Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Procédure pas à pas

Discussions connexes de la communauté d’assistance Cisco

Introduction

Ce document décrit un moyen de récupérer Network Convergence System 6000 (NCS6K) après l'échec de la mise à niveau sans utiliser de lecteur USB. La récupération avec une clé USB nécessite un accès physique au périphérique, ce qui peut prendre beaucoup de temps et de temps.

La procédure décrite dans ce document utiliserait une machine Linux agissant en tant que serveur TFTP et DHCP pour récupérer le NCS6K via le port Ethernet de gestion RP.

Conditions préalables

Conditions requises

Cisco vous recommande d'avoir des connaissances de base sur Linux, TFTP, DHCP et l'interface de ligne de commande Cisco XR.

Components Used

Ce document est limité à la plate-forme NCS6K.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Procédure pas à pas

1. Téléchargez le fichier de démarrage XR USB requis depuis le site Web de Cisco.

2. Téléchargez le fichier ZIP téléchargé sur le serveur Linux et décompressez-le dans /tftpboot :
root@xxxr:/tftpboot# unzip ncs6k-usb-boot-5.2.3.zip

Archive:  ncs6k-usb-boot-5.2.3.zip

inflating: EFI/boot/bootx64.efi

inflating: EFI/boot/grub.cfg

inflating: boot/install-image.iso

3. Recherchez l'adresse MAC du port Ethernet de gestion du processeur de routage NCS6K (RP). Il se trouve dans les journaux de console :

Press F12 to go to Boot Manager..

Booting System Host OS..

Verifying Image for Secure Boot failed with status 15

System Host OS boot failed.

Booting Int Network 0 for IPv4 (4C-4E-35-B6-63-33)..

>>Start PXE over IPv4.

PXE-E18: Server response timeout.

Int Network 0 for IPv4 (4C-4E-35-B6-63-33) boot failed.

Booting Ext Network 0 for IPv4 (4C-4E-35-B6-63-33)..

4. Ajoutez les éléments suivants au fichier dhcpd.conf. Cela allouera une adresse IP statique au port Ethernet de gestion RP lors du démarrage ( ex : 10.48.32.160) :

root@xxxr:/tftpboot/0A3020A0# cat /etc/dhcp/dhcpd.conf

allow bootp;

allow booting;

subnet 10.48.32.0 netmask 255.255.255.0 {

option routers 10.48.32.1;

next-server 10.48.32.93;

host pani0-rp {

hardware ethernet  4c:4e:35:b6:63:33;

fixed-address 10.48.32.160;

filename "EFI/boot/bootx64.efi" ;

}

}

Note: 10.48.32.93 est l’adresse du serveur TFTP et DHCP.

5. Faites une copie de grub.cfg (fichier généré à l'étape 2). Nommez le fichier après l'adresse IP que NCS6K obtiendra de DHCP :

root@xxxr:/tftpboot# cp /tftpboot/EFI/boot/grub.cfg  /tftpboot/10.48.32.160.cfg

6. Modifiez le fichier généré ci-dessus pour vous assurer que l'ISO est prélevée sur le réseau (supprimer le début /) :

root@xxxr:/tftpboot# diff /tftpboot/EFI/boot/grub.cfg  /tftpboot/10.48.32.160.cfg

11,12c11,12

<         echo "Booting from USB.."

<         loopback loop /boot/install-image.iso

---

>         echo "Booting from network.."

>         loopback loop boot/install-image.iso

Pour la version 5.2.3, cela ressemblerait à ceci :

root@xxxr:/tftpboot# cat /tftpboot/10.48.32.160.cfg

set default=0

serial --unit=0 --speed=115200

terminal_input console

terminal_output serial

set timeout=2

menuentry "System Install OS" {

echo "Booting from network..."

loopback loop boot/install-image.iso

root=loop

echo "Loading Kernel.."

linux (loop)/boot/bzImage root=/dev/ram install=/dev/sda console=ttyS0,115200 prod=1 crashkernel=192M@0 bigphysarea=10M quiet pci=assign-busses noissu aer=off pci=hpmemsize=0M,hpiosize=0M

echo "Loading initrd.."

initrd (loop)/boot/initrd.img signfile=/boot/signature.initrd.img

}

7. La configuration sur le serveur Linux est terminée. Lors de la prochaine tentative de démarrage PXE, DHCP allouera 10.48.32.160 au RP NCS6K. Il obtiendra ensuite les fichiers grub .efi et .cfg en utilisant TFTP. Ensuite, GRUB démarrerait automatiquement et chargerait l'ISO à l'aide de TFTP.

