Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Configurar

Procedimiento de recuperación de contraseña para Virtual 9800 (9800-CL)

Procedimiento de recuperación de contraseña para el dispositivo mediante ROMMON

Procedimiento de recuperación de contraseña para el dispositivo mediante USB

Arranque el WLC desde ROMMON

Cargar imagen a través de USB

Cargar una imagen desde TFTP

Troubleshoot

Otros comandos útiles de ROMMON

Información Relacionada

Introducción

Este documento describe cómo recuperar un controlador Catalyst 9800 basado en el modo ROMMON y sin imagen en la memoria flash.

Prerequisites

Requirements

Cisco recomienda que tenga conocimiento sobre estos temas:

- Controladores inalámbricos Catalyst 9800

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de software y hardware.

- Catalyst 9800 versión 16.10.1

La información que contiene este documento se creó a partir de los dispositivos en un ambiente de laboratorio específico. Todos los dispositivos que se utilizan en este documento se pusieron en funcionamiento con una configuración verificada (predeterminada). Si tiene una red en vivo, asegúrese de entender el posible impacto de cualquier comando.

Configurar

Procedimiento de recuperación de contraseña para Virtual 9800 (9800-CL)

Paso 1. Reinicie el 9800-CL. Verá rápidamente una pantalla de selección de arranque:

Paso 2. Presione C en esta pantalla para obtener el aviso de grub.

Paso 3. Puede cambiar el registro de configuración en ese prompt con el comando config  0x2142.

Paso 4. Presione la tecla ESC para volver a la indicación de selección de inicio y elija la opción packages.conf  para iniciar en la imagen normal.

Paso 5. Su WLC arranca sin configuración. Recuperarlo.

Paso 6. No olvide repetir el procedimiento del paso 1 y establecer el registro de configuración nuevamente al valor original de 0x2002 para que la configuración se guarde y se cargue al reiniciar.

Procedimiento de recuperación de contraseña para el dispositivo mediante ROMMON

Paso 1. Envíe la tecla break cuando vea ##### impreso en la consola para el sistema que carga la imagen. Luego, el sistema interrumpe el proceso de inicio y va a la indicación ROMMON. Puede hacer esto al presionar break o ctrl+break en el teclado. También puede enviar la interrupción desde el programa de terminal (por ejemplo, Comando especial de masilla > Interrupción, Control de término > Enviar interrupción).

Precaución: La recuperación de contraseña requiere que el sistema se coloque en ROMMON. En el Cisco IOS® clásico, la configuración config-register determina si el sistema podría volver a ROMMON. Un config-register de 0x2102 impediría el retorno a ROMMON cuando se emite el comando break. De forma predeterminada, todos los dispositivos 9800 (9800-40, 9800-80, 9800-L) tienen el conjunto config-register 0x2102. Sin embargo, dado que ejecutan Cisco IOS XE® basado en Linux, esto se ignora y la única manera de evitar el retorno a ROMMON es configurar el comando no service password-recovery.

Advertencia:  En 9800-L que ejecuta ROMMON anterior a 16.12(3r), este bit en config-register evita que se interrumpa el ROMMON para realizar la recuperación de contraseña.

Corregir: Si ejecuta ROMMON más antiguo, actualice ROMMON con instrucciones documentadas en: Actualizar los programables de campo para el controlador inalámbrico Cisco Catalyst 9800-L

Solución alternativa: Si no se puede realizar la actualización; modifique config-register a 0x2002 como una solución alternativa y evite el bloqueo de ROMMON.

