Table des matières

Introduction

Conditions préalables

Exigences

Composants utilisés

Informations générales

Configurer

Diagramme du réseau

ASR1K

ASR9K

Vérifier

Dépannage

Commande de vérification de la configuration ASR9K

Vérifier les XC L2VPN

Vérifier la liste des interfaces

Vérifier PWHE utilisé par une liste d'interfaces

Vérifiez que MA dispose du PWHE avec les bonnes informations

Vérifier les informations récapitulatives PWHE

Vérifier les étiquettes

Abandon du trafic/Les sessions ne s'affichent pas

Commandes show associées à BNG

Débogages à activer

Escalade

Introduction

Ce document décrit les étapes pour configurer des sessions IP over Ethernet (IPoE) sur Pseudowire Headend (PWHE) sur ASR9K.

Conditions préalables

Exigences

Cisco vous recommande de prendre connaissance des rubriques suivantes :

- VPN de couche 2 MPLS

- Fonctionnalité BNG sur ASR9K

Conseil : reportez-vous à l'article Broadband Network Gateway Configuration Guide for Cisco ASR 9000 Series Cisco afin de vous familiariser avec la fonctionnalité BNG.

Conseil : reportez-vous à l'article Cisco du Guide de configuration des VPN de couche 2 MPLS afin de vous familiariser avec les VPN de couche 2 MPLS.

Composants utilisés

Ce document n'est pas limité à une version logicielle spécifique, mais la carte de ligne que nous avons utilisée sur ASR9K est A9K-MPA-20X1GE.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Informations générales

BNG assure la prise en charge des abonnés sur PWHE. PWHE fournit une connectivité de couche 3 aux noeuds de périphérie du client par le biais d'une connexion pseudo-filaire. PWHE termine les circuits L2VPN qui existent entre les noeuds de périphérie de fournisseur d'accès (A-PE), vers une interface virtuelle, et effectue le routage sur le paquet IP natif. Chaque interface virtuelle peut utiliser une ou plusieurs interfaces physiques vers le cloud d'accès pour atteindre les routeurs des clients via les noeuds A-PE.

Remarque : cette fonctionnalité est prise en charge pour les abonnés PPPoE PTA, PPPoE LAC Subscriber Over PWHE et IPoE.

Configurer

Diagramme du réseau

Pour effectuer ce test, un ASR1K avec la version 154-3.S2 est utilisé et un ASR9K avec la version IOS-XR 5.2.2. Le protocole OSPF est utilisé comme protocole de routage pour atteindre les adresses de bouclage des autres.

Adresse de bouclage ASR9K : 10.1.1.1/32

Adresse de bouclage ASR1K : 10.2.2.2/32

ASR1K

pseudowire-class MPLS

encapsulation mpls

interface GigabitEthernet1/0/0

no ip address

media-type rj45

negotiation auto

cdp enable

xconnect 10.1.1.1 2020 encapsulation mpls pw-class MPLS

end

ASR1K#show etherchannel summary

Flags:  D - down        P/bndl - bundled in port-channel

I - stand-alone s/susp - suspended

H - Hot-standby (LACP only)

R - Layer3      S - Layer2

U - in use      f - failed to allocate aggregator

M - not in use, minimum links not met

u - unsuitable for bundling

w - waiting to be aggregated

d - default port

Number of channel-groups in use: 1

Number of aggregators:           1

Group  Port-channel  Protocol    Ports

------+-------------+-----------+-----------------------------------------------

20 Po20(RU) LACP  Gi1/0/1(bndl) Gi1/1/1(bndl)

RU - L3 port-channel UP State

SU - L2 port-channel UP state

P/bndl -  Bundled

S/susp  - Suspended

interface Port-channel20

ip address 192.168.20.2 255.255.255.0

no negotiation auto

mpls ip

end

ASR9K

Voici la configuration de ASR9K, qui agit comme BNG PWHE.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show bundle bundle-ether 20

