Sommario

Introduzione

Operazioni preliminari

Convenzioni

Prerequisiti

Componenti usati

Esempio di rete

Diagnostica loopback

Esempio 1

Riga loopback

Esempio 2

Conclusioni

Informazioni correlate

Introduzione

I loopback sono una parte importante della risoluzione dei problemi; sono utilizzati per isolare il guasto su un circuito e un circuito end-to-end (specialmente quando il circuito è inattivo). In questo documento vengono esaminati due tipi di loopback sulle interfacce ATM del router Cisco:

- diagnostica loopback: consente di determinare se l'interfaccia funziona correttamente.

- linea di loopback: consente di determinare se si è verificato un problema con il provider di servizi.

Operazioni preliminari

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

Prerequisiti

Non sono previsti prerequisiti specifici per questo documento.

Componenti usati

Le informazioni fornite in questo documento si basano sulle versioni software e hardware riportate di seguito.

- Gli esempi riportati in questo documento non richiedono nessuna particolare versione del software. AIP supporta la diagnostica di loopback mentre PA-A1, PA-A2 e PA-A3 supportano entrambe le modalità. I moduli LANE supportano la linea di loopback e altri router Cisco supportano entrambe le modalità.

- Ciò si applica solo all'interfaccia principale e non alla sottointerfaccia.

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Esempio di rete

Utilizzeremo la seguente rete per illustrare le modalità di loopback.

Diagnostica loopback

Il comando loopback diagnostic inviato dall'interfaccia ATM di un router Cisco determina il ritorno del traffico in uscita dall'interfaccia al router. Nella Figura 1 e nell'Esempio 1 viene illustrato il processo. Per visualizzare le informazioni di loopback per le interfacce non ATM, fare clic qui e scorrere verso il basso fino alla sezione sui test speciali della linea seriale.

Nota: Tx=interfaccia di trasmissione e Rx=interfaccia di ricezione.

Nota: per garantire una temporizzazione corretta, impostare il router come origine dell'orologio. A tale scopo, specificare l'impostazione interna dell'orologio ATM nella configurazione dell'interfaccia principale.

Esempio 1

Prima dell'impostazione della diagnostica di loopback sull'interfaccia

LT-7507b

lt7507b# show running-configg

Building configuration...

Current configuration:

!

version 12.0

!

hostname lt-7507b

!

ip subnet-zero

no ip domain-lookup

!

interface ATM1/0

no ip address

no ip directed-broadcast

no ip mroute-cache

no atm ilmi-keepalive

!

interface ATM1/0.1 multipoint

ip address 10.1.1.2 255.255.255.0

no ip directed-broadcast

pvc 0/85

protocol ip 10.1.1.1

encapsulation aal5snap

!

ip classless

no ip http server

!

line con 0

transport input none

line aux 0

line vty 0 4

login

!

end

lt-7507b# show interface atm 1/0

ATM1/0 is up, line protocol is up

Hardware is cxBus ATM

MTU 4470 bytes, sub MTU 4470, BW 155520 Kbit, DLY 80 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ATM, loopback not set

Keepalive not supported

Encapsulation(s): AAL5, PVC mode

256 TX buffers, 256 RX buffers,

2048 maximum active VCs, 1024 VCs per VP, 1 current VCCs

VC idle disconnect time: 300 seconds

Last input 00:01:55, output 00:01:55, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

163861 packets input, 3164940 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

33 input errors, 33 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

144191 packets output, 2138298 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

Nota: per illustrare il meccanismo di loopback, dimostreremo che possiamo inviare celle ATM sul PVC. Se il loopback non è impostato, tali celle non verranno sottoposte a loopback. Spegnere l'interfaccia ATM sull'altro router lt-7200b.

lt-7507b#debug atm packet interface

a1/0.1 vc 0/85

ATM packets debugging is on

Displaying packets on interface ATM1/0 VPI 0, VCI 85 only

lt-7507b#ping

Protocol [ip]:

Target IP address: 10.1.1.1

Repeat count [5]: 2

Datagram size [100]:

Timeout in seconds [2]:

Extended commands [n]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 2, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

Il ping ha esito negativo e il traffico show di debug ATM sta uscendo e non tornando.

