Table des matières

Introduction

Conditions préalables

Exigences

Composants utilisés

Configuration

Machine virtuelle

Outils

Déballage

Installation

Netplan

Installation du package

Vérification

Vérification du statut du service

Documentation de référence

Introduction

Ce document décrit une procédure pas à pas de l'installation du logiciel Cisco Routed PON Manager dans les travaux pratiques locaux.

Conditions préalables

Exigences

- Connaissance de l'environnement de serveur Linux

- Connaissance des éditeurs de texte Linux

- Outils Linux : openssh-server, net-tools, ntpd

Composants utilisés

- Machine virtuelle Linux (VM)

- 2 vCPUs

- 8 Go de RAM

- 20 Go d'espace (minimum)

- Ubuntu 20.04.06 LTS

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Si votre réseau est en ligne, assurez-vous de bien comprendre l’incidence possible des commandes.

Configuration

Machine virtuelle

Outils

Ce document part de l'hypothèse que la machine virtuelle a été configurée pour l'accès, que le système d'exploitation Ubuntu (OS) a été installé et configuré avec la connectivité réseau, que les outils répertoriés dans les conditions requises ont été installés et que le fichier zip Routed PON a été téléchargé. Pour plus de facilité, les commandes apt d'Ubuntu ont été fournies pour télécharger et installer les outils recommandés.

Remarque : Un lien vers le téléchargement de Routed PON 24.1.2 est disponible ici.

sudo apt install net-tools

sudo apt install openssh-server

sudo apt install ntpd

Déballage

1) Créez un répertoire d'installation dans lequel décompresser le fichier zip Routed PON 24.1.2.

rpon@rpon-mgr:~$ mkdir Routed_PON_24_1_2

2) Décompressez le fichier Cisco_Routed_PON_24_1_2_Release.zip dans le répertoire attribué.

rpon@rpon-mgr:~/PON_Mgr_24_1_2$ unzip Cisco_Routed_PON_24_1_2_Release.zip

Archive: Cisco_Routed_PON_24_1_2_Release.zip

inflating: PON_MANAGER_SIGNED_CCO/R4.0.0-Cisco-UB2004-sign.tar.gz

inflating: PON_MANAGER_SIGNED_CCO/README

inflating: PON_MANAGER_SIGNED_CCO/verify.tar.gz

3) Remplacez le répertoire (cd) par le dossier PON_MANAGER_SIGNED_CCO nouvellement créé et répertoriez (ls) les fichiers.

rpon@rpon-mgr:~/PON_Mgr_24_1_2/PON_MANAGER_SIGNED_CCO$ ls -la

total 29120

drwxrwxr-x 2 rpon rpon 4096     Jun 13 09:26 .

drwxrwxr-x 3 rpon rpon 4096     Jun 13 09:26 ..

-rw-rw-r-- 1 rpon rpon 29792662 Mar 15 05:21 R4.0.0-Cisco-UB2004-sign.tar.gz

-rw-rw-r-- 1 rpon rpon 1966     Mar 15 05:21 README

-rw-rw-r-- 1 rpon rpon 11502    Mar 15 05:21 verify.tar.gz

Remarque : Le fichier LISEZMOI décrit le processus de vérification des fichiers. Cette étape n'est pas effectuée au cours de cette procédure pas à pas d'installation.

