Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Productos Relacionados

Convenciones

Antecedentes

Procedimiento Paso a Paso para Reemplazar el Módulo Supervisor - Mismo SO Híbrido

Procedimiento paso a paso para reemplazar el módulo supervisor - diferente sistema operativo híbrido

Verifique antes de agregar el nuevo módulo de supervisor

Agregar el nuevo módulo supervisor

Verifique el Módulo Supervisor después de agregar el Nuevo Módulo Supervisor

Verifique el IOS MSFC

Conmutación por fallas a Supervisor en Espera y Verificación

Cambiar el nombre del Catalyst OS

Información Relacionada

Introducción

Este documento muestra cómo sustituir un módulo de supervisor redundante fallido en los switches Catalyst 6500 Series. Este documento explica el procedimiento para los módulos de supervisor que se ejecutan en código abierto híbrido.

Prerequisites

Requirements

Cisco recomienda que tenga conocimiento sobre estos temas:

- Redundancia de configuración

- Configuración de NSF con Redundancia MSFC SSO

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de software y hardware.

- Switch Cisco Catalyst serie 6500

- Módulo supervisor: WS-SUP32-GE-3B

- SO híbrido:

- Catalyst OS (CatOS) 8.5(8)

- MSFC IOS® 12.2(18)SXF7

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Productos Relacionados

Este documento también puede utilizarse con estas versiones de software y hardware:

- Supervisor 720 que ejecuta el sistema operativo híbrido

- Supervisor 2 que ejecuta el sistema operativo híbrido

Convenciones

Consulte Convenciones de Consejos TécnicosCisco para obtener más información sobre las convenciones del documento.

Antecedentes

Estos son algunos de los puntos importantes relacionados con los módulos de supervisor redundantes:

- En el motor supervisor en espera, el puerto de la consola está inactivo, el estado del módulo se muestra como "en espera" y el estado de los puertos de link ascendente se muestra normalmente.

- Para permitirle controlar el arranque de cada Supervisor Engine por separado, los registros de configuración no se sincronizan entre los Supervisor Engines.

- Si las versiones de software de los dos motores supervisores son diferentes, o si la configuración NVRAM de los dos motores supervisores es diferente, el motor supervisor activo descarga automáticamente su imagen y configuración de software al motor supervisor en espera.

- Los motores supervisores utilizan dos imágenes flash: la imagen de inicio y la imagen en tiempo de ejecución. El nombre de archivo de la imagen de inicio, que se especifica en la variable de entorno BOOT, se almacena en NVRAM. La imagen en tiempo de ejecución es la imagen de inicio que utiliza el monitor ROM para iniciar el motor supervisor. Una vez que se inicia el sistema, la imagen en tiempo de ejecución reside en la RAM dinámica (DRAM).

- Los motores supervisores redundantes deben ser del mismo tipo con la misma tarjeta de función de modelo. Los modelos WS-X6K-SUP1-2GE y WS-X6K-SUP1A-2GE, que carecen de tarjetas de función de políticas (PFC), son compatibles con la redundancia. Para los motores supervisores con PFC, los PFC deben ser idénticos para la redundancia (dos PFC, dos PFC2, dos PFC3A, dos PFC3Bs o dos PFC3BXL).

Procedimiento Paso a Paso para Reemplazar el Módulo Supervisor - Mismo SO Híbrido

Esta sección proporciona el procedimiento paso a paso para reemplazar el Supervisor Module 32 en un Catalyst 6500 Series Switch. Este ejemplo utiliza un switch Cisco Catalyst 6509, que tiene dos módulos de supervisor en las ranuras 5 y 6. El módulo supervisor en la ranura 6 ha fallado. Se supone que el módulo supervisor fallido en la ranura 6 se quita del chasis. Puede ver el procedimiento para agregar el nuevo módulo supervisor en la ranura 6.

