Table des matières

Introduction

Conditions préalables

Exigences

Composants utilisés

Informations générales

Topologie

Configuration importante

Routeur CA

Configuration de la passerelle VPN

Périphérique Windows

Validation

Scénario 1. Le certificat est valide pour l'authentification

Scénario 2. Le certificat est révoqué et l’authentification échoue

Dépannage

Introduction

Ce document décrit comment dépanner la liste de révocation de certificats (CRL) configurée pour l'authentification basée sur les certificats AnyConnect.

Conditions préalables

Exigences

Cisco vous recommande de prendre connaissance des rubriques suivantes :

- Autorité de certification (CA)

- Infrastructures à clé publique (PKI)

- VPN RA sur FTD

- Windows 10 avec client AnyConnect

Composants utilisés

Les informations contenues dans ce document sont basées sur les versions de logiciel suivantes :

- CSR1000V - Cisco IOS® XE, version 16.12.03 - en tant que serveur Cisco IOS XE CA

- NGFWv - Version 7.1.0 - comme passerelle VPN

- AnyConnect Secure Mobility Client version 4.10.07073 - en tant que client VPN

- Windows 10 en tant qu'ordinateur local

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Si votre réseau est en ligne, assurez-vous de bien comprendre l’incidence possible des commandes.

Informations générales

La liste de révocation de certificats permet aux périphériques de déterminer si un certificat a été révoqué avant l'expiration de sa durée de vie. Une liste de révocation de certificats contient le numéro de série et la date de révocation du certificat. Une passerelle sécurisée telle que les systèmes Firepower Thread Defense (FTD) ou d'autres périphériques finaux utilise cette fonctionnalité afin de renforcer l'authentification du certificat en validant l'état du certificat.

Topologie

Topologie de base qui fournit la connectivité à la passerelle VPN et au serveur AC.

Configuration importante

Afin d'accomplir l'authentification basée sur certificat avec CRL, la configuration présentée a été utilisée dans chacun des périphériques impliqués.

Routeur CA

L’autorité de certification du serveur est chargée de délivrer des certificats d’identité aux utilisateurs afin de fournir une authentification par rapport à la passerelle VPN. En outre, le routeur stocke le fichier de base de données CRL et agit en tant que point de distribution CRL (CDP).

Un CDP est l'emplacement où la passerelle VPN et d'autres utilisateurs finaux récupèrent les informations CRL. Ces informations sont mises en cache localement et ne sont valides que pour une période spécifique ; lorsque ce délai expire, une nouvelle liste de révocation de certificats est téléchargée.

Remarque : La base de données de la liste de révocation de certificats et l'emplacement où les périphériques ont accès à la liste de révocation de certificats peuvent se trouver sur le même périphérique. Toutefois, pour des raisons de sécurité, il est recommandé que la liste de révocation de certificats à laquelle les périphériques finaux ont accès soit stockée dans un autre périphérique que la base de données de la liste de révocation de certificats. Dans cet exemple, le routeur AC stocke la base de données CRL et agit en tant que CDP pour la passerelle VPN.

crypto pki server CAS

database level complete

no database archive

issuer-name cn=calo_root,ou=TAC,o=cisco

grant auto

hash sha256

lifetime crl 2

lifetime certificate 300

lifetime ca-certificate 1000

cdp-url http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

eku server-auth client-auth

database url ser nvram:

crypto pki trustpoint TP-self-signed-1507329386

enrollment selfsigned

subject-name cn=IOS-Self-Signed-Certificate-1507329386

revocation-check none

rsakeypair TP-self-signed-1507329386

crypto pki trustpoint CAS

revocation-check crl

rsakeypair CAS

interface GigabitEthernet2

ip address 192.0.2.10 255.255.255.0

negotiation auto

ip http server

ntp master 1

Configuration de la passerelle VPN

Le FTD est configuré afin de fournir un VPN d'accès à distance aux utilisateurs finaux en utilisant des certificats comme méthode d'authentification (certificat uniquement). À la réception du certificat d'identité de l'utilisateur, le FTD vérifie si le certificat a été émis par une autorité de certification (CA) connue et confirme sa validité en obtenant la liste de révocation de certificats du CDP défini dans le certificat.

tunnel-group local type remote-access

tunnel-group local general-attributes

address-pool AC_pool

default-group-policy local_gp

username-from-certificate use-entire-name

tunnel-group local_test webvpn-attributes

authentication certificate

group-alias test enable

Périphérique Windows

Un certificat d'identité a été émis par le serveur AC et installé sur le périphérique Windows.

