Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Configuration

Diagramme du réseau

Configurations

VTEP-1

VTEP-2

Vérification

Exemples de rapports

VTEP-1

VTEP-2

Dépannage

Introduction

Ce document décrit la configuration de Virtual Extensible LAN (VXLAN) Flood and Learn sur les commutateurs de la gamme Nexus 7000.

Conditions préalables

Conditions requises

Cisco vous recommande de prendre connaissance des rubriques suivantes :

- Concepts de routage multidiffusion, comme le point RP (rendezvous point) et la multidiffusion multiplateformes (Platform Independent Multicast ou PIM).

- Concepts VXLAN

Note: Ce document suppose que le routage IP et le routage multidiffusion ont été établis avant la configuration du VXLAN.

Components Used

Les informations contenues dans ce document sont basées sur les versions de matériel et de logiciel suivantes :

- N77-C7710

- N77-F348XP-23

- N77-F324FQ-25

Note: N77K exécute le logiciel version 7.2(0)D1(1).

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Configuration

Diagramme du réseau

Configurations

Ces configurations sont particulières à la section du VXLAN. Ces configurations supposent une accessibilité totale à toutes les interfaces de la couche 3 du réseau, quel que soit le protocole de routage utilisé Le routage statique est utilisé dans cet exemple. Il suppose également que le routage de multidiffusion a été établi sur ces mêmes interfaces L3

VTEP-1

feature pim

system bridge-domain 50,75

feature nv overlay

feature interface-vlan

feature vni

vni 5000

vni 7500

ip route 10.10.10.2/32 Ethernet10/1 192.168.1.2

ip pim rp-address 192.168.1.1 group-list 224.0.0.0/4

bridge-domain 50

bridge-domain 75

encapsulation profile vni VSI_50_TO_5000

dot1q 50  vni 5000

encapsulation profile vni VSI_75_TO_7500

dot1q 75  vni 7500

bridge-domain 50

member vni 5000

bridge-domain 75

member vni 7500

interface nve1

no shutdown

source-interface loopback10

member vni 5000 mcast-group 225.1.1.1

member vni 7500 mcast-group 227.1.1.1

interface Bdi50

no shutdown

ip address 10.50.50.50/24

interface Bdi75

no shutdown

ip address 10.75.75.75/24

interface Ethernet7/17

no switchport

no shutdown

service instance 1 vni

no shutdown

encapsulation profile VSI_50_TO_5000  default

service instance 2 vni

no shutdown

encapsulation profile VSI_75_TO_7500 default

interface Ethernet10/1

no switchport

ip address 192.168.1.1/30

ip pim sparse-mode

no shutdown

interface loopback10

ip address 10.10.10.1/32

ip pim sparse-mode

Il est important de noter que l'interface interne sur le terminal VTEP (Vxlan Tunnel endpoint) est configurée en tant que port de couche 3 (pas de port de commutation). Cependant, aucune adresse IP ne lui est attribuée. Il est également important de noter que la valeur BD définie sur le VTEP ne doit pas correspondre à l'ID de VLAN utilisé pour envoyer le trafic vers ce périphérique. Cependant, le mappage dot1q à VNI(Vxlan Network Identifier) défini dans le profil d'encapsulation, appelé sous l'instance de service sur l'interface interne, doit correspondre à l'ID de VLAN.

