Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Antecedentes

Indicadores LACP

Diagrama de la red

Verificar el funcionamiento de LACP

Comprobaciones básicas

Depuraciones

Verificar el funcionamiento de PAgP

Comprobaciones básicas

Depuraciones

Verificación de la programación Etherchannel

Verificar software

Verificar hardware

Herramientas de plataforma

Captura de paquetes integrada (EPC)

Reenvío de plataforma

Vector de estado de paquete (PSV)

Controlador de políticas del plano de control (CoPP)

Captura de paquetes de CPU FED

Información Relacionada

Introducción

Este documento describe cómo entender y resolver problemas de EtherChannels en los switches Catalyst de la serie 9000.

Prerequisites

Requirements

Cisco recomienda que tenga conocimiento sobre estos temas:

- Arquitectura de switches Catalyst serie 9000

- Arquitectura de software Cisco IOS® XE

- Link Aggregation Control Protocol (LACP) y Port Aggregation Protocol (PAgP)

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de hardware:

- Catalyst 9200

- Catalyst 9300

- Catalyst 9400

- Catalyst 9500

- Catalyst 9600

La información que contiene este documento se creó a partir de los dispositivos en un ambiente de laboratorio específico. Todos los dispositivos que se utilizan en este documento se pusieron en funcionamiento con una configuración verificada (predeterminada). Si tiene una red en vivo, asegúrese de entender el posible impacto de cualquier comando.

Antecedentes

Consulte las Notas de la versión oficiales de Cisco y las Guías de configuración para obtener información actualizada sobre las limitaciones, restricciones, opciones de configuración y advertencias, así como cualquier otro detalle relevante sobre esta función.

EtherChannel proporciona links de alta velocidad tolerantes a fallas entre switches, routers y servidores.  Utilice EtherChannel para aumentar el ancho de banda entre los dispositivos e implementarlo en cualquier lugar de la red donde sea probable que se produzcan cuellos de botella. EtherChannel proporciona recuperación automática para la pérdida de un link, redistribuye la carga a través de los links restantes. Si falla un link, EtherChannel redirige el tráfico del link fallido a los links restantes en el canal sin intervención.

Los EtherChannels se pueden configurar sin negociación o negociar dinámicamente con el soporte de un Link Aggregation Protocol, ya sea PAgP o LACP.

Al habilitar PAgP o LACP, un switch aprende la identidad de los partners y las capacidades de cada interfaz. A continuación, el switch agrupa dinámicamente las interfaces con configuraciones similares en un único enlace lógico (canal o puerto agregado); el switch basa estos grupos de interfaz en restricciones de hardware, administrativas y parámetros de puerto.

Indicadores LACP

Los indicadores LACP se utilizan para negociar los parámetros del canal de puerto cuando aparece. Eche un vistazo al significado de cada bandera:

Indicador

Estado

Actividad de LACP (bit menos significativo)

0 = Modo pasivo

1 = Modo activo

Tiempo de espera de LACP: indica el tiempo de espera de LACP enviado/recibido

0 = Tiempo de espera largo. 3 x 30 s (predeterminado)

1 = Tiempo de espera corto. 3 x 1 s (velocidad LACP rápida)

Switching

0 = Enlace individual (no se considera para la agregación)

1 = Agregable (candidato potencial para la agregación)

Sincronización

0 = el link está fuera de sincronización (estado incorrecto)

1 = El enlace está en sincronización (buen estado)

Recopilación

0 = No preparado para recibir/procesar las tramas

1 = Preparado para recibir/procesar las tramas

Distribución

0 = No preparado para enviar/transmitir las tramas

1 = Preparado para enviar/transmitir las tramas

Predeterminado

0 = Utiliza la información de la PDU recibida para el partner

1 = Utiliza la información predeterminada del partner.

Vencido (bit más significativo)

0 = la PDU ha caducado,

1 = PDU es válida

El valor esperado para los indicadores LACP es 0x3D (hex) o 0111101 (binario) para alcanzar el estado P (agrupado en canal de puerto).

.... ...1 = LACP Activity (less significant bit)

.... ..0. = LACP Timeout

.... .1.. = Aggregation

.... 1... = Synchronization

...1 .... = Collecting

..1. .... = Distributing

.0.. .... = Defaulted

0... .... = Expired (most significant bit)

Diagrama de la red

Verificar el funcionamiento de LACP

Esta sección describe cómo verificar el estado y el funcionamiento correctos del protocolo LACP.

Comprobaciones básicas

Verifique las salidas LACP con estos comandos:

show lacp sys-id

show lacp <channel-group number> neighbor

show lacp <channel-group number> counters

show interfaces <interface ID> accounting

debug lacp [event|packet|fsm|misc]

debug condition <condition>

El primer resultado del comando muestra el ID del sistema del switch y su prioridad (para LACP).

switch#show lacp sys-id

32768, f04a.0206.1900 <-- Your system MAC address

Verifique los detalles del vecino LACP, como el modo operativo, la ID de desarrollo del sistema vecino y su prioridad.

switch#show lacp 1 neighbor

Flags:  S - Device is requesting Slow LACPDUs

F - Device is requesting Fast LACPDUs

A - Device is in Active mode       P - Device is in Passive mode

Channel group 1 neighbors

LACP port                      Admin  Oper   Port    Port

Port          Flags  Priority  Dev ID          Age  key    Key    Number  State

Gi1/0/1       SA     32768     f04a.0205.d600  12s  0x0    0x1    0x102   0x3D    <-- Dev ID: Neighbor MAC Address

Gi1/0/2       SA     32768     f04a.0205.d600  24s  0x0    0x1    0x103   0x3D    <-- Dev ID: Neighbor MAC Address

Gi1/0/3       SA     32768     f04a.0205.d600  16s  0x0    0x1    0x104   0x3D    <-- Dev ID: Neighbor MAC Address

Gi1/0/4       SA     32768     f04a.0205.d600  24s  0x0    0x1    0x105   0x3D    <-- Dev ID: Neighbor MAC Address

Valide los paquetes LACP enviados y recibidos por cada interfaz. Si se detectan paquetes LACP dañados, el contador Pkts Err aumenta.

switch#show lacp 1 counters

LACPDUs         Marker          Marker Response  LACPDUs

Port             Sent   Recv     Sent   Recv     Sent   Recv      Pkts Err

--------------------------------------------------------------------------

Channel group: 1

Gi1/0/1          3111   3085     0      0        0      0         0

Gi1/0/2          3075   3057     0      0        0      0         0

Gi1/0/3          3081   3060     0      0        0      0         0

Gi1/0/4          3076   3046     0      0        0      0         0

También existe una opción para verificar la contabilización de la interfaz para LACP.

switch#show interface gigabitEthernet1/0/1 accounting

GigabitEthernet1/0/1

Protocol    Pkts In   Chars In   Pkts Out  Chars Out

Other          0          0      10677     640620

PAgP        879      78231        891      79299

Spanning Tree        240      12720         85       5100

CDP       2179     936495       2180     937020

DTP       3545     170160       3545     212700

LACP       3102     384648       3127     387748

Depuraciones

Cuando no hay sincronización LACP o cuando el peer remoto no ejecuta LACP, se generan mensajes de Syslog.