Si dispone de un switch Cisco Catalyst serie 6500 adicional, puede conectar el nuevo supervisor en el switch y actualizar o actualizar el sistema operativo híbrido al mismo nivel que el supervisor en la ranura 5 del switch de producción. Si tiene el mismo sistema operativo híbrido en el nuevo módulo supervisor, no necesita configurar nada en el nuevo módulo supervisor. Cuando agrega el módulo supervisor a la ranura 6, el motor supervisor activo sincroniza automáticamente la configuración. Esta sección muestra el proceso paso a paso y la lista de verificación durante el reemplazo del supervisor.

Este es el procedimiento paso a paso para reemplazar el Supervisor Module 32 en un Catalyst 6500 Series Switch:

1. Agregue el módulo supervisor a la ranura 6.

Si tiene conexión de consola con el supervisor en la ranura 6, debería ver este resultado:

!--- Supervisor module at slot 6

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 524288 Kbytes of main memory

Autoboot executing command: "boot bootdisk:cat6000-sup32pfc3k8.8-5-8.bin"

Self decompressing the image : ############################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

##################################################### [OK]

System Power On Diagnostics

DRAM Size ..........................512 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Firmware compiled 01-Dec-06 12:57 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor.

Esta salida muestra la consola del supervisor activo en la ranura 5:

Access2> (enable)

Access2> (enable)

Access2> (enable) 2007 May 22 19:17:48 %SYS-5-MOD_INSERT:Module

6 has been inserted

Access2> (enable)

Access2> (enable)

Access2> (enable)

%SYS-5-SUP_MODSBY:Module 6 is in standby mode

%SYS-5-SUP_IMGSYNC:File synchronization process will start in 120 seconds

%DIAG-6-RUN_MINIMUM:Module 6: Running Minimal Diagnostics...

%DIAG-6-DIAG_OK:Module 6: Passed Online Diagnostics

%SYS-3-TRANSCEIVER_NOTSUPP: Transceiver on port 6/1 is not supported

%SYS-3-TRANSCEIVER_NOTSUPP: Transceiver on port 6/2 is not supported

%SYS-5-PORT_SSUPOK:Ports on standby supervisor (module 6) are up

%SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync for Module 6

%DIAG-6-RUN_MINIMUM:Module 16: Running Minimal Diagnostics...

%DIAG-6-DIAG_OK:Module 16: Passed Online Diagnostics

%SYS-5-MOD_OK:Module 16(WS-F6K-MSFC2A,SAL1018LQ3C) is online

%MGMT-5-SYS_CONFIG_START_MOD_FAIL:Unable to start system configuration

for module 6

%MGMT-5-SYS_CONFIG_START_MOD_FAIL:Unable to start system configuration for

module 16

%SYS-5-SUP_IMGSYNCSTART:Active supervisor is synchronizing bootdisk:

cat6000-sup32pfc3k8.8-5-8.bin

%SYS-5-SUP_IMGSYNCFINISH:Active supervisor has synchronized bootdisk:

cat6000-sup32pfc3k8.8-5-8.bin

Access2> (enable)

2. Verifique el estado de redundancia del supervisor:

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: ON

Access2> (enable)

3. Verifique el estado de redundancia de MSFC:

Access2> (enable) session 15

Trying Router-15...

Connected to Router-15.

Escape character is '^]'.

LAB-Router>enable

LAB-Router#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 10 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = unsupported

Hardware Mode = Duplex

Configured Redundancy Mode = Stateful SwitchOver - SSO

Operating Redundancy Mode = Stateful SwitchOver - SSO

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 5

Current Software state = ACTIVE

Uptime in current state = 10 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 6

Current Software state = STANDBY HOT

Uptime in current state = 2 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

LAB-Router#

4. Forzar el failover y la prueba del supervisor:

!--- Supervisor in slot 5

Access2> (enable) switch supervisor

This command will force a switch-over to the standby Supervisor module.