VTEP-2

feature pim

system bridge-domain 50,75

feature nv overlay

feature interface-vlan

feature vni

vni 5000

vni 7500

ip route 10.10.10.1/32 Ethernet10/7 192.168.1.1

ip pim rp-address 192.168.1.1 group-list 224.0.0.0/4

bridge-domain 50

bridge-domain 75

encapsulation profile vni VSI_50_TO_5000

dot1q 50  vni 5000

encapsulation profile vni VSI_75_TO_7500

dot1q 75  vni 7500

bridge-domain 50

member vni 5000

bridge-domain 75

member vni 7500

interface nve1

no shutdown

source-interface loopback10

member vni 5000 mcast-group 225.1.1.1

member vni 7500 mcast-group 227.1.1.1

interface Bdi50

no shutdown

ip address 10.50.50.51/24

interface Bdi75

no shutdown

ip address 10.75.75.76/24

interface Ethernet7/30

no switchport

no shutdown

service instance 1 vni

no shutdown

encapsulation profile VSI_50_TO_5000  default

service instance 2 vni

no shutdown

encapsulation profile VSI_75_TO_7500 default

interface Ethernet10/7

no switchport

ip address 192.168.1.2/30

ip pim sparse-mode

no shutdown

interface loopback10

ip address 10.10.10.2/32

ip pim sparse-mode

Il est important de noter que l’interface interne du VTEP est configurée comme port de couche 3 (pas de port de commutation). Cependant, aucune adresse IP ne lui est attribuée. Il est également important de noter que la valeur BD définie sur le VTEP ne doit pas correspondre à l'ID de VLAN utilisé pour envoyer le trafic vers ce périphérique. Cependant, le mappage dot1q à VNI défini dans le profil d'encapsulation, appelé sous l'instance de service sur l'interface interne, doit correspondre à l'ID de VLAN.

Vérification

Utilisez cette section pour confirmer que votre configuration fonctionne correctement.

Exemples de rapports

Ces rapports sont en régime permanent. Les pairs du VTEP se sont découverts l’un l’autre et le trafic est passé entre les deux en encapsulation et en désencapsulation.

VTEP-1

VTEP-1# show nve vni

Codes: CP - Control Plane        DP - Data Plane

UC - Unconfigured         SA - Suppress ARP

Interface VNI      Multicast-group   State Mode Type [BD/VRF]      Flags

--------- -------- ----------------- ----- ---- ------------------ -----

nve1      5000     225.1.1.1         Up    DP   L2 [50]

nve1      7500     227.1.1.1         Up    DP   L2 [75]

VTEP-1# show running-config interface nve 1

interface nve1

no shutdown

source-interface loopback10

member vni 5000 mcast-group 225.1.1.1

member vni 7500 mcast-group 227.1.1.1

VTEP-1# show service instance vni detail

VSI: VSI-Ethernet7/17.1

If-index: 0x35310001

Admin Status: Up

Oper Status: Up

Auto-configuration Mode: No

encapsulation profile vni VSI_50_TO_5000

dot1q 50 vni 5000

Dot1q   VNI     BD

------------------

50      5000    50

VSI: VSI-Ethernet7/17.2

If-index: 0x35310002

Admin Status: Up

Oper Status: Up

Auto-configuration Mode: No

encapsulation profile vni TEST

dot1q 100 vni 7500

Dot1q   VNI     BD

------------------

100     7500    75

VTEP-1# show bridge-domain

Bridge-domain 50  (2 ports in all)

Name:: Bridge-Domain50

Administrative State: UP               Operational State: UP

VSI-Eth7/17.1

vni5000

nve1

Bridge-domain 75  (2 ports in all)

Name:: Bridge-Domain75

Administrative State: UP               Operational State: UP

VSI-Eth7/17.2

vni7500

nve1

VTEP-1# show mac address-table dynamic

Note: MAC table entries displayed are getting read from software.

Use the 'hardware-age' keyword to get information related to 'Age'

Legend:

* - primary entry, G - Gateway MAC, (R) - Routed MAC, O - Overlay MAC

age - seconds since last seen,+ - primary entry using vPC Peer-Link, E -

EVPN entry

(T) - True, (F) - False ,  ~~~ - use 'hardware-age' keyword to retrieve

age info

VLAN/BD   MAC Address      Type      age     Secure NTFY Ports/SWID.SSID.LID

---------+-----------------+--------+---------+------+----+------------------

* 50       547f.eeec.af43    dynamic     ~~~      F    F  nve1/10.10.10.2

* 50       547f.eeec.af44    dynamic     ~~~      F    F  VSI-Eth7/17.1

* 50       547f.eeec.af45    dynamic     ~~~      F    F  nve1/10.10.10.2

* 75       547f.eeec.af44    dynamic     ~~~      F    F  VSI-Eth7/17.2

* 75       547f.eeec.af45    dynamic     ~~~      F    F  nve1/10.10.10.2

VTEP-1# show ip mroute detail

IP Multicast Routing Table for VRF "default"