File size is 0x01d191f3

Located C9800-rpboot.16.10.01.SPA.pkg

Image size 30511603 inode num 874837, bks cnt 7450 blk size 8*512

################################################################################

################################################################################

################################################################################

##########################################################

Boot image size = 30511603 (0x1d191f3) bytes

ROM:RSA Self Test Passed

ROM:Sha512 Self Test Passed

Package header rev 3 structure detected

Calculating SHA-1 hash...done

validate_package_cs: SHA-1 hash:

calculated e36f46af:2c06b38d:eeb6e65b:ffaeb429:a6982d29

expected   e36f46af:2c06b38d:eeb6e65b:ffaeb429:a6982d29

Validating main package signatures

monitor: command "boot" aborted due to user interrupt

rommon 1 >

Paso 2.Cambie el registro de configuración a 0x2142 con el  confreg 0x2142  comando de la indicación ROMMON.

rommon 1 > confreg 0x2142

You must reset or power cycle for new config to take effect

Paso 3. Para guardar el cambio de configuración de rommon, ejecute  sync en el prompt de rommon,  reset  rommon para aplicar el cambio desde el prompt de rommon.

rommon 2 > sync

rommon 3 > reset

Resetting .......

Initializing Hardware ...

System integrity status: 90170200 12030107

System Bootstrap, Version 16.10(2r), RELEASE SOFTWARE

Copyright (c) 1994-2018  by cisco Systems, Inc.

Current image running: Boot ROM0

Last reset cause: LocalSoft

C9800-40-K9 platform with 33554432 Kbytes of main memory

File size is 0x000015c9

Located packages.conf

Image size 5577 inode num 874834, bks cnt 2 blk size 8*512

#

File size is 0x01d191f3

Located C9800-rpboot.16.10.01.SPA.pkg

Image size 30511603 inode num 874837, bks cnt 7450 blk size 8*512

################################################################################

################################################################################

################################################################################

##########################################################

Boot image size = 30511603 (0x1d191f3) bytes

ROM:RSA Self Test Passed

ROM:Sha512 Self Test Passed

Package header rev 3 structure detected

Calculating SHA-1 hash...done

validate_package_cs: SHA-1 hash:

calculated e36f46af:2c06b38d:eeb6e65b:ffaeb429:a6982d29

expected   e36f46af:2c06b38d:eeb6e65b:ffaeb429:a6982d29

Validating main package signatures

RSA Signed RELEASE Image Signature Verification Successful.

Image validated

Jun 21 02:30:21.565: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u

sed for process bt_logger

Jun 21 02:30:24.561: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u

sed for process bt_logger

Both links down, not waiting for other chassis

Chassis number is 1

Jun 21 02:30:25.327: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u

sed for process bt_logger

Jun 21 02:30:27.293: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u

sed for process bt_logger

Jun 21 02:30:33.770: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u

sed for process bt_logger

Jun 21 02:30:37.045: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u

sed for process bt_logger

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

Cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco IOS Software [Gibraltar], C9800 Software (C9800_IOS XE), Version 16.10.1, R

ELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2018 by Cisco Systems, Inc.

Compiled Mon 19-Nov-18 08:27 by mcpre

PLEASE READ THE FOLLOWING TERMS CAREFULLY. INSTALLING THE LICENSE OR

LICENSE KEY PROVIDED FOR ANY CISCO SOFTWARE PRODUCT, PRODUCT FEATURE,

AND/OR SUBSEQUENTLY PROVIDED SOFTWARE FEATURES (COLLECTIVELY, THE

"SOFTWARE"), AND/OR WITH SUCH SOFTWARE CONSTITUTES YOUR FULL

ACCEPTANCE OF THE FOLLOWING TERMS. YOU MUST NOT PROCEED FURTHER IF YOU

ARE NOT WILLING TO BE BOUND BY ALL THE TERMS SET FORTH HEREIN.

Your use of the Software is subject to the Cisco End User License Agreement

(EULA) and any relevant supplemental terms (SEULA) found at

http://www.cisco.com/c/en/us/about/legal/cloud-and-software/software-terms.html.