%ETC-5-L3DONTBNDL2: Gig1/0/1 suspended: LACP currently not enabled on the remote port.

%ETC-5-L3DONTBNDL2: Gig/1/0/1 suspended: LACP currently not enabled on the remote port.

Habilite los debugs de LACP con el uso de estos comandos:

debug lacp [event|packet|fsm|misc]

debug condition <condition>

Si observa problemas de negociación LACP, habilite los debugs de LACP para analizar por qué.

switch#debug lacp event

Link Aggregation Control Protocol events debugging is on

switch#debug lacp packet

Link Aggregation Control Protocol packet debugging is on

switch#debug lacp fsm

Link Aggregation Control Protocol fsm debugging is on

switch#debug lacp misc

Link Aggregation Control Protocol miscellaneous debugging is on

Si es necesario, también habilite la condición de depuración para una interfaz específica y filtre el resultado.

switch#debug condition interface gigabitEthernet 1/0/1

Nota: los debugs de LACP son independientes de la plataforma.

Se configuran los filtros y las depuraciones de validación.

switch#show debugging

Packet Infra debugs:

Ip Address                                               Port

------------------------------------------------------|----------

LACP:

Link Aggregation Control Protocol miscellaneous debugging is on

Link Aggregation Control Protocol packet debugging is on

Link Aggregation Control Protocol fsm debugging is on

Link Aggregation Control Protocol events debugging is on

Condition 1: interface Gi1/0/1 (1 flags triggered)

Flags: Gi1/0/1

Analice las depuraciones de LACP y utilice el comando show logging para visualizarlas. El resultado de la depuración muestra las últimas tramas LACP antes de que aparezca la interfaz de canal de puerto:

switch#show logging

<omitted output>

LACP :lacp_bugpak: Send LACP-PDU packet via Gi1/0/1

LACP : packet size: 124

LACP: pdu: subtype: 1, version: 1

LACP: Act: tlv:1, tlv-len:20, key:0x1, p-pri:0x8000, p:0x102, p-state:0x3D, s-pri:0x8000, s-mac:f04a.0206.1900

LACP: Part: tlv:2, tlv-len:20, key:0x1, p-pri:0x8000, p:0x102, p-state:0xF, s-pri:0x8000, s-mac:f04a.0205.d600

LACP: col-tlv:3, col-tlv-len:16, col-max-d:0x8000

LACP: term-tlv:0 termr-tlv-len:0

LACP: HA: Attempt to sync events -- no action  (event type 0x1)

LACP :lacp_bugpak: Receive LACP-PDU packet via Gi1/0/1

LACP : packet size: 124

LACP: pdu: subtype: 1, version: 1

LACP: Act: tlv:1, tlv-len:20, key:0x1, p-pri:0x8000, p:0x102, p-state:0x3D, s-pri:0x8000, s-mac:f04a.0205.d600

LACP: Part: tlv:2, tlv-len:20, key:0x1, p-pri:0x8000, p:0x102, p-state:0x3D, s-pri:0x8000, s-mac:f04a.0206.1900

LACP: col-tlv:3, col-tlv-len:16, col-max-d:0x8000

LACP: term-tlv:0 termr-tlv-len:0

LACP: Gi1/0/1 LACP packet received, processing    <-- beginning to process LACP PDU

lacp_rx Gi1/0/1 - rx: during state CURRENT, got event 5(recv_lacpdu)

@@@ lacp_rx Gi1/0/1 - rx: CURRENT -> CURRENT

LACP: Gi1/0/1 lacp_action_rx_current entered

LACP: recordPDU Gi1/0/1 LACP PDU Rcvd. Partners oper state is hex F    <-- operational state

LACP: Gi1/0/1 partner timeout mode changed to 0

lacp_ptx Gi1/0/1 - ptx: during state FAST_PERIODIC, got event 2(long_timeout)

@@@ lacp_ptx Gi1/0/1 - ptx: FAST_PERIODIC -> SLOW_PERIODIC

LACP: Gi1/0/1 lacp_action_ptx_fast_periodic_exit entered

LACP: lacp_p(Gi1/0/1) timer stopped

LACP: Gi1/0/1 lacp_action_ptx_slow_periodic entered

LACP: timer lacp_p_s(Gi1/0/1) started with interval 30000.

LACP: recordPDU Gi1/0/1 Partner in sync and aggregating    <-- peer is in sync

LACP: Gi1/0/1 Partners oper state is hex 3D    <-- operational state update

LACP: timer lacp_c_l(Gi1/0/1) started with interval 90000.

LACP: Gi1/0/1 LAG_PARTNER_UP.

LACP: Gi1/0/1 LAG unchanged

lacp_mux Gi1/0/1 - mux: during state COLLECTING_DISTRIBUTING, got event 5(in_sync) (ignored)

lacp_handle_standby_port_internal called, depth = 1

LACP: lacp_handle_standby_port_internal: No Standby port found for LAG 1

lacp_handle_standby_port_internal called, depth = 1

LACP: lacp_handle_standby_port_internal: No Standby port found for LAG 1

lacp_handle_standby_port_internal called, depth = 1

LACP: lacp_handle_standby_port_internal: No Standby port found for LAG 1

LACP: lacp_t(Gi1/0/1) timer stopped

LACP: lacp_t(Gi1/0/1) expired

%LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEthernet1/0/1, changed state to up

%LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEthernet1/0/2, changed state to up

%LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEthernet1/0/3, changed state to up

%LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEthernet1/0/4, changed state to up

%LINK-3-UPDOWN: Interface Port-channel1, changed state to up

%LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1, changed state to up

Si se centra en las dos líneas más importantes de las depuraciones de LACP, hay algunos conceptos que vale la pena definir algunos conceptos de PDU de LACP.

LACP: Act: tlv:1, tlv-len:20, key:0x1, p-pri:0x8000, p:0x102, p-state:0x3D, s-pri:0x8000, s-mac:f04a.0205.d600

LACP: Part: tlv:2, tlv-len:20, key:0x1, p-pri:0x8000, p:0x102, p-state:0x3D, s-pri:0x8000, s-mac:f04a.0206.1900

Concepto

Descripción

Actuar

Significa actor (usted)

Parte

Significa partner (su vecino/peer)

clave

Es el número del canal de puerto configurado.

estado-p

Significa estado del puerto y es el concepto más importante. Está construido con 8 bits (indicadores LACP). Consulte la sección Información general para obtener más información.

s-mac

Es la dirección MAC del sistema utilizada por el LACP.

Nota: Los valores que se ven en los debugs son hexadecimales. Para leer correctamente los valores, deben traducirse a sistemas decimales o binarios.

Verificar el funcionamiento de PAgP

Esta sección describe cómo verificar el estado y el funcionamiento correctos del protocolo PAgP.

Comprobaciones básicas

Verifique las salidas PAgP con estos comandos:

show pagp <channel-group number> neighbor

show pagp <channel-group number> counters

show interfaces <interface ID> accounting

Compruebe los detalles del vecino PAgP, como el modo operativo, la ID del sistema del partner, el nombre de host y la prioridad.

switch#show pagp 1 neighbor

Flags:  S - Device is sending Slow hello.  C - Device is in Consistent state.

