Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Configuration

Mode ATM

Mode EFM

Vérification

Dépannage

Informations connexes

Introduction

Ce document décrit les étapes de configuration requises pour mettre en oeuvre une connexion G.SHDSL (Multirate Symmetrix High-Speed Digital Subscriber Line) dos à dos entre deux modules EHWIC-4SHDSL-EA.

Vous devez configurer une extrémité de la connexion en mode central (CO) et l'autre extrémité en mode CPE (Customer Premises Equipment) afin d'activer la connexion SHDSL. Ce type de connexion SHDSL dos à dos est généralement mis en oeuvre dans un réseau de campus afin de fournir la connectivité entre deux bâtiments sans avoir besoin d'un multiplexeur d'accès DSLAM (Digital Subscriber Line Access Multiplexer) entre les deux routeurs DSL.

Conditions préalables

Conditions requises

Cisco vous recommande de prendre connaissance des rubriques suivantes :

- Module EHWIC-4SHDSL-EA

- Les routeurs Fixed Integrated Service Router (ISR) G2 tels que C888EA-K9 fonctionnent en mode CO et CPE avec le logiciel Cisco IOS® 15.2(2)T2 et versions ultérieures

Components Used

Ce document n'est pas limité à des versions de matériel et de logiciel spécifiques.

Cependant, la configuration est conçue avec ces périphériques :

- Deux routeurs ISR de 2ème génération (CISCO2901/K9) chargés avec Cisco IOS® 15.4.3M2

- Deux modules EHWIC-4SHDSL-EA installés sur les deux routeurs ISR G2

- Câble ANSI/TIA/EIA-568-B avec connecteurs RJ-45 aux deux extrémités

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Configuration

Dans cette configuration, vous utiliserez des routeurs identiques avec des modules EHWIC-4SHDSL-EA installés sur eux. Le périphérique nommé CO_Router a le contrôleur SHDSL configuré pour fonctionner en mode CO, tandis que le périphérique nommé CPE_Router a le contrôleur SHDSL configuré pour fonctionner en mode CPE.

Le module EHWIC-4SHDSL-EA peut être configuré pour Ethernet en mode premier mille (EFM) et ATM (Asynchronous Transfer Mode). Ce document explique comment configurer une connexion SHDSL dos à dos en mode EFM et ATM.

L'exemple ci-dessous montre comment configurer une connexion SHDSL dos à dos en mode ATM.

Mode ATM

Vous pouvez mettre en oeuvre une solution IP sur ATM (IPoA) ou PPP sur ATM (PPPoA) lorsque vous configurez une connexion SHDSL dos à dos.

1. Solution IPoA

- Routeur CO :

CO_Router#show running-config

Building configuration...

Current configuration : 1624 bytes

!

!

version 15.4

service config

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

!

no aaa new-model

!

!

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

cts logging verbose

!

!

license udi pid CISCO2901/K9 sn FGL1622241N

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package datak9

!

redundancy

!

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

interface ATM0/1/0

ip address 1.1.1.1 255.255.255.0

no atm ilmi-keepalive

pvc 1/10

!

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

!

end

CO_Router#

- Routeur CPE :

CPE_Router#show running-config

Building configuration...

Current configuration : 1538 bytes

!

version 15.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

!

!

!

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

voice-card 0

!

!

!

!

license udi pid CISCO2901/K9 sn FGL151625KN

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package uck9

license boot module c2900 technology-package datak9

!

!

!

redundancy

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

ip address 1.1.1.2 255.255.255.0

no atm ilmi-keepalive

pvc 1/10

!

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

control-plane

!

!

gatekeeper

shutdown

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CPE_Router#

2. Solution PPPoA

- Routeur CO :

CO_Router#show running-config

Building configuration...

Current configuration : 1779 bytes

!

!

version 15.4

service config

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

!

no aaa new-model

!

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

cts logging verbose

!

!

license udi pid CISCO2901/K9 sn FGL1622241N

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package datak9

!