You hereby acknowledge and agree that certain Software and/or features are

licensed for a particular term, that the license to such Software and/or

features is valid only for the applicable term and that such Software and/or

features may be shut down or otherwise terminated by Cisco after expiration

of the applicable license term (for example, 90-day trial period). Cisco reserves

the right to terminate any such Software feature electronically or by any

other means available. While Cisco may provide alerts, it is your sole

responsibility to monitor your usage of any such term Software feature to

ensure that your systems and networks are prepared for a shutdown of the

Software feature.

cisco C9800-40-K9 (1GL) processor (revision 1GL) with 7866660K/6147K bytes of me

mory.

FIPS: Flash Key Check : Key Not Found, FIPS Mode Not Enabled

Processor board ID TTM22500DAL

1 Virtual Ethernet interface

4 Ten Gigabit Ethernet interfaces

32768K bytes of non-volatile configuration memory.

33554432K bytes of physical memory.

26255359K bytes of eUSB flash at bootflash:.

234365527K bytes of SATA hard disk at hard disk:.

0K bytes of WebUI ODM Files at webui:.

Base Ethernet MAC Address          : D4:C9:3C:CC:F2:E0

Installation mode is INSTALL

Press RETURN to get started!

*Jun 21 02:31:00.165: %IOS XE_PLATFORM-3-WDC_NOT_FOUND: WDC returned length: 0

*Jun 21 02:31:00.185: %SMART_LIC-6-EXPORT_CONTROLLED: Usage of export controlled

features is not allowedAdding registry invocations for the WLC platform

*Jun 21 02:31:01.743: %SMART_LIC-6-AGENT_READY: Smart Agent for Licensing is ini

tialized

*Jun 21 02:31:01.743: %SMART_LIC-6-AGENT_ENABLED: Smart Agent for Licensing is e

nabled

*Jun 21 02:31:01.743: %SMART_LIC-6-EXPORT_CONTROLLED: Usage of export controlled

features is not allowed

*Jun 21 02:31:04.732: mcp_pm_subsys_init : Init done sucessfullyRA Tracing tool

registry return: 0SID Manager, starting initialization ...

*Jun 21 02:31:05.511: Notifications initializedSID Manager, completed initializa

tion ...

*Jun 21 02:31:07.298: %SPANTREE-5-EXTENDED_SYSID: Extended SysId enabled for typ

e vlan

*Jun 21 02:31:08.999: %CRYPTO-4-AUDITWARN: Encryption audit check could not be p

erformed

*Jun 21 02:31:09.081: %VOICE_HA-7-STATUS: CUBE HA-supported platform detected.

*Jun 21 02:31:09.317: %IOSXE_VMAN-3-MSGINITFAIL: Failed to initialize required V

irt-manager resource: Initalize MQIPC

*Jun 21 02:31:09.333: mcp_pm_init_done : Called

*Jun 21 02:31:09.338: %LINK-3-UPDOWN: Interface Lsmpi0, changed state to up

*Jun 21 02:31:09.345: %LINK-3-UPDOWN: Interface EOBC0, changed state to up

*Jun 21 02:31:09.345: %LINEPROTO-5-UPDOWN: Line protocol on Interface VoIP-Null0

, changed state to up

*Jun 21 02:31:09.346: %LINEPROTO-5-UPDOWN: Line protocol on Interface LI-Null0,

changed state to up

*Jun 21 02:31:09.346: %LINK-3-UPDOWN: Interface GigabitEthernet0, changed state

to down

*Jun 21 02:31:09.351: %LINK-3-UPDOWN: Interface LIIN0, changed state to up

*Jun 21 02:30:33.738: %PMAN-3-PROC_EMPTY_EXEC_FILE: Chassis 1 R0/0: pvp: Empty e

xecutable used for process bt_logger

*Jun 21 02:30:37.011: %PMAN-3-PROC_EMPTY_EXEC_FILE: Chassis 1 R0/0: pvp: Empty e

xecutable used for process bt_logger

*Jun 21 02:30:39.576: %CMFP-6-CRYPTO_MODULE: Chassis 1 R0/0: cman_fp: Crypto Har

dware Module is present

*Jun 21 02:31:01.754: %LMRP-3-RTU_UNINITIALIZED: Chassis 1 R0/0: lman: RTU not y

et initialized: stack enabled 0

*Jun 21 02:31:09.489: %SMART_LIC-6-HA_ROLE_CHANGED: Smart Agent HA role changed

to Active.

