Contenu

Introduction

Suivi des objets vPC

Diagramme du réseau

Commandes show de la ligne de base

Introduction

Ce document décrit le suivi des objets vPC, les raisons de son utilisation et son fonctionnement.

Suivi des objets vPC

Diagramme du réseau

Voici le schéma de réseau utilisé pour cette démonstration :

La liaison homologue vPC est Port-channel 1.  Ethernet 5/1 est la liaison de veille homologue vPC.  Deux routeurs principaux sont connectés via les liaisons L3/30 e3/3 et e3/4 sur chaque zone N7K.  N5KA et N5KB simulent les commutateurs L2 vPC connectés sur vPC 100 et vPC 101.  N7KA est le périphérique principal vPC.

Commandes show de la ligne de base

N7KA :

N7KA-vdc2# show run vpc

!Command: show running-config vpc

!Time: Thu Sep 26 19:51:57 2013

version 6.1(4)

feature vpc

vpc domain 102

peer-keepalive destination 1.1.1.2 source 1.1.1.1 vrf vpc-keepalive

peer-gateway

track 1

auto-recovery

interface port-channel1

vpc peer-link

interface port-channel100

vpc 100

interface port-channel101

vpc 101

N7KA-vdc2# show run track

!Command: show running-config track

!Time: Thu Sep 26 19:51:59 2013

version 6.1(4)

track 1 list boolean or

object 2

object 3

object 4

track 2 interface port-channel1 line-protocol

track 3 interface Ethernet3/3 line-protocol

track 4 interface Ethernet3/4 line-protocol

N7KA-vdc2# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KA-vdc2# show track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 23:24:08

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

1 changes, last change 23:26:59

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 23:26:50

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

3 changes, last change 23:26:48

Tracked by:

Track List  1

N7KA-vdc2#

N7Ko :

N7KB-vdc2# show run vpc

!Command: show running-config vpc

!Time: Thu Sep 26 19:53:17 2013

version 6.1(4)

feature vpc

vpc domain 102

peer-keepalive destination 1.1.1.1 source 1.1.1.2 vrf vpc-keepalive

peer-gateway

track 1

auto-recovery

interface port-channel1

vpc peer-link

interface port-channel100

vpc 100

interface port-channel101

vpc 101

N7KB-vdc2# show run track

!Command: show running-config track

!Time: Thu Sep 26 19:53:20 2013

version 6.1(4)

track 1 list boolean or

object 2

object 3

object 4

track 2 interface port-channel1 line-protocol

track 3 interface Ethernet3/3 line-protocol

track 4 interface Ethernet3/4 line-protocol

N7KB-vdc2# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2# show track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 23:25:51

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

1 changes, last change 23:29:09

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 23:28:55

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

3 changes, last change 23:28:56

Tracked by:

Track List  1

N7KB-vdc2#

Le suivi des objets vPC est utilisé dans un scénario comme celui-ci.  Un module M132 est utilisé pour la liaison homologue vPC ainsi que pour les liaisons ascendantes L3 vers le coeur.  Si vous perdez le module M132 en raison d'une défaillance matérielle, vous perdrez la liaison homologue vPC ainsi que les liaisons ascendantes L3.  Si cela devait se produire sur le boîtier secondaire vPC (N7KB), cela ne poserait pas de problème, car l'homologue principal opérationnel prendrait la relève de la suspension des canaux de port et des interfaces Vlan vPC sur le secondaire opérationnel.  Le problème se pose en cas de défaillance matérielle sur le périphérique principal opérationnel (N7KA).  Si vous n'avez pas utilisé le suivi d'objet, nous suspendrions tous les canaux de port vPC sur N7KB ainsi que les interfaces Vlan.  La liaison homologue serait également désactivée.  Dans ce scénario, vous n'auriez pas de moyen d'acheminer le trafic Core vers nos VLAN vPC.

Le suivi des objets contournera ce problème en désactivant le vPC sur le primaire opérationnel afin de ne pas entrer dans ce scénario où nous arrêtons les interfaces Vlan et les canaux de port vPC sur le boîtier qui possède les liaisons ascendantes restantes vers le coeur.

Ici, vous voyez les messages de keepalive d'homologue vPC à l'aide d'éthanalyzer :

N7KA# ethanalyzer local interface inband capture-filter "host 1.1.1.1 and host 1.1.1.2" limit-captured-frames 4

Capturing on inband

2013-09-26 20:01:09.629309      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:01:09.954909      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:01:10.639097      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:01:10.954944      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

4 packets captured

N7KA#

N7KB# ethanalyzer local interface inband capture-filter "host 1.1.1.1 and host 1.1.1.2" limit-captured-frames 4

Capturing on inband

2013-09-26 20:00:22.606593      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:00:22.922517      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:00:23.616427      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:00:23.922557      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

4 packets captured

N7KB#

Maintenant, vous simulez une défaillance du module 3 sur N7KA en mettant le module hors tension :

N7KA# conf t

Enter configuration commands, one per line.  End with CNTL/Z.