A - Device is in Auto mode.        P - Device learns on physical port.

Channel group 1 neighbors

Partner              Partner          Partner                   Partner Group

Port        Name                 Device ID        Port        Age  Flags    Cap.

Gi1/0/1     switch               f04a.0205.d600   Gi1/0/1     16s  SC       10001    <-- Dev ID: Neighbor MAC Address

Gi1/0/2     switch               f04a.0205.d600   Gi1/0/2     19s  SC       10001    <-- Dev ID: Neighbor MAC Address

Gi1/0/3     switch               f04a.0205.d600   Gi1/0/3     17s  SC       10001    <-- Dev ID: Neighbor MAC Address

Gi1/0/4     switch               f04a.0205.d600   Gi1/0/4     15s  SC       10001    <-- Dev ID: Neighbor MAC Address

Valide los detalles de salida de los paquetes PAgP enviados y recibidos por cada interfaz. Si se detectan paquetes PAgP dañados, el contador Pkts Err aumenta.

switch#show pagp 1 counters

Information         Flush        PAgP

Port        Sent    Recv     Sent    Recv    Err Pkts

-----------------------------------------------------

Channel group: 1

Gi1/0/1     29      17       0       0       0

Gi1/0/2     28      17       0       0       0

Gi1/0/3     28      16       0       0       0

Gi1/0/4     29      16       0       0       0

También hay una opción para verificar la contabilización de la interfaz para PAgP.

switch#show int gi1/0/1 accounting

GigabitEthernet1/0/1

Protocol    Pkts In   Chars In   Pkts Out  Chars Out

Other          0          0      10677     640620

PAgP        879      78231        891      79299

Spanning Tree        240      12720         85       5100

CDP       2179     936495       2180     937020

DTP       3545     170160       3545     212700

LACP       3102     384648       3127     387748

Depuraciones

Si observa problemas de negociación PAgP, habilite los debugs de PAgP para analizar por qué.

switch#debug pagp event

Port Aggregation Protocol events debugging is on

switch#debug pagp packet

Port Aggregation Protocol packet debugging is on

switch#debug pagp fsm

Port Aggregation Protocol fsm debugging is on

switch#debug pagp misc

Port Aggregation Protocol miscellaneous debugging is on

Si es necesario, habilite la condición de depuración para una interfaz específica y filtre el resultado.

switch#debug condition interface gigabitEthernet 1/0/1

Nota: Los debugs PAgP son independientes de la plataforma.

Se configuran los filtros y las depuraciones de validación.

switch#show debugging

Packet Infra debugs:

Ip Address                                               Port

------------------------------------------------------|----------

PAGP:

Port Aggregation Protocol miscellaneous debugging is on

Port Aggregation Protocol packet debugging is on

Port Aggregation Protocol fsm debugging is on

Port Aggregation Protocol events debugging is on

Condition 1: interface Gi1/0/1 (1 flags triggered)

Flags: Gi1/0/1

Analice las depuraciones de PAgP. El resultado de la depuración muestra las últimas tramas PAgP antes de que aparezca la interfaz de canal de puerto:

PAgP: Receive information packet via Gi1/0/1, packet size: 89

flags: 5, my device ID: f04a.0205.d600, learn-cap: 2, port-priority: 128, sent-port-ifindex: 9, group-cap: 10001, group-ifindex: 4E

your device ID: f04a.0206.1900, learn-cap: 2, port-priority: 128, sent-port-ifindex: 9, group-cap: 10001, group-ifindex: 4E

partner count: 1, num-tlvs: 2

device name TLV: switch

port name TLV: Gi1/0/1

PAgP: Gi1/0/1 PAgP packet received, processing    <-- Processing ingress PAgP frame

PAgP: Gi1/0/1 proved to be bidirectional    <--

PAgP: Gi1/0/1 action_b0 is entered

PAgP: Gi1/0/1 Input = Transmission State, V12 Old State = U5  New State = U5

PAgP: Gi1/0/1 action_a6 is entered

PAgP: Gi1/0/1 action_b9 is entered

PAgP: set hello interval from 1000 to 30000 for port Gi1/0/1    <--

PAgP: Gi1/0/1 Input = Transmission State, V10 Old State = U5  New State = U6

PAgP: set partner 0 interval from 3500 to 105000 for port Gi1/0/1

PAgP: Gi1/0/1 Setting hello flag

PAgP: timer pagp_p(Gi1/0/1) started with interval 105000.

PAgP: pagp_i(Gi1/0/1) timer stopped

PAgP: Gi1/0/1 Input = Port State, E5 Old State = S7  New State = S7

PAgP: pagp_h(Gi1/0/1) expired

PAgP: Send information packet via Gi1/0/1, packet size: 89

flags: 5, my device ID: f04a.0206.1900, learn-cap: 2, port-priority: 128, sent-port-ifindex: 9, group-cap: 10001, group-ifindex: 4E

your device ID: f04a.0205.d600, learn-cap: 2, port-priority: 128, sent-port-ifindex: 9, group-cap: 10001, group-ifindex: 4E

partner count: 1, num-tlvs: 2

device name TLV: switch

port name TLV: Gi1/0/1

PAgP: 89 bytes out Gi1/0/1

PAgP: Gi1/0/1 Transmitting information packet

PAgP: timer pagp_h(Gi1/0/1) started with interval 30000    <--

%LINK-3-UPDOWN: Interface Port-channel1, changed state to up

%LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1, changed state to up

Verificación de la programación Etherchannel

En esta sección se describe cómo verificar la configuración de software y hardware para EtherChannel.

Verificar software

Valide las entradas de software.

show run interface <interface ID>

show etherchannel <channel-group number> summary

Verifique la configuración de EtherChannel.

switch#show run interface gigabitEthernet 1/0/1

<output omitted>

interface GigabitEthernet1/0/1

channel-group 1 mode active

end

switch#show run interface gigabitEthernet 1/0/2

<output omitted> interface GigabitEthernet1/0/2 channel-group 1 mode active end switch#show run interface gigabitEthernet 1/0/3 <output omitted> interface GigabitEthernet1/0/3 channel-group 1 mode active end switch#show run interface gigabitEthernet 1/0/4 <output omitted> interface GigabitEthernet1/0/4 channel-group 1 mode active end switch#show run interface port-channel 1 <output omitted> interface Port-channel1 end

Valide que todos los miembros del puerto estén agrupados en el canal de puerto.

switch#show etherchannel 1 summary

<output omitted>

Group  Port-channel  Protocol    Ports

------+-------------+-----------+-----------------------------------------------

1      Po1(SU)         LACP        Gi1/0/1(P)      Gi1/0/2(P)

Gi1/0/3(P)      Gi1/0/4(P)

Verificar hardware

Validar entradas de software en el nivel de hardware:

show platform software interface switch <switch number or role> r0 br

show platform software fed switch <switch number or role> etherchannel <channel-group number> group-mask

show platform software fed switch <switch number or role> ifm mappings etherchannel

show platform software fed switch <switch number or role> ifm if-id <if ID>

Verifique el ID del canal de puerto y las interfaces agrupadas.

