Contenu

Introduction

Informations générales

Conditions préalables

Conditions requises

Components Used

Étapes de récupération

Introduction

Ce document décrit les étapes de dépannage pour récupérer le bootflash et l'image système sur CGR 1000.

Informations générales

Le routeur CGR1000 utilise la mémoire de la carte SD (Secure Digital) de Cisco pour stocker des images de démarrage, des images système, des configurations, etc.  Dans de rares occasions, la carte SD est corrompue. Par conséquent, l'image de démarrage et/ou l'image système sont endommagées. Cela empêche le routeur CGR de démarrer. La séquence du démarrage est décrite dans la figure donnée. La procédure décrite dans cet article consiste à restaurer le CGR à partir d'un état de mémoire de carte SD endommagé.

Conditions préalables

1. Serveur TFTP (Trivial File Transfer Protocol) installé sur le PC local

2. Configurez le serveur TFTP de sorte que l'image de démarrage et l'image système

Conditions requises

Cisco vous recommande de prendre connaissance des rubriques suivantes :

1. Câble de console

2. CAT5

3. L'image de démarrage et les images système

Components Used

Ce document est limité à la version CGOS exécutée sur CGR 1120 et CGR1240.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Étapes de récupération

1. Configurez le câble de console à l'aide de putty.

2. Connectez le câble CAT5 de la carte réseau du pc local au CGR ETH 2/2 . Il s’agit de la seule interface qui fonctionne au moment du processus de récupération.

3. Configurez la carte réseau du pc local pour qu'elle se trouve dans le même sous-réseau que le routeur CGR.

Par exemple, la carte réseau du PC est le sous-réseau 192.0.2.1 255.255.255.0.

Pour le routeur CGR, le sous-réseau 192.0.2.2 est 255.255.255.0.

4. Dans la session Putty, vous voyez :

"loader>"

IOFPGA @ 0xd0000000 version=0x30020700, datecode=0xc080d17 CPLD version 0x14

Reset Reason = 0(0)

Scratch pad test passed !!!

BIOS Version: Build # 12 -   Wed 06/27/2012

CGR Loader Version: 1.00.01

Filesystem type is ext2fs, partition type 0x83

Filesystem type is ext2fs, partition type 0x83

GNU GRUB  version 0.97

CGR Loader Version 1.00.01

loader>

5. Configurez l'adresse IP de l'ETH2/2 à l'aide de la commande « set ip ».

set ip 192.0.2.2 255.255.255.0

Correct - ip addr is 192.0.2.2, mask is 255.255.255.0

Found Intel IOH GBE [2:0.1] at 0xe020, ROM address 0x0000

Probing...[Intel IOH GBE]

MAC address 78:da:6e:8:ad:e1

External PHY link UP @ 1000/full

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 0.0.0.0

Gateway: 0.0.0.0

loader>

6. Configurez l'adresse de la passerelle en tant que carte réseau du PC local à l'aide de la commande « set gw ».

set gw 192.0.2.1

Correct gateway addr 192.0.2.1

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 0.0.0.0

Gateway: 192.0.2.1

7. Démarrez l'image de démarrage à partir du serveur tftp local avec la commande « boot tftp://« .

loader> boot tftp://192.0.2.1/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 192.0.2.1

Gateway: 192.0.2.1

Filesystem type is tftp, using whole disk

Booting: /cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin console=ttyS0,9600n8nn quie

t loader_ver="1.00.01"....

...............................................................................

................Kickstart image verification Successful

Image verification OK

INIT: Checking all filesystems ....... done.

Warning: switch is starting up with default configuration

Creating boot config file...

/etc/rc.d/rcS.d/S26check-flash: line 528: /mnt/bootloader/boot/grub/menu.lst.local: No such file or directory

cp: cannot stat `/mnt/cfg/0/boot/grub/menu.lst.local': No such file or directory

WARNING: image sync is going to be disabled after a loader netboot

Loading system software

INIT: Sending processes the TERM signal[H[J

INIT: Sending processes the TERM signal

INIT: Sending processes the

KILL signal

8.  Une fois l'image démarrée, une sortie similaire à cette sortie s'affiche.

Router(boot)# ?

Exec commands:

clear     Reset functions

config    Enter configuration mode

copy      Copy from one file to another

delete    Delete a file or directory

dir       Directory listing for files

exit      Exit from the EXEC

find      Find a file below the current directory

format    Format disks

init      Initialize internal disk

load      Load system image

mkdir     Create new directory

move      Move files

no        Disable debugging functions

pwd       View current directory

reload    Reboot this supervisor module

rmdir     Remove existing directory

show      Show running system information

sleep     Sleep for the specified number of seconds

ssh       SSH to another system

tail      Display the last part of a file

telnet    Telnet to another system

9. Formatez la carte SD endommagée avec la commande « format bootflash: ».

This command is going to erase the contents of your bootflash:.