*Jun 21 02:31:10.295: %IOSXE_MGMTVRF-6-CREATE_SUCCESS_INFO: Management vrf Mgmt-

intf created with ID 1, ipv4 table-id 0x1, ipv6 table-id 0x1E000001

*Jun 21 02:31:10.344: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan1, cha

nged state to down

*Jun 21 02:31:10.345: %LINEPROTO-5-UPDOWN: Line protocol on Interface Lsmpi0, ch

anged state to up

*Jun 21 02:31:10.394: %LINEPROTO-5-UPDOWN: Line protocol on Interface EOBC0, cha

nged state to up

*Jun 21 02:31:10.394: %LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEth

ernet0, changed state to down

*Jun 21 02:31:10.394: %LINEPROTO-5-UPDOWN: Line protocol on Interface LIIN0, cha

nged state to up

*Jun 21 02:31:10.966: %ONEP_BASE-6-SS_ENABLED: ONEP: Service set Base was enable

d by Default

*Jun 21 02:31:12.842: %SYS-6-STARTUP_CONFIG_IGNORED: System startup configuratio

n is ignored based on the configuration register setting.

*Jun 21 02:31:12.854: %IOSXE_OIR-6-REMSPA: SPA removed from subslot 0/0, interfa

ces disabled

*Jun 21 02:31:12.913: %SPA_OIR-6-OFFLINECARD: SPA (BUILT-IN-4X10G/1G) offline in

subslot 0/0

*Jun 21 02:31:12.919: %IOSXE_OIR-6-INSCARD: Card (fp) inserted in slot F0

*Jun 21 02:31:12.920: %IOSXE_OIR-6-ONLINECARD: Card (fp) online in slot F0

*Jun 21 02:31:12.946: %IOSXE_OIR-6-INSCARD: Card (cc) inserted in slot 0

*Jun 21 02:31:12.946: %IOSXE_OIR-6-ONLINECARD: Card (cc) online in slot 0

*Jun 21 02:31:13.111: % Redundancy mode change to SSO

*Jun 21 02:31:13.112: %VOICE_HA-7-STATUS: NONE->SSO; SSO mode can not take effe

ct until after a platform reload.

*Jun 21 02:31:13.231: %IOSXE_OIR-6-INSSPA: SPA inserted in subslot 0/0

*Jun 21 02:31:14.793: %SYS-5-RESTART: System restarted --

Cisco IOS Software [Gibraltar], C9800 Software (C9800_IOSXE), Version 16.10.1, R

ELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2018 by Cisco Systems, Inc.

Compiled Mon 19-Nov-18 08:27 by mcpre

*Jun 21 02:31:14.834: %CRYPTO-6-ISAKMP_ON_OFF: ISAKMP is OFF

*Jun 21 02:31:14.834: %CRYPTO-6-GDOI_ON_OFF: GDOI is OFF

*Jun 21 02:31:16.976: %LINK-3-UPDOWN: Interface GigabitEthernet0, changed state

to up

*Jun 21 02:31:17.079: %SYS-6-BOOTTIME: Time taken to reboot after reload =  325

seconds

*Jun 21 02:31:17.977: %LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEth

ernet0, changed state to up

*Jun 21 02:31:21.579: %SPA_OIR-6-ONLINECARD: SPA (BUILT-IN-4X10G/1G) online in s

ubslot 0/0

*Jun 21 02:31:21.638: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/0, li

nk down due to remote fault

*Jun 21 02:31:21.708: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/1, li

nk down due to local fault

*Jun 21 02:31:21.748: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/2, li

nk down due to local fault

*Jun 21 02:31:21.788: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/3, li

nk down due to local fault

*Jun 21 02:31:21.855: %PNP-6-PNP_DISCOVERY_STOPPED: PnP Discovery stopped (Start

up Config Present)