1w1d: ATM1/0.1(O):

VCD:0x5 VPI:0x0 VCI:0x55 DM:0x100 SAP:AAAA CTL:03 OUI:000000

TYPE:0800 Length:0x70

1w1d: 4500 0064 001C 0000 FF01 B778 0A01 0102 0A01 0101 0800 9994

0E58 068B 0000

1w1d: 0000 2D42 A290 ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

1w1d: ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

1w1d: ABCD ABCD ABCD ABCD ABCD

1w1d: .

1w1d: ATM1/0.1(O):

VCD:0x5 VPI:0x0 VCI:0x55 DM:0x100 SAP:AAAA CTL:03 OUI:000000

TYPE:0800 Length:0x70

1w1d: 4500 0064 001D 0000 FF01 B777 0A01 0102 0A01 0101 0800 91C3

0E59 068B 0000

1w1d: 0000 2D42 AA60 ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

1w1d: ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

1w1d: ABCD ABCD ABCD ABCD ABCD

1w1d: .

Success rate is 0 percent (0/2)

A questo punto, aggiungere la diagnostica di loopback e l'interfaccia show mostrerà che il loopback è impostato.

lt-7507b#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

lt-7507b(config)#int a1/0

lt-7507b(config-if)#loopback diagnostic

lt-7507b(config-if)#atm clock internal

Nota: il comando loopback deve essere configurato su un'interfaccia principale e non su una sottointerfaccia.

lt-7507b# show interface a1/0

ATM1/0 is up, line protocol is up

Hardware is cxBus ATM

MTU 4470 bytes, sub MTU 4470, BW 155520 Kbit, DLY 80 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ATM, loopback set

Keepalive not supported

Encapsulation(s): AAL5, PVC mode

256 TX buffers, 256 RX buffers,

2048 maximum active VCs, 1024 VCs per VP, 1 current VCCs

VC idle disconnect time: 300 seconds

Last input 00:03:16, output 00:03:16, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

163861 packets input, 3164940 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

33 input errors, 33 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

144191 packets output, 2138298 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 output buffer failures, 0 output buffers swapped out

Il ping ha esito negativo, ma il debug ATM visualizza il traffico in uscita (O) e in entrata (I).

lt-7507b#ping

Protocol [ip]:

Target IP address: 10.1.1.1

Repeat count [5]: 2

Datagram size [100]:

Timeout in seconds [2]:

Extended commands [n]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 2, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

1w1d: ATM1/0.1(O):

VCD:0x5 VPI:0x0 VCI:0x55 DM:0x100 SAP:AAAA CTL:03 OUI:000000

TYPE:0800 Length:0x70

1w1d: 4500 0064 001A 0000 FF01 B77A 0A01 0102 0A01 0101 0800 119A

13A2 07C5 0000

1w1d: 0000 2D41 2408 ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

1w1d: ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

1w1d: ABCD ABCD ABCD ABCD ABCD

1w1d:

1w1d: ATM1/0.1(I):

VCD:0x5 VPI:0x0 VCI:0x55 Type:0x0 SAP:AAAA CTL:03 OUI:000000

TYPE:0800 Length:0x70

1w1d: 4500 0064 001A 0000 0101 B57B 0A01 0102 0A01 0101 0800 119A

13A2 07C5 0000

1w1d: 0000 2D41 2408 ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

1w1d: ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

1w1d: ABCD ABCD ABCD ABCD ABCD

1w1d: .

1w1d: ATM1/0.1(O):

VCD:0x5 VPI:0x0 VCI:0x55 DM:0x100 SAP:AAAA CTL:03 OUI:000000

TYPE:0800 Length:0x70

1w1d: 4500 0064 001B 0000 FF01 B779 0A01 0102 0A01 0101 0800 09C9

13A3 07C5 0000

1w1d: 0000 2D41 2BD8 ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

1w1d: ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

1w1d: ABCD ABCD ABCD ABCD ABCD

1w1d:

1w1d: ATM1/0.1(I):

VCD:0x5 VPI:0x0 VCI:0x55 Type:0x0 SAP:AAAA CTL:03 OUI:000000

TYPE:0800 Length:0x70

1w1d: 4500 0064 001B 0000 0101 B57A 0A01 0102 0A01 0101 0800 09C9

13A3 07C5 0000

1w1d: 0000 2D41 2BD8 ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

1w1d: ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

1w1d: ABCD ABCD ABCD ABCD ABCD

1w1d: .