Do you want to continue (y/n) [n]? y

2007 May 21 20:40:37 %SYS-5-MOD_RESET:Module 5 reset from Console//

Access2> (enable)

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 262144 Kbytes of main memory

Autoboot executing command: "boot bootdisk:cat6000-sup32pfc3k8.8-5-8.bin"

Self decompressing the image : ##############################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

##################################################### [OK]

System Power On Diagnostics

DRAM Size ..........................256 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Firmware compiled 01-Dec-06 12:57 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor

5. Conéctese al Supervisor 6 y verifique la configuración del supervisor y MSFC.

Procedimiento paso a paso para reemplazar el módulo supervisor - diferente sistema operativo híbrido

Esta sección explica el procedimiento paso a paso para reemplazar el Supervisor Module 32 en un Catalyst 6500 Series Switch. Este ejemplo utiliza un switch Cisco Catalyst 6509 que tiene dos módulos de supervisor en las ranuras 5 y 6. El módulo supervisor en la ranura 6 ha fallado. Se supone que el módulo supervisor fallido en la ranura 6 se quita del chasis. Puede ver el procedimiento para agregar el nuevo módulo supervisor en la ranura 6.

Si no tiene la opción de actualizar el nuevo Supervisor Hybrid OS a la misma versión que el supervisor activo, puede realizar este procedimiento para agregar el módulo supervisor y sincronizar el Hybrid OS y la configuración del switch. La mayor parte del procedimiento está automatizado. Este documento muestra el proceso paso a paso y la lista de verificación que se realizará durante el reemplazo del supervisor.

Verifique antes de agregar el nuevo módulo de supervisor

Esta sección muestra el resultado show del switch sin el supervisor en la ranura 6.

- Show module

- show version

- Variable de arranque

1. Mostrar salida del módulo:

Access2> (enable) show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    0     1000BaseX Ethernet                            no  power-down

2   2    48    10/100BaseTX Ethernet     WS-X6248-RJ-45      no  ok

3   3    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

4   4    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

5   5    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes ok

15  5    1     Multilayer Switch Feature WS-F6K-MSFC2A       no  ok

7   7    5     Communication Media Mod.  WS-SVC-CMM          no  ok

8   8    0     FXS                                           no  power-down

9   9    0     10/100BaseTX Ethernet                         no  power-down

!--- Output suppressed

Mod Sub-Type                Sub-Model           Sub-Serial  Sub-Hw Sub-Sw

--- ----------------------- ------------------- ----------- ------ ------

3   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

4   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

5   L3 Switching Engine III WS-F6K-PFC3B        SAL1012GREU 2.1

Access2> (enable)

2. Mostrar salida de versión:

Access2> (enable) show version

WS-C6509 Software, Version NmpSW: 8.5(8)

Copyright (c) 1995-2006 by Cisco Systems

NMP S/W compiled on Dec  1 2006, 23:03:43

System Bootstrap Version: 12.2

System Boot Image File is 'bootdisk:cat6000-sup32pfc3k8.8-5-8.bin'

System Configuration register is 0x2102

Hardware Version: 2.0  Model: WS-C6509  Serial #: SCA034500F5

PS1  Module: WS-CAC-6000W    Serial #: AZS10130G7T

Mod Port Model               Serial #    Versions

--- ---- ------------------- ----------- --------------------------------------

2   48   WS-X6248-RJ-45      SAD03431007 Hw : 1.1

Fw : 4.2(0.24)VAI78

Sw : 8.5(8)

3   48   WS-X6348-RJ-45      SAD04150A2T Hw : 1.1

Fw : 5.3(1)

Sw : 8.5(8)

WS-F6K-VPWR                     Hw : 1.0

Sw : 1.1(1)

4   48   WS-X6348-RJ-45      SAD05070CNX Hw : 2.0

Fw : 5.4(2)

Sw : 8.5(8)

WS-F6K-VPWR                     Hw : 1.0

Sw : 1.1(1)