Total number of routes: 7

Total number of (*,G) routes: 2

Total number of (S,G) routes: 4

Total number of (*,G-prefix) routes: 1

(*, 225.1.1.1/32), uptime: 19:51:28, nve(1) ip(0) pim(1)

Data Created: No

VXLAN Flags

VXLAN Encap

Stats: 0/0 [Packets/Bytes], 0.000   bps

Incoming interface: Ethernet10/1, RPF nbr: 1.1.1.1

Outgoing interface list: (count: 2)

Ethernet10/1, uptime: 19:51:09, pim, (RPF)

nve1, uptime: 19:51:28, nve

(10.10.10.1/32, 225.1.1.1/32), uptime: 19:51:28, nve(0) mrib(0) ip(0) pim(1)

Data Created: No

Received Register stop

VXLAN Flags

VXLAN Encap

Stats: 19/2274 [Packets/Bytes], 0.000   bps

Incoming interface: loopback10, RPF nbr: 10.10.10.1, internal

Outgoing interface list: (count: 1)

Ethernet10/1, uptime: 19:51:09, pim

(10.10.10.2/32, 225.1.1.1/32), uptime: 18:10:06, pim(1) mrib(1) ip(0)

Data Created: Yes

VXLAN Flags

VXLAN Decap

Stats: 9/846 [Packets/Bytes], 0.000   bps

Incoming interface: Ethernet10/1, RPF nbr: 1.1.1.2, internal

Outgoing interface list: (count: 2)

Ethernet10/1, uptime: 01:00:32, pim, (RPF)

nve1, uptime: 18:10:06, mrib

(*, 227.1.1.1/32), uptime: 12:52:13, nve(1) ip(0) pim(1)

Data Created: No

VXLAN Flags

VXLAN Encap

Stats: 0/0 [Packets/Bytes], 0.000   bps

Incoming interface: Ethernet10/1, RPF nbr: 1.1.1.1

Outgoing interface list: (count: 2)

Ethernet10/1, uptime: 12:51:52, pim, (RPF)

nve1, uptime: 12:52:13, nve

(10.10.10.1/32, 227.1.1.1/32), uptime: 12:52:13, nve(0) mrib(0) ip(0) pim(1)

Data Created: No

Received Register stop

VXLAN Flags

VXLAN Encap

Stats: 300/39850 [Packets/Bytes], 0.000   bps

Incoming interface: loopback10, RPF nbr: 10.10.10.1, internal

Outgoing interface list: (count: 1)

Ethernet10/1, uptime: 12:51:52, pim

(10.10.10.2/32, 227.1.1.1/32), uptime: 12:51:34, pim(1) mrib(1) ip(0)

Data Created: Yes

VXLAN Flags

VXLAN Decap

Stats: 22/1928 [Packets/Bytes], 0.000   bps

Incoming interface: Ethernet10/1, RPF nbr: 1.1.1.2, internal

Outgoing interface list: (count: 2)

Ethernet10/1, uptime: 00:52:14, pim, (RPF)

nve1, uptime: 12:51:34, mrib

(*, 232.0.0.0/8), uptime: 20:56:33, pim(0) ip(0)

Data Created: No

Stats: 0/0 [Packets/Bytes], 0.000   bps

Incoming interface: Null, RPF nbr: 0.0.0.0

Outgoing interface list: (count: 0)