Thu May 21 06:35:39.294 UTC

Bundle-Ether20

Status:                                    Up

Local links

: 2 / 0 / 2 Local bandwidth

: 2000000 (2000000) kbps MAC address (source): 10f3.1172.02c8 (Chassis pool) Inter-chassis link: No Minimum active links / bandwidth: 1 / 1 kbps Maximum active links: 64 Wait while timer: 2000 ms Load balancing: Default LACP: Operational Flap suppression timer: Off Cisco extensions: Disabled mLACP: Not configured IPv4 BFD: Not configured Port Device State Port ID B/W, kbps -------------------- --------------- ----------- -------------- ---------- Gi0/0/1/18 Local Active 0x8000, 0x0007 1000000 Link is Active Gi0/0/1/19 Local Active 0x8000, 0x0008 1000000 Link is Active interface Bundle-Ether20 ipv4 address 192.168.20.1 255.255.255.0 load-interval 30 !

Configurez à présent l'interconnexion entre ASR1K et ASR9K. Spécifiez l'adresse de bouclage de ASR1K (10.2.2.2/32) en tant que voisin xconnect.

l2vpn

router-id 10.1.1.1

pw-class ASR1K

encapsulation mpls

transport-mode ethernet

!

!

xconnect group PWHE

p2p ASR1K

interface PW-Ether20

neighbor ipv4 10.2.2.2 pw-id 2020

pw-class ASR1K

!

!

!

!

generic-interface-list BE20_ONLY

interface Bundle-Ether20

interface GigabitEthernet0/0/1/18

interface GigabitEthernet0/0/1/19

!

interface PW-Ether20

ipv4 address 192.168.1.1 255.255.255.0

attach generic-interface-list BE20_ONLY

!

À présent, configurez la stratégie de contrôle de l'abonné et appliquez-la sur l'interface PW-Ethernet où l'abonné se termine.

dynamic-template

type ipsubscriber WDAAR_PWHE_DT

ipv4 verify unicast source reachable-via rx

ipv4 unnumbered Loopback44

ipv4 unreachables disable

!

!

policy-map type control subscriber IPoE_WDAAR_PWHE

event session-start match-first

class type control subscriber DHCPv4 do-until-failure

5 authorize aaa list WDAAR identifier source-address-mac password cisco

10 activate dynamic-template WDAAR_PWHE_DT

!

!

end-policy-map

interface PW-Ether20.250

ipv4 address 192.168.10.1 255.255.255.252

service-policy type control subscriber IPoE_WDAAR_PWHE

encapsulation dot1q 250

ipsubscriber ipv4 l2-connected

initiator dhcp

!

!

Vérifier

Cette section fournit des informations que vous pouvez utiliser afin de vérifier que votre configuration fonctionne correctement. Voici les commandes que vous pouvez utiliser pour vérifier que xconnect est UP/UP sur ASR9K.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect

Legend: ST = State, UP = Up, DN = Down, AD = Admin Down, UR = Unresolved,

SB = Standby, SR = Standby Ready, (PP) = Partially Programmed

XConnect                   Segment 1                       Segment 2

Group      Name       ST   Description            ST       Description            ST

------------------------   -----------------------------   -----------------------------

PWHE       ASR1K      UP   PE20                   UP       10.2.2.2         2020   UP

----------------------------------------------------------------------------------------

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect brief

AToM

Like-to-Like                        UP       DOWN        UNR

PW-Ether                           1          0          0

Total                              1          0          0

Total                                1          0          0

Total: 1 UP, 0 DOWN, 0 UNRESOLVED

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show subscriber session filter ipv4-address 192.168.44.254

Codes: IN - Initialize, CN - Connecting, CD - Connected, AC - Activated,

ID - Idle, DN - Disconnecting, ED - End

Type         Interface                State     IP Address (Vrf)

--------------------------------------------------------------------------------

IP:DHCP      PE20.250.ip1             AC        192.168.44.254 (default)

Une fois que l'xconnect est activé et que la session IPoE est en ligne sur ASR9K, vous pouvez voir que l'interface d'accès est PW-Ether.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show subscriber session filter ipv4-address 192.168.44.254 detail

