Table des matières

Introduction

Conditions préalables

Exigences

Composants utilisés

Conventions

Informations générales

Procédure pas à pas

Exemple de procédure de récupération de mot de passe

Informations connexes

Introduction

Ce document décrit comment récupérer les mots de passe enable password et enable secret de votre routeur.

Conditions préalables

Exigences

Aucune exigence spécifique n'est associée à ce document.

Composants utilisés

Les informations contenues dans ce document sont basées sur la version matérielle suivante :

- Routeur à services intégrés Cisco 1900

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Si votre réseau est en ligne, assurez-vous de bien comprendre l’incidence possible des commandes.

Conventions

Pour plus d'informations sur les conventions utilisées dans ce document, reportez-vous à Conventions relatives aux conseils techniques Cisco.

Informations générales

Ces mots de passe protègent l'accès aux modes privilégiés EXEC et de configuration. Le mot de passe enable peut être récupéré, mais le mot de passe enable secret est chiffré et doit être remplacé par un nouveau mot de passe. Utilisez la procédure décrite dans ce document pour remplacer le mot de passe enable secret.

Procédure pas à pas

Pour récupérer votre mot de passe, procédez comme suit :

1. Connectez un terminal ou un PC avec émulation de terminal au port pour console du routeur. Utilisez les paramètres de terminal suivants :

- Débit de 9 600 bauds

- Aucune parité

- 8 bits de données

- 1 bit d'arrêt

- Aucun contrôle de flux

Pour plus d'informations sur la façon de raccorder et de connecter un terminal au port pour console ou au port AUX, reportez-vous aux documents suivants :

- Configuration des câbles requis pour la console et les ports AUX

- Comprendre la connexion du terminal à un port de console sur les commutateurs Catalyst

2. Si vous pouvez accéder au routeur, tapez show version à l'invite et enregistrez la valeur du registre de configuration. Reportez-vous à la section Exemple de procédure de récupération de mot de passe pour afficher le résultat d'une commande show version.

Remarque : le registre de configuration est généralement défini sur 0x2102 ou 0x102. Si vous ne pouvez plus accéder au routeur (en raison d'une perte de connexion ou d'un mot de passe TACACS), vous pouvez supposer en toute sécurité que votre registre de configuration est défini sur 0x2102

3. Arrêtez le routeur à l'aide du bouton d'alimentation, et rallumez-le.

4. Appuyez plusieurs fois sur la touche Break du clavier du terminal après avoir vu le message « program load complete, entry point : 0x80008000, size : 0x6fdb4c » (chargement du programme terminé), point d'entrée : 0x, size : 0x6fdb4c pour mettre le routeur en mode ROMMON.

Remarque : les valeurs de point d'entrée et de taille sont soumises aux routeurs.

Si la séquence d'interruption ne fonctionne pas, référez-vous à Utiliser les combinaisons de touches d'interruption standard pour la récupération de mot de passe pour d'autres combinaisons de touches.

Si vous ne parvenez pas à passer en mode ROMMON, procédez comme suit :

1. Supprimez la mémoire flash.

2. Rechargez le routeur. Le routeur se trouve en mode ROMMON.

3. Insérez le flash.

4. Suivez la procédure standard de récupération de mot de passe.

5. Tapez confreg 0x2142 à l'invite rommon 1> pour démarrer à partir de la mémoire flash.

Cette étape ignore la configuration de démarrage dans laquelle les mots de passe sont stockés.

6. Tapez reset à l'invite rommon 2>.

Le routeur redémarre, mais ignore la configuration enregistrée.

7. Tapez no après chaque question de configuration ou appuyez sur Ctrl-C pour ignorer la procédure de configuration initiale.

8. Tapez enable à l'invite Router>.

Vous êtes en mode enable et vous voyez l'invite Router# .

9. Tapez configure memory ou copy startup-config running-config pour copier la mémoire RAM non volatile (NVRAM) dans la mémoire.

Avertissement : n'entrez pas la commande copy running-config startup-config ni la commande write. Ces commandes effacent votre configuration de démarrage.

