Table des matières

Introduction

Problème

Analyse

Consigner tous les homologues morts

Contrôles SMF

GrafanaChecks

Contrôles Nexus

Solution

Introduction

Ce document décrit comment dépanner les alertes de journal de la fonction de gestion de session (SMF) liées à All Peers are Dead, Setting status code to 0.

Problème

L'impact de la session a été signalé sur le SMF.

Analyse

Consigner tous les homologues morts

Le journal indique que tous les homologues dans SelectedProfileName : CHF-OFF sont morts.

Le journal couvre tous les terminaux configurés sur SMF, et chaque fois que vous voyez que tous les homologues sont morts à l'intérieur du profil, cela entraîne toujours un impact sur la session.

master-1 b26897bce81a[2516]:

master-1 c77834f772f7[2516]: ************* TRANSACTION: 2475167152 *************

master-1 c77834f772f7[2516]: ************* TRANSACTION: 2475167152 *************

master-1 c77834f772f7[2516]: TRANSACTION SUCCESS:

master-1 c77834f772f7[2516]: TRANSACTION SUCCESS:

master-1 c77834f772f7[2516]: GR Instance ID : 1

master-1 c77834f772f7[2516]: GR Instance ID : 1

master-1 c77834f772f7[2516]: Txn Type : N40ChargingDataReq(3585)

master-1 c77834f772f7[2516]: Txn Type : N40ChargingDataReq(3585)

master-1 c77834f772f7[2516]: Priority : 1

master-1 c77834f772f7[2516]: Priority : 1

master-1 c77834f772f7[2516]: Session Namespace : smf(1)

master-1 c77834f772f7[2516]: Session Namespace : smf(1)

master-1 c77834f772f7[2516]: CDL Slice Name : smf

master-1 c77834f772f7[2516]: CDL Slice Name : smf

master-1 c77834f772f7[2516]: LOG MESSAGES:

master-1 c77834f772f7[2516]: LOG MESSAGES:

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] All Peers are Dead, Setting status code to 0 (timeout)

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] All Peers are Dead, Setting status code to 0 (timeout)

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-1 c77834f772f7[2516]: 2023/09/10 15:00:00.007 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-1 c77834f772f7[2516]: ***********************************************

master-1 c77834f772f7[2516]: ***********************************************

Sur la base de la configuration, le SMF tente d'atteindre le serveur principal avec une priorité plus élevée dans le cas où il y a un système de code HTTP 504 (délai d'attente), puis le SMF tente d'atteindre le serveur secondaire. Si cela échoue, le système définit également la session en mode Continuer.

Dans l'exemple, la fonction de facturation secondaire (CHF) pour Hors connexion est 10.10.10.2. SMF a reçu l'erreur 504 et l'action est FailureContinueAction.

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 rest-ep [ERROR] [RestClient.go:175] [infra.rest_client.core] Error in rest call err Post "http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2/chargingdata": context deadline exceeded

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 rest-ep [ERROR] [Config.go:1721] [nrfClient.Discovery.nrf] Send to NF rpcName[CHF], method:[DataRequest] EndPoint[http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2] failed

master-2 42013075464a[2621]: ************* TRANSACTION: 2252879781 *************

master-2 42013075464a[2621]: TRANSACTION SUCCESS:

master-2 42013075464a[2621]: GR Instance ID : 1

master-2 42013075464a[2621]: Txn Type : N40ChargingDataReq(3521)

master-2 42013075464a[2621]: Priority : 1

master-2 42013075464a[2621]: Session Namespace : smf(1)

master-2 42013075464a[2621]: CDL Slice Name : smf

master-2 42013075464a[2621]: LOG MESSAGES:

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [rest_ep.app.ChargingIntf] {imsi-1234567891011121:21} Received Charging Data Response error with timediff 10001557123 - Request message {{"invocationSequenceNumber":1,"invocationTimeStamp":"2025-11-10T14:29:29Z","nfConsumerIdentification":{"nFIPv4Address":"10.10.10.12","nFName":"dce0c1d7-aa37-4f2c-870b-6f7c1be10af1","nFPLMNID":{"mcc":"123","mnc":"456"},"nodeFunctionality":"SMF"},"notifyUri":"http://10.10.10.12:8195/callbacks/v2/notifyUri/1909959397/chargingNotification","pDUSessionChargingInformation":{"chargingId":1909959397,"pduSessionInformation":{"authorizedQoSInformation":{"5qi":1,"arp":{"preemptCap":"NOT_PREEMPT","preemptVuln":"PREEMPTABLE","priorityLevel":1}},"authorizedSessionAMBR":{"downlink":"2048000 bps","uplink":"2048000 bps"},"chargingCharacteristicsSelectionMode":"VISITING_DEFAULT","dnnId":"data","hPlmnId":{"mcc":"123","mnc":"456"},"networkSlicingInfo":{"sNSSAI":{"sst":1}},"pduAddress":{"iPv6dynamicPrefixFlag":true,"pduIPv6AddresswithPrefix":"x:x:x:x::"},"pduSessionID":21,"pduType":"IPV6","ratType":"WLAN","servingCNPlmnId":{"mcc":"123","mnc":"456"},"sscMode":"SSC_MODE_1","startTime":"2025-11-10T14:29:29Z"},"userInformation":{"roamerInOut":"IN_BOUND","servedGPSI":"msisdn-12345678901"},"userLocationinfo":{"n3gaLocation":{"portNumber":4505,"ueIpv4Addr":"x.x.x.x"}}},"subscriberIdentifier":{"subscriberIdentityType":"SUPI","supi":"imsi-1234567891011121"}}}