Note: Le fichier ISO est normalement d'environ 700 Mo. Cela prendra un certain temps (jusqu'à 10 minutes) après le démarrage du réseau. s'affiche.

Remplir les journaux de l'activité :

Cisco BIOS version : SB.Panini.0014.00

BIOS Build Date : 07/10/2014 by lchinnad

System Memory Speed : 1600 MHz

Processor Type : Intel(R) Xeon(R) CPU E5-2448L @ 1.80GHz

Press F12 to goto Boot Manager..

Booting System Host OS..

Verifying Image for Secure Boot failed with status 15

System Host OS boot failed.

Booting Int Network 0 for IPv4 (4C-4E-35-B6-63-33)..

Start PXE over IPv4.

PXE-E18: Server response timeout.

Int Network 0 for IPv4 (4C-4E-35-B6-63-33) boot failed.

Booting Ext Network 0 for IPv4 (4C-4E-35-B6-63-33)..

Start PXE over IPv4.

Station IP address is 10.48.32.160

Server IP address is 10.48.32.93

NBP filename is bootx64.efi

Downloading NBP file...

Succeed to download NBP file.

GNU GRUB version 2.00

Press F2 to goto grub Menu..

Booting from network..

[    6.338259] i8042: No controller found

Starting udev: [  OK  ]

Actual changes:

large-receive-offload: off [requested on]

ntuple-filters: on

Setting hostname host:  [  OK  ]

Checking filesystems:[  OK  ]

Remounting root filesystem in read-write mode:  [  OK  ]

Entering non-interactive startup

Bringing up loopback interface:  [  OK  ]

Starting system logger: [  OK  ]

Starting kernel logger: [  OK  ]

Starting kdump:[  OK  ]

Starting system message bus: [  OK  ]

Starting smartd: [  OK  ]

Generating SSH1 RSA host key: [  OK  ]

Generating SSH2 RSA host key: [  OK  ]

Generating SSH2 DSA host key: [  OK  ]

Starting sshd: [  OK  ]

Starting xinetd: [  OK  ]

Checking PCI block device /dev/sdb disk space

Thu Jun 25 14:07:13 UTC 2015: Detected /iso/host.iso

mount: block device /iso/host.iso is write-protected, mounting read-only

Thu Jun 25 14:07:13 UTC 2015: Mounted /iso/host.iso to /tmp/isomnt.iV1833

Thu Jun 25 14:07:13 UTC 2015: Found /tmp/isomnt.iV1833/rpm/ncs6k-sysadmin-hostos.all-5.2.3-Default.x86_64.rpm in host.iso

Thu Jun 25 14:07:13 UTC 2015: Installing /tmp/isomnt.iV1833/rpm/ncs6k-sysadmin-hostos.all-5.2.3-Default.x86_64.rpm

Preparing packages for installation...

ncs6k-sysadmin-hostos.all-5.2.3-Default.x86_64

hushd_static: no process killed

hushd restarted

Thu Jun 25 14:07:13 UTC 2015: Did not detect new pxe install script, keep going with old xrnginstall