!

redundancy

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

pvc 1/10

encapsulation aal5snap

protocol ppp dialer

dialer pool-member 1

!

!

interface Dialer1

ip address 1.1.1.1 255.255.255.0

encapsulation ppp

dialer pool 1

dialer-group 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

!

control-plane

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CO_Router#

- Routeur CPE :

CPE_Router#show running-config

Building configuration...

Current configuration : 1693 bytes

!

version 15.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

!

!

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

license udi pid CISCO2901/K9 sn FGL151625KN

license boot module c2900 technology-package securityk9

license boot module c2900 technology-package uck9

license boot module c2900 technology-package datak9

!

!

!

redundancy

!

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

pvc 1/10

encapsulation aal5snap

protocol ppp dialer

dialer pool-member 1

!

!

interface Dialer1

ip address 1.1.1.2 255.255.255.0

encapsulation ppp

dialer pool 1

dialer-group 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

gatekeeper

shutdown

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

end

CPE_Router#

3. Solution PPPoE sur ATM

- Routeur CO :

CO_Router#show running-configuration

Building configuration...

Current configuration : 2299 bytes

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot-end-marker

!

no aaa new-model

!

username cisco password 0 cisco

!

redundancy

!

!

controller SHDSL 0/1/0

termination co

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

bba-group pppoe global

virtual-template 1

!

!

interface Loopback0

ip address 10.1.1.1 255.255.255.255

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

shutdown

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

shutdown

duplex auto

speed auto

!

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

!

interface ATM0/1/0.1 point-to-point

pvc 1/100

protocol pppoe group global

!

!

interface Virtual-Template1

ip unnumbered Loopback0

ip mtu 1492

peer default ip address pool PPPOE

!

!

ip local pool PPPOE 10.1.1.2 10.1.1.254

!

line con 0

line aux 0

line vty 0 4

login

transport input all

end

CO_Router#

Verification:

CO_Router#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi1.1          -          10.1.1.2        -               -               in

CO_Router#

- Routeur CPE :

CPE_Router#show running-config

Building configuration...

Current configuration : 2554 bytes

!

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot-end-marker

!

!

!

no aaa new-model

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

controller SHDSL 0/1/0

dsl-group 0 pairs  0, 1, 2, 3 m-pair

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/2

ip address dhcp

duplex auto

speed auto

!

interface ATM0/1/0

no ip address

no atm ilmi-keepalive

!

interface ATM0/1/0.1 point-to-point

pvc 1/100

pppoe-client dial-pool-number 1

!

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname cisco

ppp chap password 0 cisco

!

!

!

control-plane

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

!

end

CPE_Router#

Verification:

CPE_Router#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Embedded-Service-Engine0/0 unassigned      YES NVRAM  administratively down down

ATM0/1/0                   unassigned      YES unset  up                    up

ATM0/1/0.1                 unassigned      YES unset  up                    up

Dialer1                    10.1.1.2        YES IPCP   up                    up

Virtual-Access1            unassigned      YES unset  up                    up

CPE_Router#

Mode EFM

Vous pouvez implémenter une solution IPoE ou PPPoE lorsque vous configurez une connexion SHDSL dos à dos.

1. Solution IPoE

- Routeur CO :

CO_Router#show running-config

Building configuration...

Current configuration : 2194 bytes

!

! Last configuration change at 14:56:53 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

ip cef

no ipv6 cef

multilink bundle-name authenticated

!

!

cts logging verbose

!

!

redundancy

!

!

controller SHDSL 0/3/0

termination co

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

!

interface Ethernet0/3/0

ip address 1.1.1.1 255.255.255.252

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

control-plane

!

gatekeeper

shutdown

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CO_Router#

- Routeur CPE :

CPE_Router#show running-config

Building configuration...

Current configuration : 1646 bytes

!

! Last configuration change at 14:50:55 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

no aaa new-model

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

cts logging verbose

!

redundancy

!

controller SHDSL 0/3/0

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface Ethernet0/3/0

ip address 1.1.1.2 255.255.255.252

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

control-plane

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CPE_Router#

2. Solution PPPoE

- Routeur CO :

CO_Router#show running-config

Building configuration...