4) Décompressez le fichier R4.0.0-Cisco-UB2004-sign.tar.gz à l'aide de tar -xvf R4.0.0-Cisco-UB2004-sign.tar.gz.

rpon@rpon-mgr:~/PON_Mgr_24_1_2/PON_MANAGER_SIGNED_CCO$ tar -xvf R4.0.0-Cisco-UB2004-sign.tar.gz

R4.0.0-Cisco-UB2004-sign/

R4.0.0-Cisco-UB2004-sign/R4.0.0-Cisco-UB2004.tar.gz.signature

R4.0.0-Cisco-UB2004-sign/R4.0.0-Cisco-UB2004.tar.gz

5) Enregistrez le CD dans le répertoire R4.0.0-Cisco-UB2004-sign et répertoriez les fichiers.

rpon@rpon-mgr:~/PON_Mgr_24_1_2/PON_MANAGER_SIGNED_CCO$ cd R4.0.0-Cisco-UB2004-sign/

rpon@rpon-mgr:~/PON_Mgr_24_1_2/PON_MANAGER_SIGNED_CCO/R4.0.0-Cisco-UB2004-sign$ ls -la

total 29112

drwxr-xr-x 2 rpon rpon 4096     Mar 15 04:51 .

drwxrwxr-x 3 rpon rpon 4096     Jun 13 09:26 ..

-rw-r--r-- 1 rpon rpon 29796139 Mar 15 04:51 R4.0.0-Cisco-UB2004.tar.gz

-rw-r--r-- 1 rpon rpon 3546     Mar 15 04:51 R4.0.0-Cisco-UB2004.tar.gz.signature

6) Untar R4.0.0-Cisco-UB2004-tar.gz via tar -xvf R4.0.0-Cisco-UB2004.tar.gz.

rpon@rpon-mgr:~/PON_Mgr_24_1_2/PON_MANAGER_SIGNED_CCO/R4.0.0-Cisco-UB2004-sign$ tar -xvf R4.0.0-Cisco-UB2004.tar.gz

---- snipped for brevity -----

7) Un nouveau répertoire appelé R4.0.0-Cisco-UB2004 CD est maintenant créé dans ce répertoire.

Remarque : C'est là que se trouvent les scripts shell pour installer, désinstaller, vérifier l'état et le fichier JSON du contrôleur PON supplémentaire.

rpon@rpon-mgr:~/PON_Mgr_24_1_2/PON_MANAGER_SIGNED_CCO/R4.0.0-Cisco-UB2004-sign/R4.0.0-Cisco-UB2004$ ls -la

total 116

drwxr-xr-x 7 rpon rpon 4096  Mar 14 11:11 .

drwxr-xr-x 3 rpon rpon 4096  Jun 13 09:26 ..

-rw-r--r-- 1 rpon rpon 8196  Mar 14 11:10 .DS_Store

-rwxr-xr-x 1 rpon rpon 13650 Mar 14 11:10 get-support-info.sh

drwxr-xr-x 3 rpon rpon 4096  Mar 14 11:10 grafana_dashboards

-rwxr-xr-x 1 rpon rpon 25392 Mar 14 11:10 install.sh

-rw-r--r-- 1 rpon rpon 1493  Mar 14 11:11 PonCntlInit.json

drwxr-xr-x 2 rpon rpon 4096  Mar 14 11:10 R4.0.0-Firmware

drwxr-xr-x 5 rpon rpon 4096  Mar 14 11:14 R4.0.0-Netconf-UB2004

drwxr-xr-x 6 rpon rpon 4096  Mar 14 11:14 R4.0.0-PonManager-UB2004

-rw-r--r-- 1 rpon rpon 7949  Mar 14 11:11 README.txt

-rwxr-xr-x 1 rpon rpon 2349  Mar 14 11:10 status.sh

drwxr-xr-x 2 rpon rpon 4096  Mar 14 11:10 tools

-rwxr-xr-x 1 rpon rpon 2245  Mar 14 11:10 uninstall.sh

-rwxr-xr-x 1 rpon rpon 8605  Mar 14 11:11 upgrade.sh

Installation

Consultez le fichier README.txt pour connaître les étapes d'installation. Cette installation utilise l'option 2 pour la nouvelle installation.

rpon@rpon-mgr:~/PON_Mgr_24_1_2/PON_MANAGER_SIGNED_CCO/R4.0.0-Cisco-UB2004-sign/R4.0.0-Cisco-UB2004$ cat README.txt

--- snipped for brevity ---

Option 2: New Installation

===========================

Step 1 : Verify System Requirements:

------------------------------------

a) Verify system is running ubuntu version 20.04

user@system:~$ lsb_release -a

No LSB modules are available.