5   9    WS-SUP32-GE-3B      SAL1010F8KG Hw : 4.2

Fw : 12.2

Fw1: 8.5(8)

Sw : 8.5(8)

Sw1: 8.5(8)

WS-F6K-PFC3B        SAL1012GREU Hw : 2.1

Sw :

7   5    WS-SVC-CMM          SAD100707YJ Hw : 2.8

Fw : 12.4(7a),

Sw : 12.4(7a),

15  1    WS-F6K-MSFC2A       SAL1012GG1X Hw : 3.0

Fw : 12.2(18)SXF7

Sw : 12.2(18)SXF7

DRAM                    FLASH                   NVRAM

Module Total   Used    Free    Total   Used    Free    Total Used  Free

------ ------- ------- ------- ------- ------- ------- ----- ----- -----

5      262144K 124421K 137723K 249772K   9796K 239976K 2048K  366K 1682K

Uptime is 0 day, 0 hour, 3 minutes

Access2> (enable)

3. Variable de arranque:

!--- Current working directory

Access2> (enable) pwd

bootdisk

!--- Files in the bootdisk

Access2> (enable) dir

2   -rw-  10029260    Dec 13 2006 15:37:08 cat6000-sup32pfc3k8.8-5-8.bin

245735424 bytes available (10031104 bytes used)

!--- Boot variable

Access2> (enable) show boot

BOOT variable = bootdisk:cat6000-sup32pfc3k8.8-5-8.bin,1;

CONFIG_FILE variable = bootflash:switch.cfg

Configuration register is 0x2102

ignore-config: disabled

auto-config: non-recurring, overwrite, sync disabled

ROMMON console baud: 9600

boot: image specified by the boot system commands

Image auto sync is enabled

Image auto sync timer is 120 seconds

Access2> (enable)

Agregar el nuevo módulo supervisor

El módulo supervisor se inserta en la ranura 6. La salida de la consola de los módulos de supervisor activo y en espera cuando agrega el nuevo módulo de supervisor en espera al switch se muestra aquí:

1. Inserte el nuevo módulo supervisor en la ranura 6.

Puede ver este mensaje de registro en el módulo supervisor activo:

Access2> (enable) 2007 May 21 20:21:14 %SYS-5-MOD_INSERT:Module 6 has been

inserted

Si se ha concentrado en el supervisor en espera en 6, puede ver este proceso de inicio:

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 524288 Kbytes of main memory

Autoboot executing command: "boot bootdisk:cat6000-sup32pfc3k8.8-4-5.bin"

Self decompressing the image : ##############################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

######################################################################## [OK]

System Power On Diagnostics

DRAM Size ..........................512 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:cat6000-sup32pfc3k8.8-4-5.bin

Firmware compiled 02-Aug-05 16:08 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor

2. Puede verificar el estado de redundancia desde el módulo supervisor activo en la ranura 5.

Access2> (enable) 2007 May 21 20:23:09 %SYS-5-SUP_MODSBY:Module 6 is in standby

mode

2007 May 21 20:23:11 %SYS-5-SUP_IMGSYNCSTART:Active supervisor is synchronizing

bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: OFF(standby-supervisor-image-incompatible)

El módulo supervisor activo copia el CatOS en el módulo supervisor en espera. También configura la variable de inicio del motor supervisor en espera en el nuevo CatOS.

Access2> (enable)

2007 May 21 20:24:23 %SYS-5-SUP_IMGSYNCFINISH:Active superviso

r has synchronized bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Después de copiar la imagen de CatOS al supervisor en espera, el módulo en espera 6 se recarga automáticamente con la nueva imagen.

This module is now in standby mode.

Console is disabled for standby supervisor

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 524288 Kbytes of main memory

Autoboot executing command: "boot bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin"

Self decompressing the image : #################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

##################################################### [OK]

System Power On Diagnostics

DRAM Size ..........................512 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin

Firmware compiled 01-Dec-06 12:57 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor

3. Una vez que el módulo en espera está activo, puede verificar el estado de redundancia desde el módulo supervisor activo.

