-ddd5#show ip route 192.168.20.2

Routing entry for 192.168.20.0/24

Known via "connected", distance 0, metric 0 (connected, via interface)

Routing Descriptor Blocks:

* directly connected, via Tunnel0

Route metric is 0, traffic share count is 1

From ubr924-b5db we get

ubr924-b5db#show ip route 192.168.20.1

Routing entry for 192.168.20.0/24

Known via "connected", distance 0, metric 0 (connected, via interface)

Routing Descriptor Blocks:

* directly connected, via Tunnel0

Route metric is 0, traffic share count is 1

Per verificare che PC1 possa accedere a PC2 e viceversa, eseguire ping estesi sui modem via cavo e anche ping dai PC.

Eseguire un ping esteso su ubr924-b5db dall'interfaccia Ethernet (11.11.11.11) all'interfaccia Ethernet dell'ubr924-ddd5 (9.9.9.9).

ubr924-b5db#ping ip

Target IP address: 9.9.9.9

!--- ubr924-ddd5 Ethernet's IP address.

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Extended commands [n]: y

Source address or interface: 11.11.11.11

!--- ubr924-b5db Ethernet's IP address.

Type of service [0]:

Set DF bit in IP header? [no]:

Validate reply data? [no]:

Data pattern [0xABCD]:

Loose, Strict, Record, Timestamp, Verbose[none]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 9.9.9.9, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/16/28 ms

ubr924-b5db#

Eseguire l'operazione opposta per verificare la connettività dell'altro lato.

ubr924-ddd5#ping ip

Target IP address: 11.11.11.11

!--- ubr924-b5db Ethernet's IP address.

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Extended commands [n]: y

Source address or interface: 9.9.9.9

!--- ubr924-ddd5 Ethernet's IP address.

Type of service [0]:

Set DF bit in IP header? [no]:

Validate reply data? [no]:

Data pattern [0xABCD]:

Loose, Strict, Record, Timestamp, Verbose[none]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 11.11.11.11, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/14/16 ms

ubr924-ddd5#

Il test finale consiste nel eseguire il ping tra PC1 e PC2 e tra PC2 e PC1.

L'indirizzo IP di PC1 è 9.9.9.1.

Il PC2 ha un indirizzo IP di 11.11.11.1.

Eseguire il ping tra PC1 e PC2.

Eseguire il ping tra PC2 e PC1.

Risoluzione dei problemi

Al momento non sono disponibili informazioni specifiche per la risoluzione dei problemi di questa configurazione.

Informazioni correlate

- Risoluzione dei problemi relativi ai modem cablati uBR non in linea

- Supporto tecnico – Cisco Systems