Distributor ID: Ubuntu

Description: Ubuntu 20.04.3 LTS

Release: 20.04

Codename: bionic

b) Verify the ethernet interfaces are configured on the ubuntu system

1) Look for your Ethernet Interfaces: "ifconfig" or "ip a". <<< make note of interfaces listed >>>

2) There are multiple ways to configure interfaces on Ubuntu 18.04 and 20.04

3) The simplest way is via Netplan

4) Netplan is located in the /etc/netplan directory

5) There will be a file similar in name to "01-network-manager-all.yaml"

6) Edit this file with your favorite editor such as "nano" or "vi"

c) user@system:~$ sudo nano /etc/netplan/<net-plan-name>.yaml

Sample Netplan text <<< Make sure indentation is consistent >>>

network:

version: 2

renderer: NetworkManager

ethernets:

eno1: <<< MCMS IP Interface >>>

dhcp4: no <<< No DHCP >>>

dhcp6: no <<< No DHCP >>>

addresses: [172.16.41.5/24] <<< Static IPv4 >>>

gateway4: 172.16.41.1 <<< IPv4 default Gateway >>>

nameservers: <<< DNS Addresses >>>

vlans: <<< Configured VLANs >>>

vlan4090: <<< "l2EthInterfaceName" VLAN named vlan4090 assigned to PON Controller Interface >>>

id: 4090 <<< VLAN number >>>

link: eno2 <<< PON Controller Interface >>>

d) After finished editing, Save and exit, then enter "netplan apply" to enable new configuration.

e) Verify ubuntu system has connectivity to Internet

Step 2 : Installation

---------------------

a) Run the installation script "install.sh":

user@system:<install_directory>/R4.0.0-UB2004$ sudo ./install.sh -e <l2EthInterfaceName>

This script will do the following:

• Install MongoDB

• Install MCMS PON Manager

• Install MCMS Netconf Server

• Install PON Controller and UMT Relay (using the Ethernet interface specificed)

Required:

-e <l2EthInterfaceName> interface name of L2 port

Optional:

-d <databaseIpAaddress> IP address of MongoDB database

-n <databaseName> MongoDB database name for PON Manager

-m Install only PonManager/MongoDB/NETCONF

-c Install only PonController

defaults:

-d <databaseIpAddress> = 127.0.0.1

-n <databaseName> = tibit_pon_controller

Informational: How to verify all processes are running

=======================================================

a) Verify MongoDB is running

user@system:~$ sudo systemctl status mongod.service

● mongod.service - MongoDB Database Server

Loaded: loaded (/lib/systemd/system/mongod.service; enabled; vendor preset: enabled)

Active: active (running) since Fri 2019-08-30 11:56:38 PDT; 3 days ago

Main PID: 15035 (mongod)

CGroup: /system.slice/mongod.service

└─15035 /usr/bin/mongod --config /etc/mongod.conf

b) Verify MCMS PON Manager Apache Web Server is running

user@system:~$ sudo systemctl status apache2.service

● apache2.service - The Apache HTTP Server

Loaded: loaded (/lib/systemd/system/apache2.service; enabled; vendor preset: enabled)

Drop-In: /lib/systemd/system/apache2.service.d

└─apache2-systemd.conf

Active: active (running) since Fri 2019-08-16 15:19:09 PDT; 1 weeks 2 days ago

Process: 2981 ExecReload=/usr/sbin/apachectl graceful (code=exited, status=0/SUCCESS)

Main PID: 8471 (apache2)

---- Removed addtional information regarding PON Controller as this is installed in the XR Router so these instructions do not apply to the VM. ---