Interface:                PW-Ether20.250.ip1

Circuit ID:               Unknown

Remote ID:                Unknown

Type:                     IP: DHCP-trigger

IPv4 State:               Up, Mon Apr 20 19:32:51 2015

IPv4 Address:             192.168.44.254, VRF: default

Mac Address:              001f.ca3f.7924

Account-Session Id:       00000068

Nas-Port:                 Unknown

User name:                001f.ca3f.7924

Formatted User name:      unknown

Client User name:         unknown

Outer VLAN ID:            250

Subscriber Label:         0x000001db

Created:                  Mon Apr 20 19:32:49 2015

State:                    Activated

Authentication:           unauthenticated

Authorization:            authorized

Access-interface: PW-Ether20.250 Policy Executed:

policy-map type control subscriber IPoE_WDAAR_PWHE

event Session-Start match-first [at Mon Apr 20 19:32:49 2015]

class type control subscriber DHCPv4 do-until-failure [Succeeded]

5 authorize aaa list WDAAR [Succeeded]

10 activate dynamic-template WDAAR_PWHE_DT [Succeeded]

Session Accounting: disabled

Last COA request received: unavailable

Vérifiez à présent la connectivité de couche 3 de l'abonné BNG sur PWHE.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#ping 192.168.44.254

Mon Feb 23 19:37:58.188 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.44.254, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/2 ms

RP/0/RSP0/CPU0:ACDC-ASR9000-1#

Dépannage

Cette section fournit des informations que vous pouvez utiliser afin de dépanner votre configuration et de vérifier l'état xconnect sur ASR9K.

Commande de vérification de la configuration ASR9K

Ces commandes permettent de vérifier que la configuration est correcte sur ASR9K.

- show running-configuration l2vpn

- show running-configuration int PW-Ether<Numéro d’interface>

- show running-configuration mpls ldp

- show running-configuration generic-interface-list

Chèque VPN de couche 2 XC's

Vérifiez l'interconnexion. L'xconnect (et par conséquent le CA et le PW) doit être activé. Vous pouvez utiliser ces commandes pour vérifier l'état.

- show l2vpn xconnect summary

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect summary

Thu May 21 05:40:05.068 UTC

Number of groups: 1

Number of xconnects: 1

Up: 1  Down: 0  Unresolved: 0 Partially-programmed: 0

AC-PW: 1  AC-AC: 0  PW-PW: 0 Monitor-Session-PW: 0

Number of Admin Down segments: 0

Number of MP2MP xconnects: 0

Up 0 Down 0

Advertised: 0 Non-Advertised: 0

Number of CE Connections: 0

Advertised: 0 Non-Advertised: 0

Backup PW:

Configured   : 0

UP           : 0

Down         : 0

Admin Down   : 0

Unresolved   : 0

Standby      : 0

Standby Ready: 0

Backup Interface:

Configured   : 0

UP           : 0

Down         : 0

Admin Down   : 0

Unresolved   : 0

Standby      : 0

show l2vpn xconnect interface <Interface> detail

OR

show l2vpn xconnect detai

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect interface pw-eth20 detail

Thu May 21 05:40:55.789 UTC

Group PWHE, XC ASR1K, state is up; Interworking none

AC: PW-Ether20, state is up

Type PW-Ether

Interface-list: BE20_ONLY

Replicate status:

BE20: success

Gi0/0/1/18: success

Gi0/0/1/19: success

MTU 1500; interworking none

Internal label: 16001

Statistics:

packets: received 52970, sent 0

bytes: received 3485714, sent 0

PW: neighbor 10.2.2.2, PW ID 2020, state is up ( established )

PW class asr1k, XC ID 0xc0000001

Encapsulation MPLS, protocol LDP

Source address 10.1.1.1

PW type Ethernet, control word disabled, interworking none

PW backup disable delay 0 sec

Sequencing not set

PW Status TLV in use

MPLS         Local                          Remote

------------ ------------------------------ -----------------------------

Label        16002                          17

Group ID     0x920                          unknown

Interface    PW-Ether20                     unknown

MTU          1500                           1500

Control word disabled                       disabled

PW type      Ethernet                       Ethernet

VCCV CV type 0x2                            0x2

(LSP ping verification)        (LSP ping verification)