VTEP-1# show ip arp

Flags: * - Adjacencies learnt on non-active FHRP router

+ - Adjacencies synced via CFSoE

# - Adjacencies Throttled for Glean

D - Static Adjacencies attached to down interface

IP ARP Table for context default

Total number of entries: 4

Address         Age       MAC Address     Interface

10.50.50.1      00:11:32  547f.eeec.af44  Bdi50

10.50.50.2      00:11:14  547f.eeec.af44  Bdi50

10.75.75.1      00:10:45  547f.eeec.af44  Bdi75

10.75.75.2      00:15:04  547f.eeec.af45  Bdi75

192.168.1.2     00:05:39  547f.eeec.af43  Ethernet10/1

VTEP-1# show ip route

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

192.168.1.0/30, ubest/mbest: 1/0, attached

*via 1.1.1.1, Eth10/1, [0/0], 20:25:13, direct

192.168.1.1/32, ubest/mbest: 1/0, attached

*via 1.1.1.1, Eth10/1, [0/0], 20:25:13, local

10.10.10.1/32, ubest/mbest: 2/0, attached

*via 10.10.10.1, Lo10, [0/0], 20:25:45, local

*via 10.10.10.1, Lo10, [0/0], 20:25:45, direct

10.10.10.2/32, ubest/mbest: 1/0

*via 1.1.1.2, Eth10/1, [1/0], 20:23:42, static

50.50.50.0/24, ubest/mbest: 1/0, attached

*via 50.50.50.50, Bdi50, [0/0], 01:18:47, direct

50.50.50.50/32, ubest/mbest: 1/0, attached

*via 50.50.50.50, Bdi50, [0/0], 01:18:47, local

75.75.75.0/24, ubest/mbest: 1/0, attached

*via 75.75.75.75, Bdi75, [0/0], 01:10:05, direct

75.75.75.75/32, ubest/mbest: 1/0, attached

*via 75.75.75.75, Bdi75, [0/0], 01:10:05, local

Note: Toutes ces sorties ont été rassemblées avec un maillage complet du trafic circulant entre tous les hôtes de la topologie.

VTEP-2

VTEP-2# show nve vni

Codes: CP - Control Plane        DP - Data Plane

UC - Unconfigured         SA - Suppress ARP

Interface VNI      Multicast-group   State Mode Type [BD/VRF]      Flags

--------- -------- ----------------- ----- ---- ------------------ -----

nve1      5000     225.1.1.1         Up    DP   L2 [50]

nve1      7500     227.1.1.1         Up    DP   L2 [75]

VTEP-2# show running-config interface nve 1

interface nve1

no shutdown

source-interface loopback10

member vni 5000 mcast-group 225.1.1.1

member vni 7500 mcast-group 227.1.1.1

VTEP-2# show service instance vni detail

VSI: VSI-Ethernet7/30.1

If-index: 0x3531d001

Admin Status: Up

Oper Status: Up

Auto-configuration Mode: No

encapsulation profile vni VSI_50_TO_5000

dot1q 50 vni 5000

Dot1q   VNI     BD

------------------

50      5000    50

VSI: VSI-Ethernet7/30.2

If-index: 0x3531d002

Admin Status: Up

Oper Status: Up

Auto-configuration Mode: No

encapsulation profile vni TEST

dot1q 100 vni 7500

Dot1q   VNI     BD

------------------

100     7500    75

VTEP-2# show bridge-domain

Bridge-domain 50  (2 ports in all)

Name:: Bridge-Domain50

Administrative State: UP               Operational State: UP

vni5000

VSI-Eth7/30.1

nve1

Bridge-domain 75  (2 ports in all)

Name:: Bridge-Domain75

Administrative State: UP               Operational State: UP

vni7500

VSI-Eth7/30.2

nve1

VTEP-2# show mac address-table dynamic

Note: MAC table entries displayed are getting read from software.

Use the 'hardware-age' keyword to get information related to 'Age'

Legend:

* - primary entry, G - Gateway MAC, (R) - Routed MAC, O - Overlay MAC

age - seconds since last seen,+ - primary entry using vPC Peer-Link, E -

EVPN entry

(T) - True, (F) - False ,  ~~~ - use 'hardware-age' keyword to retrieve

age info

VLAN/BD   MAC Address      Type      age     Secure NTFY Ports/SWID.SSID.LID

---------+-----------------+--------+---------+------+----+------------------

* 50       547f.eeec.af44    dynamic     ~~~      F    F  nve1/10.10.10.1

* 50       547f.eeec.af45    dynamic     ~~~      F    F  VSI-Eth7/30.1

* 75       547f.eeec.af45    dynamic     ~~~      F    F  VSI-Eth7/30.2

* 75       547f.eeec.af48    dynamic     ~~~      F    F  nve1/10.10.10.1

VTEP-2# show ip mroute detail

IP Multicast Routing Table for VRF "default"

Total number of routes: 5

Total number of (*,G) routes: 2

Total number of (S,G) routes: 2

Total number of (*,G-prefix) routes: 1

(*, 225.1.1.1/32), uptime: 19:56:19, nve(1) ip(0) pim(0)

