Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Configurar

Diagrama de la red

Verificación

Troubleshoot

Información Relacionada

Introducción

Este documento describe cómo configurar el servidor PPPoE con la interfaz de dominio de puente (BDI) y el rango de VLAN.

Prerequisites

Requirements

Cisco recomienda que tenga conocimiento sobre estos temas:

- La conectividad de capa 1 de extremo a extremo está bien

- Los fundamentos de PPP y PPPoE se entienden bien

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de software y hardware.

- HOST-1 - CISCO887G

- HOST-2 - CISCO887

- SWITCH - WS-C3560-24TS-S

- SERVIDOR PPPoE - ASR1001-X

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Configurar

Nota: Use la Command Lookup Tool (clientes registrados solamente) para obtener más información sobre los comandos usados en esta sección.

HOST-1

!

interface FastEthernet0

switchport access vlan 100

no ip address

end

!

interface Vlan100

no ip address

pppoe enable group global

pppoe-client dial-pool-number 1

end

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname dsl

ppp chap password 0 dsl

end

!

HOST-2

!

interface FastEthernet0

switchport access vlan 200

no ip address

end

!

!

interface Vlan200

no ip address

pppoe enable group global

pppoe-client dial-pool-number 1

end

!

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname dsl

ppp chap password 0 dsl

end

!

SWITCH

SWITCH#sh cdp neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone,

D - Remote, C - CVTA, M - Two-port Mac Relay

Device ID        Local Intrfce     Holdtme    Capability  Platform  Port ID

SERVER           Gig 0/1           130              R I   ASR1001-X Gig 0/0/0

HOST-1           Fas 0/2           141            R B S I 887G      Fas 0

HOST-2           Fas 0/1           167            R B S I 887       Fas 0

!

interface FastEthernet0/2

switchport access vlan 100

end

!

interface FastEthernet0/1

switchport access vlan 200

end

!

!

interface GigabitEthernet0/1

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 100,200

switchport mode trunk

end

!

SERVIDOR PPPoE

!

username dsl password 0 dsl

!

bba-group pppoe global

virtual-template 1

!

interface GigabitEthernet0/0/0

no ip address

negotiation auto

cdp enable

service instance 100 ethernet

encapsulation dot1q 100 etype pppoe-all

rewrite ingress tag pop 1 symmetric

bridge-domain 100

!

service instance 200 ethernet

encapsulation dot1q 200 etype pppoe-all

rewrite ingress tag pop 1 symmetric

bridge-domain 200

!

!

interface Virtual-Template1

ip unnumbered Loopback0

peer default ip address pool POOL

ppp authentication chap

!

interface BDI100

no ip address

pppoe enable group global

!

interface BDI200

no ip address

pppoe enable group global

!

interface Loopback0

ip address 192.168.10.1 255.255.255.255

end

!

ip local pool POOL 192.168.1.1 192.168.1.100

!

Alternativamente, puede configurar 'vlan-range' como se muestra:

!

interface GigabitEthernet0/0/0

no ip address

negotiation auto

service instance 100 ethernet

encapsulation default

bridge-domain 1

!

end

!

interface BDI1

no ip address

vlan-range dot1q 1 4094

pppoe enable group global

!

end

Diagrama de la red

Verificación

Utilize esta sección para confirmar que su configuración funcione correctamente.

En HOST-1

HOST-1#show ip interface brief | exclude un

Interface                  IP-Address      OK? Method Status                Protocol

Dialer1                    192.168.1.4     YES IPCP   up                    up

HOST-1#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi2            SERVER     192.168.10.1    -               <unknown phone  in

HOST-1#ping 192.168.10.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.10.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

HOST-1#show ppp interface virtual-Access 2

PPP Serial Context Info

-------------------

Interface        : Vi2

PPP Serial Handle: 0x1F000003

PPP Handle       : 0xB2000003

SSS Handle       : 0x8000004

AAA ID           : 24

Access IE        : 0xA7000003

SHDB Handle      : 0x0

State            : Up

Last State       : Binding

Last Event       : LocalTerm

PPP Session Info

----------------

Interface        : Vi2

PPP ID           : 0xB2000003

Phase            : UP

Stage            : Local Termination

Peer Name        : SERVER

Peer Address     : 192.168.10.1

Control Protocols: LCP[Open] IPCP[Open] CDPCP[Stopped]

Session ID       : 3

AAA Unique ID    : 24

SSS Manager ID   : 0x8000004

SIP ID           : 0x1F000003

PPP_IN_USE       : 0x11

Vi2 LCP: [Open]