VCCV CC type 0x6                            0x6

(router alert label)           (router alert label)

(TTL expiry)                   (TTL expiry)

------------ ------------------------------ -----------------------------

Incoming Status (PW Status TLV):

Status code: 0x0 (Up) in Notification message

Outgoing Status (PW Status TLV):

Status code: 0x0 (Up) in Notification message

MIB cpwVcIndex: 3221225473

Create time: 21/05/2015 02:52:43 (02:48:12 ago)

Last time status changed: 21/05/2015 05:21:17 (00:19:38 ago)

Last time PW went down: 21/05/2015 03:10:45 (02:30:10 ago)

Statistics:

packets: received 52970, sent 0

bytes: received 3485714, sent 0

Vérifier la liste des interfaces

Affichez la liste d'interfaces utilisée par le PWHE : elle doit exister et avoir les interfaces appropriées.

- show generic-interface-list name <NOM>

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show generic-interface-list name BE20_ONLY

Thu May 21 05:43:26.649 UTC

generic-interface-list: BE20_ONLY (ID: 1, interfaces: 3)

Bundle-Ether20 - items pending 0, downloaded to FIB

GigabitEthernet0/0/1/18 - items pending 0, downloaded to FIB

GigabitEthernet0/0/1/19 - items pending 0, downloaded to FIB

Number of items: 1

List is downloaded to FIB

Vérifier PWHE utilisé par une liste d'interfaces

La sortie privée ci-dessous indique quelles interfaces membres sont « actives », c'est-à-dire celles qui ont été téléchargées sur FIB.

- show l2vpn generic-interface-list name <NOM>

- show l2vpn generic-interface-list private

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn generic-interface-list name BE20_ONLY detail

Thu May 21 05:39:04.983 UTC

Generic-interface-list: BE20_ONLY (ID: 1, interfaces: 3)

Bundle-Ether20 - items pending 0

GigabitEthernet0/0/1/18 - items pending 0

GigabitEthernet0/0/1/19 - items pending 0

Number of items: 1

PW-Ether: 20

Vérifiez que MA dispose du PWHE avec les bonnes informations

Les informations de liste d'interfaces, CW, VC-type, etc., doivent être définies correctement dans MA.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn ma pwhe interface PW-Ether 20 private

Thu May 21 05:36:28.170 UTC

Interface: PW-Ether20   Interface State: Up, Admin state: Up

Interface handle 0x920

MTU:  1514

BW:   10000 Kbit

Interface MAC addresses (1 address):

10f3.1172.02c5

IDB is not in Replicate Linked List

IDB is not in Create Linked List

IDB is not in Attr Linked List

Opaque flags: 0xe

Flags: 0x3c

Valid  : IFH, MTU, MAC, BW

MA trace history [Num events: 32]

---------------------------------------------------

Time                Event                     Value      Sticky Many

====                =====                     ========== ====== ====

05/21/2015 02:56:05 Remove retry list         0x3        No     No

05/21/2015 02:56:05 IDB Set flag              0x3c       No     No

05/21/2015 03:08:26 IDB Set State             0x1        No     No

05/21/2015 03:08:26 IM publish attr           0x45       No     No

05/21/2015 03:08:26 IM update init-data       0x1e       No     No

05/21/2015 03:08:26 IDB Set flag              0x3c       No     No

05/21/2015 03:08:26 Remove retry list         0x3        No     No

05/21/2015 03:08:26 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 IDB Set State             0          No     No

05/21/2015 03:09:54 IM publish attr           0x45       No     No

05/21/2015 03:09:54 IM publish attr           0x52       No     No

05/21/2015 03:09:54 IM update init-data       0x1e       No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 Remove retry list         0x3        No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 Remove retry list         0x3        No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:10:45 IDB Set State             0x1        No     No

05/21/2015 03:10:45 IM publish attr           0x45       No     No

05/21/2015 03:10:45 IM update init-data       0x1e       No     No

05/21/2015 03:10:45 IDB Set flag              0x3c       No     No

05/21/2015 03:10:45 Remove retry list         0x3        No     No

05/21/2015 03:10:45 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 IDB Set State             0          No     No