Validation

Les débogages et captures suivants affichent la différence entre un utilisateur utilisant un certificat valide (scénario de travail) et un utilisateur utilisant un certificat qui a été révoqué (scénario de non-travail).

Scénario 1. Le certificat est valide pour l'authentification

Lorsque l'utilisateur lance la tentative de connexion, il fournit au FTD son certificat d'identité, la passerelle VPN vérifie que l'émetteur est une autorité connue et commence à demander la liste de révocation de certificats à partir du CDP défini dans le certificat d'identité via une requête HTTP/GET. Le serveur AC répond avec la liste de révocation de certificats et le FTD vérifie si le numéro de série du certificat est répertorié. Comme la liste de révocation de certificats est vide (aucun certificat révoqué), le FTD accepte le certificat comme valide et permet à l'utilisateur de s'authentifier.

PKI[7]: Cert to verify

PKI[7]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /O=cisco/OU=TAC/CN=calo_root. ctx->error: (0)ok, cert_idx: 1

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (0)ok, cert_idx: 0

PKI[8]: pki_ossl_find_valid_chain took 217 microsecs

PKI[6]: Verified chain:

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[6]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[6]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

[..output ommitted]

CRYPTO_PKI: bitValue of KEY_USAGE = a0PKI[7]: CRYPTO_PKI:check_key_usage: Checking KU for case VPN peer certs.

PKI[7]: CRYPTO_PKI:check_key_usage: KU bit digitalSignature is ON.

PKI[7]: ExtendedKeyUsage OID = serverAuth NOT acceptable for usage type SSL VPN Peer

PKI[7]: ExtendedKeyUsage OID = clientAuth acceptable for usage type: SSL VPN Peer

PKI[7]: check_key_usage:Extended Key/Key Usage check OK

PKI[12]: pki_ossl_revocation_check, pki_ossl_validate.c:931

PKI[7]: Starting revocation check for session 0x06c8d45f

PKI[12]: pki_init_revocation, pki_ossl_revocation.c:162

PKI[12]: pki_ossl_eval_revocation, pki_ossl_validate.c:699

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x06c8d45f, cert 0 has rev_status 0, using methods 1/3/0 at index 0

PKI[12]: cert_revoc_exempt, pki_ossl_revocation.c:250

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[13]: pki_crl_cached, pki_ossl_crl_cache.c:1351

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_check_cache, pki_ossl_crl_cache.c:1269

PKI[7]: Starting OSSL CRL cache check.

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[9]: Attempting to find cached CRL for CDP http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_SelectCRLByIssuerTimeDER, pki_ossl_crl_cache.c:1219

PKI[14]: pki_ossl_get_name_string, pki_ossl.c:315

PKI[9]: Select DER crl(O=cisco, OU=TAC, CN=calo_root)

PKI[12]: pki_ossl_get_crl_internal, pki_ossl_crl_cache.c:506

PKI[7]: CRL not cached. Initiating CRL download for cert idx 0.

PKI[12]: do_get_crl, pki_ossl_revocation.c:85

PKI[9]: starting CRL FSM #0

PKI[11]: drive_fsm, pki_ossl_revocation.c:33

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: In PKICRL_InitTransaction

PKI[12]: get_cdps, pki_crl_fsm_act.c:202

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[7]: cdp: (len=58, type=URI, prot=HTTP) http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: PKICRL_InitTransaction, Return status: 0

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: In PKICRL_NextCDP

PKI[12]: crldl_cdp_blacklisted, pki_ossl_crl.c:1374

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[7]: CDP is not blacklisted

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: PKICRL_NextCDP, Return status: 0

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: In PKICRL_Request

PKI[13]: crldp_download_pending, pki_ossl_crl.c:1184

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[8]: session 0x06c8d45f adding pending CRL entry for cert 0

PKI[12]: crldp_add_pending_download, pki_ossl_crl.c:1203

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: retrieve_crl, pki_crl_fsm_act.c:233

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[7]: CDP type HTTP

PKI[7]: getting http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_crl_build_http_io, pki_ossl_crl.c:1017