switch#show platform software interface switch active r0 br

Forwarding Manager Interfaces Information

Name                                  ID               QFP ID

---------------------------------------------------------------

<output omitted>

GigabitEthernet1/0/1                9                 0

GigabitEthernet1/0/2                10                0

GigabitEthernet1/0/3                11                0

GigabitEthernet1/0/4                12                0

<output omitted> Port-channel1 76 0

Céntrese en la sección IF ID y asegúrese de que el valor (número hexadecimal) sea equivalente al ID (número decimal) observado en el comando anterior.

switch#show platform software fed switch active etherchannel 1 group-mask

Group Mask Info

Aggport IIF Id: 000000000000004c    <-- IfId Hex 0x4c = 76 decimal

Active Port: : 4

Member Ports

If Name                       If Id             local  Group Mask

-----------------------------------------------------------------------

GigabitEthernet1/0/4          000000000000000c  true   7777777777777777  <-- IfId Hex 0xc = 12 decimal

GigabitEthernet1/0/3          000000000000000b  true   bbbbbbbbbbbbbbbb  <-- IfId Hex 0xb = 11 decimal

GigabitEthernet1/0/2          000000000000000a  true   dddddddddddddddd  <-- IfId Hex 0xa = 10 decimal

GigabitEthernet1/0/1          0000000000000009  true   eeeeeeeeeeeeeeee  <-- IfId Hex 0x9 = 10 decimal

Obtenga el ID IF del canal de puerto con el siguiente comando. El valor debe coincidir con el del comando anterior.

Switch#show platform software fed switch active ifm mappings etherchannel

Mappings Table

Chan Interface IF_ID

----------------------------------------------------

1 Port-channel1 0x0000004c

Utilice el ID de IF para el siguiente comando. La información mostrada debe coincidir con los resultados recopilados anteriormente.

switch#show platform software fed switch active ifm if-id 0x0000004c

Interface IF_ID         : 0x000000000000004c

Interface Name          : Port-channel1

Interface Block Pointer : 0x7f0178ca1a28

Interface Block State   : READY

Interface State         : Enabled

Interface Status        : ADD, UPD

Interface Ref-Cnt       : 8

Interface Type          : ETHERCHANNEL

Port Type         : SWITCH PORT

Channel Number    : 1

SNMP IF Index     : 78

Port Handle       : 0xdd000068

# Of Active Ports : 4

Base GPN          : 1536

Index[2]  : 000000000000000c

Index[3]  : 000000000000000b

Index[4]  : 000000000000000a

Index[5]  : 0000000000000009

Port Information

Handle ............ [0xdd000068]

Type .............. [L2-Ethchannel]

Identifier ........ [0x4c]

Unit .............. [1]

DI ................ [0x7f0178c058a8]

Port Logical Subblock

L3IF_LE handle .... [0x0]

Num physical port . [4]

GPN Base .......... [1536]

Physical Port[2] .. [0x7b000027]

Physical Port[3] .. [0x1f000026]

Physical Port[4] .. [0xc000025]

Physical Port[5] .. [0xb7000024]

Num physical port on asic [0] is  [0]

DiBcam handle on asic [0].... [0x0]

Num physical port on asic [1] is  [4]

DiBcam handle on asic [1].... [0x7f0178c850a8]

SubIf count ....... [0]

Port L2 Subblock

Enabled ............. [No]

Allow dot1q ......... [No]

Allow native ........ [No]

Default VLAN ........ [0]

Allow priority tag ... [No]

Allow unknown unicast  [No]

Allow unknown multicast[No]

Allow unknown broadcast[No]

Allow unknown multicast[Enabled]

Allow unknown unicast  [Enabled]

Protected ............ [No]

IPv4 ARP snoop ....... [No]

IPv6 ARP snoop ....... [No]

Jumbo MTU ............ [0]

Learning Mode ........ [0]

Vepa ................. [Disabled]

App Hosting........... [Disabled]

Port QoS Subblock

Trust Type .................... [0x7]

Default Value ................. [0]

Ingress Table Map ............. [0x0]

Egress Table Map .............. [0x0]

Queue Map ..................... [0x0]

Port Netflow Subblock

Port Policy Subblock

List of Ingress Policies attached to an interface

List of Egress Policies attached to an interface

Port CTS Subblock

Disable SGACL .................... [0x0]

Trust ............................ [0x0]

Propagate ........................ [0x0]

Port SGT ......................... [0xffff]

Ref Count : 8 (feature Ref Counts + 1)

IFM Feature Ref Counts

FID : 97 (AAL_FEATURE_L2_MULTICAST_IGMP), Ref Count : 1

FID : 119 ((null)), Ref Count : 1

FID : 84 (AAL_FEATURE_L2_MATM), Ref Count : 1

No Sub Blocks Present

Herramientas de plataforma

Esta tabla muestra qué herramientas y funciones están disponibles para ayudar a comprender cuándo utilizarlas:

Herramienta

‘Nivel’

Cuándo se debe utilizar

EPC

Hardware y software

Utilícelo para validar las tramas LACP que llegan a la interfaz física o para validar que llegan a la CPU.

Reenvío de plataforma

Hardware

Si confirmó que las tramas LACP aterrizaron en el switch, utilice esta herramienta para conocer la decisión de reenvío interno del switch.

PSV

Hardware

Si confirmó que las tramas LACP aterrizaron en el switch, utilice esta herramienta para conocer la decisión de reenvío interno del switch.

CoPP

Hardware

Sin embargo, si el paquete se reenvió a la CPU desde una perspectiva de hardware, no se observó en el nivel de software (CPU). Es muy probable que esta función descartara la trama LACP a lo largo de la trayectoria entre el hardware y la CPU.

captura de paquetes de CPU FED

Software

Utilícelo para validar que la trama LACP fue impulsada a la CPU a través de la cola correcta, también valida si la CPU envía tramas LACP de vuelta al hardware.

Nota: Solo el protocolo LACP se analiza con el uso de estas herramientas, sin embargo, también se pueden utilizar para analizar tramas PAgP.

Captura de paquetes integrada (EPC)

Los comandos para configurar Wireshark (EPC) y capturar PDU LACP de entrada/salida.

monitor capture <capture name> [control-plane|interface <interface ID>] BOTH

monitor capture <capture name> match mac [any|host <source MAC address>|<source MAC address>][any|host <destination MAC address>|<destination MAC address>]

monitor capture <capture name> file location flash:<name>.pcap

show monitor capture <capture name> parameter

show monitor capture <capture name>

monitor capture <capture name> start

monitor capture <capture name> stop

show monitor capture file flash:<name>.pcap [detailed]

Nota: Los comandos se ingresan en el modo de privilegio.

Configure la captura de Wireshark.