10. Tapez show running-config.

La commande show running-config affiche la configuration du routeur. Dans cette configuration, la commande shutdown apparaît sous toutes les interfaces, ce qui indique que toutes les interfaces sont actuellement arrêtées. De plus, les mots de passe (enable password, enable secret, vty et de console) sont au format chiffré ou non chiffré. Vous pouvez réutiliser les mots de passe non chiffrés. Vous devez remplacer les mots de passe chiffrés par un nouveau mot de passe.

11. Tapez configure terminal.

L'invite hostname(config)# s'affiche.

12. Tapez enable secret <password> pour modifier le mot de passe enable secret. Exemple :

hostname(config)#enable secret cisco

13. Émettez la commande no shutdown sur chaque interface que vous utilisez.

Si vous émettez une commande show ip interface brief, chaque interface que vous voulez utiliser doit afficher up .

14. Tapez config-register <valeur_registre_configuration>. Où configuration_register_value est soit la valeur que vous avez enregistrée à l'étape 2, soit 0x2102. Exemple :

hostname(config)#config-register 0x2102

15. Appuyez sur Ctrl-z ou sur end pour quitter le mode de configuration.

L'invite hostname# s'affiche.

16. Tapez write memory ou copy running-config startup-config pour valider les modifications apportées.

Exemple de procédure de récupération de mot de passe

Cette section fournit un exemple de procédure de récupération de mot de passe. Cet exemple a été créé avec un routeur ISR de la gamme Cisco 2900. Même si vous n'utilisez pas de routeur ISR Cisco 2900, ce résultat fournit un exemple de ce que vous ressentez sur votre produit.

Router>enable

Password:

Password:

Password:

% Bad secrets

Router>show version

Cisco IOS Software, C2900 Software (C2900-UNIVERSALK9-M), Version 15.0(1)M1,

RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2009 by Cisco Systems, Inc.

Compiled Wed 02-Dec-09 15:23 by prod_rel_team

ROM: System Bootstrap, Version 15.0(1r)M1, RELEASE SOFTWARE (fc1)

c2921-CCP-1-xfr uptime is 2 weeks, 22 hours, 15 minutes

System returned to ROM by reload at 06:06:52 PCTime Mon Apr 2 1900

System restarted at 06:08:03 PCTime Mon Apr 2 1900

System image file is "flash:c2900-universalk9-mz.SPA.150-1.M1.bin"

Last reload reason: Reload Command

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

Cisco CISCO2921/K9 (revision 1.0) with 475136K/49152K bytes of memory.

Processor board ID FHH1230P04Y

1 DSL controller

3 Gigabit Ethernet interfaces

9 terminal lines

1 Virtual Private Network (VPN) Module

1 Cable Modem interface

1 cisco Integrated Service Engine-2(s)

Cisco Foundation 2.2.1 in slot 1

DRAM configuration is 64 bits wide with parity enabled.

255K bytes of non-volatile configuration memory.

248472K bytes of ATA System CompactFlash 0 (Read/Write)

62720K bytes of ATA CompactFlash 1 (Read/Write)

Technology Package License Information for Module:'c2900'

----------------------------------------------------------------

Technology    Technology-package          Technology-package

Current       Type          Next reboot

-----------------------------------------------------------------

ipbase        ipbasek9      Permanent     ipbasek9

security      securityk9    Permanent     securityk9

uc            uck9          Permanent     uck9

data          datak9        Permanent     datak9

Configuration register is 0x2102

Router>

!--- The router was just powercycled, and during bootup a

!--- break sequence was sent to the router after seeing the following message

!--- program load complete, entry point: 0x80008000, size: 0x6fdb4c.

rommon 1 > confreg 0x2142

You must reset or power cycle for new config to take effect

rommon 2 > reset

System Bootstrap, Version 15.0(1r)M1, RELEASE SOFTWARE (fc1)

Copyright (c) 2009 by cisco Systems, Inc.