PKI[13]: pki_parse_uri, pki_ossl_uri.c:75

PKI[14]: pki_uri_map_protocol, pki_ossl_uri.c:17

PKI[14]: pki_uri_get_port, pki_ossl_uri.c:34

PKI[13]: pki_free_uri, pki_ossl_uri.c:57

PKI[11]: pki_crl_request_send_async, pki_ossl_crl.c:627

PKI[8]: [15] IOCB allocated

PKI[7]: PKI CRL I/O request queue result: IO_STATUS_QUEUED

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: PKICRL_Request, Return status: 0

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 0, revoked: 0, error: 0, pending: 1, fail-allow: 0

PKI[9]: Async unlocked for session 0x06c8d45f

PKI[8]: [15] Received IO request msg

PKI[8]: [15] DNS resolve issued for 192.0.2.10

PKI[9]: CERT API thread sleeps!

PKI[7]: [15] DNS resolve 192.0.2.10 (192.0.2.10)

PKI[8]: [15] Socket open success

PKI[8]: [15] IPv4 Route lookup to 192.0.2.10 use interface outside

PKI[8]: [15] Connect sent to 192.0.2.10 from 192.0.2.1

PKI[12]: pki_io_cbfunc_log_revocation_check, pki_ossl_revocation.c:421

PKI[7]: 6717056: Attempting CRL revocation check from outside:192.0.2.1/62075 to 192.0.2.10/80 using HTTP.

PKI[8]: [15] Received Socket transmit ready msg

----- Begin Data Type:HTTP Request [15]

Length: 76 -----

47 45 54 20 2f 63 67 69 2d 62 69 6e 2f 70 6b 69 | GET /cgi-bin/pki

63 6c 69 65 6e 74 2e 65 78 65 3f 6f 70 65 72 61 | client.exe?opera

74 69 6f 6e 3d 47 65 74 43 52 4c 20 48 54 54 50 | tion=GetCRL HTTP

2f 31 2e 30 0d 0a 48 6f192.0.2.10 73 74 3a 20 31 39 32 2e | /1.0..Host: 192.

31 38 31 2e 33 2e 31 30 0d 0a 0d 0a | 0.2.10....

----- End Data Type:HTTP Request [15]

Length: 76 -----

PKI[8]: [15] Sent 76 bytes

PKI[8]: [15] Received Socket read ready msg

PKI[8]: [15] read 662 bytes

PKI[8]: [15] Read EOF

PKI[12]: pki_io_cbfunc, pki_crl_fsm_act.c:59

PKI[7]: Callback received for vcid: 0, sess_id: 0x06c8d45f, cert_idx: 0, status: IO_STATUS_OK(1), datalen: 662

PKI[13]: get_fsm_data, pki_ossl_revocation.c:446

PKI[7]: [15] IOCB freed

PKI[13]: CERT_API_QueueFSMEvent, vpn3k_cert_api.c:137

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: CERT API thread wakes up!

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=2, session=0x06c8d45f

PKI[9]: Async locked for session 0x06c8d45f

PKI[11]: pki_notify_fsm_evt, pki_ossl_revocation.c:56

PKI[11]: drive_fsm, pki_ossl_revocation.c:33

PKI[8]: [Sess: 0x06c8d45f, Cert: 0] FSM: In PKICRL_ProcessResp

PKI[13]: pki_ossl_util_find_http_payload, pki_ossl_utils.c:36

PKI[8]: Received CRL of length 249 for session 0x06c8d45f, cert idx 0

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_crl_add_to_cache, pki_ossl_crl_cache.c:1177

PKI[12]: pki_ossl_crypto_verify_and_insert_crl, pki_ossl_crl_cache.c:1126

PKI[12]: pki_ossl_insert_der_crl_int, pki_ossl_crl_cache.c:1017

PKI[8]: Inserting CRL

PKI[14]: pki_ossl_get_crl_summary, pki_ossl.c:151

PKI[8]: ---------CRL--------:

Certificate Revocation List (CRL):

Version 1 (0x0)

Signature Algorithm: sha1WithRSAEncryption

Issuer: /O=cisco/OU=TAC/CN=calo_root

Last Update: Sep 24 22:18:38 2023 GMT

Next Update: Sep 25 00:18:38 2023 GMT

No Revoked Certificates.

