Table des matières

Introduction

Conditions préalables

Exigences

Composants utilisés

Informations générales

Problème

Syslogs et sortie de débogage

Solution

Vérifier

Modification du certificat CA racine - Octobre 2018

Plates-formes 4100/9300 exécutant ASA

Étapes de résolution

Installations logicielles ASA nécessitant la conformité aux normes FIPS (Federal Information Processing Standards)

Informations connexes

Introduction

Ce document décrit comment déterminer les échecs de licences Smart ASA qui sont dus à un échec de connexion de certificat.

Conditions préalables

Exigences

Aucune exigence spécifique n'est associée à ce document.

Composants utilisés

Ce document n'est pas limité à des versions de matériel et de logiciel spécifiques.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Si votre réseau est en ligne, assurez-vous de bien comprendre l’incidence possible des commandes.

Informations générales

Ce document décrit comment traiter une modification qui s'est produite en mars 2016 et en octobre 2018, dans laquelle les serveurs Web qui hébergent tools.cisco.com ont été migrés vers un certificat d'autorité de certification (CA) racine différent. Après cette migration, certains périphériques ASA (Adaptive Security Appliance) ne parviennent pas à se connecter au portail Smart Software Licensing Portal (hébergé sur tools.cisco.com) lorsqu'ils enregistrent un jeton d'identification ou lorsqu'ils tentent de renouveler les autorisations actuelles. Il a été déterminé qu'il s'agissait d'un problème lié au certificat. Plus précisément, le nouveau certificat qui est présenté à l'ASA est signé par une autorité de certification intermédiaire différente de celle attendue par l'ASA et a été préchargé.

Problème

Lorsqu'une tentative d'enregistrement d'un ASAv sur le portail de licences logicielles Smart échoue, l'enregistrement échoue avec un échec de connexion ou de communication. Les commandes show license registration et call-home test profile license affichent ces résultats.

ASAv# show license registration

Registration Status: Retry In Progress.

Registration Start Time: Mar 22 13:25:46 2016 UTC

Registration Status: Retry In Progress.

Registration Start Time: Mar 22 13:25:46 2016 UTC

Last Retry Start Time: Mar 22 13:26:32 2016 UTC.

Next Scheduled Retry Time: Mar 22 13:45:31 2016 UTC.

Number of Retries: 1.

Last License Server response time: Mar 22 13:26:32 2016 UTC.

Last License Server response message: Communication message send response error

ASAv# call-home test profile License

INFO: Sending test message to DDCEService

ERROR: Failed: CONNECT_FAILED(35)

Cependant, ASAv peut résoudre tools.cisco.com et se connecter sur le port TCP 443 avec une requête ping TCP.

Syslogs et sortie de débogage

La sortie Syslog sur ASAv après une tentative d'enregistrement peut montrer ceci :

%ASA-3-717009: Certificate validation failed. No suitable trustpoints found to validate

certificate serial number: 250CE8E030612E9F2B89F7058FD, subject name:

cn=VeriSign Class 3 Public Primary Certification Authority - G5,ou=(c) 2006 VeriSign\, Inc.

- For authorized use only,ou=VeriSign Trust Network,o=VeriSign\, Inc.,c=US, issuer name:

ou=Class 3 Public Primary Certification Authority,o=VeriSign\, Inc.,c=US .

%ASA-3-717009: Certificate validation failed. No suitable trustpoints found to validate

certificate serial number: 513FB9743870B73440418699FF, subject name:

cn=Symantec Class 3 Secure Server CA - G4,ou=Symantec Trust Network,o=Symantec

Corporation,c=US, issuer name: cn=VeriSign Class 3 Public Primary Certification Authority

- G5,ou=(c) 2006 VeriSign\, Inc. - For authorized use only,ou=VeriSign Trust Network,

o=VeriSign\, Inc.,c=US .

Pour plus d'informations, exécutez ces commandes de débogage pendant que vous tentez une autre inscription. Des erreurs Secure Socket Layer sont détectées.

debug license 255

debug license agent all

debug call-home all

debug ssl 255

Plus précisément, ce message est considéré comme faisant partie de cette sortie :

error:14090086:SSL routines:SSL3_GET_SERVER_CERTIFICATE:certificate verify

failed@s3_clnt.c:1492

Dans la configuration ASAv par défaut, il y a un point de confiance appelé _SmartCallHome_ServerCA qui a un certificat chargé et émis pour le nom de sujet "cn=Verisign Class 3 Secure Server CA - G3".