Thu Jun 25 14:07:13 UTC 2015: Running in  Data LV support model

/etc/rc3.d/S60xrnginstall: line 239: SIMULATION: readonly variable

Thu Jun 25 14:07:13 UTC 2015: Prepping System with calvados.iso

Thu Jun 25 14:07:13 UTC 2015: Installer will install image on sda

Thu Jun 25 14:07:13 UTC 2015: Running in LVM support model

Thu Jun 25 14:07:15 UTC 2015: Partition creation on /dev/sda took 1 seconds

Thu Jun 25 14:07:15 UTC 2015: File system creation on /dev/sda1 took 0 seconds

Thu Jun 25 14:07:15 UTC 2015: Install host image on /dev/sda1

Thu Jun 25 14:07:23 UTC 2015: Installing host image size of 183M took 8 seconds

Thu Jun 25 14:07:33 UTC 2015: File system creation on /dev/sda2 took 4 seconds

Thu Jun 25 14:08:38 UTC 2015: Copying XR iso to repository took 65 seconds

Partitioning PCI block device /dev/sdb

Added VLAN with VID == 513 to IF -:eth-pf1:-

Thu Jun 25 14:08:40 UTC 2015: Copying boot/install-image.iso from tftpserver 10.48.32.93

Thu Jun 25 14:16:58 UTC 2015: Copying Pxeboot files from tftpserver 10.48.32.93 took 498 seconds

Thu Jun 25 14:17:28 UTC 2015: File system creation on /dev/panini_vol_grp/calvados_lv0 took 5 seconds

Thu Jun 25 14:17:28 UTC 2015: Install sysadmin-vm image on /dev/panini_vol_grp/calvados_lv0

mount: block device /iso/ncs6k-sysadmin.iso is write-protected, mounting read-only

Thu Jun 25 14:17:35 UTC 2015: sysadmin-vm: RP based installation

Thu Jun 25 14:18:22 UTC 2015: Installing sysadmin-vm image size of 444M took 54 seconds

Install EFI on /dev/sda4

Thu Jun 25 14:18:24 UTC 2015: Install finished on sda

Resetting BIOS Boot Mode register ...

Automatic rebooting system after installation ...

Cisco BIOS version : SB.Panini.0014.00

BIOS Build Date : 07/10/2014 by lchinnad

System Memory Speed : 1600 MHz

Processor Type : Intel(R) Xeon(R) CPU E5-2448L @ 1.80GHz

Press F12 to goto Boot Manager..

Booting System Host OS..

GNU GRUB version 2.00

Press F2 to goto grub Menu..

Booting from Disk..

Loading Kernel..

Loading initrd..

Starting udev: [  OK  ]

Setting hostname sysadmin-vm:  [  OK  ]

Checking filesystems:[  OK  ]

Mount /dev/vdd at /misc/disk1

Entering non-interactive startup

Bringing up loopback interface:  [  OK  ]

Starting system logger: [  OK  ]

Starting kernel logger: [  OK  ]

Starting system message bus: [  OK  ]

Starting smartd: [FAILED]

Generating SSH1 RSA host key: [  OK  ]

Generating SSH2 RSA host key: [  OK  ]

Generating SSH2 DSA host key: [  OK  ]

Starting sshd: [  OK  ]

Starting xinetd: [  OK  ]

Starting crond: [  OK  ]

Starting libvirtd daemon: [  OK  ]

Starting NCS6k programs for RP on sysadmin-vm: [  OK  ]

starting pm

sysadmin_startup: Starting Cisco Login Program on ttyS0

sysadmin initialized

sysadmin_startup: Starting Cisco Login Program on ttys1

sysadmin initialized

0_0_0Jun 25 14:19:32 : Send To Helper Failed - Msg : aaad[2600]: %MGBL-AAAD-7-DEBUG : AAA Init successful

0_0_0Jun 25 14:19:33 : Send To Helper Failed - Msg : vm_manager[2628]: %INFRA-VM_MANAGER-4-INFO : Info: VM Manager started. arguments  -W

0_0_0Jun 25 14:19:34 : Send To Helper Failed - Msg : sdr_mgr[2619]: %SM-SDR_MANAGER-4-INFO : Info: SDR Manager started.

SYSTEM IS NOT READY FOR LOGIN

!!!NO root-system username is configured. Need to configure root-system username!!!

