Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Solution

Vérification

Dépannage

Introduction

Ce document décrit les actions à entreprendre pour permettre aux utilisateurs finaux locaux de Cisco Unified Call Manager (CUCM) (et non au protocole LDAP (Lightweight Directory Access Protocol) synchronisé) de se connecter à Jabber dans un cluster avec authentification unique (SSO).

S'applique uniquement à Jabber pour Windows.

Conditions préalables

Conditions requises

Cisco vous recommande de prendre connaissance des rubriques suivantes :

- Solutions Cisco Unified Communications Manager

- Authentification unique (SSO)

- Cisco Jabber

- Invite de commandes Windows (CMD)

Components Used

Ce document n'est pas limité à des versions de matériel et de logiciel spécifiques.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Si votre réseau est en ligne, assurez-vous de bien comprendre l’incidence possible des commandes.

Solution

Auparavant, le paramètre Jabber SSO_Enabled était disponible dans le fichier de configuration Jabber (jabber-config.xml) pour désactiver la fonctionnalité SSO pour des utilisateurs spécifiques via Cisco Support Field dans la configuration du périphérique Jabber sous CUCM, mais ce paramètre a été déconseillé depuis mars 2021, reportez-vous au paramètre guide de référence pour Jabber 12.9.

La seule solution consiste à désactiver complètement la fonctionnalité SSO dans le client d'ordinateur local via le commutateur d'installation CMD :

msiexec.exe /i CiscoJabberSetup.msi CLEAR=1 SSO_ENABLED=FALSE

Sinon, le fichier d'amorçage Jabber (jabber-bootstrap.properties) situé dans C:\ProgramData\Cisco Systems\Cisco Jabber peut être modifié manuellement (ligne 28) comme indiqué ici :

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

SSO_Enabled: FALSE

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

EnableDPIAware: TRUE

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

STARTUP_AUTHENTICATION_REQUIRED: FALSE

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

NOT_SPECIFIED

UXModel: Modern

NOT_SPECIFIED

Vérification

Aucune procédure de vérification n'est disponible pour cette configuration.

Dépannage

Il n'existe actuellement aucune information de dépannage spécifique pour cette configuration.