05/21/2015 05:21:17 IM publish attr           0x45       No     No

05/21/2015 05:21:17 IM publish attr           0x52       No     No

05/21/2015 05:21:17 IM update init-data       0x1e       No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 Remove retry list         0x3        No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 Remove retry list         0x3        No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

CLIENT MA trace history [Num events: 27]

---------------------------------------------------

Time                Event                     Value      Sticky Many

====                =====                     ========== ====== ====

05/21/2015 02:54:01 IM Notify Up              0x50049e10 No     No

05/21/2015 02:54:01 FSM state change          0x200      No     No

05/21/2015 02:54:01 FSM state change          0x2030d    No     No

05/21/2015 02:54:02 Double restart detected   0x5        No     No

05/21/2015 02:55:00 I/f created/added         0x4000540  No     No

05/21/2015 02:55:00 I/f created/added         0x4000580  No     No

05/21/2015 02:55:00 I/f created/added         0x4000540  No     No

05/21/2015 02:55:00 I/f created/added         0x4000580  No     No

05/21/2015 02:55:00 Intf list change          0x3000300  No     No

05/21/2015 02:55:00 Intf add error            0x4000540  No     No

05/21/2015 02:55:00 Intf add error            0x4000580  No     No

05/21/2015 02:55:00 FSM state change          0x30505    No     No

05/21/2015 02:55:01 Replicate result          0x13fe     No     No

05/21/2015 02:55:01 FSM state change          0x5060b    No     No

05/21/2015 02:55:01 I/f up                    0x4000580  No     No

05/21/2015 02:55:01 I/f up                    0x4000580  No     No

05/21/2015 02:55:02 I/f up                    0x4000540  No     No

05/21/2015 02:55:02 I/f up                    0x4000540  No     No

05/21/2015 02:56:05 Added to peer             0x6060606  No     No

05/21/2015 02:56:05 FSM state change          0x60704    No     No

05/21/2015 02:56:05 Fill VIMI attr            0x20002    No     No

05/21/2015 03:08:26 FSM state change          0x70605    No     No

05/21/2015 03:09:54 FSM state change          0x60704    No     No

05/21/2015 03:09:54 Fill VIMI attr            0x20002    No     No

05/21/2015 03:10:45 FSM state change          0x70605    No     No

05/21/2015 05:21:17 FSM state change          0x60704    No     No

05/21/2015 05:21:17 Fill VIMI attr            0x20002    No     No

PW-HE IDB client data

---------------------

IDB handle 0x5016db2c

Dot1q vlan: 0x81000000

Label: 16001

Remote VC label: 17

Remote PE: 10.2.2.2

Use flow-label on tx: N

L2-overhead: 0

VC-type: 5

CW: N

FSM state: 'Up'(7)

Fwding is up: Y, got route update: Y

Use OWNED_RESOURCE fwding: N

OWNED_RESOURCE fwding is up: N

OWNED_RESOURCE data&colon; 0

Replication error msg has been printed: N

VIF MA reg_handle: 50049e10

PIC array:

(nil)

Replicate retry count: 0

Configured i/f list name: 'BE20_ONLY'

From L2VPN i/f list name: 'BE20_ONLY', i/f list id: 1

L3 i/f:'Bundle-Ether20', idx=0, repl_status 1, fwding up:N, active:Y

L3 i/f:'GigabitEthernet0/0/1/18', idx=1, repl_status 1, fwding up:Y, active:Y

L3 i/f:'GigabitEthernet0/0/1/19', idx=2, repl_status 1, fwding up:Y, active:Y

List intf: 0x5016e154, PLs size:4, num in use:2

I/f:'Gi0/0/1/18', ifh:0x4000540, bundle: 0xb20, ifl idx:1, in-use:Y, misconfig:Y, in peer route:Y, VIMI active:Y