ASAv# show crypto ca certificate

CA Certificate

Status: Available

Certificate Serial Number: 6ecc7aa5a7032009b8cebc2d491

Certificate Usage: General Purpose

Public Key Type: RSA (2048 bits)

Signature Algorithm: SHA1 with RSA Encryption

Issuer Name:

cn=VeriSign Class 3 Public Primary Certification Authority - G5

ou=(c) 2006 VeriSign\, Inc. - For authorized use only

ou=VeriSign Trust Network

o=VeriSign\, Inc.

c=US

Subject Name:

cn=VeriSign Class 3 Secure Server CA - G3

ou=Terms of use at https:// verisign /rpa (c)10

ou=VeriSign Trust Network

o=VeriSign\, Inc.

c=US

OCSP AIA:

URL: http://ocsp verisign

CRL Distribution Points:

[1]  http://crl verisign/pca3-g5.crl

Validity Date:

start date: 00:00:00 UTC Feb 8 2010

end   date: 23:59:59 UTC Feb 7 2020

Associated Trustpoints: _SmartCallHome_ServerCA

Cependant, dans les syslogs précédents, l'ASA indique qu'il obtient un certificat du portail Smart Software Licensing Portal signé par un intermédiaire appelé "cn=Symantec Class 3 Secure Server CA - G4".

Remarque : les noms des sujets sont similaires, mais ils présentent deux différences : Verisign vs Symantec au début et G3 vs G4 à la fin.

Solution

ASAv doit télécharger un pool de confiance qui contient les certificats intermédiaires et/ou racine appropriés afin de valider la chaîne.

Dans les versions 9.5.2 et ultérieures, le pool de confiance de l'ASAv est configuré pour l'importation automatique à 22:00 heure locale du périphérique :

ASAv# sh run crypto ca trustpool

crypto ca trustpool policy

auto-import

ASAv# sh run all crypto ca trustpool

crypto ca trustpool policy

revocation-check none

crl cache-time 60

crl enforcenextupdate

auto-import

auto-import url http://www.cisco.com/security/pki/trs/ios_core.p7b

auto-import time 22:00:00

S'il s'agit d'une installation initiale et que les recherches DNS (Domain Name System) et la connectivité Internet n'ont pas encore été activées, l'importation automatique n'a pas réussi et doit être effectuée manuellement.

Sur les versions antérieures, telles que 9.4.x, l'importation automatique trustpool n'est pas configurée sur le périphérique et doit être importée manuellement.

Quelle que soit la version, cette commande importe le pool de confiance et les certificats appropriés :

ASAv# crypto ca trustpool import url http://www.cisco.com/security/pki/trs/ios_core.p7b

Root file signature verified.

You are about to update the current trusted certificate pool

with the 17145 byte file at http://www.cisco.com/security/pki/trs/ios_core.p7b

Do you want to continue? (y/n)

Trustpool import:

attempted:  14

installed:  14

duplicates: 0

expired:    0

failed:     0

Vérifier

Une fois que le pool de confiance est importé soit par la commande manuelle, soit après 22h00, heure locale, cette commande vérifie qu'il y a des certificats installés dans le pool de confiance :

ASAv# show crypto ca trustpool policy

14 trustpool certificates installed

Trustpool auto import statistics:

Last import result: FAILED

Next scheduled import at 22:00:00 UTC Wed Mar 23 2016

Trustpool Policy

Trustpool revocation checking is disabled

CRL cache time: 60 seconds

CRL next update field: required and enforced

Automatic import of trustpool certificates is enabled

Automatic import URL: http://www.cisco.com/security/pki/trs/ios_core.p7b

Download time: 22:00:00

Policy Overrides:

None configured

Remarque : dans la sortie précédente, la dernière importation de mise à jour automatique a échoué car le DNS n'était pas opérationnel la dernière fois qu'il a tenté automatiquement, de sorte qu'il affiche toujours le dernier résultat d'importation automatique comme ayant échoué. Cependant, une mise à jour manuelle du pool de confiance a été exécutée et a réussi à mettre à jour le pool de confiance (c'est pourquoi il affiche 14 certificats installés).

