Table des matières

Introduction

Conditions préalables

Exigences

Composants utilisés

Conventions

Informations générales

Configurer

Diagramme du réseau

Configurations

Vérifier

Dépannage

Informations connexes

Introduction

Ce document fournit un exemple de configuration pour un routeur de ligne d'abonné numérique (DSL) Cisco 827 connecté à un multiplexeur d'accès de ligne d'abonné numérique (DSLAM) Cisco 6130, qui se termine sur un concentrateur d'accès universel (UAC) Cisco 6400.

Conditions préalables

Exigences

Aucune exigence spécifique n'est associée à ce document.

Composants utilisés

Les informations contenues dans ce document sont basées sur les versions de matériel et de logiciel suivantes :

- Équipement d'abonné (CPE) Cisco 827-4V avec logiciel IOS® version 12.1(1)XB.

- Logiciel Cisco 6400 UAC-NRP IOS Version 12.1(1)DC1 (serveur DHCP externe) ou 12.2(2)B (serveur DHCP IOS).

- Logiciel Cisco 6400 UAC-NSP IOS Version 12.0(4)DB.

- Logiciel Cisco 6130 DSLAM-NI2 IOS Version 12.1(1)DA.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Pour plus d'informations sur les conventions utilisées dans ce document, reportez-vous aux Conventions relatives aux conseils techniques Cisco.

Informations générales

Le Cisco 827 est configuré avec le pontage RFC1483 et le routage et le pontage intégrés (IRB). Le Cisco 827 permet aux PC du segment Ethernet d’obtenir des adresses d’un serveur DHCP derrière le 6400 ou du serveur DHCP IOS 6400. En outre, l'adresse BVI a également été configurée pour obtenir une adresse et une route par défaut du serveur DHCP. L’interface ATM (asynchronous transfer mode) du Cisco 6400 est configurée avec l’encapsulation de pont routé (RBE) et est configurée pour fonctionner avec un serveur DHCP externe ou un serveur DHCP IOS sur le NRP.

Pour le Cisco 6400, la fonction ATM RBE du processeur de routage de noeud (NRP) du Cisco 6400 achemine le trafic IP sur Ethernet RFC1483 ponté à partir d'un LAN à pontage d'extrémité. Les paquets IP pontés reçus sur une interface ATM configurée en mode route-bridged sont acheminés via l'en-tête IP. Les interfaces tirent parti des caractéristiques d'une topologie LAN d'extrémité couramment utilisée pour l'accès DSL et offrent des performances et une flexibilité accrues par rapport à l'IRB.

En outre, les routes d’hôte pour les clients DHCP sont automatiquement ajoutées à la table de routage 6400 lorsque les adresses IP sont distribuées. Les routes hôtes sont supprimées de la table de routage lorsque l’adresse DHCP est libérée.

Configurer

Cette section vous fournit des informations pour configurer les fonctionnalités décrites dans ce document.

Remarque : Pour en savoir plus sur les commandes utilisées dans le présent document, utilisez l’outil de recherche de commandes (clients inscrits seulement).

Diagramme du réseau

Ce document utilise la configuration réseau illustrée dans les figures 1 et 2 :

Figure 1 : scénario 1

Figure 2 : scénario 2

Configurations

Ce document utilise les configurations suivantes :

- Cisco 827

- NRP Cisco 6400

- Débogage du 6400 (utilisation de RBE avec un serveur DHCP externe)

- Débogage du 6400 (utilisation de RBE avec le serveur DHCP IOS)

Cisco 827

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R1

!

ip subnet-zero

!

bridge irb

!

interface Ethernet0

no ip address

bridge-group 1

!--- Because the Ethernet0 is bridged to the WAN interface, !--- PCs behind the ethernet0 can be setup as DHCP clients. !--- They get their addresses from the DHCP server behind the 6400, !--- or from the IOS DHCP server on the 6400.

!

interface ATM0

no ip address

no ip directed-broadcast

no ip mroute-cache

no atm ilmi-keepalive

pvc 4/100

encapsulation aal5snap

!

bundle-enable

bridge-group 1

hold-queue 224 in

!

interface BVI1

ip address dhcp client-id Ethernet0

!--- This command tells the BVI interface to get the address !--- from DHCP, and also to get the default route from DHCP.