�� ��

Netplan

À l'aide d'un éditeur de fichier texte linux (nano, vi), modifiez le fichier YAML situé dans le répertoire /etc/netplan/ en utilisant le modèle fourni dans le fichier README.txt dans le dossier d'installation. Renseignez les informations IP spécifiques au réseau et à la machine virtuelle.

rpon@rpon-mgr:~/PON-mgr-24.1.2/PON_MANAGER_SIGNED_CCO/R4.0.0-Cisco-UB2004-sign/R4.0.0-Cisco-UB2004$ sudo nano /etc/netplan/01-network-manager-all.yaml

network:

version: 2

renderer: NetworkManager

network:

ethernets:

ens192: <- This VM's network adapter is ens192. If the default is NOT ens192, change this value to the desired network adapter

dhcp4: no

dhcp6: no

addresses: [IPv4 address and subnet]

gateway4: [V4Gateway]

nameservers:

addresses: [DNS Server(s)]

vlans:

vlan.4090:

id: 4090

link: [VM network adapter name]

Remarque : Utilisation de nano pour modifier, une fois terminé ; appuyez sur Ctrl + O pour enregistrer le fichier, puis sur Ctrl X pour quitter nano. Dans VIM, utilisez :wq ! pour enregistrer et quitter.

Remarque : Utilisation de sudo netplan —debug apply est utile lors du test du netplan avant l'application.

Vérifiez que la configuration netplan est correcte en affichant le fichier via cat. Ce résultat est strictement un exemple de TP. Veuillez utiliser les adresses IP spécifiques au réseau. Une fois terminé et quitté l'éditeur de texte, exécutez sudo netplan apply.

Exemple de TP :

rpon@rpon-mgr:~/PON-mgr-24.1.2/PON_MANAGER_SIGNED_CCO/R4.0.0-Cisco-UB2004-sign/R4.0.0-Cisco-UB2004$ cat /etc/netplan/01-network-manager-all.yaml

# Let NetworkManager manage all devices on this system

network:

version: 2

renderer: NetworkManager

ethernets:

ens192:

dhcp4: no

dhcp6: no

addresses: [10.122.140.232/28]

gateway4: 10.122.140.225

nameservers:

addresses: [172.18.108.43,172.18.108.34]

vlans:

vlan4090:

id: 4090

link: ens192

rpon@rpon-mgr:~/PON-mgr-24.1.2/PON_MANAGER_SIGNED_CCO/R4.0.0-Cisco-UB2004-sign/R4.0.0-Cisco-UB2004$ sudo netplan apply

Installation du package

Effectuez l'installation à l'aide des arguments sélectionnés. Pour cette installation, utilisez -e, -d et -m. Comme indiqué dans le fichier README.txt, -e indique à l'installateur quelle interface Ethernet de la machine virtuelle utiliser, -d définit l'adresse IP appliquée au fichier mongo.conf pour que la MongoDB puisse l'utiliser, et -m installe PON Manager, MongoDB et NETCONF.

Exemple :

sudo ./install.sh -e ens192 -d [adresseIP] -m

Remarque : S'il s'agit d'une nouvelle machine virtuelle, les temps d'installation peuvent varier jusqu'à 5 minutes, pendant que les dépendances sont ajoutées et mises à jour. Une fois l'installation terminée, un message de journal est généré.

rpon@rpon-mgr:~/PON_MANAGER_SIGNED_CCO/R4.0.0-Cisco-UB2004-sign/R4.0.0-Cisco-UB2004$ sudo ./install.sh -e ens192 -d 10.122.140.232 -m

--- Installation snipped for brevity ---

Installation complete!

MCMS Component Versions:

PON Manager: R4.0.0

PON NETCONF: R4.0.0

PON Controller: Not Installed

Remarque : Le contrôleur PON est hébergé sur le routeur XR, par conséquent une installation sur la machine virtuelle est inutile.