Success rate is 0 percent (0/2)

Riga loopback

Il comando loopback line sotto un'interfaccia ATM di un router Cisco determina il rinvio del traffico in entrata alla rete. Vedere la Figura 2 e l'Esempio 2 di seguito.

Esempio 2

Configurazione del router lt-7200b

LT-7200b

lt-7200b# show running-configg

Building configuration...

Current configuration:

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname lt-7200b

!

interface ATM2/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM2/0.1 multipoint

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

pvc 0/85

protocol ip 10.1.1.2

encapsulation aal5snap

!

!

ip classless

no ip http server

!

line con 0

transport input none

line aux 0

line vty 0 4

login

!

end

Prima dell'impostazione della linea di loopback sull'interfaccia

lt-7200b# show interface atm 2/0

ATM2/0 is up, line protocol is up

Hardware is TI1570 ATM

MTU 4470 bytes, sub MTU 4470, BW 155520 Kbit, DLY 80 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ATM, loopback not set

Keepalive not supported

Encapsulation(s): AAL5, PVC mode

2048 maximum active VCs, 1024 VCs per VP, 1 current VCCs

VC idle disconnect time: 300 seconds

Last input 00:00:43, output 00:00:43, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

94912 packets input, 1637823 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

102893 packets output, 2042225 bytes, 0 underruns

0 output errors, 0 collisions, 3 interface resets

0 output buffer failures, 0 output buffers swapped out

Nota: il debug dei pacchetti ATM è attivo e viene eseguito il ping tra il router lt-7507b e il router lt-7200b. Come si può notare, i test vengono eseguiti nuovamente dallo switch 7500 (da cui è stato rimosso il loopback iniziale). Si tratta di un comportamento normale, in quanto la linea di loopback consente di verificare il corretto funzionamento della rete Telco.

lt-7507b#debug atm packet

ATM packets debugging is on

Displaying all ATM packets

lt-7507b#debug atm packet sh debug

lt-7507b#ping 10.1.1.1

Type escape sequence to abort.

Sending 1, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!

Success rate is 100 percent (1/1), round-trip min/avg/max = 1/2/4 ms

Il ping ha esito positivo e il traffico dei programmi di debug ATM sta uscendo e tornando in entrata.

00:45:14: ATM1/0.1(O):

VCD:0x1 VPI:0x0 VCI:0x55 DM:0x100 SAP:AAAA CTL:03 OUI:000000

TYPE:0800 Length:0x70

00:45:14: 4500 0064 0005 0000 FF01 B78F 0A01 0102 0A01 0101 0800 028C

02D4 0C51 0000

00:45:14: 0000 0029 6C70 ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

00:45:14: ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

00:45:14: ABCD ABCD ABCD ABCD ABCD

00:45:14:

00:45:14: ATM1/0.1(I):

VCD:0x1 VPI:0x0 VCI:0x55 Type:0x0 SAP:AAAA CTL:03 OUI:000000

TYPE:0800 Length:0x70

00:45:14: 4500 0064 0005 0000 FE01 B88F 0A01 0101 0A01 0102 0000 0A8C

02D4 0C51 0000

00:45:14: 0000 0029 6C70 ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

00:45:14: ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

00:45:14: ABCD ABCD ABCD ABCD ABCD

Success rate is 100 percent (1/1)

Configurazione della linea di loopback sull'interfaccia ATM del router lt-7200b

lt-7200b#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

lt-7200b(config)#int a2/0

lt-7200b(config-if)#loopback line

lt-7200b(config-if)#^Z

lt-7200b#config show interface a2/0

ATM2/0 is up, line protocol is up

Hardware is TI1570 ATM

MTU 4470 bytes, sub MTU 4470, BW 155520 Kbit, DLY 80 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ATM,loopback set