Sugerencia: si desea centrarse en una interfaz agrupada específica o una dirección MAC de origen específica, ajuste la interfaz y las palabras clave mac coincidentes.

monitor capture CAP interface GigabitEthernet1/0/1 BOTH

monitor capture CAP interface GigabitEthernet1/0/2 BOTH

monitor capture CAP interface GigabitEthernet1/0/3 BOTH

monitor capture CAP interface GigabitEthernet1/0/4 BOTH

monitor capture CAP match mac any host 0180.c200.0002

show monitor capture CAP file location flash:CAP.pcap

Nota: La dirección MAC de destino 0180.c200.0002 definida en la captura le ayuda a filtrar tramas LACP.

Verifique que Wireshark se haya configurado correctamente:

switch#show monitor capture CAP parameter

monitor capture CAP interface GigabitEthernet1/0/1 BOTH

monitor capture CAP interface GigabitEthernet1/0/2 BOTH

monitor capture CAP interface GigabitEthernet1/0/3 BOTH

monitor capture CAP interface GigabitEthernet1/0/4 BOTH

monitor capture CAP match mac any host 0180.c200.0002

monitor capture CAP file location flash:LACP.pcap

switch#show monitor capture CAP

Status Information for Capture CAP

Target Type:

Interface: GigabitEthernet1/0/1, Direction: BOTH

Interface: GigabitEthernet1/0/2, Direction: BOTH

Interface: GigabitEthernet1/0/3, Direction: BOTH

Interface: GigabitEthernet1/0/4, Direction: BOTH

Status : Inactive

Filter Details:

MAC

Source MAC: 0000.0000.0000 mask:ffff.ffff.ffff

Destination MAC: 0180.c200.0002 mask:0000.0000.0000

Buffer Details:

Buffer Type: LINEAR (default)

File Details:

Associated file name: flash:CAP.pcap

Limit Details:

Number of Packets to capture: 0 (no limit)

Packet Capture duration: 0 (no limit)

Packet Size to capture: 0 (no limit)

Packet sampling rate: 0 (no sampling)

Iniciar la captura:

switch#monitor capture CAP start

Started capture point : CAP

Deténgalo después de (al menos) 30 segundos si no utiliza el temporizador rápido de velocidad LACP:

switch#monitor capture CAP stop

Capture statistics collected at software:

Capture duration - 58 seconds

Packets received - 16

Packets dropped - 0

Packets oversized - 0

Bytes dropped in asic - 0

Stopped capture point : CAP

Tramas capturadas:

switch#show monitor capture file flash:CAP.pcap

Starting the packet display ........ Press Ctrl + Shift + 6 to exit

1   0.000000 f0:4a:02:06:19:04 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:06:19:00 P: 261 K: 1 **DCSG*A PARTNER f0:4a:02:05:d6:00 P: 261 K: 1 **DCSG*A

2   2.563406 f0:4a:02:05:d6:01 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:05:d6:00 P: 258 K: 1 **DCSG*A PARTNER f0:4a:02:06:19:00 P: 258 K: 1 **DCSG*A

3   3.325148 f0:4a:02:05:d6:04 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:05:d6:00 P: 261 K: 1 **DCSG*A PARTNER f0:4a:02:06:19:00 P: 261 K: 1 **DCSG*A

4   5.105978 f0:4a:02:06:19:01 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:06:19:00 P: 258 K: 1 **DCSG*A PARTNER f0:4a:02:05:d6:00 P: 258 K: 1 **DCSG*A

5   6.621438 f0:4a:02:06:19:02 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:06:19:00 P: 259 K: 1 **DCSG*A PARTNER f0:4a:02:05:d6:00 P: 259 K: 1 **DCSG*A

6   8.797498 f0:4a:02:05:d6:03 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:05:d6:00 P: 260 K: 1 **DCSG*A PARTNER f0:4a:02:06:19:00 P: 260 K: 1 **DCSG*A

7  13.438561 f0:4a:02:05:d6:02 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:05:d6:00 P: 259 K: 1 **DCSG*A PARTNER f0:4a:02:06:19:00 P: 259 K: 1 **DCSG*A

8  16.658497 f0:4a:02:06:19:03 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:06:19:00 P: 260 K: 1 **DCSG*A PARTNER f0:4a:02:05:d6:00 P: 260 K: 1 **DCSG*A

9  28.862344 f0:4a:02:06:19:04 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:06:19:00 P: 261 K: 1 **DCSG*A PARTNER f0:4a:02:05:d6:00 P: 261 K: 1 **DCSG*A

10  29.013031 f0:4a:02:05:d6:01 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:05:d6:00 P: 258 K: 1 **DCSG*A PARTNER f0:4a:02:06:19:00 P: 258 K: 1 **DCSG*A

11  30.756138 f0:4a:02:05:d6:04 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:05:d6:00 P: 261 K: 1 **DCSG*A PARTNER f0:4a:02:06:19:00 P: 261 K: 1 **DCSG*A

12  33.290542 f0:4a:02:06:19:01 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:06:19:00 P: 258 K: 1 **DCSG*A PARTNER f0:4a:02:05:d6:00 P: 258 K: 1 **DCSG*A

13  36.387119 f0:4a:02:06:19:02 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:06:19:00 P: 259 K: 1 **DCSG*A PARTNER f0:4a:02:05:d6:00 P: 259 K: 1 **DCSG*A

14  37.598788 f0:4a:02:05:d6:03 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:05:d6:00 P: 260 K: 1 **DCSG*A PARTNER f0:4a:02:06:19:00 P: 260 K: 1 **DCSG*A

15  40.659931 f0:4a:02:05:d6:02 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:05:d6:00 P: 259 K: 1 **DCSG*A PARTNER f0:4a:02:06:19:00 P: 259 K: 1 **DCSG*A

16  45.242014 f0:4a:02:06:19:03 b^F^R 01:80:c2:00:00:02 LACP 124 v1 ACTOR f0:4a:02:06:19:00 P: 260 K: 1 **DCSG*A PARTNER f0:4a:02:05:d6:00 P: 260 K: 1 **DCSG*A

Si necesita verificar el campo LACP de una trama específica, utilice la palabra clave detailed.

switch#show monitor capture file flash:CAP.pcap detailed

Starting the packet display ........ Press Ctrl + Shift + 6 to exit

Frame 1: 124 bytes on wire (992 bits), 124 bytes captured (992 bits) on interface 0

Interface id: 0 (/tmp/epc_ws/wif_to_ts_pipe)

Interface name: /tmp/epc_ws/wif_to_ts_pipe

Encapsulation type: Ethernet (1)

Arrival Time: Mar 28, 2023 15:48:14.985430000 UTC

[Time shift for this packet: 0.000000000 seconds]

Epoch Time: 1680018494.985430000 seconds

[Time delta from previous captured frame: 0.000000000 seconds]

[Time delta from previous displayed frame: 0.000000000 seconds]

[Time since reference or first frame: 0.000000000 seconds]

Frame Number: 1

Frame Length: 124 bytes (992 bits)

Capture Length: 124 bytes (992 bits)

[Frame is marked: False]

[Frame is ignored: False]

[Protocols in frame: eth:ethertype:slow:lacp]

Ethernet II, Src: f0:4a:02:06:19:04 (f0:4a:02:06:19:04), Dst: 01:80:c2:00:00:02 (01:80:c2:00:00:02)

Destination: 01:80:c2:00:00:02 (01:80:c2:00:00:02)

