Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Conventions

Codes CLEI

Informations connexes

Introduction

Ce document répertorie les codes CLEI du Cisco ONS 15454.

Conditions préalables

Conditions requises

Aucune spécification déterminée n'est requise pour ce document.

Components Used

Ce document n'est pas limité à des versions de matériel et de logiciel spécifiques.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Pour plus d'informations sur les conventions utilisées dans ce document, reportez-vous à Conventions relatives aux conseils techniques Cisco.

Codes CLEI

Ce tableau répertorie les codes CLEI.

Informations connexes

- Présentation du produit : Cisco ONS 15454

- Fiche technique : Cartes d'interface Ethernet Cisco ONS 15454

- Fiche technique : Carte TCC+ Cisco ONS 15454

- Support et documentation techniques - Cisco Systems