Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Antecedentes

Visualización de registros

Solución

Información Relacionada

Introducción

Este documento describe cómo recopilar registros del controlador RAID UCSC-PSAS12GHBA?

Prerequisites

Requirements

No hay requisitos específicos para este documento.

Componentes Utilizados

- PID del controlador: UCSC-PSAS12GHBA

- Proveedor: PMC-Sierra (Microsemi)

- Controlador: aacraid

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Si tiene una red en vivo, asegúrese de entender el posible impacto de cualquier comando.

Antecedentes

UCSC-PSAS12GHBA (HBA Microsemi-PMC-Sierra) es el único controlador HBA no LSI utilizado en el servidor C240 M4; a diferencia de los controladores RAID LSI, el Deamon de Almacenamiento "almacenado" en CIMC no almacena los registros para esta tarjeta HBA.

Visualización de registros

Registros de ejemplo del servidor UCS: mensajes/

"Event log fetch is not valid for this controller type"

723: 6:2017 Dec 20 00:50:14 EST:BMC:storaged:1628: handy_utils.c:46:==>>>> ctlr 2 pd_list device_IDs: 0x0000000000000000 0x0000000000000000 0x0000000000000000 0x0000000000007f00

749: 6:2017 Dec 20 00:50:50 EST:BMC:storaged:1628: handy_utils.c:46:==>>>> ctlr 2 occupied slots according to pd_list: 0x0000000000000000 0x0000000000000000 0x0000000000000000 0x00000000000000fe

893: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:283:CMD: 'controller-type: ALL;controller: SLOT-HBA;log: ;command: get-newest-entries;starting-entry: 1;entry-count: 500 '

894: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:333:Accepted request 'controller-type: ALL;controller: SLOT-HBA;log: ;command: get-newest-entries;starting-entry: 1;entry-count: 500 '

895: 4:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:169:CMD: write-status: Event log fetch is not valid for this controller type

896: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:283:CMD: 'controller-type: RAID;controller: SLOT-HBA;operation: get-tty-log;mode: compressed '

897: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:333:Accepted request 'controller-type: RAID;controller: SLOT-HBA;operation: get-tty-log;mode: compressed '

898: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:283:CMD: 'controller-type: RAID;controller: SLOT-HBA;operation: get-phy-errors '

899: 5:2017 Dec 20 01:29:11 EST:BMC:storaged:1628: service.c:333:Accepted request 'controller-type: RAID;controller: SLOT-HBA;operation: get-phy-errors '

900: 4:2017 Dec 20 01:29:12 EST:BMC:storaged:1628: service.c:169:CMD: write-status: Invalid controller operation

Solución

Hay una herramienta CLI para este controlador HBA (al igual que storcli para controladores LSI),

Utilidad de línea de comandos Adaptec ARCCONF v2.01.2270

https://storage.microsemi.com/en-us/speed/raid/storage_manager/arcconf_v2_01_22270_zip.php

Guía del usuario:

http://download.adaptec.com/pdfs/user_guides/cli_arc_v2_01_22270_users_guide.pdf

Información Relacionada

Para obtener los detalles del controlador para este controlador:

Linux:

$ modinfo aacraid

filename:       /lib/modules/2.6.32-696.6.3.el6.x86_64/kernel/drivers/scsi/aacraid/aacraid.ko

version:        1.2-0[30300]-ms

license:        GPL

description:    Dell PERC2, 2/Si, 3/Si, 3/Di, Adaptec Advanced Raid Products, HP NetRAID-4M, IBM ServeRAID & ICP SCSI driver

author:         Red Hat Inc and Adaptec

VMWare:

vmkload_mod -s aacraid | grep Version