Access2> (enable) 2007 May 21 20:26:22 %SYS-5-SUP_MODSBY:Module 6 is in standby

mode

2007 May 21 20:26:23 %SYS-5-SUP_IMGSYNC:File synchronization process will start

in 120 seconds

2007 May 21 20:27:08 %SYS-1-SYS_LCPERR1:Module 16: RP requested reset of peer RP

: MSFC on module 16 will be reset

2007 May 21 20:27:24 %DIAG-6-RUN_MINIMUM:Module 6: Running Minimal Diagnostics..

.

2007 May 21 20:27:24 %DIAG-6-DIAG_OK:Module 6: Passed Online Diagnostics

2007 May 21 20:27:25 %SYS-3-TRANSCEIVER_NOTSUPP: Transceiver on port 6/1 is not

supported

2007 May 21 20:27:25 %SYS-3-TRANSCEIVER_NOTSUPP: Transceiver on port 6/2 is not

supported

2007 May 21 20:27:25 %SYS-5-PORT_SSUPOK:Ports on standby supervisor (module 6) a

re up

2007 May 21 20:27:25 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync for Module

6

2007 May 21 20:28:24 %SYS-5-SUP_IMGSYNCSTART:Active supervisor

is synchronizing bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

2007 May 21 20:28:25 %SYS-5-SUP_IMGSYNCFINISH:Active supervisor has synchronized

bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Access2> (enable)

Access2> (enable) dir

2   -rw-  10029260    Dec 13 2006 15:37:08 cat6000-sup32pfc3k8.8-5-8.bin

245735424 bytes available (10031104 bytes used)

Access2> (enable) dir 6/

2   -rw-   9356096    May 11 2006 19:04:09 cat6000-sup32pfc3k8.8-4-5.bin

2287   -rw-  10029260    May 21 2007 20:24:10 RTSYNC_cat6000-sup32pfc3k8.8-5-

8.bin

!--- You can see the copied CatOS name starts with RTSYNC_

236900352 bytes available (19390464 bytes used)

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: ON

Verifique el Módulo Supervisor después de agregar el Nuevo Módulo Supervisor

Siga estos pasos:

1. Mostrar salida del módulo:

Access2> (enable) show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    0     1000BaseX Ethernet                            no  power-down

2   2    48    10/100BaseTX Ethernet     WS-X6248-RJ-45      no  ok

3   3    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

4   4    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

5   5    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes ok

15  5    1     Multilayer Switch Feature WS-F6K-MSFC2A       no  ok

6   6    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes standby

7   7    5     Communication Media Mod.  WS-SVC-CMM          no  ok

8   8    0     FXS                                           no  power-down

9   9    0     10/100BaseTX Ethernet                         no  power-down

!--- Output suppressed

Mod Sub-Type                Sub-Model           Sub-Serial  Sub-Hw Sub-Sw

--- ----------------------- ------------------- ----------- ------ ------

3   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

4   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

5   L3 Switching Engine III WS-F6K-PFC3B        SAL1012GREU 2.1

6   L3 Switching Engine III WS-F6K-PFC3B        SAL1017L9WJ 2.1

2. Verificar el historial de redundancia:

Access2> (enable) show system redundancy-history

Maximum entries of switchover history table = 10

System cold start due to switchover failure = 4

Standby available time (secs*100)          = 33291

Redundant History Switchover Table:

Verifique el IOS MSFC

El CatOS se copia automáticamente durante el proceso SYNC. Sin embargo, el IOS en la MSFC no se copia automáticamente.

1. Verifique el IOS y la redundancia de la MSFC:

!--- 1. Connect to MSFC

Access2> (enable) session 15

Trying Router-15...

Connected to Router-15.

Escape character is '^]'.