Repl:Y pending:N failed:N not supp:N, unrepl pending:N failed:N, up:Y us:3

I/f:'Gi0/0/1/19', ifh:0x4000580, bundle: 0xb20, ifl idx:2, in-use:Y, misconfig:Y, in peer route:Y, VIMI active:Y

Repl:Y pending:N failed:N not supp:N, unrepl pending:N failed:N, up:Y us:3

I/f:'', ifh:0x0, bundle: 0x0, ifl idx:0, in-use:N, misconfig:N, in peer route:N, VIMI active:N

Repl:N pending:N failed:N not supp:N, unrepl pending:N failed:N, up:N us:0

I/f:'', ifh:0x0, bundle: 0x0, ifl idx:0, in-use:N, misconfig:N, in peer route:N, VIMI active:N

Repl:N pending:N failed:N not supp:N, unrepl pending:N failed:N, up:N us:0

---------------------------------------------------

Vérifier les informations récapitulatives PWHE

Vérifiez que les compteurs en sortie sont corrects :

- show l2vpn pwhe summary

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn pwhe summary

Thu May 21 05:35:59.381 UTC

Number of PW-HE interfaces: 1

Up: 1  Down: 0  Admindown: 0

PW-Ether: 1

Up: 1  Down: 0  Admindown: 0

PW-IW: 0

Up: 0  Down: 0  Admindown: 0

Vérifier les étiquettes

Cochez étiquette dans la table des étiquettes. Vous devez d'abord obtenir les étiquettes internes à partir des informations xconnect à l'aide de cette commande.

- show l2vpn xconnect detail

recherchez ensuite internal Label dans la sortie, puis exécutez cette commande show pour vérifier l'association entre l'étiquette et l'interface sur ASR9K.

- show mpls label table label label <internal_label> detail

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect detail

Thu May 21 05:27:11.762 UTC

Group PWHE, XC ASR1K, state is up; Interworking none

AC: PW-Ether20, state is up

Type PW-Ether

Interface-list: BE20_ONLY

Replicate status:

BE20: success

Gi0/0/1/18: success

Gi0/0/1/19: success

MTU 1500; interworking none

Internal label: 16001

Statistics:

packets: received 27293, sent 0

bytes: received 1996176, sent 0

PW: neighbor 10.2.2.2, PW ID 2020, state is up ( established )

PW class asr1k, XC ID 0xc0000001

Encapsulation MPLS, protocol LDP

Source address 10.1.1.1

PW type Ethernet, control word disabled, interworking none

PW backup disable delay 0 sec

Sequencing not set

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show mpls label table label 16001 detail

Thu May 21 05:27:55.760 UTC

Table Label   Owner                        State  Rewrite

----- ------- ---------------------------- ------ -------

0     16001   L2VPN:Active                 InUse  Yes

(PW-HE, vers:0, intf=PE20)

Abandon du trafic/Les sessions ne s'affichent pas

Si la session ne s'ouvre pas, vérifiez si les paquets sont abandonnés dans NP. Vous pouvez utiliser ces commandes pour voir la perte de paquets dans NP sur ASR9K.

- clear counters

- show l2vpn xconnect detail | inclure le paquet

- clear controllers np counters all

- show controller np counters all

Commandes show associées à BNG

Utilisez ces commandes afin de vérifier les informations relatives à BNG sur ASR9K.

- show subscriber session all summary

- show subscriber manager disconnect-history unique summary

- show subscriber manager statistics debug total

- show subscriber manager statistics summary total

- show subscriber manager trace event/error

Débogages à activer

Si la session n'est pas arrivée sur ASR9K et que vous n'avez pas trouvé de paquet abandonné sur NP, vous pouvez activer ces débogages sur ASR9K pour voir pourquoi la session n'est pas arrivée dans ASR9K.

- debug l2vpn ea pwhe platform verbose

- debug l2vpn forwarding platform common all

- debug pm api location <location>

- debug pm error location <location>

- debug uidb api errors location <location>

Escalade

Si vous rencontrez toujours un problème, contactez le centre d'assistance technique Cisco et récupérez le produit Show tech auprès de l'ASR9K.

- show tech-support subscriber

- show tech-support l2vpn