N7KA(config)# poweroff mod 3

N7KA(config)# end

N7KA#

2013 Sep 26 20:03:25 N7KA %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

Journaux :

N7KA:

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_INITIALIZING: Interface port-channel1 is down (Initializing)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_MODULE_REMOVED: Interface Ethernet3/3 is down (module removed)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_MODULE_REMOVED: Interface Ethernet3/4 is down (module removed)

2013 Sep 26 20:03:28 N7KA-vdc2 %VPC-2-TRACK_INTFS_DOWN: In domain 102, vPC tracked interfaces down, suspending all vPCs and keep-alive

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_NONE: Interface port-channel101 is down (None)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_NONE: Interface port-channel100 is down (None)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel101: Ethernet4/7 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel100: Ethernet4/6 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel101: first operational port changed from Ethernet4/7 to none

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel100: first operational port changed from Ethernet4/6 to none

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/1 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/2 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel1: first operational port changed from Ethernet3/1 to none

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface port-channel1 is down (No operational members)

N7KB:

2013 Sep 26 20:02:39 N7KB-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel1: first operational port changed from Ethernet3/1 to none

2013 Sep 26 20:02:40 N7KB-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/2 is down

2013 Sep 26 20:02:40 N7KB-vdc2 %ETHPORT-5-IF_DOWN_LINK_FAILURE: Interface Ethernet3/2 is down (Link failure)

2013 Sep 26 20:02:45 N7KB-vdc2 %VPC-2-PEER_KEEP_ALIVE_RECV_FAIL: In domain 102, VPC peer keep-alive receive has failed

2013 Sep 26 20:02:45 N7KB-vdc2 %ETHPORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface port-channel1 is down (No operational members)

2013 Sep 26 20:02:45 N7KB-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/1 is down

2013 Sep 26 20:02:45 N7KB-vdc2 %ETHPORT-5-IF_DOWN_LINK_FAILURE: Interface Ethernet3/1 is down (Link failure)

2013 Sep 26 20:02:45 N7KB-vdc2 %ETHPORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface port-channel1 is down (No operational members)

Maintenant, vous restez dans cet état.  N7KA est l'homologue principal vPC, mais il arrête d'envoyer des messages de test d'activité vPC à N7KB afin que N7KB ne soit pas suspendu.  N7KB est le seul système qui possède des liaisons ascendantes.

Note: e3/4 sur N7KB se connecte à un autre VDC sur N7KA, ce qui explique pourquoi il a également baissé.  Le fait est que vous avez suivi les interfaces sur N7KB et aucune sur N7KA. Il arrête donc d'envoyer des messages à N7KB sur le lien peer-keepalive.

Sortie d'analyseur d'éthers de N7KA :

(Remarquez qu'après TRACK_INTFS_DOWN syslog, nous n'envoyons plus de messages de veille sur N7KB, nous ne les recevons que de N7KB qui est 1.1.1.2)

2013-09-26 20:03:23.684887      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:23.685766      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:24.684863      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:24.685580      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:03:25 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013 Sep 26 20:03:25 N7KA %$ VDC-1 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013-09-26 20:03:25.684869      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:25.685771      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:26.684835      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:26.685716      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:27.690661      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:27.691367      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:03:28 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:03:28 N7KA %$ VDC-1 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:03:28 N7KA-vdc2 %$ VDC-2 %$ %VPC-2-TRACK_INTFS_DOWN: In domain 102, vPC tracked interfaces down, suspending all vPCs and keep-alive

2013-09-26 20:03:28.700594      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:29.700538      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:30.700603      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:31.710665      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:32.720601      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:33.715295      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:34.713112      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:35.713177      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

Sortie éthanalyzer de N7KB :

2013-09-26 20:02:36.651007      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:36.651534      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:37.651053      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:37.651644      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:38.650967      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:38.651579      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:39.656523      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:39.657500      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

(Here we stop receiving keepalive messages from N7KA or 1.1.1.1):

2013-09-26 20:02:40.666531      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:41.666442      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:42.666479      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:43.676461      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:44.686478      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:02:45 N7KB-vdc2 %$ VDC-2 %$ %VPC-2-PEER_KEEP_ALIVE_RECV_FAIL: In domain 102, VPC peer keep-alive receive has failed