!

ip classless

!--- Note: The default route will be inserted into !--- the routing table automatically from the DHCP server, and !--- no static routing statement is required.

no ip http server

!

bridge 1 protocol ieee

bridge 1 route ip

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

NRP Cisco 6400

Current configuration:

!

version 12.1

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

redundancy

main-cpu

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface Loopback1

ip address 198.1.1.1 255.255.255.0

no ip directed-broadcast

!--- This address and mask must match the intended !--- scope and network configured on the external DHCP server.

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip mroute-cache

no ATM ilmi-keepalive

!

interface ATM0/0/0.4 point-to-point

!--- The interface ATM0/0/0.4 point-to-point uses IP !--- unnumbered Loopback1 for its IP address requirements.

ip unnumbered Loopback1

ip helper-address <dhcp server ip address>

atm route-bridged ip

PVC 4/100

encapsulation aal5snap

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

ip classless

!--- Note: For every DHCP client that is relayed an address, !--- a host route will be automatically inserted in the routing !--- table, and no host route statement for a DHCP client is required.

end

Débogage du 6400 (utilisation de RBE avec un serveur DHCP externe)

debug ip dhcp server events

Looks for existing binding. . .

00:10:56:  find_or_create(): Look for existing binding for:

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

00:10:56:  find_or_create(): Creating new binding with data

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

!--- Forwards DHCP DISCOVER packet from the client to the !--- external DHCP server.

00:10:56: DHCPD: Received DHCPDISCOVER on UNNUM-IF

00:10:56: DHCPD: Forwarding reply on un-numbered intf

!--- Forwards the DHCP OFFER packet from the external DHCP server !--- to the client.

00:10:56: DHCPD: Unnum: Received DHCPOFFER

00:10:56:  DHCPD: Server Address = 200.200.200.2

00:10:56:  DHCPD: Giaddr Address = 124.124.124.1

00:10:56:  find_or_create(): Look for existing binding for:

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

!--- Forwards the DHCP REQUEST packet from the client to the external !--- DHCP server.

00:10:56: DHCPD: Received DHCPREQUEST on UNNUM-IF

00:10:56:  DHCPD: request_on_unnumif ():Real Server = 200.200.200.2

00:10:56: DHCPD: Forwarding reply on un-numbered intf

!--- Forwards the DHCP ACK packet from the DHCP server to the client.

00:10:56: DHCPD: Unnum: Received DHCPACK

00:10:56:  DHCPD: lease time = 86400

!--- Adds a dynamic host route to the client into the routing table.

00:10:56: DHCPD: dhcpd_lookup_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: index = 126

00:10:56:  DHCPD: Adding new route to host 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: index = 126

00:10:56: DHCPD: dhcpd_create_and_hash_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_create_and_hash_route index = 126

00:10:56: DHCPD: dhcpd_add_route: lease = 86400

00:10:56:  DHCPD: Server ID saved in Binding = 200.200.200.2

00:10:56:  DHCPD: Server ID saved in Route block = 200.200.200.2

00:10:56:  DHCPD: Giaddr Address = 124.124.124.1

Débogage du 6400 (utilisation de RBE avec le serveur DHCP IOS)

debug ip dhcp server events

Assigns an address to the client from the IOS DHCP server.

23:19:09: DHCPD: assigned IP address 124.124.124.3 to

client 0063.6973.636f.2d30.3030.302e.3063.3036.2e32.3339.342d.4256.31.

23:19:10:  DHCPD: lease time = 86400

Adds a dynamic host route to the client into the routing table.

23:19:10: DHCPD: dhcpd_lookup_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: index = 127

23:19:10:  DHCPD: Adding new route to host 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: index = 127

23:19:10: DHCPD: dhcpd_create_and_hash_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_create_and_hash_route index = 127

23:19:10: DHCPD: dhcpd_add_route: lease = 86400

Vérifier

Aucune procédure de vérification n'est disponible pour cette configuration.

Dépannage

Il n'existe actuellement aucune information de dépannage spécifique pour cette configuration.

Informations connexes

- Configuration d'un routeur Cisco 827 avec terminaison sur Cisco 6400 en mode RBE à l'aide du pontage RFC1483

- Page d'assistance produit DSL