Une fois le pool de confiance installé, la commande d'enregistrement de jeton peut être exécutée à nouveau afin d'enregistrer l'ASAv avec le portail de licences logicielles Smart.

ASAv# license smart register idtoken id_token force

Si l'ASAv a déjà été enregistré sur le portail de gestion des licences Smart Software, mais que les renouvellements d'autorisation ont échoué, ces tentatives peuvent également être effectuées manuellement.

ASAv# license smart renew auth

Modification du certificat CA racine - Octobre 2018

Le certificat d'autorité de certification racine pour tools.cisco.com a été modifié le vendredi 5 octobre 2018.

Les versions 9.6(2) et ultérieures de l'appliance ASAv actuellement déployée et l'appliance ASA exécutant Firepower 2100 ne peuvent pas être affectées par cette modification si la communication vers http://www.cisco.com/security/pki/trs/ios_core.p7b n'est pas autorisée.  Il existe une fonction d'importation automatique de certificat qui est activée par défaut sur toutes les plates-formes ASA sous licence Smart mentionnées ci-dessus.  La sortie de « show crypto ca trustpool » contient le certificat « QuoVadis Root CA 2 » :

CA Certificate

Fingerprint: 5e397bddf8baec82e9ac62ba0c54002b

Issuer Name:

cn=QuoVadis Root CA 2

o=QuoVadis Limited

c=BM

Subject Name:

cn=QuoVadis Root CA 2

o=QuoVadis Limited

c=BM

Pour les nouveaux déploiements, vous pouvez exécuter la commande « crypto ca trustpool import default » et télécharger l'ensemble de certificats Cisco par défaut qui contient le certificat QuoVadis.  Si cela ne fonctionne pas, vous pouvez installer le certificat manuellement :

asa(config)# crypto ca trustpoint QuoVadisRootCA2

asa(config-ca-trustpoint)# enrollment terminal

asa(config-ca-trustpoint)# crl configure

asav(config-ca-crl)# crypto ca authenticate QuoVadisRootCA2

Enter the base 64 encoded CA certificate.

