Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Configurar

Verificación

Introducción

Este documento describe cómo enviar a los switches Cisco Multilayer Data Switch (MDS) 9000 o Nexus Series sin que se le pida una contraseña de usuario de Secure Shell (SSH).

Puede utilizar ssh con autenticación basada en clave y ejecutar comandos para que no haya avisos de contraseña.

comando switch# ssh username@switch

Prerequisites

Requirements

Cisco recomienda que tenga conocimiento sobre estos temas:

- Servidor con la aplicación ssh actual

Componentes Utilizados

La información en este documento se basa en un servidor Linux con versión ssh:

$ ssh -v

OpenSSH_5.0p1-hpn13v1, OpenSSL 0.9.8d 28 de septiembre de 2006

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Configurar

Para activar esta función, siga estos pasos:

Paso 1. SSH debe estar habilitado en el switch MDS/Nexus.

#conf

(config)#feature ssh

Paso 2. Debe sacar la clave pública del host y configurarla en el switch MDS/Nexus.

Opciones:

-v: Verbose habilitado

-b: Número de bits para la clave

-t: Tipo de algoritmo ya sea DSA o RSA

$ ssh-keygen -v -b 1024 -t rsa

Generating public/private rsa key pair.

Enter file in which to save the key (/users/thteoh/.ssh/id_rsa):

Enter passphrase (empty for no passphrase):

Enter same passphrase again:

Your identification has been saved in /users/thteoh/.ssh/id_rsa.

Your public key has been saved in /users/thteoh/.ssh/id_rsa.pub.

The key fingerprint is:

61:18:ad:14:cd:a7:bf:44:89:73:4a:2e:09:96:bb:51 thteoh@people

Nota: En este ejemplo, se utiliza RSA, también puede elegir la clave Digital Signature Algorithm (DSA).

Verifique la clave generada utilizando cat con el archivo id_rsa.pub (el archivo también puede ser id_dsa.pub)

$ cat id_rsa.pub

ssh-rsa AAAAB3NzaC1yc2EAAAABIwAAAIEAzDWrMuGDkDXFRnuCqdJRM9Yd+oi0ff2K6HxRsyqh82GmQJ3IX6OG7obiQTKnT9+eH7h2WCArEiMsOz3GYtakEkpYx6zR3cKwrsrgKv4TwRgSv8yUyH8GwPZOvZP97szJDu/3WP/ni4wJBb+yDqoI6+G1Rq/F2aYx45fh6SwlPv0= thteoh@people

Paso 3. Transfiera el archivo id_rsa.pub (o id_dsa.pub) al directorio bootflash del switch MDS/Nexus y configure la clave pública ssh.

En este ejemplo, SFTP se utiliza para transferir id_rsa.pub en el switch MDS

#copy sftp:  bootflash

Para transferir el archivo en los switches Nexus, incluya vrf en el comando.

Paso 4.Genere la clave SSH en el switch usando id_rsa.pub o id_dsa.pub.

para referencia teoh nombre de usuario utilizado.

#conf

(config)#username teoh sshkey file bootflash:id_rsa.pub

Paso 5. Puede comprobar que el comando se ha completado correctamente.

switch# show user-account teoh

user:teoh

this user account has no expiry date

roles:network-admin

ssh public key: ssh-rsa AAAAB3NzaC1yc2EAAAABIwAAAIEAzDWrMuGDkDXFRnuCqdJRM9Yd+oi0ff2K6HxRsyqh82GmQJ3IX6OG7o

biQTKnT9+eH7h2WCArEiMsOz3GYtakEkpYx6zR3cKwrsrgKv4TwRgSv8yUyH8GwPZOvZP97szJDu/3WP/ni4wJBb+yDqoI6+G1Rq/F2aYx45fh6Swl

Pv0= thteoh@people

switch#

Verificación

Ahora puede enviar a switch y ejecutar cualquier comando sin mensaje de contraseña:

$ ssh teoh@10.66.78.53 "sh system uptime"

Warning: the output may not have all the roles

System start time: Tue May 29 17:51:30 2012

System uptime: 7 days, 19 hours, 42 minutes, 15 seconds

Kernel uptime: 7 days, 19 hours, 45 minutes, 17 seconds