[..outout ommitted]

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x06c8d45f, cert 0 has rev_status 3, using methods 1/3/0 at index 0

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 1, revoked: 0, error: 0, pending: 0, fail-allow: 0

PKI[7]: session: 0x06c8d45f, all revocation processing complete

PKI[5]: session: 0x06c8d45f, CRL for certificate 0 has been cached

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: pki_ossl_crl_add_cache_to_store, pki_ossl_crl_cache.c:1396

PKI[9]: OSSL certstore updated with 0 certs, 1 CRLs and 0 policies, 0 certs added to stack

PKI[7]: session 0x06c8d45f, Starting chain validation with cached CRL checking

PKI[12]: pki_ossl_find_valid_chain, pki_ossl_validate.c:472

PKI[9]: Begin sorted cert chain

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[9]: End sorted cert chain

PKI[13]: pki_ossl_get_store, pki_ossl_certstore.c:61

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: Cert to verify

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /O=cisco/OU=TAC/CN=calo_root. ctx->error: (0)ok, cert_idx: 1

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (0)ok, cert_idx: 0

PKI[8]: pki_ossl_find_valid_chain took 167 microsecs

PKI[7]: session 0x06c8d45f, Validation with CRL checking completed, status 0

PKI[7]: session 0x06c8d45f, Revocation check complete, no revoked certs found

PKI[12]: pki_ossl_do_callback, pki_ossl_validate.c:164

PKI[13]: CERT_Close, vpn3k_cert_api.c:291

PKI[8]: Close session 0x06c8d45f asynchronously

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: Async unlocked for session 0x06c8d45f

PKI[8]: No IOCB found for SOCKET CLOSE message, handle 0x5dba666

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=1, session=0x06c8d45f

PKI[9]: Async locked for session 0x06c8d45f

PKI[9]: Async unlocked for session 0x06c8d45f

PKI[13]: pki_ossl_free_valctx, pki_ossl_validate.c:251

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[9]: CERT API thread sleeps!

PKI[13]: CERT_GetGroupFromSSLRule, vpn3k_cert_api.c:1672

La capture FTD suivante affiche la transaction HTTP entre le FTD et le CDP (serveur AC dans ce cas) afin de récupérer la liste de révocation de certificats.

Scénario 2. Le certificat est révoqué et l’authentification échoue

Un certificat d'identité est révoqué sur le serveur AC et enregistré dans le fichier de base de données CRL. Cependant, la liste de révocation de certificats mise à jour n'est pas disponible pour le FTD tant que la liste de révocation de certificats actuelle n'expire pas (configurée pour être valide pendant deux heures).

CA-router#show crypto pki server CAS crl

Certificate Revocation List:

Issuer: cn=calo_root,ou=TAC,o=cisco

This Update: 22:18:38 UTC Sep 24 2023

Next Update: 00:18:38 UTC Sep 25 2023

Number of CRL entries: 0

CRL size: 249 bytes

CA-router#show crypto pki server CAS certificates

Serial Issued date Expire date Subject Name

1 20:18:36 UTC Sep 24 2023 20:18:36 UTC Jun 20 2026 cn=calo_root ou=TAC o=cisco

2 20:19:33 UTC Sep 24 2023 20:19:33 UTC Jul 20 2024 hostname=CA-router cn=desktop.example.com

3 23:50:58 UTC Sep 24 2023 23:50:58 UTC Jul 20 2024 cn=test.cisco.com

CA-router#crypto pki server CAS revoke 0x2

% Certificate 02 succesfully revoked.

CA-router#show crypto pki server CAS crl

Certificate Revocation List:

Issuer: cn=calo_root,ou=TAC,o=cisco

This Update: 23:59:32 UTC Sep 24 2023

Next Update: 01:59:32 UTC Sep 25 2023

Number of CRL entries: 1

CRL size: 272 bytes

Revoked Certificates:

Serial Number (hex): 02

Revocation Date: 23:59:32 UTC Sep 24 2023

Lors d'une nouvelle tentative de connexion après la confirmation de l'expiration de la liste de révocation de certificats, l'inspection de certificat est généralement identique au scénario précédent. La nouvelle liste de révocation de certificats est demandée une fois que le FTD a confirmé l'absence de liste de révocation de certificats dans le cache. À la réception de la nouvelle liste de révocation de certificats, le FTD vérifie si le numéro de série du certificat d’identité fait partie de la liste. Le numéro de série est marqué comme révoqué et le FTD continue à refuser l'accès à l'utilisateur.

CRYPTO_PKI: bitValue of KEY_USAGE = a0PKI[7]: CRYPTO_PKI:check_key_usage: Checking KU for case VPN peer certs.

