Table des matières

Introduction

Conditions préalables

Exigences

Composants utilisés

Topologie

Problème

Procédure De Mise À Niveau

Introduction

Ce document décrit une procédure étape par étape sur la façon de mettre à niveau la version CPLD (Complex Programmable Logic Device) sur une configuration de liaison virtuelle StackWise (SVL) de Catalyst 9400.

Conditions préalables

Exigences

Cisco recommande que vous ayez des connaissances de base sur la configuration et la configuration de Stackwise-Virtual sur le Catalyst 9400.

Composants utilisés

Les informations dans ce document sont basées sur le PID : C9404R versions du logiciel et du matériel.

Modules:

C940-SUP-1XL

C940-LC-24XS

Version du logiciel : 17.09.4a

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Si votre réseau est en ligne, assurez-vous de bien comprendre l’incidence possible des commandes.

Topologie

Problème

Dans Catalyst 9400, lors de la mise à niveau de la version Cisco IOS®, dans de rares cas, la version CPLD du périphérique n'est pas mise à niveau. La version CPLD et la version Rommon pour la version particulière peut être vérifiée à partir du lien https://www.cisco.com/c/en/us/td/docs/switches/lan/catalyst9400/software/release/17-13/release_notes/ol-17-13-9400/rommon_versions.html.

Référez-vous à cet extrait de code :

9400-1#show platform

Chassis type: C9404R

Switch 1

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:05:00

1/0       C9400-LC-24XS       ok                    00:00:56

2         C9400-SUP-1XL       ok                    00:05:00

2/0       C9400-SUP-1XL       ok                    00:00:53

R0                            ok, active            00:05:00

P1        C9400-PWR-3200AC    ok                    00:04:38

P9        C9404-FAN           ok                    00:04:37

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         20062105            17.10.1r

2         20062105            17.10.1r

Switch 2

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:04:57

1/0       C9400-LC-24XS       ok                    00:00:08

2         C9400-SUP-1XL       ok                    00:04:57

2/0       C9400-SUP-1XL       ok                    00:00:07

R0                            ok, standby           00:04:57

P1        C9400-PWR-3200AC    ok                    00:04:35

P9        C9404-FAN           ok                    00:04:33

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         19032905            17.10.1r                         >>>>>>>>>>CPLD did not get upgraded

2         19032905            17.10.1r                         >>>>>>>>>>CPLD did not get upgraded

Dans ce cas, le CPLD du standby n'a pas été mis à niveau après la mise à niveau.

Procédure De Mise À Niveau

Étape 1. Utilisez la show redundacny afin de vérifier si le SVL fonctionne correctement.

9400-1#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 4 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = none

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = Switch 1

Current Software state = ACTIVE

Uptime in current state = 4 minutes

Image Version = Cisco IOS Software [Cupertino], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 17.9.4a, RELEASE SOFTWARE (fc3)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2023 by Cisco Systems, Inc.

Compiled Fri 20-Oct-23 10:44 by mcpre

BOOT = bootflash:packages.conf;

Peer Processor Information :

----------------------------

Standby Location = Switch 2 >>>>>>>>>>Switch 2 is standby

Current Software state = STANDBY HOT

Uptime in current state = 0 minutes

Image Version = Cisco IOS Software [Cupertino], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 17.9.4a, RELEASE SOFTWARE (fc3)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2023 by Cisco Systems, Inc.

Compiled Fri 20-Oct-23 10:44 by mcpre

BOOT = bootflash:packages.conf;

Étape 2. Afin de mettre à niveau la version CPLD utilisez cette commande :

upgrade hw-programmable cpld filename bootflash: switch {1-2} RP active

9400-1#upgrade hw-programmable cpld filename bootflash: switch 2 R0

Firmware upgrade requires the SVL member to reload. Do you want to proceed?(y/n)y

Use cli 'redundancy reload peer' to upgrade the firmware on peer

9400-1#redundancy reload peer

Stack is in Half ring setup; Reloading a switch might cause stack split

Reload peer [confirm]

Preparing to reload peer

Étape 3. Ici, vous pouvez voir que le CPLD est en cours de mise à niveau :

Chassis 2 reloading, reason - Admin reload CLI

May 4 01:34:23.829: %PMAN-5-EXITACTION: R0/0: pvp:

Initializing Hardware......

System Bootstrap, Version 17.10.1r, RELEASE SOFTWARE (P)

Compiled Tue Aug 2 13:02:51 2022 by rel

Current ROMMON image : Primary

Last reset cause : SoftwareResetTrig

C9400-SUP-1XL platform with 16777216 Kbytes of main memory

Starting System FPGA Upgrade .....

Programming SPI Primary image is completed.

Authenticating SPI Primary image .....

IO FPGA image is authenticated successfully.

Programming Header .....

FPGA HDR file size: 12

Image page count: 1

Verifying programmed header .....

Verifying programmed header .....

Programmed header is verified successfully.

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Power Cycle is needed to complete System firmware upgrade.

It takes ~7 mins to upgrade firmwre after power cycle starts.

DO NOT DISRUPT AFTER POWER C

Initializing Hardware......

Initializing Hardware......

System Bootstrap, Version 17.10.1r, RELEASE SOFTWARE (P)

Compiled Tue Aug 2 13:02:51 2022 by rel

Étape 4. Vérifiez si le CPLD est mis à niveau en veille :

F241.24.02-9400-1#show platform

Chassis type: C9404R

Switch 1

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:29:38

1/0       C9400-LC-24XS       ok                    00:25:34

2         C9400-SUP-1XL       ok                    00:29:38

2/0       C9400-SUP-1XL       ok                    00:25:31

R0                            ok, active            00:29:38

P1        C9400-PWR-3200AC    ok                    00:29:16

P9        C9404-FAN           ok                    00:29:14

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         20062105            17.10.1r

2         20062105            17.10.1r

Switch 2

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:29:35

1/0       C9400-LC-24XS       ok                    00:00:11

2         C9400-SUP-1XL       ok                    00:29:35

2/0       C9400-SUP-1XL       ok                    00:00:10

R0                            ok, standby           00:29:35

P1        C9400-PWR-3200AC    ok                    00:29:13

P9        C9404-FAN           ok                    00:29:11

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1 20062105 17.10.1r >>>>>>>>>>CPLD got upgraded

2 20062105 17.10.1r >>>>>>>>>>CPLD got upgraded

Étape 5. Dans ce cas, si la version CPLD du commutateur actif doit être mise à niveau, vous devez procéder comme suit :

1. Do a switchover

9400-1#redundency force-switchover                             >>>>>>>>>>Initially Switch 1 is active and Switch 2 is standby.

After switchover it is vise-versa

2. Upgrade the CPLD version of previous active [now standby] with the command:

9400-1#upgrade hw-programmable cpld filename bootflash: switch 1 R0

3. Reload the the standby

9400-1#redundancy reload peer