End with the word "quit" on a line by itself

-----BEGIN CERTIFICATE-----

MIIFtzCCA5+gAwIBAgICBQkwDQYJKoZIhvcNAQEFBQAwRTELMAkGA1UEBhMCQk0x

GTAXBgNVBAoTEFF1b1ZhZGlzIExpbWl0ZWQxGzAZBgNVBAMTElF1b1ZhZGlzIFJv

b3QgQ0EgMjAeFw0wNjExMjQxODI3MDBaFw0zMTExMjQxODIzMzNaMEUxCzAJBgNV

BAYTAkJNMRkwFwYDVQQKExBRdW9WYWRpcyBMaW1pdGVkMRswGQYDVQQDExJRdW9W

YWRpcyBSb290IENBIDIwggIiMA0GCSqGSIb3DQEBAQUAA4ICDwAwggIKAoICAQCa

GMpLlA0ALa8DKYrwD4HIrkwZhR0In6spRIXzL4GtMh6QRr+jhiYaHv5+HBg6XJxg

Fyo6dIMzMH1hVBHL7avg5tKifvVrbxi3Cgst/ek+7wrGsxDp3MJGF/hd/aTa/55J

WpzmM+Yklvc/ulsrHHo1wtZn/qtmUIttKGAr79dgw8eTvI02kfN/+NsRE8Scd3bB

rrcCaoF6qUWD4gXmuVbBlDePSHFjIuwXZQeVikvfj8ZaCuWw419eaxGrDPmF60Tp

+ARz8un+XJiM9XOva7R+zdRcAitMOeGylZUtQofX1bOQQ7dsE/He3fbE+Ik/0XX1

ksOR1YqI0JDs3G3eicJlcZaLDQP9nL9bFqyS2+r+eXyt66/3FsvbzSUr5R/7mp/i

Ucw6UwxI5g69ybR2BlLmEROFcmMDBOAENisgGQLodKcftslWZvB1JdxnwQ5hYIiz

PtGo/KPaHbDRsSNU30R2be1B2MGyIrZTHN81Hdyhdyox5C315eXbyOD/5YDXC2Og

/zOhD7osFRXql7PSorW+8oyWHhqPHWykYTe5hnMz15eWniN9gqRMgeKh0bpnX5UH

oycR7hYQe7xFSkyyBNKr79X9DFHOUGoIMfmR2gyPZFwDwzqLID9ujWc9Otb+fVuI

yV77zGHcizN300QyNQliBJIWENieJ0f7OyHj+OsdWwIDAQABo4GwMIGtMA8GA1Ud

EwEB/wQFMAMBAf8wCwYDVR0PBAQDAgEGMB0GA1UdDgQWBBQahGK8SEwzJQTU7tD2

A8QZRtGUazBuBgNVHSMEZzBlgBQahGK8SEwzJQTU7tD2A8QZRtGUa6FJpEcwRTEL

MAkGA1UEBhMCQk0xGTAXBgNVBAoTEFF1b1ZhZGlzIExpbWl0ZWQxGzAZBgNVBAMT

ElF1b1ZhZGlzIFJvb3QgQ0EgMoICBQkwDQYJKoZIhvcNAQEFBQADggIBAD4KFk2f

BluornFdLwUvZ+YTRYPENvbzwCYMDbVHZF34tHLJRqUDGCdViXh9duqWNIAXINzn

g/iN/Ae42l9NLmeyhP3ZRPx3UIHmfLTJDQtyU/h2BwdBR5YM++CCJpNVjP4iH2Bl

fF/nJrP3MpCYUNQ3cVX2kiF495V5+vgtJodmVjB3pjd4M1IQWK4/YY7yarHvGH5K

WWPKjaJW1acvvFYfzznB4vsKqBUsfU16Y8Zsl0Q80m/DShcK+JDSV6IZUaUtl0Ha

B0+pUNqQjZRG4T7wlP0QADj1O+hA4bRuVhogzG9Yje0uRY/W6ZM/57Es3zrWIozc

hLsib9D45MY56QSIPMO661V6bYCZJPVsAfv4l7CUW+v90m/xd2gNNWQjrLhVoQPR

TUIZ3Ph1WVaj+ahJefivDrkRoHy3au000LYmYjgahwz46P0u05B/B5EqHdZ+XIWD

mbA4CD/pXvk1B+TJYm5Xf6dQlfe6yJvmjqIBxdZmv3lh8zwc4bmCXF2gw+nYSL0Z

ohEUGW6yhhtoPkg3Goi3XZZenMfvJ2II4pEZXNLxId26F0KCl3GBUzGpn/Z9Yr9y

4aOTHcyKJloJONDO1w2AFrR4pTqHTI2KpdVGl/IsELm8VCLAAVBpQ570su9t+Oza

8eOx79+Rj1QqCyXBJhnEUhAFZdWCEOrCMc0u

-----END CERTIFICATE-----

quit

INFO: Certificate has the following attributes:

Fingerprint:     5e397bdd f8baec82 e9ac62ba 0c54002b

Do you accept this certificate? [yes/no]: yes

Trustpoint CA certificate accepted.

% Certificate successfully imported

Plates-formes 4100/9300 exécutant ASA

Ce problème a affecté certains 4100/9300 sur le terrain qui exécutent ASA qui s'appuie sur Firepower eXtensible Operating System (FXOS) pour fournir des informations sur les licences Smart :

Unité concernée :

FP9300-1-A-A-A /license # show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: REGISTERED

Smart Account: TAC Cisco Systems, Inc.

Virtual Account: CALO

Export-Controlled Functionality: Allowed

Initial Registration: SUCCEEDED on Jul 01 18:37:38 2018 UTC

Last Renewal Attempt: FAILED on Oct 09 17:32:59 2018 UTC

Failure reason: Failed to authenticate server

Étapes de résolution

Pour résoudre le problème, vous devez créer un nouveau point de confiance et entrer les données de certificat dans FXOS :

FPR-2-A /license # scope security

FPR-2-A /security # enter trustpoint QuoVadisRootCA2

FPR-2-A /security/trustpoint* # set certchain

Enter lines one at a time. Enter ENDOFBUF to finish. Press ^C to abort.