LAB-Router>enable

!--- 2. Verify the IOS file in the bootflash

LAB-Router#dir

Directory of bootflash:/

1  -rwx    17966324  Dec 13 2006 15:12:29 +00:00  c6msfc2a-adventerprisek9_w

an-mz.122-18.SXF7.bin

65536000 bytes total (47569548 bytes free)

!--- 3. Show version output

LAB-Router#show version

Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M), Version 12.2(18)SXF7,

RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

Image text-base: 0x40101040, data-base: 0x42638000

ROM: System Bootstrap, Version 12.2(17r)SX3, RELEASE SOFTWARE (fc1)

BOOTLDR: MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M), Version 12.2(18)SXF7,

RELEASE SOFTWARE (fc1)

LAB-Router uptime is 26 minutes

System returned to ROM by power-on

System image file is "bootflash:c6msfc2a-adventerprisek9_wan-mz.122-18.SXF7.bin"

!--- 4. MSFC redundancy status

LAB-Router#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 4 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = unsupported

Hardware Mode = Duplex

Configured Redundancy Mode = Stateful SwitchOver - SSO

Operating Redundancy Mode = Route Processor Redundancy

!--- It is running in the RPR mode because the standby MSFC !--- is running different version of IOS.

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 5

Current Software state = ACTIVE

Uptime in current state = 4 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 6

Current Software state = STANDBY COLD

Uptime in current state = 2 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-IPBASE_WAN-M),

Version 12.2(18)SXF4, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Mar-06 14:53 by tinhuang

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

!--- Note that the boot variable is blank. The MSFC boots the !--- first IOS image in the bootflash:

LAB-Router#

LAB-Router#exit

Access2> (enable)

2. Actualice el IOS en el MSFC en espera.

1. Copie la imagen del IOS a la MSFC en espera:

LAB-Router#copy c6msfc2a-adventerprisek9_wan-mz.122-18.SXF7.bin slavebootflash:/

Destination filename [c6msfc2a-adventerprisek9_wan-mz.122-18.SXF7.bin]?

Copy in progress...CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

17966324 bytes copied in 44.180 secs (406662 bytes/sec)

LAB-Router#

!--- Delete the old IOS image. Because the boot variable is blank !--- and the MSFC boots the first IOS image in the bootflash:

LAB-Router#cd slavebootflash:

LAB-Router#delete c6msfc2a-ipbase_wan-mz.122-18.SXF4.bin

Delete filename [c6msfc2a-ipbase_wan-mz.122-18.SXF4.bin]?

Delete slavebootflash:c6msfc2a-ipbase_wan-mz.122-18.SXF4.bin? [confirm]

LAB-Router#

2. Recargue el módulo supervisor en espera:

LAB-Router#exit

Access2> (enable) reset 6

This command will reset module 6.

Do you want to continue (y/n) [n]? y

2007 May 21 21:14:03 %SYS-5-MOD_RESET:Module 6 reset from Console//

Resetting module 6...

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: OFF(standby-supervisor-not-present)

Access2> (enable)

2007 May 21 21:16:01 %SYS-5-SUP_MODSBY:Module 6 is in standby

mode

2007 May 21 21:16:02 %SYS-5-SUP_IMGSYNC:File synchronization

process will start

in 120 seconds

2007 May 21 21:16:03 %DIAG-6-RUN_MINIMUM:Module 6: Running Minimal

Diagnostics..

.

2007 May 21 21:16:05 %DIAG-6-DIAG_OK:Module 6: Passed Online Diagnostics

2007 May 21 21:16:06 %SYS-3-TRANSCEIVER_NOTSUPP:

Transceiver on port 6/1 is not supported

2007 May 21 21:16:06 %SYS-3-TRANSCEIVER_NOTSUPP:

Transceiver on port 6/2 is not supported

2007 May 21 21:16:06 %SYS-5-PORT_SSUPOK:Ports on standby supervisor

(module 6) are up

2007 May 21 21:16:07 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in

sync for Module

6

2007 May 21 21:16:49 %SYS-1-SYS_LCPERR1:Module 16: RP requeste

d reset of peer RP: MSFC on module 16 will be reset

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: ON

Access2> (enable)

3. Verifique el IOS MSFC después de la actualización:

Access2> (enable) session 15

Trying Router-15...