*Jun 21 02:31:23.541: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/0, changed

state to down

*Jun 21 02:31:23.571: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/1, changed

state to down

*Jun 21 02:31:23.572: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/2, changed

state to down

*Jun 21 02:31:23.575: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/3, changed

state to down

*Jun 21 02:31:24.680: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/0, li

nk down due to local fault

*Jun 21 02:31:23.618: %LINK-3-UPDOWN: SIP0/0: Interface TenGigabitEthernet0/0/0,

changed state to down

*Jun 21 02:31:29.036: %PKI-2-NON_AUTHORITATIVE_CLOCK: PKI functions can not be i

nitialized until an authoritative time source, like NTP, can be obtained.

*Jun 21 02:31:29.491: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/0, changed

state to up

*Jun 21 02:31:30.492: %LINEPROTO-5-UPDOWN: Line protocol on Interface TenGigabit

Ethernet0/0/0, changed state to up

*Jun 21 02:31:29.491: %LINK-3-UPDOWN: SIP0/0: Interface TenGigabitEthernet0/0/0,

changed state to up

*Jun 21 02:31:30.495: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan1, cha

nged state to up

*Jun 21 02:31:37.119: %CRYPTO_ENGINE-5-KEY_ADDITION: A key named CISCO_IDEVID_SU

DI_LEGACY has been generated or imported by pki-sudi

*Jun 21 02:31:39.050: %CRYPTO_ENGINE-5-KEY_ADDITION: A key named CISCO_IDEVID_SU

DI has been generated or imported by pki-sudi

Paso 4. Ahora, el sistema arranca sin ninguna configuración. Ignore startup config wizard.

Paso 5. Una vez que el sistema se active, copie startup-config en running-config.

Paso 6. Vuelva a configurar la contraseña de habilitación o las credenciales de inicio de sesión y verifique si puede acceder al dispositivo a través de telnet o ssh.

C9800-40#telnet 172.22.175.1

Trying 172.22.175.1 ... Open

User Access Verification

Username: admin

Password:

C9800-40#

Paso 7. Vuelva a cambiar config-register a 0x2002.

C9800-40(config)#config-register 0x2002

Nota: No utilice 0x2102. Con 0x2102, ya no se le permite enviar interrupciones.

Paso 8. Guarde la configuración.

C9800-40#write memory

Building configuration...

[OK]

Procedimiento de recuperación de contraseña para el dispositivo mediante USB

Arranque el WLC desde ROMMON

Si se atasca en ROMMON y el arranque no funciona:

rommon 12 > boot

File size is 0x0001dfe6

Located memleak.tcl

Image size 122854 inode num 12, bks cnt 30 blk size 8*512

##

Boot image size = 122854 (0x1dfe6) bytes

Unsigned package found, aborting package loading...

Failed to Free memory block at address 0x00000000cd50b000

File size is 0x00000023

Located pnp-tech-time

Image size 35 inode num 13, bks cnt 1 blk size 8*512

Boot image size = 35 (0x23) bytes

Unsigned package found, aborting package loading...

Failed to Free memory block at address 0x00000000cd4d3000

File size is 0x0001ad3f

Located pnp-tech-discovery-summary

Image size 109887 inode num 14, bks cnt 27 blk size 8*512

#

Boot image size = 109887 (0x1ad3f) bytes

Unsigned package found, aborting package loading...

Failed to Free memory block at address 0x00000000cd49b000

File size is 0x00000268

Located vlan.dat

Image size 616 inode num 15, bks cnt 1 blk size 8*512

Boot image size = 616 (0x268) bytes

Unsigned package found, aborting package loading...