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [nrfClient.SendMesg.NRF] FHI status 504 timediff 1000332537, Uri: http://10.10.10.2:1090/OFFLINE/nchf-convergedcharging/v2, retryCount = 0 loopMaxRetry = 0, maxRetry = 0

master-2 42013075464a[2621]: 2023/09/10 15:00:00.063 [ERROR] [nrfClient.Discovery.nrf] Message send failed, response [Type:CHF Http2_Status:504 FailAction:FailureContinueAction MsgType:3587 ServiceName:nchf-convergedcharging SelectedProfileName:"CHF-OFF" FailureProfile:"Fail-H-CHF-OFF" GroupID:"CHF-*" ]

master-2 42013075464a[2621]: ***********************************************

Contrôles SMF

Sur SMF, vérifiez les homologues et leur heure de connexion en ce qui concerne le terminal qui a signalé le problème.

smf# show peers

GR                                                                                POD              CONNECTED              ADDITIONAL

INSTANCE  ENDPOINT        LOCAL ADDRESS         PEER ADDRESS           DIRECTION  INSTANCE   TYPE  TIME           RPC     DETAILS     INTERFACE NAME     VRF

--------------------------------------------------------------------------------------------------------------------------------------------------------------

1         <none>          192.168.1.1        10.10.10.2:1090      Outbound   rest-ep-0  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.2        10.10.10.2:1090      Outbound   rest-ep-1  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.3        10.10.10.1:1090     Outbound   rest-ep-2  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.3        10.10.10.2:1090      Outbound   rest-ep-2  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.4        10.10.10.1:1090     Outbound   rest-ep-3  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.2        10.10.10.1:1090     Outbound   rest-ep-1  Rest  4 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.4        10.10.10.2:1090      Outbound   rest-ep-3  Rest  2 hours        CHF     <none>      n40                NA

1         <none>          192.168.1.1        10.10.10.1:1090     Outbound   rest-ep-0  Rest  4 hours        CHF     <none>      n40                NA

// CHF related profiles

profile network-element chf CHF-OFFLINE

nf-client-profile        CHF-OFF

failure-handling-profile Fail-H-CHF-OFF

discovery local

exit

// Here is configuration for CHF profile where all peers are dead

profile nf-client nf-type chf

chf-profile CHF-OFF

locality LOC1

priority 1

service name type nchf-convergedcharging

responsetimeout 1000

endpoint-profile epprof

capacity   10

api-root   OFFLINE

uri-scheme http

version

uri-version v2

exit

exit

endpoint-name ep1

priority 1

capacity 10

primary ip-address ipv4 10.10.10.1

primary ip-address port 1090

exit

endpoint-name ep2

priority 2

capacity 10

primary ip-address ipv4 10.10.10.2

primary ip-address port 1090

exit

exit

exit

exit

exit

// Failure handling that in case of timeout (HTTP code 504) then try secondary server one time and then proceed with continuing the session

profile nf-client-failure nf-type chf

profile failure-handling Fail-H-CHF-OFF

service name type nchf-convergedcharging

responsetimeout 1000

message type ChfConvergedchargingCreate

status-code httpv2 504

retry  1

action continue

exit

exit

message type ChfConvergedchargingUpdate

status-code httpv2 504

retry  1

action continue

exit

exit

message type ChfConvergedchargingDelete

status-code httpv2 504

retry  1

action continue

exit

exit

exit

Grafana Checks

La corrélation directe entre HTTP 504 Timeout et l'heure du problème a été observée.

query: sum(increase(smf_restep_http_msg_total{nf_type="chf", namespace=~"$namespace"}[15m])) by (api_name, response_cause, response_status)

Contrôles Nexus

Vérifiez si des volets ont été détectés.

Nexus# show logging last 500 | include BFD

Solution

La solution à ce problème varie dans ce cas, car SMF est le client et CHF est le serveur.

La perte de connexion n'a pas été causée par SMF.