TAC:Home:SW:IOS:Specials for info

C2900 platform with 524288 Kbytes of main memory

program load complete, entry point: 0x80008000, size: 0x6fdb4c

Self decompressing the image : ###############################

##############################################################

##############################################################

##############################################################

############################### [OK]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco IOS Software, C2900 Software (C2900-UNIVERSALK9-M), Version 15.0(1)M1,

RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2009 by Cisco Systems, Inc.

Compiled Wed 02-Dec-09 15:23 by prod_rel_team

Cisco CISCO2921/K9 (revision 1.0) with 475136K/49152K bytes of memory.

Processor board ID FHH1230P04Y

1 DSL controller

3 Gigabit Ethernet interfaces

9 terminal lines

1 Virtual Private Network (VPN) Module

1 Cable Modem interface

1 cisco Integrated Service Engine-2(s)

Cisco Foundation 2.2.1 in slot 1

DRAM configuration is 64 bits wide with parity enabled.

255K bytes of non-volatile configuration memory.

248472K bytes of ATA System CompactFlash 0 (Read/Write)

62720K bytes of ATA CompactFlash 1 (Read/Write)

--- System Configuration Dialog ---

Would you like to enter the initial configuration dialog? [yes/no]:  n

Press RETURN to get started!

00:00:19: %LINK-3-UPDOWN: Interface BRI0/0, changed state to up

00:00:19: %LINK-3-UPDOWN: Interface Ethernet0/0, changed state to up

00:00:19: %LINK-3-UPDOWN: Interface Ethernet0/1, changed state to up

00:00:19: %LINK-3-UPDOWN: Interface Serial0/0, changed state to down

00:00:19: %LINK-3-UPDOWN: Interface Serial0/1, changed state to down

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0/0,

changed state to down

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/0,

changed state to up

Router>

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/1,

changed state to up

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0/0,

changed state to down

00:00:20: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0/1,

changed state to down

00:00:50: %SYS-5-RESTART: System restarted --

Cisco IOS Software, C2900 Software (C2900-UNIVERSALK9-M), Version 15.0(1)M1,

RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2009 by Cisco Systems, Inc.

Compiled Wed 02-Dec-09 15:23 by prod_rel_team

00:00:50: %LINK-5-CHANGED: Interface BRI0/0,

changed state to administratively down

00:00:52: %LINK-5-CHANGED: Interface Ethernet0/0,

changed state to administratively down

00:00:52: %LINK-5-CHANGED: Interface Serial0/0,

changed state to administratively down

00:00:52: %LINK-5-CHANGED: Interface Ethernet0/1,

changed state to administratively down

00:00:52: %LINK-5-CHANGED: Interface Serial0/1,

changed state to administratively down

00:00:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/0,

changed state to down

00:00:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/1,

changed state to down

Router>

Router>enable

Router#copy startup-config running-config

Destination filename [running-config]?

1324 bytes copied in 2.35 secs (662 bytes/sec)

Router#

00:01:24: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0/0:1,

changed state to down

00:01:24: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0/0:2,

changed state to down

Router#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#enable secret

Router(config)#^Z

00:01:54: %SYS-5-CONFIG_I: Configured from console by console

Router#show ip interface brief

Interface   IP-Address        OK?  Method     Status                   Protocol

Ethernet0/0 10.200.40.37      YES  TFTP       administratively down    down

Serial0/0   unassigned        YES  TFTP       administratively down    down

BRI0/0      192.168.121.157   YES  unset      administratively down    down

BRI0/0:1    unassigned        YES  unset      administratively down    down

BRI0/0:2    unassigned        YES  unset      administratively down    down

Ethernet0/1 unassigned        YES  TFTP       administratively down    down

Serial0/1   unassigned        YES  TFTP       administratively down    down

Loopback0   192.168.121.157   YES  TFTP       up                       up

Router#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#interface Ethernet0/0