Failed to Free memory block at address 0x00000000cd463000

boot: cannot determine first file name on device "bootflash:/"

rommon 13 >

La memoria flash no tiene ninguna imagen desde la que arrancar:

rommon 13 > dir bootflash:

File System: EXT2/EXT3

11         16384     drwx------     lost+found

850305     4096      drwxr-xr-x     .installer

588673     4096      drwxrwxrwx     .prst_sync

948417     4096      drwxr-xr-x     .rollback_timer

1381745    4096      drwxr-xr-x     dc_profile_dir

12         122854    -rw-r--r--     memleak.tcl

506913     4096      drwxr-x---     vman_fdb

670433     4096      drwxr-xr-x     .dbpersist

793073     4096      drwxr-xr-x     onep

13         35        -rw-r--r--     pnp-tech-time

14         109887    -rw-r--r--     pnp-tech-discovery-summary

15         616       -rw-r--r--     vlan.dat

Puede recuperar la caja mediante:

- Carga de una imagen a través de una unidad de lápiz USB.

- Carga de una imagen a través de Gigabit0 (interfaz de administración fuera de banda).

Cargar imagen a través de USB

Paso 1. Cargue una memoria USB con el archivo .bin en el controlador 9800. (en 9800-80, debido al ID de bug de Cisco CSCvn82287, una unidad flash USB 3.0 no se puede reconocer en ROMMON).

Nota: El procedimiento es el mismo en el caso de un 9800-CL virtual, pero debe conectar la unidad USB en el VMhost y asignarla a la VM.

Paso 2. Conecte el controlador USB al puerto USB 0 del 9800.

Vista frontal:

Paso 3. Inicie sesión desde la consola en el controlador y asegúrese de que puede leer el USB.

rommon 19 > dir usb0:

File System: FAT32

!

!--Output omitted--

!

335644   1009389904-rw-     <filename>SSA.bin

Paso 4. Configure el 9800 para arrancar desde la imagen USB.

rommon 21 > boot usb0:<filename>.bin

Located qwlc-universalk9_wlc.BLD_V169_THROTTLE_LATEST_20180601_191011.SSA.bin, start cluster is 335644

########################################################################################################

########################################################################################################

########################################################################################################

Paso 5. Una vez que el 9800 se ejecuta, copie la imagen del USB a la memoria de inicialización:

WLC# copy usb0:<filename>.bin bootflash:

Destination filename [qwlc-universalk9_wlc.BLD_V169_THROTTLE_LATEST_20180601_191011.SSA.bin]?

Copy in progress...CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

Paso 6. Cambie el 9800 del modo de agrupamiento al modo de instalación.

Cuando inicia el controlador desde un USB, se inicia en el modo Bundle:

!

!--Output omitted--

!

FIPS: Flash Key Check : Key Not Found, FIPS Mode Not Enabled

Processor board ID TTM22071510

1 Virtual Ethernet interface

4 Ten Gigabit Ethernet interfaces

32768K bytes of non-volatile configuration memory.

33554432K bytes of physical memory.

26910719K bytes of eUSB flash at bootflash:.

234365527K bytes of SATA hard disk at hard disk:.

15243680K bytes of USB flash at usb0:.

0K bytes of WebUI ODM Files at webui:.

Base Ethernet MAC Address          : 00:A3:8E:23:A2:40

Installation mode is BUNDLE

%INIT: waited 0 seconds for NVRAM to be available

Desde la versión 16.12, en la interfaz de usuario, puede optar por pasar al modo INSTALL en la siguiente actualización. Proporcione cualquier archivo de software, que incluya la versión actual para pasar al modo INSTALAR.

Paso 7. Edite la variable boot si no apunta hacia un archivo packages.conf.

WLC#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

WLC(config)#no boot system

WLC(config)#boot system bootflash:packages.conf

WLC(config)#end

WLC#write

Building configuration...

[OK]

WLC#show boot

BOOT variable = flash:packages.conf,12;

CONFIG_FILE variable does not exist

BOOTLDR variable does not exist

Configuration register is 0x2102

Standby not ready to show bootvar

Asegúrese de que el registro de configuración sea 0x2002.