2013-09-26 20:02:45.681050      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:46.678911      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:47.678918      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:48.678961      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

N7KA :

N7KA-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  down   success     success                    -

101  Po101  down   success     success                    -

N7KA-vdc2# show track

Track 1

List  Boolean or

Boolean or is DOWN

3 changes, last change 00:20:50

Track List Members:

object 4 DOWN

object 3 DOWN

object 2 DOWN

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is DOWN

2 changes, last change 00:20:50

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is DOWN

4 changes, last change 00:20:50

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is DOWN

4 changes, last change 00:20:50

Tracked by:

Track List  1

N7KA-vdc2#

N7Ko :

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2# sh track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 23:57:10

Track List Members:

object 4 DOWN

object 3 UP

object 2 DOWN

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is DOWN

2 changes, last change 00:22:04

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 1d00h

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is DOWN

4 changes, last change 00:22:04

Tracked by:

Track List  1

N7KB-vdc2#

Vous pouvez maintenant restaurer la configuration :

N7KA# conf t

Enter configuration commands, one per line.  End with CNTL/Z.

N7KA(config)# no poweroff mod 3

N7KA(config)# end

N7KA#

2013 Sep 26 20:26:53 N7KA %PLATFORM-2-PFM_MODULE_POWER_ON: Manual power-on of Module 3  from Command Line Interface

2013 Sep 26 20:26:56 N7KA %PLATFORM-2-MOD_DETECT: Module 3 detected (Serial number JAF1703ALTD) Module-Type 10 Gbps Ethernet XL Module Model N7K-M132XP-12L

2013 Sep 26 20:26:56 N7KA %PLATFORM-2-MOD_PWRUP: Module 3 powered up (Serial number JAF1703ALTD)

2013 Sep 26 20:26:56 N7KA %PLATFORM-5-MOD_STATUS: Module 3 current-status is MOD_STATUS_POWERED_UP

N7KA :

N7KA-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary, operational secondary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KA-vdc2# sh track

Track 1

List  Boolean or

Boolean or is UP

4 changes, last change 00:01:44

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

3 changes, last change 00:01:40

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

5 changes, last change 00:01:43

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

5 changes, last change 00:01:44

Tracked by:

Track List  1

N7KA-vdc2#

N7Ko :

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2# sh track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 1d00h

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

3 changes, last change 00:02:07

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 1d00h

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

5 changes, last change 00:02:09

Tracked by:

Track List  1

N7KB-vdc2#

Détails sur l'échec de Peer-keepalive vPC :

Réexécutez le test afin de voir ce qui se passe avec la liaison peer-keepalive.

Envoyer les keepliaves bidirectionnellement - actuellement, tout est opérationnel :

2013-09-26 20:32:12.532319      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:12.533083      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:13.532485      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:13.533147      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

Maintenant, arrêtez à nouveau le module M132 3 sur N7KA :

2013 Sep 26 20:32:14 N7KA %$ VDC-1 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013 Sep 26 20:32:14 N7KA-vdc3 %$ VDC-3 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013 Sep 26 20:32:14 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013-09-26 20:32:14.532364      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:14.533217      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:15.532453      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:15.533158      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:16.532452      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:16.536224      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:32:17 N7KA %$ VDC-1 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:32:17 N7KA-vdc3 %$ VDC-3 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:32:16 N7KA-vdc2 %$ VDC-2 %$ %VPC-2-TRACK_INTFS_DOWN: In domain 102, vPC tracked interfaces down, suspending all vPCs and keep-alive

2013 Sep 26 20:32:17 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

Vous voyez maintenant que seul N7KB (1.1.1.2) envoie les messages keepalive à N7KA (1.1.1.1) :

2013-09-26 20:32:17.549161      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:18.549352      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:19.549294      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:20.549358      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:21.549303      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:22.549991      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

Ici, vous voyez l'état sur N7KB montrant que le keepalive homologue a échoué :

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is not reachable through peer-keepalive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2#

Maintenant, vous commencez à recevoir à nouveau des messages de keepalive d'homologue de N7KA après une brève période (90 secondes) :

<snip>

2013-09-26 20:33:42.630255      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:43.630199      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:44.630263      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:45.640201      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:46.650262      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:47.652445      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:47.660318      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:48.652768      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:48.653347      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:49.652409      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:49.652705      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:50.652423      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:50.652773      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:51.652401      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:51.652839      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

Vous voyez ensuite l'état le plus récent sur N7KB (indiquant que l'homologue est vivant) :

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2#