Address: 01:80:c2:00:00:02 (01:80:c2:00:00:02)

.... ..0. .... .... .... .... = LG bit: Globally unique address (factory default)

.... ...1 .... .... .... .... = IG bit: Group address (multicast/broadcast)

Source: f0:4a:02:06:19:04 (f0:4a:02:06:19:04)

Address: f0:4a:02:06:19:04 (f0:4a:02:06:19:04)

.... ..0. .... .... .... .... = LG bit: Globally unique address (factory default)

.... ...0 .... .... .... .... = IG bit: Individual address (unicast)

Type: Slow Protocols (0x8809)

Slow Protocols

Slow Protocols subtype: LACP (0x01)

Link Aggregation Control Protocol

LACP Version: 0x01

TLV Type: Actor Information (0x01)

TLV Length: 0x14

Actor System Priority: 32768

Actor System ID: f0:4a:02:06:19:00 (f0:4a:02:06:19:00)

Actor Key: 1

Actor Port Priority: 32768

Actor Port: 261

Actor State: 0x3d, LACP Activity, Aggregation, Synchronization, Collecting, Distributing

.... ...1 = LACP Activity: Active

.... ..0. = LACP Timeout: Long Timeout

.... .1.. = Aggregation: Aggregatable

.... 1... = Synchronization: In Sync

...1 .... = Collecting: Enabled

..1. .... = Distributing: Enabled

.0.. .... = Defaulted: No

0... .... = Expired: No

[Actor State Flags: **DCSG*A]

Reserved: 000000

TLV Type: Partner Information (0x02)

TLV Length: 0x14

Partner System Priority: 32768

Partner System: f0:4a:02:05:d6:00 (f0:4a:02:05:d6:00)

Partner Key: 1

Partner Port Priority: 32768

Partner Port: 261

Partner State: 0x3d, LACP Activity, Aggregation, Synchronization, Collecting, Distributing

.... ...1 = LACP Activity: Active

.... ..0. = LACP Timeout: Long Timeout

.... .1.. = Aggregation: Aggregatable

.... 1... = Synchronization: In Sync

...1 .... = Collecting: Enabled

..1. .... = Distributing: Enabled

.0.. .... = Defaulted: No

0... .... = Expired: No

[Partner State Flags: **DCSG*A]

Reserved: 000000

TLV Type: Collector Information (0x03)

TLV Length: 0x10

Collector Max Delay: 32768

Reserved: 000000000000000000000000

TLV Type: Terminator (0x00)

TLV Length: 0x00

Pad: 000000000000000000000000000000000000000000000000...

Frame 2: 124 bytes on wire (992 bits), 124 bytes captured (992 bits) on interface 0

Interface id: 0 (/tmp/epc_ws/wif_to_ts_pipe)

Interface name: /tmp/epc_ws/wif_to_ts_pipe

Encapsulation type: Ethernet (1)

Arrival Time: Mar 28, 2023 15:48:17.548836000 UTC

[Time shift for this packet: 0.000000000 seconds]

Epoch Time: 1680018497.548836000 seconds

[Time delta from previous captured frame: 2.563406000 seconds]

[Time delta from previous displayed frame: 2.563406000 seconds]

[Time since reference or first frame: 2.563406000 seconds]

Nota: El formato de salida de Wireshark puede diferir en los dispositivos 9200 y no ser legible desde el switch. Exporte la captura y léala desde su PC si ese es el caso.

Reenvío de plataforma

Para depurar la información de reenvío y rastrear la trayectoria del paquete en el plano de reenvío de hardware, utilice el show platform hardware fed switch <switch number or role> forward interface comando. Este comando simula un paquete definido por el usuario y recupera la información de reenvío del plano de reenvío de hardware. Se genera un paquete en el puerto de ingreso en función de los parámetros de paquete especificados en este comando. También puede proporcionar un paquete completo de los paquetes capturados almacenados en un archivo PCAP.

En este tema sólo se explican las opciones específicas de reenvío de interfaz, es decir, las opciones disponibles con el show platform hardware fed switch {switch_num|active|standby}forward interface comando.

show platform hardware fed switch <switch number or role> forward interface <interface ID> <source mac address> <destination mac address> <protocol number | arp | cos | ipv4 | ipv6 | mpls>

show platform hardware fed switch <switch number or role> forward interface <interface ID> pcap <pcap file name> number <packet number> data

show platform hardware fed switch <switch number or role> forward interface <interface ID> vlan <VLAN ID> <source mac address> <destination mac address> <protocol-number | arp | cos | ipv4 | ipv6 | mpls>

Defina la captura de reenvío de plataforma. En este caso, se analiza la CAP.pcap trama 1.

switch#show platform hardware fed switch active forward interface gigabitEthernet 1/0/1 pcap flash:CAP.pcap number 1 data

show forward is running in the background. After completion, syslog will be generated.

Una vez realizada la captura de reenvío de plataforma, se muestran los siguientes mensajes de Syslog.

switch#show logging

<output omitted>

*Mar 28 16:47:57.289: %SHFWD-6-PACKET_TRACE_DONE: Switch 1 R0/0: fed: Packet Trace Complete: Execute (show platform hardware fed switch <> forward last summary|detail)

*Mar 28 16:47:57.289: %SHFWD-6-PACKET_TRACE_FLOW_ID: Switch 1 R0/0: fed: Packet Trace Flow id is 100990977

Analice la captura de reenvío de la plataforma. La sección Egress le indica cuál fue la decisión de reenvío interno. Se espera que las tramas LACP y PAgP sean impulsadas a la CPU.

switch#show platform hardware fed switch active forward last summary

Input Packet Details:

###[ Ethernet ]### dst = 01:80:c2:00:00:02 src. = f0:4a:02:06:19:04 type = 0x8809 <-- slow protocols (LACP) defined by IANA ###[ Raw ]###

load      = '01 01 01 14 80 00 F0 4A 02 06 19 00 00 01 80 00 01 05 3D 00 00 00 02 14 80 00 F0 4A 02 05 D6 00 00 01 80 00 01 05 3D 00 00 00 03 10 80 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 00'

Ingress:

Port                      :

Global Port Number        : 1536

Local Port Number         : 0

Asic Port Number          : 0

Asic Instance             : 1

Vlan                      : 1

Mapped Vlan ID            : 4

STP Instance              : 2

BlockForward              : 0

BlockLearn                : 0

L3 Interface              : 37

IPv4 Routing          : enabled

IPv6 Routing          : enabled

Vrf Id                : 0

Adjacency:

Station Index         : 107    [SI_CPUQ_L2_CONTROL]

Destination Index     : 21106

Rewrite Index         : 1

Replication Bit Map   : 0x20   ['coreCpu']

Decision:

Destination Index     : 21106  [DI_CPUQ_L2_CONTROL]

Rewrite Index         : 1      [RI_CPU]

Dest Mod Index        : 0      [IGR_FIXED_DMI_NULL_VALUE]

CPU Map Index         : 0      [CMI_NULL]

Forwarding Mode       : 0      [Bridging]

Replication Bit Map   :        ['coreCpu']

Winner                :        L2DESTMACVLAN LOOKUP

Qos Label             : 65

SGT                   : 0

DGTID                 : 0

Egress: Possible Replication : Port : CPU_Q_L2_CONTROL Output Port Data : Port : CPU        Asic Instance         : 0

CPU Queue : 1 [CPU_Q_L2_CONTROL]        Unique RI             : 0

Rewrite Type          : 0      [NULL]

Mapped Rewrite Type   : 15     [CPU_ENCAP] Vlan : 1       Mapped Vlan ID        : 4

********************************************************************************

Vector de estado de paquete (PSV)

PSV es similar a las capturas de Platform Forward, con la excepción de que PSV captura tramas de entrada activas de la red que coinciden con los criterios de activación.