PKI[7]: CRYPTO_PKI:check_key_usage: KU bit digitalSignature is ON.

PKI[7]: ExtendedKeyUsage OID = serverAuth NOT acceptable for usage type SSL VPN Peer

PKI[7]: ExtendedKeyUsage OID = clientAuth acceptable for usage type: SSL VPN Peer

PKI[7]: check_key_usage:Extended Key/Key Usage check OK

PKI[12]: pki_ossl_revocation_check, pki_ossl_validate.c:931

PKI[7]: Starting revocation check for session 0x0dc288f9

PKI[12]: pki_init_revocation, pki_ossl_revocation.c:162

PKI[12]: pki_ossl_eval_revocation, pki_ossl_validate.c:699

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x0dc288f9, cert 0 has rev_status 0, using methods 1/3/0 at index 0

PKI[12]: cert_revoc_exempt, pki_ossl_revocation.c:250

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[13]: pki_crl_cached, pki_ossl_crl_cache.c:1351

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_check_cache, pki_ossl_crl_cache.c:1269

PKI[7]: Starting OSSL CRL cache check.

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[9]: Attempting to find cached CRL for CDP http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_SelectCRLByIssuerTimeDER, pki_ossl_crl_cache.c:1219

PKI[14]: pki_ossl_get_name_string, pki_ossl.c:315

PKI[9]: Select DER crl(O=cisco, OU=TAC, CN=calo_root)

PKI[12]: pki_ossl_get_crl_internal, pki_ossl_crl_cache.c:506

PKI[7]: CRL not cached. Initiating CRL download for cert idx 0.

PKI[12]: do_get_crl, pki_ossl_revocation.c:85

PKI[9]: starting CRL FSM #0

PKI[11]: drive_fsm, pki_ossl_revocation.c:33

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_InitTransaction

PKI[12]: get_cdps, pki_crl_fsm_act.c:202

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[7]: cdp: (len=58, type=URI, prot=HTTP) http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_InitTransaction, Return status: 0

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_NextCDP

PKI[12]: crldl_cdp_blacklisted, pki_ossl_crl.c:1374

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[7]: CDP is not blacklisted

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_NextCDP, Return status: 0

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_Request

PKI[13]: crldp_download_pending, pki_ossl_crl.c:1184

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[8]: session 0x0dc288f9 adding pending CRL entry for cert 0

PKI[12]: crldp_add_pending_download, pki_ossl_crl.c:1203

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: retrieve_crl, pki_crl_fsm_act.c:233

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[7]: CDP type HTTP

PKI[7]: getting http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_crl_build_http_io, pki_ossl_crl.c:1017

PKI[13]: pki_parse_uri, pki_ossl_uri.c:75

PKI[14]: pki_uri_map_protocol, pki_ossl_uri.c:17

PKI[14]: pki_uri_get_port, pki_ossl_uri.c:34

PKI[13]: pki_free_uri, pki_ossl_uri.c:57

PKI[11]: pki_crl_request_send_async, pki_ossl_crl.c:627

PKI[8]: [16] IOCB allocated

PKI[7]: PKI CRL I/O request queue result: IO_STATUS_QUEUED

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_Request, Return status: 0

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 0, revoked: 0, error: 0, pending: 1, fail-allow: 0

PKI[9]: Async unlocked for session 0x0dc288f9

PKI[8]: [16] Received IO request msg

PKI[8]: [16] DNS resolve issued for 192.0.2.10

PKI[9]: CERT API thread sleeps!

PKI[7]: [16] DNS resolve 192.0.2.10 (192.0.2.10)

PKI[8]: [16] Socket open success

PKI[8]: [16] IPv4 Route lookup to 192.0.2.10 use interface outside

PKI[8]: [16] Connect sent to 192.0.2.10 from 192.0.2.1

PKI[12]: pki_io_cbfunc_log_revocation_check, pki_ossl_revocation.c:421

PKI[7]: 6717056: Attempting CRL revocation check from outside:192.0.2.1/27791 to 192.0.2.10/80 using HTTP.

PKI[8]: [16] Received Socket transmit ready msg

----- Begin Data Type:HTTP Request [16]

Length: 76 -----

47 45 54 20 2f 63 67 69 2d 62 69 6e 2f 70 6b 69 | GET /cgi-bin/pki

63 6c 69 65 6e 74 2e 65 78 65 3f 6f 70 65 72 61 | client.exe?opera

74 69 6f 6e 3d 47 65 74 43 52 4c 20 48 54 54 50 | tion=GetCRL HTTP

2f 31 2e 30 0d 0a 48 6f 73 74 3a 20 31 39 32 2e | /1.0..Host: 192.

