Contenu

Introduction

Problème

Solution

Introduction

Ce document décrit les étapes à suivre pour résoudre Unable to connect to the server: x509: certificate has expired or is not yet valid erreur .

Problème

Connexions à l'infrastructure de microservices d'abonné de noyau de cloud Ultra (SMI) Kubectl jeter l'erreur.

Unable to connect to the server: x509: certificate has expired or is not yet valid

La communication du noeud du plan de contrôle Kubernetes se fait par tunnel SSL. Le tunnel SSL repose généralement sur un ensemble d'autorités de certification tierces de confiance pour établir l'authenticité des certificats.

Lorsque le certificat a expiré, la communication du noeud du plan de contrôle s'arrête.

Pour vérifier l'expiration des certificats : kubectl get secrets --all-namespaces | grep 'kubernetes.io/tls' | awk '{print $2, $1}' | xargs -n2 sh -c 'echo container $0 namespace $1;kubectl -n $1 get secret $0 -o jsonpath="{.data.tls\.crt}" | base64 -d | openssl x509 -noout -enddate; echo ----------------------'

cloud-user@k8-rcdn-primary-1:~$ kubectl get secrets --all-namespaces | grep 'kubernetes.io/tls' | awk '{print $2, $1}' | xar

gs -n2 sh -c 'echo container $0 namespace $1;kubectl -n $1 get secret $0 -o jsonpath="{.data.tls\.crt}" | base64 -d | open

ssl x509 -noout -enddate; echo ----------------------'

container cert-cli-cee-k8-rcdn-ops-center-ingress namespace cee-k8-rcdn

notAfter=May 1 16:54:39 2023 GMT

----------------------

container cert-docs-cee-k8-rcdn-product-documentation-ingress namespace cee-k8-rcdn

notAfter=May 1 16:56:04 2023 GMT

----------------------

container cert-grafana-ingress namespace cee-k8-rcdn

notAfter=May 1 16:56:06 2023 GMT

----------------------

container cert-restconf-cee-k8-rcdn-ops-center-ingress namespace cee-k8-rcdn

notAfter=May 1 16:54:40 2023 GMT

----------------------

container cert-show-tac-cee-k8-rcdn-ops-center-ingress namespace cee-k8-rcdn

notAfter=May 1 16:54:40 2023 GMT

----------------------

container cert-show-tac-cee-k8-rcdn-smi-show-tac-ingress namespace cee-k8-rcdn

notAfter=May 1 16:56:07 2023 GMT

----------------------

container cert-cli-smf-rcdn-ops-center-ingress namespace smf-rcdn

notAfter=May 1 16:54:56 2023 GMT

----------------------

container cert-restconf-smf-rcdn-ops-center-ingress namespace smf-rcdn

notAfter=May 1 16:54:57 2023 GMT

----------------------

container cert-show-tac-smf-rcdn-ops-center-ingress namespace smf-rcdn

notAfter=May 1 16:54:57 2023 GMT

----------------------

container cert-cli-smf-rcdn1-ops-center-ingress namespace smf-rcdn1

notAfter=May 1 16:55:07 2023 GMT

----------------------

container cert-restconf-smf-rcdn1-ops-center-ingress namespace smf-rcdn1

notAfter=May 1 16:55:08 2023 GMT

----------------------

container cert-show-tac-smf-rcdn1-ops-center-ingress namespace smf-rcdn1

notAfter=May 1 16:55:08 2023 GMT

----------------------

container cert-cli-smf-rcdn2-ops-center-ingress namespace smf-rcdn2

notAfter=May 3 18:11:26 2023 GMT

----------------------

container cert-restconf-smf-rcdn2-ops-center-ingress namespace smf-rcdn2

notAfter=May 3 18:11:28 2023 GMT

----------------------

container cert-show-tac-smf-rcdn2-ops-center-ingress namespace smf-rcdn2

notAfter=May 3 18:11:27 2023 GMT

----------------------

container cert-cli-smf-rcdn3-ops-center-ingress namespace smf-rcdn3

notAfter=May 3 18:11:41 2023 GMT

----------------------

container cert-restconf-smf-rcdn3-ops-center-ingress namespace smf-rcdn3

notAfter=May 3 18:11:43 2023 GMT

----------------------

container cert-show-tac-smf-rcdn3-ops-center-ingress namespace smf-rcdn3

notAfter=May 3 18:11:42 2023 GMT

----------------------

Solution

1. Vérifiez que le fichier apiserver.crt affiche la date de fin correcte.

ubuntu@labnode-cnat-cnat-core-primary1:~$ cd /data/kubernetes/pki

ubuntu@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki$ sudo su

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# sudo cat /data/kubernetes/pki/apiserver.crt | openssl x509 -enddate -noout

notAfter=Feb 17 08:22:04 2022 GMT

2. Vérifiez la date de fin dans SSL.

ubuntu@labnode-cnat-cnat-core-primary1:~$ echo | openssl s_client -showcerts -servername gnupg.org -connect localhost:6443 2>/dev/null | openssl x509 -inform pem -noout -text

Certificate:

Data:

Version: 3 (0x2)

Serial Number: 44335566778899aabba (0xabcdef0123456789)

Signature Algorithm: sha256WithRSAEncryption

Issuer: CN = kubernetes

Validity

Not Before: Mar 17 11:59:23 2020 GMT

Not After : Mar 19 10:37:35 2021 GMT

3. Vérifiez l'état du conteneur docker.

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# docker ps -f "name=k8s_kube-apiserver"

CONTAINER ID IMAGE COMMAND CREATED STATUS PORTS NAMES

f988867819ed c2c9a0406787 "kube-apiserver --ad…" 12 months ago Up 12 months k8s_kube-apiserver_kube-apiserver-labnode-cnat-cnat-core-primary1_kube-system_00112233445566778899aabbccddeeff_0

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki#

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# docker ps -f "name=k8s_kube-controller"

CONTAINER ID IMAGE COMMAND CREATED STATUS PORTS NAMES

929a8f1ef716 6e4bffa46d70 "kube-controller-man…" 3 days ago Up 3 days k8s_kube-controller-manager_kube-controller-manager-labnode-cnat-cnat-core-primary1_kube-system_112233445566778899aabbccddeeff00_2

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# docker ps -f "name=k8s_kube-scheduler"

CONTAINER ID IMAGE COMMAND CREATED STATUS PORTS NAMES

32783a2c3a71 ebac1ae204a2 "kube-scheduler --au…" 12 months ago Up 12 months k8s_kube-scheduler_kube-scheduler-labnode-cnat-cnat-core-primary1_kube-system_2233445566778899aabbccddeeff0011_1

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki#

4. Redémarrez les conteneurs docker de kube-apiserver et kube-scheduler sur les trois noeuds du plan de contrôle.

docker ps -f "name=k8s_kube-apiserver" -q | xargs docker restart

docker ps -f "name=k8s_kube-scheduler" -q | xargs docker restart

5. Vérifiez que le fichier apiserver.crt affiche la date de fin correcte.

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# sudo cat /data/kubernetes/pki/apiserver.crt | openssl x509 -enddate -noout

notAfter=Feb 17 08:22:04 2022 GMT

6. Vérifiez que la date de fin est mise à jour dans SSL et qu'elle est correcte.

echo | openssl s_client -showcerts -servername gnupg.org -connect localhost:6443 2>/dev/null | openssl x509 -inform pem -noout -text

7. Vérifiez que le cluster est sain

Pour plus d'informations sur les opérations, reportez-vous aux guides Cisco Ultra Cloud Core - Subscriber Microservices Infrastructure.