Trustpoint Certificate Chain:    (THIS PART NEEDS TO BE COPY/PASTED)

>

-----BEGIN CERTIFICATE-----

MIIFtzCCA5+gAwIBAgICBQkwDQYJKoZIhvcNAQEFBQAwRTELMAkGA1UEBhMCQk0x

GTAXBgNVBAoTEFF1b1ZhZGlzIExpbWl0ZWQxGzAZBgNVBAMTElF1b1ZhZGlzIFJv

b3QgQ0EgMjAeFw0wNjExMjQxODI3MDBaFw0zMTExMjQxODIzMzNaMEUxCzAJBgNV

BAYTAkJNMRkwFwYDVQQKExBRdW9WYWRpcyBMaW1pdGVkMRswGQYDVQQDExJRdW9W

YWRpcyBSb290IENBIDIwggIiMA0GCSqGSIb3DQEBAQUAA4ICDwAwggIKAoICAQCa

GMpLlA0ALa8DKYrwD4HIrkwZhR0In6spRIXzL4GtMh6QRr+jhiYaHv5+HBg6XJxg

Fyo6dIMzMH1hVBHL7avg5tKifvVrbxi3Cgst/ek+7wrGsxDp3MJGF/hd/aTa/55J

WpzmM+Yklvc/ulsrHHo1wtZn/qtmUIttKGAr79dgw8eTvI02kfN/+NsRE8Scd3bB

rrcCaoF6qUWD4gXmuVbBlDePSHFjIuwXZQeVikvfj8ZaCuWw419eaxGrDPmF60Tp

+ARz8un+XJiM9XOva7R+zdRcAitMOeGylZUtQofX1bOQQ7dsE/He3fbE+Ik/0XX1

ksOR1YqI0JDs3G3eicJlcZaLDQP9nL9bFqyS2+r+eXyt66/3FsvbzSUr5R/7mp/i

Ucw6UwxI5g69ybR2BlLmEROFcmMDBOAENisgGQLodKcftslWZvB1JdxnwQ5hYIiz

PtGo/KPaHbDRsSNU30R2be1B2MGyIrZTHN81Hdyhdyox5C315eXbyOD/5YDXC2Og

/zOhD7osFRXql7PSorW+8oyWHhqPHWykYTe5hnMz15eWniN9gqRMgeKh0bpnX5UH

oycR7hYQe7xFSkyyBNKr79X9DFHOUGoIMfmR2gyPZFwDwzqLID9ujWc9Otb+fVuI

yV77zGHcizN300QyNQliBJIWENieJ0f7OyHj+OsdWwIDAQABo4GwMIGtMA8GA1Ud

EwEB/wQFMAMBAf8wCwYDVR0PBAQDAgEGMB0GA1UdDgQWBBQahGK8SEwzJQTU7tD2

A8QZRtGUazBuBgNVHSMEZzBlgBQahGK8SEwzJQTU7tD2A8QZRtGUa6FJpEcwRTEL

MAkGA1UEBhMCQk0xGTAXBgNVBAoTEFF1b1ZhZGlzIExpbWl0ZWQxGzAZBgNVBAMT

ElF1b1ZhZGlzIFJvb3QgQ0EgMoICBQkwDQYJKoZIhvcNAQEFBQADggIBAD4KFk2f

BluornFdLwUvZ+YTRYPENvbzwCYMDbVHZF34tHLJRqUDGCdViXh9duqWNIAXINzn

g/iN/Ae42l9NLmeyhP3ZRPx3UIHmfLTJDQtyU/h2BwdBR5YM++CCJpNVjP4iH2Bl

fF/nJrP3MpCYUNQ3cVX2kiF495V5+vgtJodmVjB3pjd4M1IQWK4/YY7yarHvGH5K

WWPKjaJW1acvvFYfzznB4vsKqBUsfU16Y8Zsl0Q80m/DShcK+JDSV6IZUaUtl0Ha

B0+pUNqQjZRG4T7wlP0QADj1O+hA4bRuVhogzG9Yje0uRY/W6ZM/57Es3zrWIozc

hLsib9D45MY56QSIPMO661V6bYCZJPVsAfv4l7CUW+v90m/xd2gNNWQjrLhVoQPR

TUIZ3Ph1WVaj+ahJefivDrkRoHy3au000LYmYjgahwz46P0u05B/B5EqHdZ+XIWD

mbA4CD/pXvk1B+TJYm5Xf6dQlfe6yJvmjqIBxdZmv3lh8zwc4bmCXF2gw+nYSL0Z

ohEUGW6yhhtoPkg3Goi3XZZenMfvJ2II4pEZXNLxId26F0KCl3GBUzGpn/Z9Yr9y