Connected to Router-15.

Escape character is '^]'.

LAB-Router>enable

LAB-Router#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 17 minutes

Switchovers system experienced = 0

Standby failures = 1

Last switchover reason = unsupported

Hardware Mode = Duplex

Configured Redundancy Mode = Stateful SwitchOver - SSO

Operating Redundancy Mode = Stateful SwitchOver - SSO

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 5

Current Software state = ACTIVE

Uptime in current state = 17 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 6

Current Software state = STANDBY HOT

Uptime in current state = 0 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

LAB-Router#

Conmutación por fallas a Supervisor en Espera y Verificación

Ahora, puede conmutar por error el módulo supervisor por el módulo supervisor en espera recién agregado y probarlo.

1. Conmutar por error el módulo supervisor:

Access2> (enable) switch supervisor

This command will force a switch-over to the standby Supervisor module.

Do you want to continue (y/n) [n]? y

2007 May 21 20:40:37 %SYS-5-MOD_RESET:Module 5 reset from Console//

Access2> (enable)

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 262144 Kbytes of main memory

Autoboot executing command: "boot bootdisk:cat6000-sup32pfc3k8.8-5-8.bin"

Self decompressing the image : #################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

##################################################### [OK]

System Power On Diagnostics

DRAM Size ..........................256 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Firmware compiled 01-Dec-06 12:57 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor

2. Conéctese al Supervisor 6, que es ahora el módulo activo.

1. Estado de redundancia:

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: ON

Access2> (enable) show system redundancy-history

Maximum entries of switchover history table = 10

System cold start due to switchover failure = 4

Standby available time (secs*100)          = 98984

Redundant History Switchover Table:

Index: 1

Previous active supervisor module: 5

Current active supervisor module : 6

Switchover reason                : user initiated

Switchover time                  : Mon May 21 2007, 20:40:37

2. Mostrar versión:

Access2> (enable) show version

WS-C6509 Software, Version NmpSW: 8.5(8)

Copyright (c) 1995-2006 by Cisco Systems

NMP S/W compiled on Dec  1 2006, 23:03:43

System Bootstrap Version: 12.2

System Boot Image File is 'bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin'

System Configuration register is 0x2102

3. Variable de arranque:

Access2> (enable) show boot

BOOT variable = bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin,1;bootdisk:cat6000

-sup32pfc3k8.8-4-5.bin,1;

CONFIG_FILE variable = bootdisk:switch.cfg

Configuration register is 0x2102

ignore-config: disabled

auto-config: non-recurring, overwrite, sync disabled

ROMMON console baud: 9600

boot: image specified by the boot system commands

Image auto sync is enabled

Image auto sync timer is 120 seconds

4. Show module:

Access2> (enable) show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1          Unknown Card                                  power-down

2   2    48    10/100BaseTX Ethernet     WS-X6248-RJ-45      no  ok

3   3    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

4   4    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

5   5    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes standby

6   6    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes ok

16  6    1     Multilayer Switch Feature WS-F6K-MSFC2A       no  ok

7   7    5     Communication Media Mod.  WS-SVC-CMM          no  ok

8   8    0     FXS                                           no  power-down

9   9          Unknown Card                                  power-down

!--- Output suppressed

Mod Sub-Type                Sub-Model           Sub-Serial  Sub-Hw Sub-Sw

--- ----------------------- ------------------- ----------- ------ ------

3   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

4   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

5   L3 Switching Engine III WS-F6K-PFC3B        SAL1012GREU 2.1

6   L3 Switching Engine III WS-F6K-PFC3B        SAL1017L9WJ 2.1

Access2> (enable)

3. Verifique el MSFC:

Access2> (enable) session 16

Trying Router-16...