Paso 8. Recargue el WLC:

WLC#reload

Después de esto, el controlador arranca en el modo de instalación.

WLC#show version

!

!--Output omitted--

!

Installation mode is INSTALL Configuration register is 0x2002

Cargar una imagen desde TFTP

Para cargar una imagen desde la red, debe tener el puerto de administración GigabitEthernet0 conectado físicamente a un puerto de acceso.

Desde ROMMON, puede verificar las variables en cualquier momento con el comando set.

rommon 1 > set

PS1=rommon ! >

?=0

DEFAULT_GATEWAY=10.1.1.1

ETHER_SPEED_MODE=4

TFTP_RETRY_COUNT=36

SWITCH_NUMBER=1

DLC_DONE=TRUE

RET_2_RTS=

RET_2_RCALTS=

MCP_STARTUP_TRACEFLAGS=00000000:00000000

TFTP_MACADDR=00:db:ad:ba:d0:52

IP_SUBNET_MASK=255.255.255.0

IP_ADDRESS=10.1.1.152

TFTP_SERVER=10.1.1.1

TFTP_FILE=C9800-80-universalk9_wlc.BLD_V1610_1_THROTTLE_LATEST_20181016_174328_2.bin

BSI=0

RANDOM_NUM=1650632109

A continuación, puede establecer las variables una por una. No hay necesidad de escribir  set antes del nombre de variable como lo hace para otros dispositivos ROMMON. Evite los errores tipográficos al escribir el nombre de la variable, ya que no se comprobará ningún tipo de ordenación.

rommon 2 > IP_ADDRESS=10.48.71.113

rommon 3 > IP_SUBNET_MASK=255.255.255.128

rommon 4 > DEFAULT_GATEWAY=10.48.71.5

Una vez que los parámetros de IP están en su lugar, puede iniciar desde una imagen TFTP con el siguiente comando:

rommon 5 > boot tftp://10.48.39.33/C9800-80-universalk9_wlc.16.10.01.SPA.bin

IP_ADDRESS: 10.48.71.113

IP_SUBNET_MASK: 255.255.255.128

DEFAULT_GATEWAY: 10.48.71.5

TFTP_SERVER: 10.48.39.33

TFTP_FILE: C9800-80-universalk9_wlc.16.10.01.SPA.bin

TFTP_MACADDR: 70:6d:15:35:99:ff

TFTP_VERBOSE: Progress

TFTP_RETRY_COUNT: 36

TFTP_TIMEOUT: 7200

TFTP_BLKSIZE: 1460

TFTP_CHECKSUM: Yes

ETHER_PORT: 3

ETHER_SPEED_MODE: 1000MB/HD

link up

Receiving C9800-80-universalk9_wlc.16.10.01.SPA.bin from 10.48.39.33

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Usted termina en la línea de comandos de Cisco IOS. No olvide copiar realmente la imagen del IOS de Cisco en la memoria flash o el disco duro y establecer la variable de inicio correctamente. Puede reanudar el procedimiento desde el USB, anterior al paso 6, una vez que el archivo se ha copiado en la memoria flash o el disco duro:

Troubleshoot

Si sigue viendo el rommon diciéndole "Por favor reinicie antes de arrancar" cuando intenta arrancar desde un archivo en la memoria, USB o TFTP como este :

rommon 4 > boot bootflash:C9800-L-universalk9_wlc.V176_1.SPA.bin

Please reset before booting

Todo lo que tiene que hacer es anular el registro de configuración y restablecer. El problema desaparece después de reiniciar y puede arrancar desde cualquier origen.

confreg 0x0

reset

Otros comandos útiles de ROMMON

El  dev  comando enumera los dispositivos de almacenamiento disponibles (bootflash, harddisk, usb, etc.).

El comandoshowmon muestra la versión de ROMMON.

Información Relacionada

- Soporte técnico y descargas de Cisco