Our Negotiated Options

Vi2 LCP:    MagicNumber 0x7735647E (0x05067735647E)

Peer's Negotiated Options

Vi2 LCP:    MRU 1500 (0x010405DC)

Vi2 LCP:    AuthProto CHAP (0x0305C22305)

Vi2 LCP:    MagicNumber 0xA7A011AC (0x0506A7A011AC)

Vi2 IPCP: [Open]

Our Negotiated Options

Vi2 IPCP:    Address 192.168.1.5 (0x0306C0A80105)

Peer's Negotiated Options

Vi2 IPCP:    Address 192.168.10.1 (0x0306C0A80A01)

En HOST-2

HOST-2#show ip interface brief | exclude un

Interface                  IP-Address      OK? Method Status                Protocol

Dialer1                    192.168.1.6     YES IPCP   up                    up

HOST-2#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi2            SERVER     192.168.10.1    -               <unknown phone  in

HOST-2#ping 192.168.10.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.10.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

HOST-2#show ppp interface virtual-Access 2

PPP Serial Context Info

-------------------

Interface        : Vi2

PPP Serial Handle: 0x7B00000A

PPP Handle       : 0xA000000A

SSS Handle       : 0x4C00000B

AAA ID           : 68

Access IE        : 0x1D00000A

SHDB Handle      : 0x0

State            : Up

Last State       : Binding

Last Event       : LocalTerm

PPP Session Info

----------------

Interface        : Vi2

PPP ID           : 0xA000000A

Phase            : UP

Stage            : Local Termination

Peer Name        : SERVER

Peer Address     : 192.168.10.1

Control Protocols: LCP[Open] IPCP[Open] CDPCP[Stopped]

Session ID       : 10

AAA Unique ID    : 68

SSS Manager ID   : 0x4C00000B

SIP ID           : 0x7B00000A

PPP_IN_USE       : 0x11

Vi2 LCP: [Open]

Our Negotiated Options

Vi2 LCP:    MagicNumber 0x421AC8AB (0x0506421AC8AB)

Peer's Negotiated Options

Vi2 LCP:    MRU 1500 (0x010405DC)

Vi2 LCP:    AuthProto CHAP (0x0305C22305)

Vi2 LCP:    MagicNumber 0xA7A0942C (0x0506A7A0942C)

Vi2 IPCP: [Open]

Our Negotiated Options

Vi2 IPCP:    Address 192.168.1.6 (0x0306C0A80106)

Peer's Negotiated Options

Vi2 IPCP:    Address 192.168.10.1 (0x0306C0A80A01)

En SWITCH

SWITCH#show vlan brief

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/4, Fa0/5, Fa0/6, Fa0/7

Fa0/8, Fa0/9, Fa0/10, Fa0/11

Fa0/12, Fa0/13, Fa0/14, Fa0/15

Fa0/16, Fa0/17, Fa0/18, Fa0/19

Fa0/20, Fa0/21, Fa0/22, Fa0/23

Fa0/24, Gi0/2

11   VLAN0011                         active

12   VLAN0012                         active

13   VLAN0013                         active

100  VLAN0100                         active    Fa0/2

200  VLAN0200                         active    Fa0/1

SWITCH#Show interface trunk

Port        Mode             Encapsulation  Status        Native vlan

Gi0/1       on               802.1q         trunking      1

Port        Vlans allowed on trunk

Gi0/1       100,200

Port        Vlans allowed and active in management domain

Gi0/1       100,200

Port        Vlans in spanning tree forwarding state and not pruned

Gi0/1       100,200

En el SERVIDOR PPPoE

SERVER#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi2.1          dsl        192.168.1.6     -               -               in

Vi2.2          dsl        192.168.1.5     -               -               in

SERVER#show ip local pool POOL

Pool                     Begin           End             Free  In use

POOL                     192.168.1.1     192.168.1.100     98       2

Available addresses:

192.168.1.7

192.168.1.8

192.168.1.9

.....

.....

Cuando utilice 'vlan-range', observe el cambio en 'Port':

SERVER#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi2.1          dsl        192.168.1.7     -               -               in

Vi2.2          dsl        192.168.1.8     -               -               in

Troubleshoot

En esta sección se brinda información que puede utilizar para resolver problemas en su configuración.

Estos debugs serán útiles para resolver problemas de PPP/PPPoE.

- debug pppoe events

- debug pppoe errors

- debug ppp negotiation

Información Relacionada

- PPPoE sobre BDI en CISCO CSR 1000V

- Error de mejora: terminación PPPoE en BDI y rango de VLAN en ASR1k

- Soporte Técnico y Documentación - Cisco Systems