31 38 31 2e 33 2e 31 30 0d 0a 0d 0a | 0.2.10....

----- End Data Type:HTTP Request [16]

Length: 76 -----

PKI[8]: [16] Sent 76 bytes

PKI[8]: [16] Received Socket read ready msg

PKI[8]: [16] read 685 bytes

PKI[8]: [16] Read EOF

PKI[12]: pki_io_cbfunc, pki_crl_fsm_act.c:59

PKI[7]: Callback received for vcid: 0, sess_id: 0x0dc288f9, cert_idx: 0, status: IO_STATUS_OK(1), datalen: 685

PKI[13]: get_fsm_data, pki_ossl_revocation.c:446

PKI[7]: [16] IOCB freed

PKI[13]: CERT_API_QueueFSMEvent, vpn3k_cert_api.c:137

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: CERT API thread wakes up!

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=2, session=0x0dc288f9

PKI[9]: Async locked for session 0x0dc288f9

PKI[11]: pki_notify_fsm_evt, pki_ossl_revocation.c:56

PKI[11]: drive_fsm, pki_ossl_revocation.c:33

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_ProcessResp

PKI[13]: pki_ossl_util_find_http_payload, pki_ossl_utils.c:36

PKI[8]: Received CRL of length 272 for session 0x0dc288f9, cert idx 0

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_crl_add_to_cache, pki_ossl_crl_cache.c:1177

PKI[12]: pki_ossl_crypto_verify_and_insert_crl, pki_ossl_crl_cache.c:1126

PKI[12]: pki_ossl_insert_der_crl_int, pki_ossl_crl_cache.c:1017

PKI[8]: Inserting CRL

PKI[14]: pki_ossl_get_crl_summary, pki_ossl.c:151

PKI[8]: ---------CRL--------:

Certificate Revocation List (CRL):

Version 1 (0x0)

Signature Algorithm: sha1WithRSAEncryption

Issuer: /O=cisco/OU=TAC/CN=calo_root

Last Update: Sep 25 00:18:09 2023 GMT

Next Update: Sep 25 02:18:09 2023 GMT

Number of Revoked Certificates: 1

PKI[12]: asn1_to_unix_time, crypto_pki.c:1735

PKI[12]: asn1_to_unix_time, crypto_pki.c:1735

PKI[12]: pki_ossl_crypto_certc_insert_CRL, pki_ossl_crl_cache.c:735

PKI[7]: CRL: current time is 1695601164

PKI[7]: CRL: nextupdate time is 1695608289

PKI[7]: CRL: lastupdate time is 1695601089

PKI[7]: set CRL update timer with delay: 7125

PKI[12]: pki_ossl_get_crl_internal, pki_ossl_crl_cache.c:506

PKI[7]: the current device time: 00:19:24 UTC Sep 25 2023

PKI[7]: the last CRL update time: 00:18:09 UTC Sep 25 2023

PKI[7]: the next CRL update time: 02:18:09 UTC Sep 25 2023

PKI[7]: CRL cache delay being set to: 3600000

PKI[14]: pki_ossl_set_crl_store_dirty, pki_ossl_crl_cache.c:1441

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: crldl_notify_result, pki_ossl_crl.c:1304

PKI[12]: crl_find_pending_crl, pki_ossl_crl.c:1155

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[14]: cmp_cdp_info, pki_ossl_crl.c:1121

PKI[13]: get_pending_crl_list, pki_ossl_crl.c:1101

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_ProcessResp, Return status: 0

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: In PKICRL_Callback

PKI[12]: rev_cb, pki_ossl_validate.c:902

PKI[7]: revocation status queued for session 0x0dc288f9 and cert_idx 0, rev_status 3

PKI[13]: CERT_API_QueueFSMResp, vpn3k_cert_api.c:158

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[8]: [Sess: 0x0dc288f9, Cert: 0] FSM: PKICRL_Callback, Return status: 0

PKI[9]: Async unlocked for session 0x0dc288f9

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=3, session=0x0dc288f9

PKI[9]: Async locked for session 0x0dc288f9

PKI[12]: pki_ossl_eval_revocation, pki_ossl_validate.c:699

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x0dc288f9, cert 0 has rev_status 3, using methods 1/3/0 at index 0