Router(config-if)#no shutdown

Router(config-if)#

00:02:14: %LINK-3-UPDOWN: Interface Ethernet0/0, changed state to up

00:02:15: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/0,

changed state to up

Router(config-if)#interface BRI0/0

Router(config-if)#no shutdown

Router(config-if)#

00:02:26: %LINK-3-UPDOWN: Interface BRI0/0:1, changed state to down

00:02:26: %LINK-3-UPDOWN: Interface BRI0/0:2, changed state to down

00:02:26: %LINK-3-UPDOWN: Interface BRI0/0, changed state to up

00:02:115964116991: %ISDN-6-LAYER2UP: Layer 2 for Interface BR0/0,

TEI 68 changed to up

Router(config-if)#^Z

Router#

00:02:35: %SYS-5-CONFIG_I: Configured from console by console

Router#copy running-config startup-config

Destination filename [startup-config]?

Building configuration...

[OK]

Router#show version

Cisco IOS Software, C2900 Software (C2900-UNIVERSALK9-M), Version 15.0(1)M1,

RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2009 by Cisco Systems, Inc.

Compiled Wed 02-Dec-09 15:23 by prod_rel_team

ROM: System Bootstrap, Version 15.0(1r)M1, RELEASE SOFTWARE (fc1)

c2921-CCP-1-xfr uptime is 2 weeks, 22 hours, 15 minutes

System returned to ROM by reload at 06:06:52 PCTime Mon Apr 2 1900

System restarted at 06:08:03 PCTime Mon Apr 2 1900

System image file is "flash:c2900-universalk9-mz.SPA.150-1.M1.bin"

Last reload reason: Reload Command

Cisco CISCO2921/K9 (revision 1.0) with 475136K/49152K bytes of memory.

Processor board ID FHH1230P04Y

1 DSL controller

3 Gigabit Ethernet interfaces

9 terminal lines

1 Virtual Private Network (VPN) Module

1 Cable Modem interface

1 cisco Integrated Service Engine-2(s)

Cisco Foundation 2.2.1 in slot 1

DRAM configuration is 64 bits wide with parity enabled.

255K bytes of non-volatile configuration memory.

248472K bytes of ATA System CompactFlash 0 (Read/Write)

62720K bytes of ATA CompactFlash 1 (Read/Write)

Configuration register is 0x2102

Router#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#config-register 0x2102

Router(config)#^Z

00:03:20: %SYS-5-CONFIG_I: Configured from console by console

Router#show version

Cisco IOS Software, C2900 Software (C2900-UNIVERSALK9-M), Version 15.0(1)M1,

RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2009 by Cisco Systems, Inc.

Compiled Wed 02-Dec-09 15:23 by prod_rel_team

ROM: System Bootstrap, Version 15.0(1r)M1, RELEASE SOFTWARE (fc1)

c2921-CCP-1-xfr uptime is 2 weeks, 22 hours, 15 minutes

System returned to ROM by reload at 06:06:52 PCTime Mon Apr 2 1900

System restarted at 06:08:03 PCTime Mon Apr 2 1900

System image file is "flash:c2900-universalk9-mz.SPA.150-1.M1.bin"

Last reload reason: Reload Command

Cisco CISCO2921/K9 (revision 1.0) with 475136K/49152K bytes of memory.

Processor board ID FHH1230P04Y

1 DSL controller

3 Gigabit Ethernet interfaces

9 terminal lines

1 Virtual Private Network (VPN) Module

1 Cable Modem interface

1 cisco Integrated Service Engine-2(s)

Cisco Foundation 2.2.1 in slot 1

DRAM configuration is 64 bits wide with parity enabled.

255K bytes of non-volatile configuration memory.

248472K bytes of ATA System CompactFlash 0 (Read/Write)

62720K bytes of ATA CompactFlash 1 (Read/Write)

Configuration register is 0x2142 (will be 0x2102 at next reload)

Router#

Informations connexes

- Exemple de procédure de récupération de mot de passe

- Configuration des câbles requis pour la console et les ports AUX

- Comprendre la connexion du terminal à un port de console sur les commutateurs Catalyst

- Assistance produit routeurs

- Assistance technique et téléchargements Cisco