4aOTHcyKJloJONDO1w2AFrR4pTqHTI2KpdVGl/IsELm8VCLAAVBpQ570su9t+Oza

8eOx79+Rj1QqCyXBJhnEUhAFZdWCEOrCMc0u

-----END CERTIFICATE-----

>ENDOFBUF <---manually type this on a new line after the ----END OF CERTIFICATE---- line and press ENTER

Validez ensuite la modification, puis renouvelez la licence :

FPR-2-A /security/trustpoint* # comm

FPR-2-A /security/trustpoint # scope license

FPR-2-A /license # scope licdebug

FPR-2-A /license/licdebug # renew

Vous devez maintenant vérifier que la licence a été renouvelée :

FP9300-1-A-A-A /license/licdebug # show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: REGISTERED

Smart Account: TAC Cisco Systems, Inc.

Virtual Account: CALO

Export-Controlled Functionality: Allowed

Initial Registration: SUCCEEDED on Jul 01 18:37:38 2018 UTC

Last Renewal Attempt: SUCCEEDED on Oct 09 17:39:07 2018 UTC

Next Renewal Attempt: Apr 07 17:39:08 2019 UTC

Registration Expires: Oct 09 17:33:07 2019 UTC

License Authorization:

Status: AUTHORIZED on Oct 09 17:39:12 2018 UTC

Last Communication Attempt: SUCCESS on Oct 09 17:39:12 2018 UTC

Next Communication Attempt: Nov 08 17:39:12 2018 UTC

Communication Deadline: Jan 07 17:33:11 2019 UTC

Installations logicielles ASA nécessitant la conformité aux normes FIPS (Federal Information Processing Standards)

Pour les plates-formes ASA qui nécessitent la conformité FIPS, l'importation du certificat QuoVadis Root CA 2 peut échouer pour non-conformité aux exigences de cryptographie de signature et ce message peut être affiché :

Do you accept this certificate? [yes/no]: yes

Trustpoint CA certificate is not FIPS compliant.

% Error in saving certificate: status = FAIL

Comme solution de contournement pour les installations ASA conformes à la norme FIPS, importez le certificat intermédiaire HydrantID SSL ICA G2. Le certificat HydrantID SSL ICA G2 est affiché ci-dessous et est conforme aux exigences de l'algorithme de signature sha256WithRSAEncryption. Reportez-vous à la documentation présentée dans cet article afin de charger le certificat basé sur votre plate-forme :