Data Created: No

VXLAN Flags

VXLAN Encap

Stats: 8/748 [Packets/Bytes], 0.000   bps

Incoming interface: Ethernet10/7, RPF nbr: 1.1.1.1

Outgoing interface list: (count: 1)

nve1, uptime: 19:56:19, nve

(10.10.10.2/32, 225.1.1.1/32), uptime: 19:56:19, nve(0) mrib(0) pim(1) ip(0)

Data Created: No

Received Register stop

VXLAN Flags

VXLAN Encap

Stats: 9/834 [Packets/Bytes], 0.000   bps

Incoming interface: loopback10, RPF nbr: 10.10.10.2

Outgoing interface list: (count: 1)

Ethernet10/7, uptime: 18:15:17, pim

(*, 227.1.1.1/32), uptime: 12:57:03, nve(1) ip(0) pim(0)

Data Created: No

VXLAN Flags

VXLAN Encap

Stats: 10/864 [Packets/Bytes], 0.000   bps

Incoming interface: Ethernet10/7, RPF nbr: 1.1.1.1

Outgoing interface list: (count: 1)

nve1, uptime: 12:57:03, nve

(10.10.10.2/32, 227.1.1.1/32), uptime: 12:57:03, nve(0) mrib(0) ip(0) pim(1)

Data Created: No

Received Register stop

VXLAN Flags

VXLAN Encap

Stats: 30/2648 [Packets/Bytes], 0.000   bps

Incoming interface: loopback10, RPF nbr: 10.10.10.2

Outgoing interface list: (count: 1)

Ethernet10/7, uptime: 12:56:45, pim

(*, 232.0.0.0/8), uptime: 18:20:36, pim(0) ip(0)

Data Created: No

Stats: 0/0 [Packets/Bytes], 0.000   bps

Incoming interface: Null, RPF nbr: 0.0.0.0

Outgoing interface list: (count: 0)

VTEP-2# show ip arp

Flags: * - Adjacencies learnt on non-active FHRP router

+ - Adjacencies synced via CFSoE

# - Adjacencies Throttled for Glean

D - Static Adjacencies attached to down interface

IP ARP Table for context default

Total number of entries: 4

Address         Age       MAC Address     Interface

10.50.50.1      00:11:30  547f.eeec.af44  Bdi50

10.50.50.2      00:17:07  547f.eeec.af45  Bdi50

10.75.75.1      00:04:14  547f.eeec.af45  Bdi75

10.75.75.2      00:03:24  547f.eeec.af45  Bdi75

192.168.1.1     00:10:52  547f.eeec.af48  Ethernet10/7

VTEP-2# show ip route

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

192.168.1.0/30, ubest/mbest: 1/0, attached

*via 1.1.1.2, Eth10/7, [0/0], 20:30:24, direct

192.168.1.2/32, ubest/mbest: 1/0, attached

*via 1.1.1.2, Eth10/7, [0/0], 20:30:24, local

10.10.10.1/32, ubest/mbest: 1/0

*via 1.1.1.1, Eth10/7, [1/0], 20:29:48, static

10.10.10.2/32, ubest/mbest: 2/0, attached

*via 10.10.10.2, Lo10, [0/0], 20:29:39, local

*via 10.10.10.2, Lo10, [0/0], 20:29:39, direct

50.50.50.0/24, ubest/mbest: 1/0, attached

*via 50.50.50.51, Bdi50, [0/0], 01:22:50, direct

50.50.50.51/32, ubest/mbest: 1/0, attached

*via 50.50.50.51, Bdi50, [0/0], 01:22:50, local

75.75.75.0/24, ubest/mbest: 1/0, attached

*via 75.75.75.76, Bdi75, [0/0], 01:14:50, direct

75.75.75.76/32, ubest/mbest: 1/0, attached

*via 75.75.75.76, Bdi75, [0/0], 01:14:50, local

Note: Toutes ces sorties ont été rassemblées avec un maillage complet du trafic circulant entre tous les hôtes de la topologie.

Dépannage

Il n'existe actuellement aucune information de dépannage spécifique pour cette configuration.