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 1, revoked: 0, error: 0, pending: 0, fail-allow: 0

PKI[7]: session: 0x0dc288f9, all revocation processing complete

PKI[5]: session: 0x0dc288f9, CRL for certificate 0 has been cached

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[12]: pki_ossl_crl_add_cache_to_store, pki_ossl_crl_cache.c:1396

PKI[9]: OSSL certstore updated with 0 certs, 1 CRLs and 0 policies, 0 certs added to stack

PKI[7]: session 0x0dc288f9, Starting chain validation with cached CRL checking

PKI[12]: pki_ossl_find_valid_chain, pki_ossl_validate.c:472

PKI[9]: Begin sorted cert chain

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)<<<<<<<<<<<<<<<<<<<

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[9]: End sorted cert chain

PKI[13]: pki_ossl_get_store, pki_ossl_certstore.c:61

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: Cert to verify

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[6]: val status=0: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (23)certificate revoked, cert_idx: 0<<<<<<<<<<<<<<<<<

PKI[14]: is_crl_error, pki_ossl_validate.c:278

PKI[14]: is_crl_error, pki_ossl_validate.c:278

PKI[4]: Certificate verification error: certificate revoked<<<<<<<<<<<<<<<<<<<

PKI[14]: map_ossl_error, pki_ossl_validate.c:62

PKI[7]: session 0x0dc288f9, Validation with CRL checking completed, status 15

PKI[5]: session 0x0dc288f9, Error in revocation check or revoked certs found

PKI[12]: pki_ossl_do_callback, pki_ossl_validate.c:164

PKI[13]: CERT_Close, vpn3k_cert_api.c:291

PKI[8]: Close session 0x0dc288f9 asynchronously

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: Async unlocked for session 0x0dc288f9

PKI[8]: No IOCB found for SOCKET CLOSE message, handle 0x1a6b367e

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=1, session=0x0dc288f9

PKI[9]: Async locked for session 0x0dc288f9

PKI[9]: Async unlocked for session 0x0dc288f9

PKI[13]: pki_ossl_free_valctx, pki_ossl_validate.c:251

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[9]: CERT API thread sleeps!

[..output ommitted]

PKI[7]: Cert to verify

PKI[7]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /O=cisco/OU=TAC/CN=calo_root. ctx->error: (0)ok, cert_idx: 1

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[8]: val status=1: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (0)ok, cert_idx: 0

PKI[8]: pki_ossl_find_valid_chain took 233 microsecs

PKI[6]: Verified chain:

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[6]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[6]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

[..ooutput ommitted]

CRYPTO_PKI: bitValue of KEY_USAGE = a0PKI[7]: CRYPTO_PKI:check_key_usage: Checking KU for case VPN peer certs.

PKI[7]: CRYPTO_PKI:check_key_usage: KU bit digitalSignature is ON.

PKI[7]: ExtendedKeyUsage OID = serverAuth NOT acceptable for usage type SSL VPN Peer

PKI[7]: ExtendedKeyUsage OID = clientAuth acceptable for usage type: SSL VPN Peer

PKI[7]: check_key_usage:Extended Key/Key Usage check OK

PKI[12]: pki_ossl_revocation_check, pki_ossl_validate.c:931

PKI[7]: Starting revocation check for session 0x1acca1bd

PKI[12]: pki_init_revocation, pki_ossl_revocation.c:162

PKI[12]: pki_ossl_eval_revocation, pki_ossl_validate.c:699

PKI[7]: Evaluating session revocation status, 1 certs to check

PKI[8]: session 0x1acca1bd, cert 0 has rev_status 0, using methods 1/3/0 at index 0

PKI[12]: cert_revoc_exempt, pki_ossl_revocation.c:250

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[13]: pki_crl_cached, pki_ossl_crl_cache.c:1351

PKI[13]: get_tp_from_policy, pki_ossl_policy_transition.c:230

PKI[11]: polinfo->name: CRL-AC

PKI[11]: tp label: Trustpool

PKI[13]: label: CRL-AC

PKI[12]: pki_ossl_check_cache, pki_ossl_crl_cache.c:1269

PKI[7]: Starting OSSL CRL cache check.