-----BEGIN CERTIFICATE-----

MIIGxDCCBKygAwIBAgIUdRcWd4PQQ361VsNXlG5FY7jr06wwDQYJKoZIhvcNAQEL

BQAwRTELMAkGA1UEBhMCQk0xGTAXBgNVBAoTEFF1b1ZhZGlzIExpbWl0ZWQxGzAZ

BgNVBAMTElF1b1ZhZGlzIFJvb3QgQ0EgMjAeFw0xMzEyMTcxNDI1MTBaFw0yMzEy

MTcxNDI1MTBaMF4xCzAJBgNVBAYTAlVTMTAwLgYDVQQKEydIeWRyYW50SUQgKEF2

YWxhbmNoZSBDbG91ZCBDb3Jwb3JhdGlvbikxHTAbBgNVBAMTFEh5ZHJhbnRJRCBT

U0wgSUNBIEcyMIICIjANBgkqhkiG9w0BAQEFAAOCAg8AMIICCgKCAgEA9p1ZOA9+

H+tgdln+STF7bdOxvnOERYyjo8ZbKumzigNePSwbQYVWuso76GI843yjaX2rhn0+

Jt0NVJM41jVctf9qwacVduR7CEi0qJgpAUJyZUuB9IpFWF1Kz14O3Leh6URuRZ43

RzHaRmNtzkxttGBuOtAg+ilOuwiGAo9VQLgdONlqQFcrbp97/fO8ZIqiPrbhLxCZ

fXkYi3mktZVRFKXG62FHAuH1sLDXCKba3avDcUR7ykG4ZXcmp6kl14UKa8JHOHPE

NYyr0R6oHELOGZMox1nQcFwuYMX9sJdAUU/9SQVXyA6u6YtxlpZiC8qhXM1IE00T

Q9+q5ppffSUDMC4V/5If5A6snKVP78M8qd/RMVswcjMUMEnov+wykwCbDLD+IReM

A57XX+HojN+8XFTL9Jwge3z3ZlMwL7E54W3cI7f6cxO5DVwoKxkdk2jRIg37oqSl

SU3z/bA9UXjHcTl/6BoLho2p9rWm6oljANPeQuLHyGJ3hc19N8nDo2IATp70klGP

kd1qhIgrdkki7gBpanMOK98hKMpdQgs+NY4DkaMJqfrHzWR/CYkdyUCivFaepaFS

K78+jVu1oCMOFOnucPXL2fQa3VQn+69+7mA324frjwZj9NzrHjd0a5UP7waPpd9W

2jZoj4b+g+l+XU1SQ+9DWiuZtvfDW++k0BMCAwEAAaOCAZEwggGNMBIGA1UdEwEB

/wQIMAYBAf8CAQAweAYDVR0gBHEwbzAIBgZngQwBAgEwCAYGZ4EMAQICMA4GDCsG

AQQBvlgAAmQBAjBJBgwrBgEEAb5YAAOHBAAwOTA3BggrBgEFBQcCARYraHR0cDov

L3d3dy5oeWRyYW50aWQuY29tL3N1cHBvcnQvcmVwb3NpdG9yeTByBggrBgEFBQcB

AQRmMGQwKgYIKwYBBQUHMAGGHmh0dHA6Ly9vY3NwLnF1b3ZhZGlzZ2xvYmFsLmNv

bTA2BggrBgEFBQcwAoYqaHR0cDovL3RydXN0LnF1b3ZhZGlzZ2xvYmFsLmNvbS9x

dnJjYTIuY3J0MA4GA1UdDwEB/wQEAwIBBjAfBgNVHSMEGDAWgBQahGK8SEwzJQTU

7tD2A8QZRtGUazA5BgNVHR8EMjAwMC6gLKAqhihodHRwOi8vY3JsLnF1b3ZhZGlz

Z2xvYmFsLmNvbS9xdnJjYTIuY3JsMB0GA1UdDgQWBBSYarYtLr+nqp/299YJr9WL

V/mKtzANBgkqhkiG9w0BAQsFAAOCAgEAlraik8EDDUkpAnIOajO9/r4dpj/Zry76

6SH1oYPo7eTGzpDanPMeGMuSmwdjUkFUPALuWwkaDERfz9xdyFL3N8CRg9mQhdtT

3aWQUv/iyXULXT87EgL3b8zzf8fhTS7r654m9WM2W7pFqfimx9qAlFe9XcVlZrUu

9hph+/MfWMrUju+VPL5U7hZvUpg66mS3BaN15rsXv2+Vw6kQsQC/82iJLHvtYVL/

LwbNio18CsinDeyRE0J9wlYDqzcg5rhD0rtX4JEmBzq8yBRvHIB/023o/vIO5oxh

83Hic/2Xgwksf1DKS3/z5nTzhsUIpCpwkN6nHp6gmA8JBXoUlKQz4eYHJCq/ZyC+

BuY2vHpNx6101J5dmy7ps7J7d6mZXzguP3DQN84hjtfwJPqdf+/9RgLriXeFTqwe

snxbk2FsPhwxhiNOH98GSZVvG02v10uHLVaf9B+puYpoUiEqgm1WG5mWW1PxHstu

Ew9jBMcJ6wjQc8He9rSUmrhBr0HyhckdC99RgEvpcZpV2XL4nPPrTI2ki/c9xQb9

kmhVGonSXy5aP+hDC+Ht+bxmc4wN5x+vB02hak8Hh8jIUStRxOsRfJozU0R9ysyP

EZAHFZ3Zivg2BaD4tOISO8/T2FDjG7PNUv0tgPAOKw2t94B+1evrSUhqJDU0Wf9c

9vkaKoPvX4w=

-----END CERTIFICATE-----

Informations connexes

- Assistance technique et téléchargements Cisco