Nota: PSV solo es compatible con las plataformas C9500-32C, C9500-32QC, C9500-24Y4C, C9500-48Y4C y C9606R.

debug platform hardware fed <switch number or role> capture trigger interface <interface ID> ingress

debug platform hardware fed <switch number or role> capture trigger layer2 <source MAC address> <destination MAC address>

show platform hardware fed <switch number or role> capture trigger

show platform hardware fed <switch number or role> capture status

show platform hardware fed <switch number or role> capture summary

Se utilizan dos switches C9500-48Y4C conectados entre sí para el canal de puerto siguiente y la captura de PSV.

switch#show etherchannel 1 summary

<output omitted>

Group Port-channel Protocol Ports

------+-------------+-----------+-----------------------------------------------

1 Po1(SU) LACP Twe1/0/1(P) Twe1/0/2(P)

Configure los criterios de activación. Utilice la palabra clave layer2 para que coincida con la dirección MAC de origen específica y la dirección MAC de LACP como destino.

switch#debug platform hardware fed active capture trigger interface twentyFiveGigE1/0/1 ingress

switch#debug platform hardware fed active capture trigger layer2 0000.0000.0000 0180.c200.0002 <-- match source MAC: any, match destination MAC: LACP MAC address

Capture trigger set successful.

Nota: La dirección MAC 0000.0000.0000 definida en la captura PSV significa que coincide con cualquiera.

Se configuraron los criterios de activación de validación.

switch#show platform hardware fed active capture trigger

Trigger Set:

Ingress Interface: TwentyFiveGigE1/0/1

Dest Mac: 0180.c200.0002

Una vez que se ha activado PST, el estado se muestra como Completado.

switch#show platform hardware fed active capture status

Asic: 0 Status: Completed

Analice el resultado de la captura de PSV con el siguiente comando. Se espera que vea que las tramas LACP y PAgP se dirigen a la CPU.

switch#show platform hardware fed active capture summary

Trigger: Ingress Interface:TwentyFiveGigE1/0/1 Dest Mac:0180.c200.0002

Input        Output       State     Reason

Tw1/0/1 cpuQ 1 PUNT Bridged

Controlador de políticas del plano de control (CoPP)

CoPP es básicamente un regulador de QoS aplicado a la tubería entre el plano de datos (hardware) y el plano de control (CPU) para evitar problemas altos de CPU. CoPP puede filtrar tramas LACP y PAgP si estas tramas exceden el umbral establecido por la función.

Validar si CoPP descarta paquetes LACP.

show platform hardware fed switch active qos queue stats internal cpu policer

La salida de este comando, L2 Control queue no tiene caídas:

switch#show platform hardware fed switch active qos queue stats internal cpu policer

CPU Queue Statistics

============================================================================================

(default) (set)     Queue        Queue

QId PlcIdx  Queue Name                Enabled   Rate     Rate      Drop(Bytes)  Drop(Frames)

--------------------------------------------------------------------------------------------

0    11     DOT1X Auth                  Yes     1000      1000     0            0

1 1 L2 Control Yes 2000 2000 0 0 <-- L2 Control queue filters LACP packets, rate set to 2000 (packets per second), no drops 2    14     Forus traffic               Yes     4000      4000     0            0

<output omitted>

* NOTE: CPU queue policer rates are configured to the closest hardware supported value

CPU Queue Policer Statistics

====================================================================

Policer    Policer Accept   Policer Accept  Policer Drop  Policer Drop

Index         Bytes          Frames        Bytes          Frames

-------------------------------------------------------------------

0          0                0               0             0

1 13328202 79853 0 0 <-- QId = 1 matches policer index (level 1) = 1, no drops 2          0                0               0             0

<output omitted>

Second Level Policer Statistics

====================================================================

20 34149506 389054 0 0 <-- Policer index (level 2) no drops 21         76896            596             0             0

Policer Index Mapping and Settings

--------------------------------------------------------------------

level-2   :   level-1                      (default)   (set)

PlcIndex  :   PlcIndex                       rate      rate

--------------------------------------------------------------------

20 : 1 2 8 13000 13000 <-- Policer index (level 1) = 1 matches policer index (level 2) = 20 21        :   0 4 7 9 10 11 12 13 14 15      6000      6000

====================================================================

Second Level Policer Config

====================================================================

level-1 level-2                            level-2

QId PlcIdx  PlcIdx  Queue Name                 Enabled

--------------------------------------------------------------------

0    11      21      DOT1X Auth                  Yes

1 1 20 L2 Control Yes 2    14      21      Forus traffic               Yes

<output omitted>

No se espera que sobrecargue la cola de control L2. La captura de paquetes del plano de control es necesaria cuando se observa lo contrario.

Captura de paquetes de CPU FED

Si se ha asegurado de que los paquetes LACP se recibieron en el nivel de interfaz, las tramas LACP confirmadas por EPC y ELAM/PSV se dirigieron a la CPU sin caídas observadas en el nivel CoPP, luego utilice la herramienta de captura de paquetes FED CPU.

La captura de paquetes de CPU FED le indica por qué un paquete fue impulsado desde el hardware a la CPU, también le indica a qué cola de CPU fue enviado el paquete. La captura de paquetes de CPU FED también puede capturar paquetes generados por la CPU inyectada en el hardware.

debug platform software fed sw active punt packet-capture set-filter <filter>

debug platform software fed switch active punt packet-capture start

debug platform software fed switch active punt packet-capture stop

show platform software fed switch active punt packet-capture status

show platform software fed switch active punt packet-capture brief

debug platform software fed sw active inject packet-capture set-filter <filter>

debug platform software fed switch active inject packet-capture start

debug platform software fed switch active inject packet-capture stop

show platform software fed switch active inject packet-capture status

show platform software fed switch active inject packet-capture brief

Punt

Defina la captura de paquetes para filtrar sólo paquetes LACP.

switch#debug platform software fed sw active punt packet-capture set-filter "eth.dst==0180.c200.0002"

Filter setup successful. Captured packets will be cleared

Inicie la captura.

switch#debug platform software fed sw active punt packet-capture start

Punt packet capturing started.