Keepalive not supported

Encapsulation(s): AAL5, PVC mode

2048 maximum active VCs, 1024 VCs per VP, 1 current VCCs

VC idle disconnect time: 300 seconds

Last input 00:02:45, output 00:02:45, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

94917 packets input, 1638383 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

102898 packets output, 2042785 bytes, 0 underruns

0 output errors, 0 collisions, 5 interface resets

0 output buffer failures, 0 output buffers swapped out

Nota:  Eseguire il ping dal router lt-7507b. Il ping avrà esito negativo come previsto, ma il traffico viene rimandato indietro dalla rete al router lt-7507b e il debug ATM visualizza il traffico in uscita (O) e in entrata (I).

lt-7507b#ping 10.1.1.1

Type escape sequence to abort.

Sending 2, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

..

Success rate is 0 percent (0/2)

00:52:00: ATM1/0.1(O):

VCD:0x1 VPI:0x0 VCI:0x55 DM:0x100 SAP:AAAA CTL:03 OUI:000000

TYPE:0800 Length:0x70

00:52:00: 4500 0064 000F 0000 FF01 B785 0A01 0102 0A01 0101 0800 CE44 1

21D 0009 0000

00:52:00: 0000 002F 9DB0 ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

00:52:00: ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

00:52:00: ABCD ABCD ABCD ABCD ABCD

00:52:00:

00:52:00: ATM1/0.1(I):

VCD:0x1 VPI:0x0 VCI:0x55 Type:0x0 SAP:AAAA CTL:03 OUI:000000

TYPE:0800 Length:0x70

00:52:00: 4500 0064 000F 0000 0101 B586 0A01 0102 0A01 0101 0800 CE44

121D 0009 0000

00:52:00: 0000 002F 9DB0 ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

00:52:00: ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

00:52:00: ABCD ABCD ABCD ABCD ABCD

00:52:00: .

00:52:02: ATM1/0.1(O):

VCD:0x1 VPI:0x0 VCI:0x55 DM:0x100 SAP:AAAA CTL:03 OUI:000000

TYPE:0800 Length:0x70

00:52:02: 4500 0064 0010 0000 FF01 B784 0A01 0102 0A01 0101 0800 C673

121E 0009 0000

00:52:02: 0000 002F A580 ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

00:52:02: ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

00:52:02: ABCD ABCD ABCD ABCD ABCD

00:52:02:

00:52:02: ATM1/0.1(I):

VCD:0x1 VPI:0x0 VCI:0x55 Type:0x0 SAP:AAAA CTL:03 OUI:000000

TYPE:0800 Length:0x70

00:52:02: 4500 0064 0010 0000 0101 B585 0A01 0102 0A01 0101 0800 C673

121E 0009 0000

00:52:02: 0000 002F A580 ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

00:52:02: ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD ABCD

ABCD ABCD ABCD

00:52:02: ABCD ABCD ABCD ABCD ABCD

Success rate is 0 percent (0/2)

Conclusioni

I loopback sono uno strumento utile per la risoluzione dei problemi relativi ai circuiti danneggiati. Possono:

- aiuta a risolvere i problemi dell'interfaccia fisica.

- consente di risolvere i problemi relativi ai provider di servizi ATM.

Abbiamo eseguito i test in questo documento nel modo abituale: Ping dell'altro lato. Se si utilizza la mappatura corretta o una sottointerfaccia point-to-point, l'utente può eseguire il ping del proprio indirizzo IP. Pertanto, l'eco ICMP sarà sicuramente inviata all'interfaccia e riceverà una risposta dal router. In altri termini, in un ambiente attivo è possibile eseguire gli stessi test senza attivare il debug. È sufficiente verificare se è possibile eseguire il ping del proprio indirizzo IP e verificare se il test ha esito positivo.

Informazioni correlate

- Pagine di supporto per la tecnologia ATM

- Documentazione e supporto tecnico – Cisco Systems