--- Administrative User Dialog ---

Enter root-system Username: 0_0_0Jun 25 14:20:58 : Send To Helper Failed - Msg : plx_fpd[2616]: %INFRA-FPD_Driver-1-UPGRADE_ALERT : Driver missing fpd obfl log function for fpd PLX-8748, FPD init continues but debugability impacted

0/RP0/ADMIN0:Jun 25 14:20:58.410 : envmon[2609]: %PKT_INFRA-FM-4-FAULT_MINOR : ALARM_MINOR :Unsupported power module detected :DECLARE :0/PT0-PM0:

0/RP0/ADMIN0:Jun 25 14:20:58.417 : envmon[2609]: %PKT_INFRA-FM-4-FAULT_MINOR : ALARM_MINOR :Unsupported power module detected :DECLARE :0/PT0-PM1:

0/RP0/ADMIN0:Jun 25 14:20:58.418 : envmon[2609]: %PKT_INFRA-FM-4-FAULT_MINOR : ALARM_MINOR :Unsupported power module detected :DECLARE :0/PT0-PM2:

0/RP0/ADMIN0:Jun 25 14:20:58.434 : envmon[2609]: %PKT_INFRA-FM-4-FAULT_MINOR : ALARM_MINOR :Unsupported power module detected :DECLARE :0/PT3-PM0:

0/RP0/ADMIN0:Jun 25 14:20:58.445 : envmon[2609]: %PKT_INFRA-FM-4-FAULT_MINOR : ALARM_MINOR :Unsupported power module detected :DECLARE :0/PT3-PM1:

0/RP0/ADMIN0:Jun 25 14:20:58.451 : envmon[2609]: %PKT_INFRA-FM-4-FAULT_MINOR : ALARM_MINOR :Unsupported power module detected :DECLARE :0/PT3-PM2:

0/RP0/ADMIN0:Jun 25 14:20:58.517 : zen[2630]: %INFRA-FPD_Driver-1-UPGRADE_ALERT : Driver missing fpd obfl log function for fpd CPU Complex FPGA, FPD init continues but debugability impacted

Enter root-system Username: root

Enter secret:

Enter secret again:

Successfully created root-system user

System Admin Username: root

Password:

root connected from 127.0.0.1 using console on sysadmin-vm:0_RP0

sysadmin-vm:0_RP0# show platform

Thu Jun  25 14:21:33.150 UTC

Location  Card Type               HW State      SW State      Config State

----------------------------------------------------------------------------

0/1       NC6-60X10GE-M-S         POWERED_ON    SW_INACTIVE   NSHUT

0/7       NC6-10X100G-M-P         POWERED_ON    SW_INACTIVE   NSHUT

0/RP0     NC6-RP                  OPERATIONAL   OPERATIONAL   NSHUT

0/RP1     NC6-RP                  POWERED_ON    SW_INACTIVE   NSHUT

0/FC0     P-L-FC-S                POWERED_ON    N/A           NSHUT

0/FC1     P-L-FC-S                POWERED_ON    N/A           NSHUT

0/FC2     P-L-FC-S                POWERED_ON    N/A           NSHUT

0/FC3     P-L-FC-S                POWERED_ON    N/A           NSHUT

0/FC4     P-L-FC-S                POWERED_ON    N/A           NSHUT

0/FC5     P-L-FC-S                POWERED_ON    N/A           NSHUT

0/CI0     NCS-CRFT=               OPERATIONAL   N/A           NSHUT

0/FT0     NC6-FANTRAY             OPERATIONAL   N/A           NSHUT

0/FT1     NC6-FANTRAY             OPERATIONAL   N/A           NSHUT

0/PT0     NCS-AC-PWRTRAY          OPERATIONAL   N/A           NSHUT

0/PT1     NCS-AC-PWRTRAY          OPERATIONAL   N/A           NSHUT

0/PT2     NCS-AC-PWRTRAY          OPERATIONAL   N/A           NSHUT

0/PT3     NCS-AC-PWRTRAY          OPERATIONAL   N/A           NSHUT

0/PT4     NCS-AC-PWRTRAY          OPERATIONAL   N/A           NSHUT

0/PT5     NCS-AC-PWRTRAY          OPERATIONAL   N/A           NSHUT

Au bout d'un certain temps, d'autres cartes RP et de ligne démarrent également.