Connected to Router-16.

Escape character is '^]'.

LAB-Router>enable

LAB-Router#show version

Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

Image text-base: 0x40101040, data-base: 0x42638000

ROM: System Bootstrap, Version 12.2(17r)SX3, RELEASE SOFTWARE (fc1)

BOOTLDR: MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M), Version 12.2(18)SXF7,

RELEASE SOFTWARE (fc1)

LAB-Router uptime is 7 minutes

System returned to ROM by Stateful Switchover

System image file is "bootflash:c6msfc2a-adventerprisek9_wan-mz.122-18.SXF7.bin"

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

cisco MSFC2A (R7000) processor (revision MSFC2A) with 458752K/65536K bytes of me

mory.

Processor board ID MSFC2A

R7000 CPU at 300Mhz, Implementation 0x27, Rev 3.3, 256KB L2, 1024KB L3 Cache

Last reset from power-on

SuperLAT software (copyright 1990 by Meridian Technology Corp).

X.25 software, Version 3.0.0.

Bridging software.

TN3270 Emulation software.

29 Virtual Ethernet/IEEE 802.3 interfaces

509K bytes of non-volatile configuration memory.

65536K bytes of Flash internal SIMM (Sector size 512K).

Configuration register is 0x2102

Cambiar el nombre del Catalyst OS

Puede ver que el nombre de CatOS en el módulo supervisor reemplazado comienza con RTSYNC. Puede dejar el sistema para que se ejecute tal cual. También puede cambiar el nombre del archivo y conservarlo como un nombre estándar, como se muestra aquí:

Access2> (enable) rename RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin

cat6000-sup32pfc3k 8.8-5-8.bin

Access2> (enable) dir

2287   -rw-  10029260    May 21 2007 21:40:01 cat6000-sup32pfc3k8.8-5-8.bin

236900352 bytes available (19390464 bytes used)

Access2> (enable)

Después de cambiar el nombre del archivo, debe cambiar la variable de inicio.

!--- Verify boot variable

Access2> (enable) show boot

BOOT variable = bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin,1;bootdisk:cat6000

-sup32pfc3k8.8-4-5.bin,1;

CONFIG_FILE variable = bootdisk:switch.cfg

Configuration register is 0x2102

ignore-config: disabled

auto-config: non-recurring, overwrite, sync disabled

ROMMON console baud: 9600

boot: image specified by the boot system commands

Image auto sync is enabled

Image auto sync timer is 120 seconds

!--- Clear all the boot variables

Access2> (enable) clear boot system all

BOOT variable =

Access2> (enable) 2007 May 21 21:41:56 %SYS-5-SUP_IMGSYNC:File synchronization p

rocess will start in 120 seconds

!--- Configure the boot variable

Access2> (enable) set boot system flash bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

BOOT variable = bootdisk:cat6000-sup32pfc3k8.8-5-8.bin,1;

Access2> (enable) 2007 May 21 21:42:14 %SYS-5-SUP_IMGSYNC:File synchronization p

rocess will start in 120 seconds

!--- Verify the boot variable

Access2> (enable) show boot

BOOT variable = bootdisk:cat6000-sup32pfc3k8.8-5-8.bin,1;

CONFIG_FILE variable = bootdisk:switch.cfg

Configuration register is 0x2102

ignore-config: disabled

auto-config: non-recurring, overwrite, sync disabled

ROMMON console baud: 9600

boot: image specified by the boot system commands

Image auto sync is enabled

Image auto sync timer is 120 seconds

Información Relacionada

- Ejemplo de Configuración de Actualización de Imagen de Catalyst 6000/6500 Series Switches con Supervisor Engines Redundantes Software

- Switches Catalyst de Cisco serie 6500 - Documentos de soporte

- Páginas de Soporte de Productos de LAN

- Página de Soporte de LAN Switching

- Soporte Técnico y Documentación - Cisco Systems