Vérification

Vérification du statut du service

Effectuez une vérification de l'état des services installés pour vérifier qu'ils sont opérationnels via le script status.sh, situé dans le même répertoire d'installation.

Remarque : Si une installation complète a été effectuée comme indiqué par -m, vérifiez que les services répertoriés sont opérationnels et en cours d'exécution.

- mongod.service

- apache2.service

- tibit-netoper2-server.service

- tibit-netconf.service

Exemple :

rpon@rpon-mgr:~/PON-mgr-24.1.2/PON_MANAGER_SIGNED_CCO/R4.0.0-Cisco-UB2004-sign/R4.0.0-Cisco-UB2004$ sudo ./status.sh

MCMS Component Versions:

PON Manager: R4.0.0

PON NETCONF: R4.0.0

PON Controller: Not Installed

● mongod.service - MongoDB Database Server

Loaded: loaded (/lib/systemd/system/mongod.service; enabled; vendor preset: enabled)

Active: active (running) since Wed 2024-06-12 19:45:37 EDT; 2min 49s ago

Main PID: 54731 (mongod)

Memory: 74.7M

CGroup: /system.slice/mongod.service

└─54731 /usr/bin/mongod --config /etc/mongod.conf

● apache2.service - The Apache HTTP Server

Loaded: loaded (/lib/systemd/system/apache2.service; enabled; vendor preset: enabled)

Active: active (running) since Wed 2024-06-12 19:46:44 EDT; 1min 42s ago

Main PID: 62165 (apache2)

Tasks: 123 (limit: 9419)

Memory: 18.6M

CGroup: /system.slice/apache2.service

├─62165 /usr/sbin/apache2 -k start

├─62167 /usr/sbin/apache2 -k start

├─62168 /usr/sbin/apache2 -k start

└─62169 /usr/sbin/apache2 -k start

● tibit-netopeer2-server.service - Tibit Communications, Inc. Netopeer2 Server

Loaded: loaded (/lib/systemd/system/tibit-netopeer2-server.service; enabled; vendor preset: enabled)

Active: active (running) since Wed 2024-06-12 19:47:04 EDT; 1min 21s ago

Process: 63029 ExecStart=/opt/tibit/netconf/bin/start_netopeer2_server.sh (code=exited, status=0/SUCCESS)

Main PID: 63035 (netopeer2-serve)

Tasks: 7 (limit: 9419)

Memory: 5.4M

CGroup: /system.slice/tibit-netopeer2-server.service

└─63035 /opt/tibit/netconf/bin/netopeer2-server -v 1 -t 55

● tibit-netconf.service - Tibit Communications, Inc. NetCONF Server

Loaded: loaded (/lib/systemd/system/tibit-netconf.service; enabled; vendor preset: enabled)

Active: active (running) since Wed 2024-06-12 19:47:04 EDT; 1min 21s ago

Process: 63023 ExecStartPre=/opt/tibit/netconf/bin/shm_clean.sh (code=exited, status=0/SUCCESS)

Process: 63027 ExecStartPre=/opt/tibit/netconf/bin/sysrepocfg --copy-from startup -d running (code=exited, status=0/SUCCESS)

Main PID: 63028 (tibit-netconf)

Tasks: 17 (limit: 9419)

Memory: 49.4M

CGroup: /system.slice/tibit-netconf.service

├─63028 /opt/tibit/netconf/bin/tibit-netconf

└─63037 /opt/tibit/netconf/bin/tibit-netconf

11. Ouvrez un navigateur Internet et saisissez l'adresse IP de la machine virtuelle.

Écran de connexion de PON Manager

Documentation de référence

- Page d'assistance et de téléchargement Cisco

- Page Solution Cisco Routed PON

- Guide d'installation de Cisco Routed PON

- Guide de déploiement de Cisco Routed PON

- Notes de version de Cisco Routed PON, Cisco IOS® XR versions 24.1.1 et 24.1.2