Do you want to continue? (y/n)  [n] y

Formatting bootflash:

Formatting started at:  Fri Feb 20 23:56:00 UTC 2015

mke2fs 1.35 (28-Feb-2004)

Formatting finished at:  Fri Feb 20 23:56:52 UTC 2015

Formatting completed

10. Exécuter le système d'initialisation (étape de l'option : cette commande formate la carte SD et efface tout).

Router(boot)# init system

This command is going to erase your startup-config, licenses as well as the contents of your bootflash:.

Do you want to continue? (y/n)  [n] yInitializing the system

mount: /dev/mmcblk0p4 already mounted or /bootflash busy

mount: according to mtab, /dev/mmcblk0p4 is already mounted on /bootflash

ERROR: cannot mount filesystem

cp: omitting directory `/bootflash/'

Partitioning failed

11. Configurez l'interface de gestion (ceci est nécessaire pour copier l'image système et de démarrage dans le bootflash).

Router(boot)# configure terminal

Router(boot)(config)# interface mgmt0

Router(boot)(config-if)#ip address 192.0.2.2 255.255.255.0

Router(boot)(config-if)#no shut

12. Copiez l'image système et de démarrage dans le bootflash.

Router(boot)# copy tftp://192.0.2.1/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

Router(boot)# copy tftp://192.0.2.1/cgr1000-uk9.5.2.1.CG4.3.SPA.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

13. Vérifiez que l'image de démarrage et système se trouve sur le CGR avec « dir ».

Router(boot)#dir

29167616    Feb 21 00:39:59 2015  cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin

143332283    Feb 21 00:42:06 2015  cgr1000-uk9.5.2.1.CG4.3.SPA.bin

372    Feb 23 17:55:52 2015  fpga.log

1905    Feb 23 18:39:54 2015  mts.log

Usage for bootflash://

691462144 bytes used

8859394048 bytes free

9550856192 bytes total

14. Démarrez l'image système à l'aide de la commande load bootflash.

Router(boot)# load bootflash:cgr1000-uk9.5.2.1.CG4.3.SPA.bin

Loading system software

Uncompressing bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin..........done. (in 37 seconds)

Loading plugin 0: core_plugin...

INIT: Switching to runlevel: 3

INIT: Sending processes the TERM signal

Router(boot)#

INIT:

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

System is coming up ... Please wait ...

2015 Feb 21 00:47:56  %$ VDC-1 %$ %COPP-2-COPP_NO_POLICY: Control-plane is unprotected.System is coming up ... Please wait ...

2015 Feb 21 00:47:58  %$ VDC-1 %$ %VDC_MGR-2-VDC_ONLINE: vdc 1 has come online 2015 Feb 21 00:47:58 Router %$ VDC-1 %$ %PLATFORM-2-

INPUT_POWER_SOURCE_TRANSITION: Three Phase and DC Input Status Alert:  L1 Phase ON, L2 Phase OFF, L3 Phase OFF, DC Input Absent

15. Une fois que le routeur CGR démarre dans l'image système, vous devez installer l'image système kickstart et l'image système avec « installer tous les bootflash:<kickstart-image> system bootflash:<image système>.

cgr1120# install all kickstart bootflash:cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin system bootflash:cgr1000-uk9.5.2.1.CG4.3.SPA.bin

Verifying image bootflash:/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin for boot variable "kickstart".

-- SUCCESS

Verifying image bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin for boot variable "system".

-- SUCCESS

Verifying image type.

-- SUCCESS

Extracting "system" version from image bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin.

-- SUCCESS

Extracting "kickstart" version from image bootflash:/cgr1000-uk9-kickstart.5.2.1.CG4.3.SPA.bin.

-- SUCCESS

Extracting "bios" version from image bootflash:/cgr1000-uk9.5.2.1.CG4.3.SPA.bin.

-- SUCCESS

Checking for Battery Power Mode.

-- SUCCESS

Checking for Module Power Status.

-- SUCCESS

Checking for WPAN upgrade compatibility.

-- SUCCESS

Performing module support checks.

-- SUCCESS

Notifying services about system upgrade.

-- SUCCESS

Compatibility check is done:

Module  bootable          Impact  Install-type  Reason

------  --------  --------------  ------------  ------

1       yes      disruptive         reset  Hitless upgrade is not supported

Images will be upgraded according to following table:

Module       Image                  Running-Version(pri:alt)           New-Version  Upg-Required

------  ----------  ----------------------------------------  --------------------  ------------

1      system                              5.2(1)CG4(3)          5.2(1)CG4(3)            no

1   kickstart                              5.2(1)CG4(3)          5.2(1)CG4(3)            no

1        bios   v16.1.0(10/15/2013):V12.1.0(06/27/2012)   v16.1.0(10/15/2013)            no

1        fpga                                   2.07.00               2.07.00            no

Switch will be reloaded for disruptive upgrade.

Do you want to continue with the installation (y/n)?  [n] y