Pare después de (al menos) 30 segundos si no utiliza el temporizador rápido de velocidad LACP.

switch#debug platform software fed switch active punt packet-capture stop

Punt packet capturing stopped. Captured 11 packet(s)

Verifique el estado de la captura de paquetes de CPU FED.

switch#show platform software fed switch active punt packet-capture status

Punt packet capturing: disabled. Buffer wrapping: disabled

Total captured so far: 11 packets. Capture capacity : 4096 packets

Capture filter : "eth.dst==0180.c200.0002"

Analice la salida de captura de paquetes de CPU de FED.

switch#show platform software fed switch active punt packet-capture brief

Punt packet capturing: disabled. Buffer wrapping: disabled

Total captured so far: 11 packets. Capture capacity : 4096 packets

Capture filter : "eth.dst==0180.c200.0002"

------ Punt Packet Number: 1, Timestamp: 2023/03/31 00:27:54.141 ------

interface : physical: GigabitEthernet1/0/2[if-id: 0x0000000a], pal: GigabitEthernet1/0/2 [if-id: 0x0000000a]    <-- interface that punted the frame

metadata  : cause: 96 [Layer2 control protocols], sub-cause: 0, q-no: 1, linktype: MCP_LINK_TYPE_LAYER2 [10]    <-- LACP frame was punted due to L2 ctrl protocol to queue 1 (L2 control)

ether hdr : dest mac: 0180.c200.0002, src mac: f04a.0205.d602 <-- source and destination MAC addresses

ether hdr : ethertype: 0x8809

------ Punt Packet Number: 2, Timestamp: 2023/03/31 00:27:58.436 ------

interface : physical: GigabitEthernet1/0/4[if-id: 0x0000000c], pal: GigabitEthernet1/0/4 [if-id: 0x0000000c]

metadata  : cause: 96 [Layer2 control protocols], sub-cause: 0, q-no: 1, linktype: MCP_LINK_TYPE_LAYER2 [10]

ether hdr : dest mac: 0180.c200.0002, src mac: f04a.0205.d604

ether hdr : ethertype: 0x8809

------ Punt Packet Number: 3, Timestamp: 2023/03/31 00:28:00.758 ------

interface : physical: GigabitEthernet1/0/1[if-id: 0x00000009], pal: GigabitEthernet1/0/1 [if-id: 0x00000009]

metadata  : cause: 96 [Layer2 control protocols], sub-cause: 0, q-no: 1, linktype: MCP_LINK_TYPE_LAYER2 [10]

ether hdr : dest mac: 0180.c200.0002, src mac: f04a.0205.d601

ether hdr : ethertype: 0x8809

------ Punt Packet Number: 4, Timestamp: 2023/03/31 00:28:11.888 ------

interface : physical: GigabitEthernet1/0/3[if-id: 0x0000000b], pal: GigabitEthernet1/0/3 [if-id: 0x0000000b]

metadata  : cause: 96 [Layer2 control protocols], sub-cause: 0, q-no: 1, linktype: MCP_LINK_TYPE_LAYER2 [10]

ether hdr : dest mac: 0180.c200.0002, src mac: f04a.0205.d603

ether hdr : ethertype: 0x8809

Inyectar

Defina la captura de paquetes para filtrar sólo paquetes LACP.

switch#debug platform software fed sw active inject packet-capture set-filter "eth.dst==0180.c200.0002"

Filter setup successful. Captured packets will be cleared

Inicie la captura.

switch#debug platform software fed sw active inject packet-capture start

Punt packet capturing started.

Pare después de (al menos) 30 segundos si no utiliza el temporizador rápido de velocidad LACP.

switch#debug platform software fed switch active inject packet-capture stop

Inject packet capturing stopped. Captured 12 packet(s)

Verifique el estado de la captura de paquetes de CPU FED.

switch#show platform software fed sw active inject packet-capture status

Inject packet capturing: disabled. Buffer wrapping: disabled

Total captured so far: 12 packets. Capture capacity : 4096 packets

Capture filter : "eth.dst==0180.c200.0002"

Analice la salida de captura de paquetes de CPU de FED.

switch#show platform software fed sw active inject packet-capture brief

Inject packet capturing: disabled. Buffer wrapping: disabled

Total captured so far: 12 packets. Capture capacity : 4096 packets

Capture filter : "eth.dst==0180.c200.0002"

------ Inject Packet Number: 1, Timestamp: 2023/03/31 19:59:26.507 ------

interface : pal: GigabitEthernet1/0/2 [if-id: 0x0000000a] <-- interface that LACP frame is destined to

metadata  : cause: 1 [L2 control/legacy], sub-cause: 0, q-no: 7, linktype: MCP_LINK_TYPE_LAYER2 [10] <-- cause L2 ctrl, queue=7 (high priority)

ether hdr : dest mac: 0180.c200.0002, src mac: f04a.0206.1902 <-- source and destination MAC addresses

ether hdr : ethertype: 0x8809

------ Inject Packet Number: 2, Timestamp: 2023/03/31 19:59:28.538 ------

interface : pal: GigabitEthernet1/0/3 [if-id: 0x0000000b]

metadata  : cause: 1 [L2 control/legacy], sub-cause: 0, q-no: 7, linktype: MCP_LINK_TYPE_LAYER2 [10]

ether hdr : dest mac: 0180.c200.0002, src mac: f04a.0206.1903

ether hdr : ethertype: 0x8809

------ Inject Packet Number: 3, Timestamp: 2023/03/31 19:59:30.050 ------

interface : pal: GigabitEthernet1/0/1 [if-id: 0x00000009]

metadata  : cause: 1 [L2 control/legacy], sub-cause: 0, q-no: 7, linktype: MCP_LINK_TYPE_LAYER2 [10]

ether hdr : dest mac: 0180.c200.0002, src mac: f04a.0206.1901

ether hdr : ethertype: 0x8809

------ Inject Packet Number: 4, Timestamp: 2023/03/31 19:59:33.467 ------

interface : pal: GigabitEthernet1/0/4 [if-id: 0x0000000c]

metadata  : cause: 1 [L2 control/legacy], sub-cause: 0, q-no: 7, linktype: MCP_LINK_TYPE_LAYER2 [10]

ether hdr : dest mac: 0180.c200.0002, src mac: f04a.0206.1904

ether hdr : ethertype: 0x8809

Información Relacionada

- Números IEEE 802

- IEEE - Protocolo de control de agregación de enlaces

- Guía de Configuración de Capa 2, Cisco IOS XE Amsterdam 17.3.x (Catalyst 9200 Switches) - Capítulo: Configuración de EtherChannels

- Guía de Configuración de Capa 2, Cisco IOS XE Cupertino 17.7.x (Switches Catalyst 9300) - Capítulo: Configuración de EtherChannels

- Guía de Configuración de Capa 2, Cisco IOS XE Amsterdam 17.3.x (Catalyst 9400 Switches) - Capítulo: Configuración de EtherChannels

- Guía de Configuración de Capa 2, Cisco IOS XE Cupertino 17.9.x (Switches Catalyst 9500) - Capítulo: Configuración de EtherChannels

- Guía de Configuración de Capa 2, Cisco IOS XE Cupertino 17.9.x (Switches Catalyst 9600) - Capítulo: Configuración de EtherChannels

- Capítulo: Comandos de interfaz y hardware - show platform hardware fed switch forward interface

- Configuración de la captura de paquetes de CPU FED en switches Catalyst 9000

- Soporte Técnico y Documentación - Cisco Systems