Current configuration : 1851 bytes

!

! Last configuration change at 15:00:06 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CO_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

cts logging verbose

!

controller SHDSL 0/3/0

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

bba-group pppoe global

virtual-template 1

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

interface Ethernet0/3/0

ip address 1.1.1.2 255.255.255.252

pppoe enable group global

!

interface Virtual-Template1

mtu 1492

ip unnumbered Ethernet0/3/0

peer default ip address pool PPPOE

!

!

ip local pool PPPOE 1.1.1.1

!

no ip http server

no ip http secure-server

!

control-plane

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CO_Router#

- Routeur CPE :

CPE_Router#show running-config

Building configuration...

Current configuration : 2310 bytes

!

! Last configuration change at 15:10:04 UTC Thu Mar 10 2016

!

version 15.4

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname CPE_Router

!

boot-start-marker

boot system flash:c2900-universalk9-mz.SPA.154-3.M2.bin

boot-end-marker

!

!

ip cef

no ipv6 cef

multilink bundle-name authenticated

!

!

!

!

!

!

cts logging verbose

!

!

voice-card 0

!

!

!

!

!

redundancy

!

controller SHDSL 0/3/0

termination co

mode efm

dsl-group 0 pairs  0, 1, 2, 3 efm-bond

!

!

!

!

!

!

interface Embedded-Service-Engine0/0

no ip address

shutdown

!

interface GigabitEthernet0/0

no ip address

duplex auto

speed auto

!

interface GigabitEthernet0/1

no ip address

duplex auto

speed auto

!

!

interface Ethernet0/3/0

no ip address

pppoe enable group global

pppoe-client dial-pool-number 1

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

!

!

ip forward-protocol nd

!

no ip http server

no ip http secure-server

!

!

!

!

!

control-plane

!

!

!

!

gatekeeper

shutdown

!

!

!

line con 0

line aux 0

line vty 0 4

login

transport input all

!

scheduler allocate 20000 1000

!

end

CPE_Router#

Vérification

Utilisez cette section pour confirmer que votre configuration fonctionne correctement.

1. Afin de vérifier que le routeur est en mode CO, exécutez la commande show. La ligne de terminaison CO du résultat (gras dans l'exemple) indique que le routeur est en mode CO. Le mode par défaut est CPE. Une partie du résultat n'apparaît pas ici, pour plus de concision.

CO# show controllers shdSL 0/1/0

Controller SHDSL 0/1/0 is UP

Hardware is EHWIC-4SHDSL-EA, rev 0 on slot 0, hwic slot 1

Capabilities: EFM: 2-wire, EFM-Bond, Annex A, B, F & G

ATM: 2-wire, Mpair, IMA, Annex A, B, F & G

- Terminaison CO :

cdb=0x3CF085F0, plugin=0x21C33C1C, ds=0x21C33C68 base=0x10200000

FPGA Version is A14

NPU Source: System

NPU Firmware version: SHDSL_EA_FW_20130116053038

Vendor: Infineon, Chipset: SOCRATES-4e

PHY Source: System

IDC Firmware version: 1.7.5.0

DFE Firmware version: 1.1-1.7.5__002

Firmware reload mode: Auto

<Output abbreviated due to space constraints>

2. Pour le mode EFM, exécutez la commande show controllers ethernet pour vérification.

3. Pour le mode ATM, exécutez la commande show controllers atm pour vérification.

Dépannage

Il n'existe actuellement aucune information de dépannage spécifique pour cette configuration.

Informations connexes

- Pour plus d'informations sur le dépannage des connexions SHDSL, reportez-vous à Configuration des EHWIC EFM/ATM Cisco G.SHDSL dans les routeurs Cisco

- Pour le dépannage lié au protocole PPP, reportez-vous au diagramme de flux de dépannage PPP

- Support et documentation techniques - Cisco Systems