PKI[12]: pki_ossl_crypto_build_crldp_list, pki_ossl_crl_cache.c:326

PKI[12]: pki_get_der_cdp_ext, crypto_pki.c:1528

PKI[14]: url_type_allowed, pki_ossl_crl_cache.c:153

PKI[9]: Attempting to find cached CRL for CDP http://192.0.2.10/cgi-bin/pkiclient.exe?operation=GetCRL

PKI[12]: pki_ossl_SelectCRLByIssuerTimeDER, pki_ossl_crl_cache.c:1219

PKI[14]: pki_ossl_get_name_string, pki_ossl.c:315

PKI[9]: Select DER crl(O=cisco, OU=TAC, CN=calo_root)

PKI[12]: pki_ossl_get_crl_internal, pki_ossl_crl_cache.c:506

PKI[13]: is_crl_dst, pki_ossl_crl_cache.c:479

PKI[7]: CRL for cert idx 0 found in cache

PKI[7]: Chain revocation status: good: 0, exempt: 0, cached: 1, revoked: 0, error: 0, pending: 0, fail-allow: 0

PKI[7]: session: 0x1acca1bd, all revocation processing complete

PKI[5]: session: 0x1acca1bd, CRL for certificate 0 has been cached

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[7]: session 0x1acca1bd, Starting chain validation with cached CRL checking

PKI[12]: pki_ossl_find_valid_chain, pki_ossl_validate.c:472

PKI[9]: Begin sorted cert chain

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 1 (0x1)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: O=cisco, OU=TAC, CN=calo_root

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[9]: End sorted cert chain

PKI[13]: pki_ossl_get_store, pki_ossl_certstore.c:61

PKI[12]: pki_ossl_rebuild_ca_store, pki_ossl_certstore.c:194

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[13]: crypto_pki_get_ossl_env, pki_ossl.c:42

PKI[14]: pki_ossl_get_cert_summary, pki_ossl.c:119

PKI[9]: Cert to verify

PKI[9]: ---------Certificate--------:

Serial Number: 2 (0x2)

Issuer: O=cisco, OU=TAC, CN=calo_root

Subject: CN=desktop.example.com/unstructuredName=CA-router

PKI[12]: pki_verify_cb, pki_ossl_validate.c:358

PKI[6]: val status=0: cert subject: /CN=desktop.example.com/unstructuredName=CA-router. ctx->error: (23)certificate revoked, cert_idx: 0

PKI[14]: is_crl_error, pki_ossl_validate.c:278

PKI[14]: is_crl_error, pki_ossl_validate.c:278

PKI[4]: Certificate verification error: certificate revoked

PKI[14]: map_ossl_error, pki_ossl_validate.c:62

PKI[7]: session 0x1acca1bd, Validation with CRL checking completed, status 15

PKI[5]: session 0x1acca1bd, Error in revocation check or revoked certs found

PKI[12]: pki_ossl_do_callback, pki_ossl_validate.c:164

PKI[13]: CERT_Close, vpn3k_cert_api.c:291

PKI[8]: Close session 0x1acca1bd asynchronously

PKI[13]: CERT_API_req_enqueue, vpn3k_cert_api.c:2913

PKI[9]: Async unlocked for session 0x1acca1bd

PKI[12]: CERT_API_Q_Process, vpn3k_cert_api.c:2811

PKI[12]: CERT_API_process_req_msg, vpn3k_cert_api.c:2746

PKI[8]: process msg cmd=1, session=0x1acca1bd

PKI[9]: Async locked for session 0x1acca1bd

PKI[9]: Async unlocked for session 0x1acca1bd

PKI[13]: pki_ossl_free_valctx, pki_ossl_validate.c:251

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[13]: free_fsm_data, pki_ossl_revocation.c:225

PKI[13]: ocsp_free_fsmdata, pki_ossl_ocsp.c:1462

PKI[9]: CERT API thread sleeps!

La capture FTD suivante affiche la transaction HTTP entre le FTD et le CDP afin de récupérer la liste de révocation de certificats maintenant qu'un certificat révoqué est stocké dans la liste.

Dépannage

Ces commandes peuvent être utilisées afin d'identifier d'autres problèmes liés aux certificats :

- Sur le FTD :

debug crypto ca 14

- Sur le routeur CA :

debug crypto pki API

debug crypto pki callbacks

debug crypto pki messages

debug crypto pki validation

debug crypto pki error

debug crypto pki server

debug crypto pki transactions